International Journal of Breast Cancer
Volume 2015 (2015), Article ID 287398, 6 pages
http://dx.doi.org/10.1155/2015/287398

Clinical Study

Evaluation of the Quilting Technique for Reduction of Postmastectomy Seroma: A Randomized Controlled Study

Ashraf Khater,¹ Waleed Elnahas,¹ Sameh Roshdy,¹ Omar Farouk,¹ Ahmed Senbel,¹ Adel Fathi,¹ EmadEldeen Hamed,¹ Mohamed Abdelkhalek,¹ and Hosam Ghazy²

¹Department of Surgical Oncology, Mansoura Oncology Center (OCMU), Faculty of Medicine, Mansoura University, Dakahlia, Egypt
²General Surgery Department, Mansoura University Hospital, Mansoura University, Dakahlia, Egypt

Received 26 February 2015; Revised 9 June 2015; Accepted 17 June 2015

Academic Editor: Ian S. Fentiman

Copyright © 2015 Ashraf Khater et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Postmastectomy seroma causes patients’ discomfort, delays starting the adjuvant therapy, and may increase the possibility of surgical site infection. Objective. To evaluate quilting of the mastectomy flaps with obliteration of the axillary space in reducing postmastectomy seroma. Methods. A randomized controlled study was carried out among 120 females who were candidates for mastectomy and axillary clearance. The intervention group () with quilting and the control group without quilting. All patients were followed up routinely for immediate and late complications. Results. There were no significant differences between the two groups as regards the demographic characteristics, postoperative pathological finding, and the immediate postoperative complications. The incidence of seroma was significantly lower in the intervention group compared with the control group (20% versus 78.3%, ). Additionally, the intervention group had a shorter duration till seroma resolution (9 days versus 11 days, ) and a smaller volume of drainage (710 mL versus 1160 mL, ) compared with the control group. Conclusion. The use of mastectomy with quilting of flaps and obliteration of the axillary space is an efficient method to significantly reduce the postoperative seroma in addition to significantly reducing the duration and volume of wound drainage. Therefore we recommend quilting of flaps as a routine step at the end of any mastectomy.

1. Introduction

Seroma is one of the most bothersome events that disturbs both the patient and surgeon with multiple visits that delay starting the adjuvant therapy and cause great patients’ discomfort with a possibility of increased surgical site infection [1–3]. Postmastectomy seroma can be defined as a collection of serous fluid just under the skin flaps or in the axillary pace immediately following mastectomy with axillary dissection that can be detected either clinically or sonographically [4, 5]. Seroma is graded 1 if asymptomatic (only diagnosed by ultrasound), graded 2 if symptomatic but can be managed either medically or by simple aspiration, and graded 3 if symptomatic and requires surgical or radiologic intervention [1]. The incidence of seroma following mastectomy and axillary clearance varies in reports from 25% to 60% [6], with even higher incidences being reported [1]. Despite the extensive investigation [7–15], the exact pathogenesis of postmastectomy seroma is still not fully understood. However a significant correlation was discovered with the volume of drainage in the first three postoperative days [8, 16], especially when exceeding 500 mL [17]. In a controlled randomized study that was carried out by Lumachi et al. in 2004, the total amount of drainage was independently correlated with seroma formation [18]. In this important study the use of the ultrasonic dissector significantly reduced seroma formation [18]. On the other hand, in another important controlled randomized study that was done by Porter et al. in 1998, the use of electrocautery was significantly associated with increased seroma formation when compared with flap elevation and dissection of the fascia by the scalpel [19]. Other implicated factors have been described in the evidence based search by Kuroi et al. and a systematic review by van Bemmel et al. [15, 20]. The first research group to report the concept of flap fixation to significantly reduce the development of seroma was Chilson et al. in 1992 [13]. Table 1 shows summary of studies that utilized this technique with a significant reduction in the incidence of seroma [3, 5, 13, 21–23].

Table 1: Studies that investigated closure of the dead space after mastectomy.

Study/year
Type of trial
Number
Intervention
Result

Chilson et al. 1992 [13]
Retrospective
Level 3
351
MRM with or without suture flap fixation
Suture flap fixation Sig. ↓ seroma

Coveney et al. 1993 [21]
RCT
Level 2
39
Suture flap fixation versus conventional skin closure
25% incidence of seroma versus 85% ()

Purushotham et al. 2002 [22]
RCT
Level 2
375
Mastectomy, BCS
No drainage with suture flap fixation versus drainage without suture flap fixation
61% versus 55% (NS) in MRM, 47% versus 51% (NS) in BCS

Schuijtvlot et al. 2002 [23]
Prospective
Level 2
97
BCS without drainage
suture flap fixation (buttress suture) without drainage versus conventional surgery
Suture flap fixation Sig. ↓ seroma

Sakkary 2012 [5]
Prospective
40
MRM with or without suture flap fixation
Suture flap fixation Sig. ↓ seroma

Ten Wolde et al. 2014 [3]
Retrospective
176
MRM with or without suture flap fixation
Suture flap fixation Sig. ↓ seroma

The aim of the current study was to evaluate the efficacy of mastectomy with quilting of flaps and obliteration of the axillary space in reducing postmastectomy seroma.

2. Patients and Methods

2.1. Patients

A planned number of 120 operable female patients who were candidates for total mastectomy and axillary clearance were enrolled in this study. Patients with inoperable disease, those who received prior chemotherapy or breast irradiation, those with prior breast surgery, those with morbid obesity, those with collagen disease, those with poorly controlled diabetes, and those with history of long term use of steroids were excluded from this study.

2.2. Design

A randomized controlled study was carried out in the period from February 2012 to September 2014. Written consent was obtained from all patients prior to enrollment. After obtaining all required ethical approvals from ethical committees at the Mansoura University Hospital and Mansoura Oncology center (OCMU), patients were randomized into equal two groups using a computer generated random number. In the first (intervention) group (), mastectomy was done using the scalpel with cautery of the bleeding points only with quilting suture of both the upper and lower flaps to the underlying pectoral fascia together with obliteration of the axillary space as well while, in the second (control) group (), mastectomy was done in the same way without quilting.

2.3. Intervention

Using Vicryl 2/0 suture, we started the quilting technique in the upper flap from medial to lateral by a continuous suture that fixes the undersurface of the upper flap to the pectoral fascia with care to avoid entangling the dermis which results in unsightly dimpling. The second row was done by the same continuous suture from lateral to medial till the medial angle. The same was done for the lower flap. Lastly the axilla was obliterated by suturing its lateral wall to the fascia of the serratus anterior and medial axillary wall (Figure 1). An 18 French tube drain was inserted in the axilla in all cases of the study.

(a)

(b)

(c)

Figure 1: Quilting of the upper flap (a), the lower flap (b), and the axilla (c).

2.4. Patients Follow-Up

All patients were followed up routinely for immediate and late complications including hemorrhage, flap necrosis, and wound sepsis. Patients were typically discharged at the second postoperative day with instructions for home drain care, assisted by regular visits for recording of the total drainage volume before drain removal, the amount of drainage fluid in the first 3 days, the amount of drainage in the last 3 days before removal, and the duration till drain removal (drain was removed when the 24-hour effluent was less than 50 mL). Seroma was recorded when detected either clinically or sonographically (on routine postoperative ultrasound evaluation). If seroma was diagnosed, we recorded the number of aspirations till resolution, the total aspirated volume, and the number of days before complete resolution. The patients’ pathological data was also recorded.

2.5. Statistical Analysis

Data were presented as frequencies and percentages for categorical data and mean, standard deviation (SD), and range for continuous data. The association between categorical variables was examined using Chi Square Test . The difference in mean values of continuous data was examined using independent-samples -test. All values were two-tailed. value <0.05 was considered as significant. SPSS software (release 15.0, SPSS Inc., Chicago, US) was used for statistical analyses.

3. Results

The mean age of the quilting (study) group was years (range 38–65), while in the control group it was with (range 37–66), with a nonsignificant difference ( value  =  0.14). Similarly, no significant differences were detected between the two study groups as regards the baseline body mass index, tumor size, pathologic type, and pathologic grade (Table 2).

Table 2: Demographic and clinical data of the two study groups.

Intervention group
Control group
Statistics
P value

( = 60)
( = 60)

Age (years)
46 ± 7
44 ± 8
1.5
0.14

[38–65]
[37–66]

BMI
30.5 ± 1.8
30.9 ± 1.5
1.3
0.19

[29–35]
[27–34]

Tumor size (mm)
35 ± 6
34 ± 7
0.8
0.4

[24–65]
[25–66]

Pathologic Type
46 (76.7%)
47 (78.3%)
0.0
1.00

(Ductal versus others)

Grade (Grade 1 versus 2 and 3)
8 (13.3%)
11 (18.3%)
0.25
0.62

Data were presented as mean ± SD [range] for continuous data and number (%) for categorical data.

-test for continuous data and Chi square for categorical data.

The operative outcome among the two study groups is shown in (Table 3). The operative time was prolonged in the quilting group by around 20 minutes (). The number of positive lymph nodes was nearly similar in both groups. The duration before drain removal was shorter in the intervention group (9 days, range 7–20) than the control group (11 days, range 9–18), and the difference was highly significant (). Similarly, compared to the control group, the intervention groups had smaller total drainage volume (710 mL versus 1160 mL, ), smaller amount of effluent in the first three days (230 mL versus 425 mL, ), and smaller output in the last three days (180 mL versus 231 mL, ). Additionally, the average number of aspirations till disappearance of the seroma and the average number of days till seroma disappearance were smaller in the intervention group compared with the control groups (2.1 versus 4.7 aspirations and 2.3 versus 10 days, resp., for each).

Table 3: Operative data and outcome among the two study groups.

Intervention group
( = 60) 
mean ± SD 
Range
Control group 
( = 60) 
Mean ± SD 
Range
Statistics
value

Operative time in minutes
127 (10.5) 
90–160
105 (7.5) 
80–139
9
<0.001

The total number of lymph nodes
19 ± 3 
13–24
18 ± 3 
12–23
1.8
0.07

The number of positive lymph nodes
3.3 ± 1.5 
0–9
3.6 ± 1.6 
0–10
1.1
0.30

Duration before drain removal (days)
9 ± 3 
7–20
11 ± 3 
9–18
3.7
<0.001

Total drainage volume (mL)
710 ± 290 
300–1500
1160 ± 420 
500–2000
6.8
<0.001

Volume in the first 3 days (mL)
230 ± 112 
120–550
425 ± 143 
130–650
8.3
<0.001

Volume in the last 3 days (mL)
180 ± 88 
130–350
231 ± 134 
150–450
2.5
0.02

Seroma
12 (20%)
47 (78.3%)
38.5
<0.001

Days till seroma disappearance
2.3 ± 4.9 
0–12
10 ± 4.2 
0–12
9.2
<0.001

Numbers of aspirations
2.1 ± 0.6 
2–4
4.7 ± 2.1 
3–7
9.22
<0.001

Total volume of aspirations (mL)
45 ± 15 
0–250
189 ± 60 
0–380
18
<0.001

Postoperative hematoma
18 (30%)
16 (26.7%)
0.04
0.80

Flap necrosis
5 (8.3%)
6 (10%)
0.0
1.00

Data were presented as mean ± SD range for continuous data and number (%) for categorical data.

-test for continuous data and Chi square for categorical data.

There were no significant differences between the two groups as regards the postoperative hematoma and flap necrosis (Table 3). The incidence of seroma in the intervention group was 20% (12/60 patients) compared to 78.3% (47/60 patients) in the control group, and the difference was highly significant ().

4. Discussion

We are reporting the efficacy of the use of mastectomy with quilting of flaps and obliteration of the axillary space in reducing the postmastectomy seroma using a randomized design. Several trials used adhesive glues and sclerosant agents to reduce the postmastectomy seroma. However, a recent meta-analysis showed that such preventive techniques are still not convincing [20]. As electrocautery was associated with a higher incidence of seroma formation, there was a trend towards the use of scalpel mastectomy [19] or harmonic shear [24].

The concept of suturing the skin flaps to the underlying muscle and obliteration of the axillary space is not new. Actually, closure of the dead space especially in the axilla was recommended by van Bemmel et al. [20]. Table 1 shows most of the trials that used fixation of the skin flaps to the underlying muscles and fascia. However most of these studies were nonrandomized [13, 21–23]. In our study the incidence of seroma in the quilting group was 20% versus 78.6% in the control group (Table 3). This was in line with that described by Coveney EC and his coworkers in 1993 who described an incidence of 25% in the suture group versus 85% in the control group [21]. A similar figure was reported by Sakkary MA in 2012 in a small study (20 patients per each arm) with an overall incidence of 20% in the intervention group versus 50% in the control group () [5]. In a more recent study by Ten Wolde and his coworkers in 2014, there was a decrease of seroma from 80.5% in the control group to 22.5% in the quilting group () [3].

The quilting maneuver in the current study had significantly decreased the total drainage volume (from a mean of 1160 to a mean of 710) (Table 3). Similar results were reported by Sakkary with a mean decrease from 2017.8 mL in the control group to 524.8 in the intervention group () [5]. Additionally, the quilting in the current study significantly reduced the mean duration of drainage from 11 days in the control group to 9 in the intervention group (). A similarly significant finding was described by Sakkary (from 13.4 to 5, ). The quilting in the current study was found to significantly decrease the mean days to seroma disappearance, the total aspirated volume, and the number of aspirations (Table 3). This was similar to that reported by Ten Wolde and his coworkers, which is a decrease of mean number of aspirations from 4.86 to 2.40 () and the volume of aspirations from 1660 mL to 611 mL (). There was a significant correlation between the extent of mastectomy and seroma formation being more significant with modified radical mastectomy than with breast conserving surgery [10, 11]. It was not a surprise to find that this maneuver prolongs the operative time significantly (Table 3) and we consider this the expense for reduction of postmastectomy seroma and all its sequels. Similar to our findings, neither the number of dissected axillary lymph nodes nor the extent of dissection influenced seroma formation significantly [12, 13]. However Purushotham et al. demonstrated in a controlled randomized study that the incidence of seroma was significantly lower with sentinel lymph node (SLNB) axillary approach than with conventional axillary dissection [14]. Neither the number of drains nor the nature of the drain (suction or passive) significantly influenced the seroma formation [15].

5. Conclusion

The use of mastectomy with quilting of flaps and obliteration of the axillary space is an efficient method to significantly reduce the postoperative seroma in addition to significantly reducing the duration and volume of wound drainage. Therefore we recommend quilting of flaps as a routine step at the end of any mastectomy.

Conflict of Interests

The authors report no proprietary or commercial interest in any product mentioned or concept discussed in this paper.

Acknowledgments

The authors are thankful for Professor Dr. Mohamed Awad Ibrahem, Professor Dr. Aiman El-Saed, and Dr. Amr Hassan for their valuable assistance and guidance throughout this work.

References

K. Kuroi, K. Shimozuma, T. Taguchi et al., “Pathophysiology of seroma in breast cancer,” Breast Cancer, vol. 12, no. 4, pp. 288–293, 2005.

D. R. Aitken and J. P. Minton, “Complications associated with mastectomy,” Surgical Clinics of North America, vol. 63, no. 6, pp. 1331–1352, 1983.

B. Ten Wolde, F. J. H. van den Wildenberg, M. E. Keemers-Gels, F. Polat, and L. J. A. Strobbe, “Quilting prevents seroma formation following breast cancer surgery: closing the dead space by quilting prevents seroma following axillary lymph node dissection and mastectomy,” Annals of Surgical Oncology, vol. 21, no. 3, pp. 802–807, 2014.

C. J. Pogson, A. Adwani, and S. R. Ebbs, “Seroma following breast cancer surgery,” European Journal of Surgical Oncology, vol. 29, no. 9, pp. 711–717, 2003.

M. A. Sakkary, “The value of mastectomy flap fixation in reducing fluid drainage and seroma formation in breast cancer patients,” World Journal of Surgical Oncology, vol. 10, article 8, 2012.

N. Chand, A. M. Aertssen, and G. T. Royle, “Axillary ‘Exclusion’—a successful technique for reducing seroma formation after mastectomy and axillary dissection,” Advances in Breast Cancer Research, vol. 2, no. 1, pp. 1–6, 2013.

S. Sampathraju and G. Rodrigues, “Seroma formation after mastectomy: pathogenesis and prevention,” Indian Journal of Surgical Oncology, vol. 1, no. 4, pp. 328–333, 2010.

W. E. Burak Jr., P. S. Goodman, D. C. Young, and W. B. Farrar, “Seroma formation following axillary dissection for breast cancer: risk factors and lack of influence of bovine thrombin,” Journal of Surgical Oncology, vol. 64, no. 1, pp. 27–31, 1997.

S. Kumar, B. Lal, and M. C. Misra, “Post-mastectomy seroma: a new look into the aetiology of an old problem,” Journal of the Royal College of Surgeons of Edinburgh, vol. 40, no. 5, pp. 292–294, 1995.

E. A. Gonzalez, E. C. Saltzstein, C. S. Riedner, and B. K. Nelson, “Seroma formation following breast cancer surgery,” Breast Journal, vol. 9, no. 5, pp. 385–388, 2003.

E. Hashemi, A. Kaviani, M. Najafi, M. Ebrahimi, H. Hooshmand, and A. Montazeri, “Seroma formation after surgery for breast cancer,” World Journal of Surgical Oncology, vol. 2, article 44, 2004.

M. Medl, K. Mayerhofer, C. Peters-Engl et al., “The application of fibrin glue after axillary lymphadenectomy in the surgical treatment of human breast cancer,” Anticancer Research, vol. 15, no. 6, pp. 2843–2845, 1995.

T. R. Chilson, F. D. Chan, R. R. Lonser, T. M. Wu, and D. R. Aitken, “Seroma prevention after modified radical mastectomy,” American Surgeon, vol. 58, no. 12, pp. 750–754, 1992.

A. D. Purushotham, S. Upponi, M. B. Klevesath et al., “Morbidity after sentinel lymph node biopsy in primary breast cancer: results from a randomized controlled trial,” Journal of Clinical Oncology, vol. 23, no. 19, pp. 4312–4321, 2005.

K. Kuroi, K. Shimozuma, T. Taguchi et al., “Evidence-based risk factors for seroma formation in breast surgery,” Japanese Journal of Clinical Oncology, vol. 36, no. 4, pp. 197–206, 2006.

D. Kopelman, O. Klemm, H. Bahous, R. Klein, M. Krausz, and M. Hashmonai, “Postoperative suction drainage of the axilla: for how long? Prospective randomised trial,” European Journal of Surgery, vol. 165, no. 2, pp. 117–122, 1999.

W. Loo and L. Chow, “Factors predicting seroma formation after mastectomy for Chinese breast cancer patients,” Indian Journal of Cancer, vol. 44, no. 3, pp. 99–103, 2007.

F. Lumachi, A. A. Brandes, P. Burelli, S. M. M. Basso, M. Iacobone, and M. Ermani, “Seroma prevention following axillary dissection in patients with breast cancer by using ultrasound scissors: a prospective clinical study,” European Journal of Surgical Oncology, vol. 30, no. 5, pp. 526–530, 2004.

K. A. Porter, S. O'Connor, E. Rimm, and M. Lopez, “Electrocautery as a factor in seroma formation following mastectomy,” The American Journal of Surgery, vol. 176, no. 1, pp. 8–11, 1998.

A. J. M. van Bemmel, C. J. H. van de Velde, R. F. Schmitz, and G. J. Liefers, “Prevention of seroma formation after axillary dissection in breast cancer: a systematic review,” European Journal of Surgical Oncology, vol. 37, no. 10, pp. 829–835, 2011.

E. C. Coveney, P. J. O'Dwyer, J. G. Geraghty, and N. J. O'Higgins, “Effect of closing dead space on seroma formation after mastectomy—a prospective randomized clinical trial,” European Journal of Surgical Oncology, vol. 19, no. 2, pp. 143–146, 1993.

A. D. Purushotham, E. McLatchie, D. Young et al., “Randomized clinical trial of no wound drains and early discharge in the treatment of women with breast cancer,” British Journal of Surgery, vol. 89, no. 3, pp. 286–292, 2002.

M. Schuijtvlot, A. K. Sahu, and S. J. Cawthorn, “A prospective audit of the use of a buttress suture to reduce seroma formation following axillary node dissection without drains,” Breast, vol. 11, no. 1, pp. 94–96, 2002.

M. Kontos, A. Kothari, and H. Hamed, “Effect of harmonic scalpel on seroma formation following surgery for breast cancer: a prospective randomized study,” Journal of the Balkan Union of Oncology, vol. 13, pp. 223–230, 2008.