International Journal of Chemical Engineering
Volume 2017 (2017), Article ID 1920805, 1 page
https://doi.org/10.1155/2017/1920805

Retraction

Retracted: Oxygen Mass Transfer in an Aerated Stirred Tank with Double Impellers: A Generalized Correlation Including Spacing Impact

International Journal of Chemical Engineering

Received 9 April 2017; Accepted 9 April 2017; Published 11 May 2017

Copyright © 2017 International Journal of Chemical Engineering. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

At the request of the author, the article titled “Oxygen Mass Transfer in an Aerated Stirred Tank with Double Impellers: A Generalized Correlation Including Spacing Impact” [1] has been retracted. The data presented in the article were published without the permission of the University of Toulouse.

References

H. M. Issa, “Oxygen Mass Transfer in an Aerated Stirred Tank with Double Impellers: A Generalized Correlation Including Spacing Impact,” International Journal of Chemical Engineering, vol. 2016, Article ID 7386453, 2016.