International Journal of Chemical Engineering
Volume 2019 (2019), Article ID 5634678, 1 page
https://doi.org/10.1155/2019/5634678

Corrigendum

Corrigendum to “VLE of Carbon Dioxide-Loaded Aqueous Potassium Salt of L-Histidine Solutions as a Green Solvent for Carbon Dioxide Capture: Experimental Data and Modelling”

Afaf Syalsabila,1,2 Abdulhalim Shah Maulud,² Humbul Suleman,³ and Nik Abdul Hadi Md Nordin²

¹CO2 Research Centre, Universiti Teknologi PETRONAS, Bandar Seri Iskandar, 32610 Perak, Malaysia
²Department of Chemical Engineering, Universiti Teknologi PETRONAS, Bandar Seri Iskandar, 32610 Perak, Malaysia
³Centre for Energy Resources Engineering, Department of Chemical and Biochemical Engineering, Technical University of Denmark, 2800 Kgs. Lyngby, Denmark

Correspondence should be addressed to Abdulhalim Shah Maulud; halims@utp.edu.my

Received 16 June 2019; Accepted 18 June 2019; Published 21 July 2019

Copyright © 2019 Afaf Syalsabila et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “VLE of Carbon Dioxide-Loaded Aqueous Potassium Salt of L-Histidine Solutions as a Green Solvent for Carbon Dioxide Capture: Experimental Data and Modelling” [1], the second author was mistakenly linked to the third affiliation. The corrected authors’ list and affiliations are shown above.

References

A. Syalsabila, A. S. Maulud, H. Suleman, and N. A. H. Md Nordin, “VLE of carbon dioxide-loaded aqueous potassium salt of L-histidine solutions as a green solvent for carbon dioxide capture: experimental data and modelling,” International Journal of Chemical Engineering, vol. 2019, Article ID 9428638, 11 pages, 2019.