International Journal of Dentistry
Volume 2020 (2020), Article ID 2761094, 1 page
https://doi.org/10.1155/2020/2761094

Corrigendum

Corrigendum to “Effect of Incisal Porcelain Veneering Thickness on the Fracture Resistance of CAD/CAM Zirconia All-Ceramic Anterior Crowns”

Noha Badran,¹ Sanaa Abdel Kader,² Fayza Alabbassy,³ and Amir Azer¹

¹Conservative Dentistry Department, Fixed Prosthodontic Division, Faculty of Dentistry, Alexandria University, Alexandria City, Egypt
²Conservative Dentistry Department, Faculty of Dentistry, Alexandria University, Alexandria City, Egypt
³Dental Biomaterials Department, Faculty of Dentistry, Alexandria University, Alexandria City, Egypt

Correspondence should be addressed to Noha Badran; nohahelmybadran@gmail.com

Received 17 April 2020; Accepted 28 May 2020; Published 15 July 2020

Copyright © 2020 Noha Badran et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Effect of Incisal Porcelain Veneering Thickness on the Fracture Resistance of CAD/CAM Zirconia All-Ceramic Anterior Crowns” [1], Dr. Amir Azer was missing from the authors’ list. Dr. Azer edited and commented on the manuscript and approved the final version. He was a main supervisor on the Master’s thesis from which this work derived and he contributed to the study planning through his static loading device, which was used in the cementation procedure of the specimens. The corrected authors’ list is shown above.

References

N. Badran, S. Abdel Kader, and F. Alabbassy, “Effect of incisal porcelain veneering thickness on the fracture resistance of CAD/CAM zirconia all-ceramic anterior crowns,” International Journal of Dentistry, vol. 2019, Article ID 6548519, 12 pages, 2019.