International Journal of ElectrochemistryVolume 2012 (2012), Article ID 943957, 6 pagesdoi:10.1155/2012/943957

Research Article

Sensitive Electrochemical Detection of Glucose at Glucose Oxidase-Cobalt Phthalocyanine-Modified Boron-Doped Diamond Electrode

Takeshi Kondo,1,2 Masaru Horitani,¹ and Makoto Yuasa1,2

¹Department of Pure and Applied Chemistry, Faculty of Science and Technology, Tokyo University of Science, 2641 Yamazaki, Noda 278-8510, Japan²Reaserach Institute for Science and Technology, Tokyo University of Science, 2641 Yamazaki, Noda 278-8510, Japan

Received 7 May 2011; Revised 28 July 2011; Accepted 1 August 2011

Academic Editor: Giancarlo R. Salazar-Banda

Copyright © 2012 Takeshi Kondo et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Electrochemical detection of glucose was achieved at a glucose oxidase (GOx)-cobalt phthalocyanine (CoPc)-modified boron-doped diamond (BDD) electrode without any additional electron mediator in the electrolyte solution. The surface of the hydrogen-terminated BDD thin film prepared by microwave plasma-assisted CVD was modified with 4-vinylpyridine (4VP) via photochemical modification. The 4VP-BDD was then immersed in a CoPc solution to obtain CoPc-BDD. A poly(p-phenylenediamine) (PPD) thin film containing GOx was coated on the CoPc-BDD electrode surface via electropolymerization. At the GOx/PPD-CoPc-BDD electrode, anodic current for glucose oxidation was observed with a sigmoidal voltammetric curve, indicating successful electron mediation of H₂O₂ generated as the result of glucose oxidation at GOx. The signal-to-background ratio for voltammetric current of glucose detection was larger at the GOx/PPD-CoPc-BDD electrode than at the GOx/PPD-modified platinum electrode due to the smaller background current of the modified BDD electrode.

1. Introduction

Highly boron-doped diamond (BDD) electrodes have been known to be a promising electrode material for sensitive electroanalysis based on the wide potential window and low background current as well as physical and chemical stability and biocompatibility [1]. Glucose is a compound, whose concentration is one of the most desired to be determined via electrochemical methods in relation to increasing demands for diabetes care [2]. In order to use BDD electrode for glucose detection, one should modify the surface with catalysts or enzymes due to the large overpotential for direct glucose oxidation at unmodified BDD electrodes. For glucose detection at BDD electrodes using electrocatalysts, Cu [3–5] and Ni [6–9] have been used for modification of the surfaces. Immobilization of particles or line patterns of these metals with micrometer or nanometer scale onto BDD surface enables sensitive glucose detection with low background current. On the other hand, BDD electrodes modified with glucose oxidase (GOx) [10–13] are advantageous because of their selectivity and sensitivity of the glucose molecule. In some cases, additional mediators, such as ferrocene carboxylic acid [11], were employed for glucose detection at GOx-modified BDD electrodes. Glucose detection without any additional reagents to samples is possible for simple analysis systems, and especially for monitoring concentration. Hydrogen peroxide is a product of glucose oxidation at GOx and thus can act as an electroactive mediator for electrochemical detection of glucose. We have reported that sensitive electrochemical detection of hydrogen peroxide can be achieved at BDD electrodes modified with cobalt(II) phthalocyanine (CoPc) [14]. The limit of detection of hydrogen peroxide at CoPc-BDD electrode using a flow-injection system was found to be in the range of 1–10 nM and that was rather low comparing to Pt-modified BDD electrodes (30 nM) [15]. Thus the use of CoPc-BDD should be effective for fabrication of a GOx-modified BDD electrodes for sensitive glucose detection. In the present study, we prepared a GOx containing poly(p-phenylenediamine) (PPD) film on a CoPc-BDD electrode surface to fabricate an electrode material for reagentless sensitive glucose detection (Scheme 1). The signal-to-background ratio of glucose was found to be larger at GOx/PPD-CoPc-BDD electrode than at GOx/PPD-Pt electrode.

Scheme 1: Fabrication of GOx/PPD-CoPc-BDD electrode.

2. Experimental

BDD electrodes were prepared by microwave plasma-assisted chemical vapor deposition (MPCVD). The deposition condition was identical to what can be found in our previous report [16]. A conductive polycrystalline BDD thin film with a grain size of 1–5 μm was first grown on a conductive silicon wafer substrate. Surface modification of BDD with CoPc was carried out with a procedure described in the previous report [14]. A hydrogen-terminated BDD (H-BDD) sample was immersed in a 100 mM 4-vinylpyridine (4VP)/acetonitrile solution. The sample surface was then irradiated with UV light (254 nm) from a low pressure mercury lamp (SUV-40, Sen Lights Corp.) in Ar atmosphere through a quartz window for 3 h. The 4VP-modified BDD sample was then immersed in a 0.1 mM CoPc/chloroform solution for one day to obtain CoPc-BDD. Surface modification with 4VP and CoPc was confirmed with X-ray photoelectron spectroscopy (XPS) with a XP spectrometer (AXIS-NOVA, Kratos). GOx/PPD film was prepared using an electropolymerization method. Potential cycling, repeated 10 times, between 0 to +0.6 V versus Ag/AgCl was performed in 0.1 M phosphate buffer solution (PBS, pH 7) containing 0.15 mM p-phenylenediamine, 0.15 mM resorcinol, and 500 U/mL glucose oxidase (Type VII, from aspergillus niger, Sigma-Aldrich) at a CoPc-BDD electrode at a potential sweep rate of 20 mVs⁻¹. For all electrochemical experiments, an Ag/AgCl electrode with saturated KCl and a platinum spiral wire were used for a reference and a counter electrode, respectively, connecting to a digital potentiostat (HZ-5000, Hokuto Denko).

3. Results and Discussion

3.1. Preparation of CoPc-BDD Electrode

Surface modification of BDD with 4VP was confirmed with XPS. After surface modification with 4VP, an N 1s peak was shown in the XP spectra at 397 eV (Figure 1(b)), which was absent in the spectrum of H-BDD (Figure 1(a)). This should be based on the pyridine moiety on the 4VP-BDD surface. The N/C atomic concentration ratio determined from XPS quantitative analysis was found to saturate with between 2 and 3 h UV irradiation. Thus, we decided the UV irradiation time for the 4VP modification to be 3 h. Immobilization of CoPc on 4VP-BDD surface was also confirmed with Co 2p3/2 and (781 eV) Co 2p1/2 (797 eV) peaks (Figure 1(c)). The Co/C atomic concentration ratio saturated within 24 h of immersion of a 4VP-BDD in a CoPc solution. Figure 2 shows cyclic voltammograms (CVs) in 0.1 M phosphate buffer solution (PBS, pH 7) at modified BDD electrodes. Although no redox peak was found in the CVs at H- and 4VP-BDD electrode, an anodic and a cathodic peak was found at the CoPc-BDD electrode. This result indicates that the immobilized CoPc was redox-active on the modified electrode [14]. Figure 3 shows CVs at CoPc-BDD electrode in 0.1 M PBS containing various concentrations of H₂O₂. At unmodified (H-terminated) BDD surface, no increase of the faradaic current for H₂O₂ was found. This is due to a large overpotential of the electrode reaction of H₂O₂ at the unmodified BDD electrode. On the other hand, the CV at CoPc-BDD showed an anodic and cathodic faradaic current depending on H₂O₂ concentration, based on the electrocatalytic activity of CoPc to the electrode reaction of H₂O₂ [17].

(a) H-BDD

(b) 4VP-BDD

(c) CoPc-BDD

(d) CoPc-BDD (Co 2p)

Figure 1: XPS of (a) H-, (b) 4VP-, and (c) CoPc-BDD surfaces. (d) Co 2p spectrum of CoPc-BDD surface.

Figure 2: CVs in 0.1 M PBS at (a) H-, (b) 4VP-, and (c) CoPc-BDD electrodes. Potential sweep rate was 100 mVs⁻¹.

Figure 3: CVs in 0.1 M PBS containing 0, 1, 10, and 100 mM H₂O₂ at CoPc-BDD electrode. Potential sweep rate was 100 mVs⁻¹.

3.2. Preparation of GOx/PPD-CoPc-BDD Electrode

In order to immobilize GOx onto the electrode surface, GOx/PPD film was formed via electropolymerization method. Figure 4 shows ten successive CVs for the electropolymerization in 0.1 M PBS containing 0.15 mM p-phenylenediamine, 0.15 mM resorcinol and 500 U/mL GOx at CoPc-BDD electrode. The decrease in the anodic current is typical of electropolymerization of similar polymer films and is based on the insulating properties of the film formed at the interface [18]. Figure 5 shows scanning electron microscopy (SEM) images of a BDD and a GOx/PPD-CoPc-BDD electrode surfaces. PPD is known to be a stiff polymer with a ladderlike network structure [19], and it should be responsible for the linear texture of the film observed with SEM. In addition, the PPD film formed with electropolymerization method is known to be a permselective membrane for H₂O₂ [19] and can suppress electrode reaction of electroactive interferences such as ascorbic acid and dopamine [14]. Thus, the use of PPD matrices should be advantageous for selective detection of glucose.

Figure 4: CVs in 0.1 M PBS containing 0.15 mM p-phenylenediamine, 0.15 mM resorcinol and 500 U/mL GOx at CoPc-BDD electrode for electropolymerization of a GOx/PPD film. Ten successive cycles are indicated. Potential sweep rate was 20 mVs⁻¹.

(a)

(b)

Figure 5: SEM image of (a) unmodified BDD and (b) GOx/PPD-CoPc-BDD surface.

3.3. Glucose Detection

Figure 6(a) shows a CV in 0.1 M PBS containing 5 mM glucose at a GOx/PPD-CoPc-BDD electrode. In the absence of glucose, almost no current was observed. However, in the presence of glucose, anodic current began to flow at +0.15 V versus Ag/AgCl and was almost constant at +0.3 V versus Ag/AgCl or more positive potentials. This sigmoidal curve is typical of enzyme electrode reactions [11], indicating successful electron transfer from glucose to the BDD electrode. In the case of an electrode with a GOx/PPD film formed on the H-BDD surface (GOx/PPD-H-BDD), no current response was observed in the presence of glucose in the electrolyte solution (Figure 6(b)). These results indicate that the current response observed for GOx/PPD-CoPc-BDD was not with direct electron transfer from glucose or GOx and should be based on the mediation of H₂O₂ electrooxidation catalyzed by the CoPc on the BDD surface. Thus, it was shown that electrocatalysts, such as CoPc, are essential for the current response of BDD-based enzyme electrodes using oxidases that can generate H₂O₂. Similar to the case of GOx/PPD-CoPc-BDD electrode, a sigmoid-shaped voltammetric curve was shown at a Pt electrode covered with a GOx/PPD film via electropolymerization (GOx/PPD-Pt, Figure 6(c)). This result was not surprising because H₂O₂ can be oxidized on a Pt electrode at low potentials without the use of any additional catalyst. The signal current at +0.5 V versus Ag/AgCl was larger at GOx/PPD-Pt electrode (54 μA cm⁻²) than at GOx/PPD-CoPc-BDD electrode (25 μA cm⁻²). On the other hand, however, the background current was much lower at GOx/PPD-CoPc-BDD electrode (1.8 μA cm⁻²) than at GOx/PPD-Pt electrode (14 μA cm⁻²). As a result, the signal-to-background (S/B) ratio at this potential was found to be 12.5 at the GOx/PPD-CoPc-BDD electrode while that was 3.8 at the GOx/PPD-Pt electrode. As seen in previous reports, low background current at modified BDD electrodes enabled sensitive electrochemical detection of oxalic acid [20] and H₂O₂ [14]. Also in this study, the low background current feature of BDD was maintained even after surface modification with 4VP, CoPc and GOx/PPD film. Therefore, immobilization of enzymes on CoPc-BDD should be a useful method for fabrication of sensitive enzyme electrodes using other types of oxidase which can generate H₂O₂ (e.g., uricase, cholesterol oxidase, lactate oxidase, alcohol oxidase, bilirubin oxidase, or choline oxidase) based on the low background current.

GOx/PPD-CoPc-BDD

GOx/PPD-H-BDD

GOx/PPD-Pt

Figure 6: CVs for 5 mM glucose in 0.1 M PBS at (A) GOx/PPD-CoPc-BDD, (B) GOx/PPD-H-BDD, and (C) GOx/PPD-Pt electrodes. Curves (a) and (b) indicate CVs for 5 mM glucose and background, respectively. Potential sweep rate was 5 mVs⁻¹.

4. Conclusion

GOx-immobilized PPD polymer film was formed on a CoPc-BDD electrode via electropolymerization. At the GOx/PPD-CoPc-BDD electrode, CV for glucose showed a sigmoidal curve without any additional electron mediator in the electrolyte solution, indicating that the glucose oxidation at the GOx and the electrocatalytic oxidation of H₂O₂, which is a product of glucose oxidation, at the CoPc were successful at the electrolyte/electrode interface. Since the GOx/PPD-CoPc-BDD electrode exhibited significantly small background current, the S/B ratio was found to be larger at the GOx/PPD-CoPc-BDD electrode than at the GOx/PPD-Pt electrode. This result is consistent with our previous result that H₂O₂ can be detected electrochemically on the CoPc-BDD electrode with the lowest limit of detection level based on the small background current [14]. This study showed that this feature of the CoPc-BDD electrode can be maintained even after further modification with GOx. Therefore, sensitive enzyme electrodes, involved with H₂O₂/O₂ redox mediation, having low limit of detection should be able to be fabricated with a similar method using a CoPc-BDD electrode. For application of this electrode to a glucose sensor, amperometric studies using a solution containing glucose and other possible interferents which exist in human blood should be investigated in the future study.

Acknowledgments

This work was supported by Program for Fostering Regional Innovation in Nagano, granted by MEXT, Japan, KAKENHI (21750209), and Iketani Science and Technology Foundation.

References

Diamond Electrochemistry, Elsevier, Tokyo, Japan, 2005.

K. E. Toghill and R. G. Compton, “Electrochemical non-enzymatic glucose sensors: a perspective and an evaluation,” International Journal of Electrochemical Science, vol. 5, no. 9, pp. 1246–1301, 2010.

T. Watanabe, T. A. Ivandini, Y. Makide, A. Fujishima, and Y. Einaga, “Selective detection method derived from a controlled diffusion process at metal-modified diamond electrodes,” Analytical Chemistry, vol. 78, no. 22, pp. 7857–7860, 2006.

J. Zhao, R. Tian, and J. Zhi, “Electroless deposition of copper and fabrication of copper micropatterns on CVD diamond film surfaces,” Applied Surface Science, vol. 254, no. 11, pp. 3282–3287, 2008.

M. Chiku, T. Watanabe, and Y. Einaga, “Fabrication of Cu-modified boron-doped diamond microband electrodes and their application for selective detection of glucose,” Diamond and Related Materials, vol. 19, no. 7–9, pp. 673–679, 2010.

R. Uchikado, T. N. Rao, D. A. Tryk, and A. Fujishima, “Metal-modified diamond electrode as an electrochemical detector for glucose,” Chemistry Letters, vol. 30, no. 2, pp. 144–145, 2001.

K. Ohnishi, Y. Einaga, H. Notsu et al., “Electrochemical glucose detection using nickel-implanted boron-doped diamond electrodes,” Electrochemical and Solid-State Letters, vol. 5, no. 3, pp. D1–D3, 2002.

T. Watanabe and Y. Einaga, “Design and fabrication of nickel microdisk-arrayed diamond electrodes for a non-enzymatic glucose sensor based on control of diffusion profiles,” Biosensors and Bioelectronics, vol. 24, no. 8, pp. 2684–2689, 2009.

K. E. Toghill, L. Xiao, M. A. Phillips, and R. G. Compton, “The non-enzymatic determination of glucose using an electrolytically fabricated nickel microparticle modified boron-doped diamond electrode or nickel foil electrode,” Sensors and Actuators, B, vol. 147, no. 2, pp. 642–652, 2010.

C. E. Troupe, I. C. Drummond, C. Graham et al., “Diamond-based glucose sensors,” Diamond and Related Materials, vol. 7, no. 2–5, pp. 575–580, 1998.

L. Su, X. Qiu, L. Guo, F. Zhang, and C. Tung, “Amperometric glucose sensor based on enzyme-modified boron-doped diamond electrode by cross-linking method,” Sensors and Actuators, B, vol. 99, no. 2-3, pp. 499–504, 2004.

K. B. Male, S. Hrapovic, and J. H. T. Luong, “Electrochemically-assisted deposition of oxidases on platinum nanoparticle/multi-walled carbon nanotube-modified electrodes,” Analyst, vol. 132, no. 12, pp. 1254–1261, 2007.

M. J. Song, J. H. Kim, S. K. Lee et al., “Pt-polyaniline nanocomposite on boron-doped diamond electrode for amperometic biosensor with low detection limit,” Microchimica Acta, vol. 171, no. 3-4, pp. 249–255, 2010.

T. Kondo, A. Tamura, and T. Kawai, “Cobalt phthalocyanine-modified boron-doped diamond electrode for highly sensitive detection of hydrogen peroxide,” Journal of the Electrochemical Society, vol. 156, no. 11, pp. F145–F150, 2009.

T. A. Ivandini, R. Sato, Y. Makide, A. Fujishima, and Y. Einaga, “Pt-implanted boron-doped diamond electrodes and the application for electrochemical detection of hydrogen peroxide,” Diamond and Related Materials, vol. 14, no. 11-12, pp. 2133–2138, 2005.

T. Kondo, S. Aoshima, K. Honda, Y. Einaga, A. Fujishima, and T. Kawai, “Fabrication of covalent SAM/Au nanoparticle/boron-doped diamond configurations with a sequential self-assembly method,” Journal of Physical Chemistry C, vol. 111, no. 34, pp. 12650–12657, 2007.

P. N. Mashazi, K. I. Ozoemena, and T. Nyokong, “Tetracarboxylic acid cobalt phthalocyanine SAM on gold: potential applications as amperometric sensor for H₂O₂ and fabrication of glucose biosensor,” Electrochimica Acta, vol. 52, no. 1, pp. 177–186, 2006.

H. H. Weetall, D. W. Hatchett, and K. R. Rogers, “Electrochemically deposited polymer-coated gold electrodes selective for 2,4-dichlorophenoxyacetic acid,” Electroanalysis, vol. 17, no. 19, pp. 1789–1794, 2005.

S. J. Killoran and R. D. O'Neill, “Characterization of permselective coatings electrosynthesized on Pt-Ir from the three phenylenediamine isomers for biosensor applications,” Electrochimica Acta, vol. 53, no. 24, pp. 7303–7312, 2008.

T. Kondo, Y. Niwano, A. Tamura et al., “Sensitive electrochemical detection of oxalate at a positively charged boron-doped diamond surface,” Electroanalysis, vol. 20, no. 14, pp. 1556–1564, 2008.