International Journal of Photoenergy
Volume 2019 (2019), Article ID 2385164, 1 page
https://doi.org/10.1155/2019/2385164

Corrigendum

Corrigendum to “An Intelligent Maximum Power Point Using a Fuzzy Log Controller under Severe Weather Conditions”

Khaled Bataineh

Department of Mechanical Engineering, Jordan University of Science and Technology, Irbid, Jordan

Correspondence should be addressed to Khaled Bataineh; k.bataineh@just.edu.jo

Received 16 January 2019; Accepted 20 January 2019; Published 10 March 2019

Copyright © 2019 Khaled Bataineh. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “An Intelligent Maximum Power Point Using a Fuzzy Log Controller under Severe Weather Conditions” [1], an acknowledgment section should be added as follows:

Acknowledgments

This work was supported by the Deanship of Research of Jordan University of Science and Technology (grant number 476-2017).

References

K. Bataineh, “An intelligent maximum power point using a fuzzy log controller under severe weather conditions,” International Journal of Photoenergy, vol. 2018, Article ID 1840502, 8 pages, 2018.