International Journal of Pediatrics
Volume 2020 (2020), Article ID 4131098, 6 pages
https://doi.org/10.1155/2020/4131098

Research Article

Bacteriology and Antibiotic Susceptibility Patterns among Neonates Diagnosed of Omphalitis at a Tertiary Special Care Baby Unit in Western Uganda

Munanura Turyasiima,¹ Martin Nduwimana,¹ Gloria Kiconco,¹ Walufu Ivan Egesa,¹ Silva Andres Manuel,¹ Peter Kalubi,1,2 and Yamile Enedina Arias Ortiz¹

¹Department of Pediatrics and Child Health, Faculty of Clinical Medicine and Dentistry, Kampala International University, Kampala, Uganda
²Department of Pediatrics and Child Health, Faculty of Medicine, Mbarara University of Science and Technology, Mbarara, Uganda

Correspondence should be addressed to Munanura Turyasiima; munanuraturyasiima@kiu.ac.ug

Received 14 July 2020; Revised 22 September 2020; Accepted 5 October 2020; Published 26 October 2020

Academic Editor: Somashekhar Marutirao Nimbalkar

Copyright © 2020 Munanura Turyasiima et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Newborn infections remain a major cause of morbidity and mortality among neonates in low-income countries. Clinical diagnosis for omphalitis in such settings is possible but this does not depict the microbiological characteristics of the involved organisms, and clinicians have often prescribed empirical antibiotics in neonates with omphalitis, despite an increasing burden of antibiotic resistance. Methods. A hospital-based cross-sectional study was conducted to evaluate the bacteriology and antibiotic susceptibility patterns among neonates diagnosed with omphalitis at the special care baby unit (SCBU) of Kampala International University-Teaching Hospital (KIU-TH), western Uganda from March to June 2019. Sixty-five (65) neonates with a clinical diagnosis of omphalitis were consecutively recruited in the study. Cord swabs were taken under sterile (aseptic) precautions from all neonates, and antibiotic susceptibility tests performed using the Kirby Bauer disk diffusion technique with commercially available antibiotics disks of ampicillin, cloxacillin, gentamicin, amikacin, cefotaxime, ceftriaxone, vancomycin, and imipenem on Mueller Hinton agar plates. The data was analyzed using STATA version 13.0, frequencies and proportions used to describe the variables. Results. Fifty-five, 55 (84.6%), neonates with suspected omphalitis had positive cord swab culture. Staphylococcal aureus (58.2%) was the commonest cause of omphalitis followed by Neisseria spp (16.4%), E. coli 6 (10.9%), Proteus spp (5.5%), Klebsiella spp (3.6%), Citrobacter spp (3.6%), and Haemophilus spp (1.8%) in decreasing frequency. Isolates were resistant to ampicillin (87.7%), gentamicin (54.4%), and cloxacillin (34.4%), the drugs recommended for use in neonates with suspected omphalitis. Conclusions. Staphylococcal aureus is still the predominant cause of omphalitis among neonates. There was high resistance to the commonly used antibiotics in the treatment of omphalitis among newborns. This study reemphasizes that clinicians should do cord swabbing for both culture and susceptibility tests among newborns with suspected omphalitis before initiation of antibiotics.

1. Background

Neonatal omphalitis is still a common condition in low resource settings where routine care of the umbilical stump still involves application of potentially dangerous substances [1–3], contrary to the cord care recommendations by the World Health Organization [4]. The high mortality rate from omphalitis, due partially to the rapid progression from omphalitis to necrotizing fasciitis, can be prevented through early recognition of the signs and symptoms of omphalitis followed by prompt, aggressive treatment [5].

Diagnosis of omphalitis through physical examination of the umbilicus is an acceptable standard of diagnosis according to WHO [4]. This, however, does not describe the causative organisms and hence precise antibiotic treatment. The result is that many clinicians now use empirical antibiotics for every neonate whose focus for sepsis is infection of the umbilicus, and this has contributed to the growing global antibiotic resistance. Since neonates are vulnerable to drug toxicity, and few specific drugs are recommended for use in this group, it is important that culture and sensitivity patterns of the causative organisms involved in omphalitis be optimized while treating neonates.

While Staphylococcus aureus remains the most frequent bacterial cause of omphalitis in neonates, other many bacteria have been isolated from cord swabs cultures of neonates with omphalitis including Escherichia coli, Klebsiella species, Pseudomonas species, group A and group B Streptococci, and Tetanus [6–13]. Without proper and specific identification of the causative organism and treatment, through culture and antibiotic susceptibility tests, the risk of antibiotic resistance will continue to increase.

A systematic review by Huynh and colleagues [14] on community-acquired invasive bacterial infections and antibiotic resistance among neonates in developing countries found available data insufficient to draw a true, recent, and accurate picture of antibiotic resistance among severe bacterial infections in neonates, particularly at the community level. This article adds to the few epidemiological reports on the bacteriology and antibiotic susceptibility patterns of the commonly used antibiotics among neonates diagnosed with omphalitis in low resource settings.

2. Methods and Materials

2.1. Study Design and Setting

This was a hospital-based cross-sectional study on neonates diagnosed with omphalitis at a special care baby unit (SCBU) of Kampala International University-Teaching Hospital (KIU-TH), Uganda. KIU-TH is a tertiary teaching and referral hospital in western Uganda, located approximately 326.6 km southwest of Kampala, the city of Uganda. Sixty-five (65) neonates with a clinical diagnosis of omphalitis were consecutively recruited in the study from March to June 2019. The study evaluated the bacteriology from cord swab cultures and antibiotic susceptibility patterns among neonates daiganosed of omphalitis.. This study did not evaluate for sepsis that may result from omphalitis, and so only cord swabs but not blood samples were taken for culture from the neonates.

2.2. Inclusion and Exclusion Criteria

The study was conducted in term and late preterm neonates. Term neonates already started on antibiotic therapy at the time of recruitment were excluded.

2.3. Definition of Neonatal Omphalitis

Omphalitis was diagnosed in every neonate found to have at least one physical sign of purulent discharge, reddening, and swelling (edema) on the physical examination of the cord stump according to WHO neonatal guidelines [4].

2.4. Collection of Samples

Cord swabs were taken under sterile (aseptic) precautions from all neonates with clinical evidence of omphalitis, before administering antibiotic therapy. Cord swab tip was rotated over 1 cm² area of the deep part of septic cord stump for 5 seconds (Levine method) while avoiding touching the stump edge with the swab. Infection control during swabbing was observed through hand washing, use of sterile gloves, cleansing the surrounding (periumbilical area), and use of sterile swab sticks and gloves for each client. The samples were delivered to the KIU-TH laboratory on the same day of sample collection to minimize contamination.

2.5. Culture of Samples

Smear preparation: inoculation was first made on the culture media before using the swab to make smears for Gram staining.

Gram staining: the specimen was evenly spread on a clean, grease-free slide and allowed to air-dry in a safe place. The specimen was heat fixed and stained by Gram staining technique. The smear was then examined for the presence of bacteria and pus cells (PMNs) using 100x objective lens and specially looking for Gram-negative rods; Gram-negative diplococci; Gram-positive cocci in pairs, chains, or clusters; and Gram-positive large rods with square ends.

2.6. Susceptibility Tests of Isolated Specimens

The antimicrobial susceptibility tests were performed using the Kirby Bauer disk diffusion technique (Bauer et al., 1966) with commercially available disks on Mueller Hinton agar plates.

The following antibiotic disks were used: ampicillin (10 μg), cloxacillin (5 μg), gentamicin (10 μg), amikacin (30 μg), cefotaxime (30 μg), ceftriaxone (30 μg), vancomycin (30 μg), and imipenem (10 μg). The diameter of the zone of inhibition for each antibiotic was measured and interpreted as resistant, intermediate, and sensitive according to Clinical Laboratory Standards Institute Criteria (2007).

2.7. Data Interpretation and Analysis

The data was analyzed using STATA version 13.0, frequencies and proportions used to describe the variables under study.

3. Results

3.1. Neonates’ Perinatal Characteristics

Sixty-five (65) neonates met the WHO diagnosis criteria of omphalitis. Most of the neonates were male, aged below 7 days of life with a normal average birth weight, and not exposed to maternal perinatal infection. This is shown in Table 1.

Table 1: Perinatal characteristics of neonates diagnosed of omphalitis.

Characteristic
Frequency, (%)

Age of the neonate

    <7 days
60 (92.3)

    7-14 days
5 (0.7)

Neonatal birth weight (g)

    ≤2499
5 (7.7)

    2500-3999
50 (76.9)

    ≥4000
10 (15.4)

Sex of the neonate

    Female
36. (55.4)

    Male
29 (44.6)

Mode of delivery

    Vaginal
23 (35.4)

    Caesarean
42 (64.6)

Gestational age (weeks of amenorrhea)

    Term (>37)
60 (92.3)

    Preterm (≤36)
5 (0.7)

Place of delivery

    Home
2 (3.1)

    Private health facility
55 (84.6)

    Public health facility
8 (12.3)

3.2. Bacterial Isolates from Cord Swabs of Neonates Diagnosed with Omphalitis

Fifty-five, 55 (84.6%), of the 65 neonates with clinical signs of omphalitis had positive culture results. Staphylococcus aureus 32(58.2%), the only gram-positive isolate, was the most frequent isolated organism. The rest of the isolates were Gram-negative bacteria (41.8%) and included Neisseria spp9 (16.4%), E. coli 6 (10.9%), Proteus spp3 (5.5%), Klebsiella spp2 (3.6%), Citrobacter spp2(3.6%), and Haemophilus spp1 (1.8%). This is summarized in Figure 1.

Figure 1: Bar graph showing the percentage prevalence of bacteria causing omphalitis among neonates.

3.3. Percentage Antibiotic Susceptibility Patterns of Bacterial Isolates from Cord Swabs of Neonates Diagnosed of Omphalitis

The susceptibility of isolated organisms to commonly used antibiotics including ampicillin, cloxacillin, gentamicin, amikacin, cefotaxime, ceftriaxone, vancomycin, and imipenem was assessed and reported as sensitive, intermediate, and resistant.

The findings generally show a high antibiotic resistance across all the isolated organisms. The highest antibiotic sensitivity of the isolated organisms is as follows; Staphylococcal aureus, the most frequently isolated organism, was only moderately sensitive (53.1%) to cefotaxime and imipenem; Neisseria spp moderately sensitive (55.6%) to imipenem, low sensitivity (44.4%) to amikacin and cefotaxime; E. coli high sensitivity (83.3%) to imipenem and moderate sensitivity (66.7%) to cloxacillin and cefotaxime; Klebseilla spp highly sensitive (100%) to imipenem and moderate sensitivity to vancomycin (50%); Proteus spp had moderate sensitivity (66.7%) to amikacin and cefotaxime; Citrobacter spp only had moderate sensitivity (50%) to amikacin and gentamicin. Haemophilus spp were highly sensitive (100%) to cloxacillin, and ceftriaxone, yet highly resistant (100%) to ampicillin, gentamicin, amikacin, imipenem, and vancomycin. This is shown in Table 2 and Figure 2.

Table 2: Percentage antibiotic susceptibility patterns of bacterial isolates from cord swabs of neonates diagnosed of omphalitis.

Ampicillin
Gentamicin
Amikacin
Cloxacillin
Ceftriaxone
Cefotaxime
Vancomycin
Imipenem

S. aureus

    Sensitive
9.4
28.1
40.6
37.5
12.5
53.1
28.1
53.1

    Intermediate
3.1
17.5
3.1
28.1
21.9
12.5
34.4
21.9

    Resistant
87.5
54.4
56.3
34.4
65.6
34.4
37.5
25.0

E. coli

    Sensitive
0
0
33.3
66.7
16.7
66.7
0
83.3

    Intermediate
0
16.7
16.7
0
16.6
33.3
0
0

    Resistant
100
83.3
50.0
33.3
66.7
00
100
16.7

Klebsiella spp

    Sensitive
0
0
0
0
0
0
50.0
100

    Intermediate
0
50.0
50.0
50.0
50.0
0
0
0

    Resistant
100
50.0
50.0
50.0
50.0
100
50.0
0

Neiserria spp

    Sensitive
0
22.2
44.4
33.3
33.3
44.4
22.2
55.6

    Intermediate
0
0
0
0
22.3
33.4
0
11.1

    Resistant
100
77.8
55.6
66.7
44.4
22.2
77.8
33.3

Citrobacter spp

    Sensitive
0
50.0
50.0
0
0
0
0
50.0

    Intermediate
0
0
0
0
100
100
0
50

    Resistant
100
50.0
50.0
100
0
0
100
00

Proteus spp

    Sensitive
0
33.3
66.7
0
33.3
66.7
0
100

    Intermediate
0
0
0
33.3
66.7
0
0
0

    Resistant
100
66.7
33.3
66.7
0
33.3
100
0

Haemophilus spp

    Sensitive
0
0
0
100
100
0
0
0

    Intermediate
0
0
0
0
0
100
0
0

    Resistant
100
100
100
0
0
0
100
100

Figure 2: Percentage antibiotic sensitivity and resistance patterns of bacterial isolates from cord swabs among neonates diagnosed of omphalitis.

4. Discussion

Empirical use of ampicillin/gentamicin and cloxacillin/gentamicin combinations is recommended for presumed sepsis and sepsis where staphylococcal infection is highly suspected (for example in omphalitis), respectively, whereas blood and/or swab cultures should be collected before antibiotic administration where possible [4]. Staphylococcal aureus was the most frequent bacterial isolate of all the cord swabs of neonates with omphalitis in this study. This finding is universal to all other epidemiological studies on omphalitis etiology and neonatal related sepsis worldwide [6, 14]. The high frequency of staphylococcal aureus isolates (58.2%) in this study is comparable to other studies, 39.8% in Uganda [8] and 57.9% in Pakistan [9]. Staphylococcal aureus showed moderate sensitivity to cefotaxime and imipenem (53.1%), and these could be used instead of the commonly used resistant ampicillin (87.5%), gentamicin (54.4%), and cloxacillin (34.4%) that showed high resistance. Staphylococcus aureus is a normal flora in the mothers’ birth canal; nonsterile hands of the persons involved in maternal delivery [6] and hence can easily contaminate the umbilicus of the newborn during delivery. In addition, most cord care practices in low resource settings involve the application of potentially dangerous substances to the umbilicus of the neonates [1–3], which results in the high rate of staphylococcal aureus transmission from these nonsterile substances.

Gram-negative bacteria are on average the commonest etiology for omphalitis than Gram-positive [14], unlike the findings in this study where Gram-positive bacteria were predominant. A related study among neonates with cord sepsis at Mulago national referral hospital (Uganda) [8] found Gram-negative bacteria the most predominant isolates (60.4%) mainly due to E. coli (33.3%), Proteus (14.6%), and Klebiesella (10.4%). A prospective study in India also found Gram-negative organisms to be responsible for the majority of omphalitis in 57.1%, of cases, and Klebsiella spp were the most isolated [12]. Neisseria spp (16.4%) was the second frequent isolate and the most common Gram-negative bacteria in this study. This finding is peculiar as few or no study has isolated Neiserria spp from umbilical cord swabs. Either E. coli or Klebsiella spp is the second most isolated organism after Staphylococcal aureus from cord swabs of neonates with omphalitis in all previous studies under literature search [6–13]. This finding could suggest a correspondingly high incidence of gonococcal infection among mothers of the neonates involved in this study. Other organisms like Proteus spp (5.5%), Klebsiella spp (3.6%), Citrobacter spp (3.6%), and Haemophilus spp (1.8%) were isolated from cord swabs of neonates in this study at lower frequencies. Although Klebsiella spp were isolated in a few swabs in this study, it caused most of the omphalitis among neonates in a study done in India [12] in which Gram-negative organisms were responsible for the majority of the omphalitis.

In this study, all the bacterial isolates from the cord swabs generally showed a high antibiotic resistance and low sensitivity pattern to the commonly used antibiotics in omphalitis. Staphylococcal aureus, the most common isolate, was highly resistant to ampicillin, gentamicin, and cloxacillin at 87.5%, 54.4%, and 34.4%, respectively. There was, however, a low resistance to cefotaxime and imipenem, 34.4% and 25%, respectively, and these two drugs could be used to treat staphylococcal omphalitis instead of cloxacillin and gentamicin. The 2015 situation analysis on antibiotic resistance in Uganda [15] estimated staphylococcal aureus resistance to ampicillin between 40 and 100% and resistance to gentamicin of up to 30%. A hospital study in Tanzania also found a high resistance to ampicillin and cloxacillin, moderate resistance to ceftriaxone and cefuroxime, and low resistance to amikacin among bacterial isolates from cord swabs of neonates [7]. Neiserria spp, the second common isolate in this study, showed a high resistance to the commonly used ampicillin (100%), gentamicin (77.8%), and cloxacillin (66.7%). There was similarly high antibiotic resistance patterns among all the other bacterial isolates from the cord swabs.

The high rates of resistance in this study are in line with the national antibiotic resistance situation (over 50 percent in many cases) by a broad range of bacteria to commonly used antibiotics such as penicillin, tetracycline, and cotrimoxazole [15]. A high prevalence of antimicrobial self-medication frequently associated with inappropriate drug use in developing countries [16], including Uganda, contributes to this high antibiotic resistance. Routine culture and sensitivity prior to administration of empiric antibiotics could be a solution; however, it remains a dream in resource-limited settings. In such circumstances, clinicians blindly prescribe cloxacillin/gentamicin combination to treat omphalitis where staphylococcal infection is highly suspected and ampicillin/gentamicin when it is unlikely. For settings where cord swabbing for culture is possible, culture/sensitivity reports come late because conventional methods are commonly used. This still makes it impossible for the clinicians to follow the right treatments at the right time of prescription.

This study did not describe resistance by methicillin-resistant Staphylococcus aureus (MRSA) and extended-spectrum beta-lactamase (ESBL)-producing bacteria that confer resistance to some advanced antibiotics. A high-level study is recommended to discuss this public health problem.

Primary prevention of omphalitis through clean delivery, clean cord care, avoiding harmful cord care practices and by increasing tetanus toxoid immunization coverage can potentially reduce the prescription of antibiotics among neonates. This in turn could reduce the bacterial resistance to the commonly used antibiotics in neonatal omphalitis. World Health Organization [4] recommends daily chlorhexidine (4%) application to the umbilical stump during the first week of life for newborns born at home in settings with high neonatal mortality (neonatal mortality rate >30 per 1000 live births) and clean dry cord care for newborns born in health facilities, and at home in low neonatal mortality as the primary prevention of omphalitis.

5. Conclusions

Staphylococcus aureus was the predominant cause of omphalitis among neonates admitted in the special care baby unit. Neisseria spp was the second frequent isolate and the common Gram-negative cause of omphalitis, indicating a possibly high rate of gonococcal infections among the nursing mothers in this setting. There was high antibiotic resistance to the commonly used antibiotics in neonates with omphalitis. Cord swabs for culture and sensitivity should always be taken in all neonates with signs of cord infection before antibiotics administration to minimize irrational antibiotic use and resistance. This study did not evaluate sepsis and related mortality that may result from omphalitis. More studies are required to further describe the resistance patterns in many settings and as well influence the current treatment policies.

Data Availability

The datasets used to support the findings of this study are available from the corresponding author upon request.

Ethical Approval

The research protocol was approved by the Research Ethics Committee (REC) of Kampala International University under the number [UG-REC-023/201901]. Written consent was sought from the mothers of neonates before recruitment to the study. The results from culture and sensitivity were explained to the mothers of neonates and then put in their respective medical files for use by the attending clinicians.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this paper.

Acknowledgments

We appreciate and thank the contributions of Dr. Theophilus Pius, a laboratory technologist at Kampala International University-Teaching Hospital who helped in the processing and analysis of culture and susceptibility tests on the cord swabs. This research article is part of the thesis report for the award of master degree of pediatrics and child health of Kampala International University.

References

M. Turyasiima, M. Nduwimana, S. M. Andres et al., “Neonatal umbilical cord infections: incidence, associated factors and cord care practices by nursing mothers at a tertiary Hospital in Western Uganda,” Open Journal of Pediatrics, vol. 10, no. 2, pp. 288–301, 2020.

P. S. Coffey and S. C. Brown, “Umbilical cord-care practices in low- and middle-income countries: a systematic review,” BMC Pregnancy and Childbirth, vol. 17, no. 1, p. 68, 2017.

L. C. Mullany, G. L. Darmstadt, J. Katz et al., “Risk factors for umbilical cord infection among newborns of southern Nepal,” American Journal of Epidemiology, vol. 165, no. 2, pp. 203–211, 2006.

World Health Organization, WHO recommendations on newborn health: guidelines approved by the WHO Guidelines Review Committee, World Health Organization, Geneva, pp. 1–26, 2017.

M. Anderson and A. G. S. Philip, “Management of the Umbilical Cord : Care Regimens, Colonization, Infection, and Separation,” American Academy of Pediatrics, vol. 5, no. 4, p. 155, 2004.

D. Stewart, W. Benitz, and AAP COMMITTEE ON FETUS AND NEWBORN, “Umbilical Cord Care in the Newborn Infant,” Pediatrics, vol. 138, no. 3, article e20162149, 2016.

T. V. Mhada, F. Fredrick, M. I. Matee, and A. Massawe, “Neonatal sepsis at Muhimbili National Hospital, Dar es Salaam, Tanzania: aetiology, antimicrobial sensitivity pattern and clinical outcome,” BMC Public Health, vol. 12, no. 1, p. 1, 2012.

S. B. Musoke, “Umbilical cord sepsis among neonates admitted to Mulago Hospital: bacterial aetiology, prevalence and immediate outcome,” Tech. Rep., Makerere University, 2012, http://mak.ac.ug.

F. Mir, S. S. Tikmani, S. Shakoor et al., “Incidence and etiology of omphalitis in Pakistan: a community-based cohort study,” The Journal of Infection in Developing Countries, vol. 5, no. 12, pp. 828–833, 2011.

K. Sawardekar, “Changing spectrum of neonatal omphalitis,” The Pediatric Infectious Disease Journal, vol. 23, no. 1, pp. 22–26, 2004.

H. Güvenç, A. D. Aygün, F. Yaşar, F. Soylu, M. Güvenç, and K. Kocabay, “Omphalitis in term and preterm appropriate for gestational age and small for gestational age infants,” Journal of Tropical Pediatrics, vol. 43, no. 6, pp. 368–372, 1997.

M. M. Faridi, A. Rattan, and S. H. Ahmad, “Omphalitis neonatorum,” Journal of the Indian Medical Association, vol. 91, no. 11, pp. 2833–2835, 1993.

H. Güvenç, M. Ü. Z. Güvenç, H. Yenioglu, A. Ayata, K. Kocabay, and S. Bektasl, “Neonatal omphalitis is still common in eastern Turkey,” Scandinavian Journal of Infectious Diseases, vol. 23, no. 5, pp. 613–616, 2009.

B. T. Huynh, M. Padget, B. Garin et al., “Burden of bacterial resistance among neonatal infections in low income countries: how convincing is the epidemiological evidence?” BMC Infectious Diseases, vol. 15, no. 1, p. 127, 2015.

UNAS, CDDEP, GARP-Uganda, Y. Mpairwe, and S. Wamala, Antibiotic resistance in Uganda: situation analysis and recommendations (pp. 107), Uganda National Academy of Sciences; Center for Disease Dynamics, Economics & Policy, Kampala, Uganda, 2015.

M. Ocan, E. A. Obuku, F. Bwanga et al., “Household antimicrobial self-medication: a systematic review and meta-analysis of the burden, risk factors and outcomes in developing countries,” BMC Public Health, vol. 15, no. 1, p. 742, 2015.