Journal of Applied Mathematics

Volume 2013 (2013), Article ID 583809, 11 pages

http://dx.doi.org/10.1155/2013/583809

Research Article

Mathematical Analysis of Casson Fluid Model for Blood Rheology in Stenosed Narrow Arteries

J. Venkatesan,¹ D. S. Sankar,² K. Hemalatha,³ and Yazariah Yatim⁴

¹Department of Mathematics, Rajalakshmi Engineering College, Thandalam, Chennai 602 105, India

²Division of Mathematics, School of Advanced Sciences, VIT University, Chennai Campus, Chennai 600 127, India

³Department of Mathematics, Anna University, Chennai 600 025, India

⁴School of Mathematical Sciences, Universiti Sains Malaysia, 11800 Penang, Malaysia

Received 1 April 2013; Accepted 14 July 2013

Academic Editor: Mohamed Fathy El-Amin

Copyright © 2013 J. Venkatesan et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The flow of blood through a narrow artery with bell-shaped stenosis is investigated, treating blood as Casson fluid. Present results are compared with the results of the Herschel-Bulkley fluid model obtained by Misra and Shit (2006) for the same geometry. Resistance to flow and skin friction are normalized in two different ways such as (i) with respect to the same non-Newtonian fluid in a normal artery which gives the effect of a stenosis and (ii) with respect to the Newtonian fluid in the stenosed artery which spells out the non-Newtonian effects of the fluid. It is found that the resistance to flow and skin friction increase with the increase of maximum depth of the stenosis, but these flow quantities (when normalized with non-Newtonian fluid in normal artery) decrease with the increase of the yield stress, as obtained by Misra and Shit (2006). It is also noticed that the resistance to flow and skin friction increase (when normalized with Newtonian fluid in stenosed artery) with the increase of the yield stress.

1. Introduction

The study of the fluid dynamical aspects of blood flow through a stenosed artery is useful for the fundamental understanding of circulatory disorders. Stenosis in an artery is the narrowing of the blood flow area in the artery by the development of arteriosclerosis plaques due to the deposits of fats, cholesterol, and so forth on the inner wall of the artery. This leads to an increase in the resistance to flow and associated reduction in blood supply in the downstream which leads to serious cardiovascular diseases such as myocardial infarction and cerebral strokes [1–3].

Blood shows Newtonian fluid’s character when it flows through larger diameter arteries at high shear rates, but it exhibits a remarkable non-Newtonian behavior when it flows through small diameter arteries at low shear rates [4, 5]. Moreover, there is an increase in viscosity of blood at low rates of shear as the red blood cells tend to aggregate into the Rouleaux form [6]. Rouleaux form behaves as a semi-solid along the center forming a plug flow region. In the plug flow region, we have a flattened parabolic velocity profile rather than the parabolic velocity profile of a Newtonian fluid. This behavior can be modeled by the concept of yield stress. The yield stress for blood depends strongly on fibrinogen concentration and is also dependent on the hematocrit. The yield stress values for normal human blood is between 0.01 and 0.06 dyn/cm² [7].

Casson fluid model is a non-Newtonian fluid with yield stress which is widely used for modeling blood flow in narrow arteries. Many researchers have used the Casson fluid model for mathematical modeling of blood flow in narrow arteries at low shear rates. It has been demonstrated by Blair [8] and Copley [9] that the Casson fluid model is adequate for the representation of the simple shear behavior of blood in narrow arteries. Casson [10] examined the validity of Casson fluid model in his studies pertaining to the flow characteristics of blood and reported that at low shear rates the yield stress for blood is nonzero. It has been established by Merrill et al. [11] that the Casson fluid model predicts satisfactorily the flow behaviors of blood in tubes with the diameter of 130–1000 μm.

Charm and Kurland [12] pointed out in their experimental findings that the Casson fluid model could be the best representative of blood when it flows through narrow arteries at low shear rates and that it could be applied to human blood at a wide range of hematocrit and shear rates. Blair and Spanner [13] reported that blood behaves like a Casson fluid in the case of moderate shear rate flows, and it is appropriate to assume blood as a Casson fluid. Aroesty and Gross [14] have developed a Casson fluid theory for pulsatile blood flow through narrow uniform arteries. Chaturani and Samy [15] analyzed the pulsatile flow of Casson fluid through stenosed arteries using the perturbation method.

Herschel-Bulkley fluid is also a non-Newtonian fluid with yield stress which is more general in the sense that it contains two parameters such as the yield stress and power law index, whereas the Casson fluid has only one parameter which is the yield stress. Herschel-Bulkley fluid’s constitutive equation can be reduced to the constitutive equations of Newtonian, Power law, and Bingham fluid models by taking appropriate values to the parameters. Chaturani and Ponnalagar Samy [16] analyzed the steady flow of Herschel-Bulkley fluid for blood flow through cosine-shaped stenosed arteries.

Misra and Shit [17] analyzed the steady flow of Herschel-Bulkley fluid for blood flow in narrow arteries with bell-shaped mild stenosis. The mathematical modeling of Casson fluid model for steady flow of blood in narrow arteries with bell-shaped mild stenosis was not studied by anyone so far, according to the knowledge of the authors. Hence, in the present study, a mathematical model is developed to analyze the blood flow at low shear rates in narrow arteries with mild bell-shaped stenosis, treating blood as Casson fluid model. The results of the present study are compared with the results of Misra and Shit [17], and Chaturani and Ponnalagar Samy [16] and some possible clinical applications to the present study are also given.

2. Formulation

Let us consider an axially symmetric, laminar, steady, and fully developed flow of a non-Newtonian incompressible viscous fluid (blood) in the axial direction through a circular artery with bell-shaped mild stenosis. The non-Newtonian behavior of the flowing blood is characterized by Casson fluid model. The artery wall is assumed to be rigid (due to the presence of the stenosis) and the artery is assumed to be long enough so that the entrance and end effects can be neglected in the arterial segment under study. A cylindrical polar coordinate system is used to analyze the blood flow, where and are the variables taken in the radial and axial directions, respectively, and is the azimuthal angle. The geometry of the arterial segment with mild constriction is shown in Figure 1.

Figure 1: Geometry of the arterial segment with stenosis.

Since the blood flow in narrow arteries is slow, the magnitude of the inertial forces is negligibly small, and thus the inertial terms in the momentum equations are neglected. Since the considered flow is unidirectional and is in the axial direction, the radial component of the momentum equation is ignored. The axial component of the momentum equation is simplified to the following:

where is the shear stress and is the pressure. The constitutive equation (relationship between the shear stress and strain rate) of Casson fluid model is defined as follows:

where is the velocity of blood in the axial direction, is the yield stress, and is the viscosity coefficient of Casson fluid.

The geometry of the segment of the narrow artery with mild bell-shaped stenosis is mathematicaly defined as follows:

where is the radius of the normal artery, is the radius of the artery in the stenosis region, is the depth of the stenosis at its throat, is a parametric constant, and characterizes the relative length of the constriction, defined as .

Equation (3) can be rewritten as

where and . Note that and are the parameters in the nondimensional form corresponding to the maximum projection of the stenosis at its throat and variable length of the stenosis in the segment of the narrow artery under study, respectively. Equation (3) spells out that the bell-shaped geometry has the advantage of having two parameters such as and compared to cosine-curve shaped geometry which has only one parameter, namely, the maximum depth of the stenosis [15]. In the bell-shaped stenosis geometry, by keeping as variable and as constant, one can generate arteries with different stenosis lengths with the same maximum depth of the stenosis , and also by keeping as variable and as constant one can generate arteries with different maximum depths with the same length of the stenosis. The different stenosis shapes obtained by varying the stenosis height with 30% stenosis that is, , are shown in Figure 2. The percentage of stenosis is given by . In the present study, we have taken  cm and as taken by Misra and Shit [17].

Figure 2: Stenosis geometries for different values of stenosis height .

Figure 3(a) depicts the shapes of stenoses with different lengths by fixing and keeping as variable (for different values of stenosis the length with fixed value of ). Figure 3(b) shows the shapes of stenoses with different lengths by fixing and varying the values of (for different values of and with a fixed value of ). It is noticed that the width of the stenosis decreases with the increase in the values of .

(a)

(b)

Figure 3: (a) Shapes of the arterial stenosis for different values of the stenosis length . (b) Shapes of the arterial stenosis for different values of the stenosis shape parameter .

Equations (1) and (2) have to be solved with the help of the following no slip boundary condition:

and the regularity condition

3. Method of Solution

Integrating (1) and then using (6), we get

From (7), the skin friction is obtained as

where .

The volumetric flow rate is as follows:

where and are given by (7) and (8), respectively.

Substituting (2) into (9), we get

Integrating (10) and then simplifying, one can get

Since , neglecting the term involving in (11), we get the expression for flow rate as

Using (8) in (12), we get

Neglecting the term involving in (13), we get

Integrating (14) along the length of the artery and using the conditions that at and at , we obtain

Simplifying (15), one can obtain the following expression for pressure drop:

3.1. Resistance to Flow

The resistance to flow is defined as follows:

The resistance to flow for Casson fluid in a stenosed artery is obtained as follows:

In the absence of any constriction ( and ), the resistance to flow (in the normal artery) is given by the following:

The expression for resistance to flow in the dimensionless form is obtained as follows:

where , , and .

It is noted that measures the relative resistance in a stenosed artery compared to normal artery. Substituting the expression for from (4), the integrals ,  , and are reduced to the following:

Using a two-point Gauss quadrature formula, the integrals in (21) are evaluated as follows:

If we want to compare the resistance to flow for different fluid models, we have to normalize it with respect to resistance to flow of Newtonian fluid in normal artery, and the respective expression for Casson fluid model is obtained as follows:

where

which is obtained from (18) with , , and .

3.2. Skin Friction

From (8) and (14), the expression for the skin friction is obtained as follows:

In the absence of any constriction when , the expression for the skin friction becomes the following:

The nondimensional form of skin friction with effects on stenosis is defined as the ratio between the skin friction in the stenosed artery and skin friction in the normal artery. From (25) and (26), the skin friction with effects on stenosis is obtained as

The nondimensional form of skin friction with effects on the non-Newtonian behavior of blood is defined as the ratio between the skin friction of the non-Newtonian fluid in the stenosed artery and the skin friction of the Newtonian fluid in the same stenosed artery. The expression for skin friction with effects on the non-Newtonian behavior of blood is obtained as follows:

where

4. Numerical Simulations of the Results

The objective of this study is to discuss the effects of various parameters on the physiologically important flow quantities such as skin friction, resistance to flow, and flow rate. The following parameters with their ranges mentioned as : 0–1, : 2.0–7.0, : 0.0–0.5, , , and are used to evaluate the expressions of these flow quantities and get data for plotting the graphs.

4.1. Skin-Friction

4.1.1. Effects of Stenosis on Skin-Friction

The variation of skin friction with axial distance for different values of and yield stress with is shown in Figure 4. It is observed that the skin friction increases considerably with the increase in the stenosis length for a given value of yield stress , but it decreases very slightly when the yield stress increases for the fixed value of . The same observations were recorded by Misra and Shit [17] for the Herschel-Bulkley fluid.

Figure 4: Variations of skin friction with axial distance for different percentages of stenosis and yield stress .

The variations of skin friction at the midpoint of the stenosis with stenosis height for different values of the yield stress with and are sketched in Figure 5. It is noted that the skin friction decreases marginally as the yield stress increases.

Figure 5: Variations of skin friction with stenosis height for different values of yield stress .

The estimates of skin friction for different values of axial variable and viscosity coefficient with and 30% stenosis are computed in Table 1. It is observed that the skin friction increases very slightly with the increase of the viscosity coefficient.

Table 1: Variations of the skin friction with axial distance for different values of viscosity with and .

1.01069
1.010799
1.010864

1.104858
1.105946
1.106599

1.490229
1.495693
1.49897

0
1.915269
1.926048
1.932516

0.5
1.490229
1.495693
1.49897

1
1.104858
1.105946
1.106599

1.5
1.01069
1.010799
1.010864

In order to compare our results with those of Misra and Shit [17], the variations of skin friction with axial distance for different fluids are shown in Figure 6 for 30% of stenosis with and . It is observed that the plot of the skin friction of Casson fluid model lies between those of the Herschel-Bulkley fluid model with and . Here, the skin friction is normalized with respect to the normal artery with the same fluid, as was done by Misra and Shit [17].

Figure 6: Variations of skin friction with axial distance for different fluids.

The mathematical form of cosine curve-shaped geometry for stenosis given by Chaturani and Ponnalagar Samy [16] is reproduced as follows:

For computation, values of the parameters are taken as , , and .

The variations of skin friction with axial distance for Casson fluid model with cosine- and bell-shaped stenosis geometries with 30% stenosis and with and are shown in Figure 7 (the data for plotting the graph is computed from (27)). It is found that the skin friction in cosine curve-shaped stenosed arteries is considerably higher than that in bell-shaped stenosed arteries.

Figure 7: Variations of skin friction for Casson fluid with axial distance for different arterial geometries.

4.1.2. Effects of Non-Newtonian Behavior on Skin-Friction

We can study the effects of different non-Newtonian fluids if we normalize it with respect to Newtonian fluid as done by [15, 16, 18–20]. In this case, the following results are in agreement with the results given by these authors but are opposite in nature to those given in Section 4.1.1 except for the variations of skin friction with axial distance for different values of stenosis length as given in Figure 8.

Figure 8: Comparison of cosine- and bell-shaped stenosis shapes.

The variations of skin friction with axial distance for different values of and for a given and are illustrated in Figure 9. It is observed that the skin friction increases considerably with the increase in the stenosis length.

Figure 9: Variations of skin friction with axial distance for different values of stenosis size .

Figure 10 sketches the variations of skin friction with axial distance for different values of yield stress with and . It is observed that the skin friction increases marginally with the increase in the yield stress of the fluid.

Figure 10: Variations of skin friction with axial distance for different values of yield stress .

The variations of skin friction at the midpoint of the stenosis with stenosis height for different values of the yield stress with and are shown in Figure 11. It is clear that the skin friction increases marginally when the yield stress increases.

Figure 11: Variations of skin friction with stenosis height for different values of yield stress .

Figure 12 depicts the variations of skin friction with axial distance for different values of viscosity coefficient for and 30% of stenosis. One can notice that the skin friction decreases slightly as viscosity increases.

Figure 12: Variations of skin friction with axial distance for different values of viscosity .

Figure 13 shows the variations of skin friction with axial distance for different fluid models using cosine-shaped stenosis with 30% of stenosis, yield stress , and . It is observed that the skin friction of Casson fluid model lies between those of the Herschel-Bulkley fluid model with and .

Figure 13: Variations of skin friction with axial distance for different fluid models with cosine-shaped stenosis.

The variations of skin friction with axial distance for different fluid models using bell-shaped stenosis with 30% of stenosis, yield stress , and are shown in Figure 14. It is observed that the skin friction of Casson fluid model lies between those of the Herschel-Bulkley fluid model with and .

Figure 14: Variations of skin friction with axial distance for different fluid models with bell-shaped stenosis.

Figure 15 shows the variations of skin friction with axial distance for Casson fluid model with cosine- and bell-shaped geometries with 30% stenosis, , and (data computed using (28)). It is seen that the cosine-shaped stenosis has a greater width than that of bell-shaped stenosis as depicted in Figure 8.

Figure 15: Variations of skin friction of Casson fluid model with axial distance for different geometries.

Misra and Shit [17] have analyzed the variations of skin friction with axial distance for different values of power law index and yield stress and reported that the skin friction decreases with increase in yield stress. If normalized with Newtonian fluid, the skin friction increases considerably when the yield stress increases with axial distance for 30% stenosis, as displayed in Figure 16.

Figure 16: Variations of skin friction with axial distance for different values of power index and yield stress .

4.2. Resistance to Flow

The variations of resistance to flow with the height of the stenosis for different values of stenosis length with viscosity coefficient and yield stress are shown in Figure 17. It is found that the flow resistance increases nonlinearly with the increase in the stenosis size.

Figure 17: Variations of flow resistance with stenosis height for different values of stenosis length .

Using the result (23), the variations of resistance to flow with stenosis height for different values of stenosis length, for the given and are shown in Figure 18. It is observed that the flow resistance decreases considerably when the length of the stenosis increases. Also, the variations of resistance to flow with stenosis height for different values of yield stress and for and is shown in Figure 19. It is clear that the resistance to flow increases significantly with the increase in the yield stress.

Figure 18: Variations of flow resistance with stenosis height for different values of stenosis length .

Figure 19: Variations of flow resistance with stenosis height for different values of yield stress .

4.3. Flow Rate

Figure 20 depicts the variation of flow rate with axial distance for different values of viscosity coefficient and yield stress with of stenosis. One can notice that the flow rate decreases significantly with the increase of either the viscosity coefficient or the yield stress. It is also observed that the flow rate decreases very significantly (nonlinearly) at the throat of the stenosis for lower values of either the yield stress or viscosity coefficient and slowly (almost linearly) for higher values of either the yield stress or viscosity coefficient.

Figure 20: Variations of the rate of flow with axial distance for different values of viscosity and yield stress .

4.4. Physiological Application

To highlight some possible clinical applications of the present study, the data used by Sankar [21] (the radii of different arteries and flow rate) are used to compute the physiologically important flow quantities such as resistance to flow and skin friction. The values of the parameters are taken as and . The dimensionless resistance to flow and skin friction are computed for arteries with different radii and with and from (23) and (28) (normalized with Newtonian fluid in stenosed artery) and are presented in Table 2. It is noted that the resistance to flow increases, considerably when the stenosis height increases and skin friction significantly increases with the increase of stenosis height.

Table 2: Estimates of resistance to flow and skin friction (dimensionless) in arteries with different radii with .

Blood vessels

Radius (cm)

Flow rate (cm³ s⁻¹)

Aorta

1.567142
1.722748
1.745439
2.008973

(1, 71.67)

Femoral

1.429659
1.581644
1.598551
1.856356

(0.5, 19.63)

Carotid

1.407374
1.558726
1.574716
1.831521

(0.4, 12.57)

Coronary

1.303768
1.451998
1.463802
1.715671

(0.15, 3.47)

Arteriole

1.428014
1.579953
1.596792
1.854524

(0.008, 0.00008)

The percentages of increase in resistance to flow and skin friction over that for uniform diameter tube (no stenosis) and for arteries with different radii are computed in Table 3. One can observe that the percentages of increase in resistance to flow and skin friction increase significantly when stenosis height increases. Comparisons of resistance to flow () in bell-shaped stenosed arteries and cosine curve-shaped stenosed arteries with different values of stenosis size parameters , , and are given in Table 4. It is recorded that the resistance to flow in bell-shaped stenosed artery increases considerably when the length of the stenosis increases, and also it significantly increases when stenosis height increases. But it marginally decreases with the increase of the stenosis length parameter . It is also found that for a given set of values of the parameters, the percentage of increase in resistance to flow in the case of bell-shaped stenosed artery is slightly lower than that of cosine curve-shaped stenosed artery. This is physically verified with the depth of the stenosis for cosine-shaped stenosis (shown in Figure 8) being more; the resistance to flow is higher in this type of stenosis geometry compared to the bell-shaped stenosis geometry.

Table 3: Estimates of the percentage of increase in resistance to flow and skin friction for arteries with different radii with and  0.04 dyn cm⁻².

Blood vessels

(%)
(%)
(%)
(%)

Aorta

20.31
32.25
34.00
54.23

Femoral

21.13
34.00
35.44
57.28

Carotid

21.27
34.31
35.69
57.82

Coronary

22.00
35.86
36.97
60.53

Arteriole

21.14
34.03
35.45
57.32

Table 4: Estimates of percentage of increase in resistance to flow for arteries with different radii and with (i) bell-shaped stenosis (ii) cosine curve-shaped stenosis.

Blood vessels
Bell-shaped stenosis
Cosine curve-shaped stenosis

 (%)
 (%)

Aorta
4.06
6.09
4.33
10.42
15.31
4.28
15.79

Femoral
4.23
6.34
4.50
10.87
15.99
4.45
16.78

Carotid
4.25
6.38
4.53
10.95
16.11
4.50
16.96

Coronary
4.40
6.60
4.68
11.35
16.72
4.71
17.86

Arteriole
4.23
6.34
4.50
10.88
16.00
4.47
16.79

5. Conclusion

The present study analyzed the steady flow of blood in a narrow artery with bell-shaped mild stenosis, treating blood as Casson fluid, and the results are compared with the results of Misra and Shit for, Herschel-Bulkley fluid model [17] and also with the results of Chaturani and Ponnalagar Samy [16] (for blood flow in cosine curve-shaped stenosed arteries, treating blood as Herschel-Bulkley fluid model). The main findings of the present mathematical analysis are as follows:

(i)Whether normalized with respect to non-Newtonian or Newtonian fluid in normal artery (i.e., in both cases of the effect of stenosis and the effect of non-Newtonian fluid) we notice the following.

(1)Skin friction increases with the increase of depth and length of the stenosis.(2)Skin friction of Casson fluid model is significantly lower than that of the Herschel-Bulkley fluid model.(3)Skin friction in bell-shaped stenosed artery is considerably lower than that in the cosine curve-shaped stenosed artery.

(ii)The effect of stenosis on blood flow is that the resistance to flow increases when either the stenosis length or depth increases.(iii)The effect of non-Newtonian fluid on blood flow is that the resistance to flow increases significantly with the increase of yield stress, but it decreases when either the stenosis length or depth increases.(iv)The percentage of increase in resistance to flow in the case of bell-shaped stenosed artery is slightly lower than that of the cosine curve-shaped stenosed artery in the case of normalization with respect to Newtonian fluid.(v)Flow rate decreases with the increase of the yield stress and viscosity coefficient.

Hence, in view of the results obtained, we conclude that the present study may be considered as an improvement in the studies of the mathematical modeling of blood flow in narrow arteries with mild stenosis.

Nomenclature

: | Shear stress
: | Yield stress for Casson fluid
: | Skin friction in stenosed artery
: | Nondimensional skin friction normalized with non-Newtonian fluid
: | Nondimensional skin friction normalized with Newtonian fluid
: | Skin friction in normal artery normalized with non-Newtonian fluid
: | Skin friction in normal artery normalized with Newtonian fluid
: | Stenosis height
: | Flow resistance
: | Nondimensional flow resistance normalized with non-Newtonian fluid
: | Nondimensional flow resistance normalized with Newtonian fluid
: | Flow resistance in normal artery normalized with non-Newtonian fluid
: | Flow resistance in normal artery normalized with Newtonian fluid
: | Volumetric flow rate
: | Radial coordinate
: | Axial coordinate
: | Radial velocity
: | Radius of the normal artery
: | Radius of the artery in the stenosed portion
: | Half-length of segment of the narrow artery
: | Half-length of the stenosis
: | Pressure
: | Viscosity coefficient.

Acknowledgments

The authors thank S. V. Subhashini, Assistant Professor (SG), Department of Mathematics, Anna University, Chennai, for her useful suggestions and timely help for improving the quality of the paper. The research work is supported by the Research University grant of the Universiti Sains Malaysia, Malaysia. RU Grant no. 1001/PMATHS/811177.

References

M. E. Clark, J. M. Robertson, and L. C. Cheng, “Stenosis severity effects for unbalanced simple-pulsatile bifurcation flow,” Journal of Biomechanics, vol. 16, no. 11, pp. 895–906, 1983.

D. Liepsch, M. Singh, and M. Lee, “Experimental analysis of the influence of stenotic geometry on steady flow,” Biorheology, vol. 29, no. 4, pp. 419–431, 1992.

S. Cavalcanti, “Hemodynamics of an artery with mild stenosis,” Journal of Biomechanics, vol. 28, no. 4, pp. 387–399, 1995.

V. P. Rathod and S. Tanveer, “Pulsatile flow of couple stress fluid through a porous medium with periodic body acceleration and magnetic field,” Bulletin of the Malaysian Mathematical Sciences Society, vol. 32, no. 2, pp. 245–259, 2009.

G. R. Cokelet, “The rheology of human blood,” in Biomechanics, Y. C. Fung, et al., Ed., p. 63, Prentice-hall, Englewood Cliffs, NJ, USA, 1972.

W. Boyd, Text Book of Pathology: Structure and Functions in Diseases, Lea and Febiger, Philadelphia, Pa, USA, 1963.

B. C. Krishnan, S. E. Rittgers, and A. P. Yoganathan, Biouid Mechanics: The Human Circulation, Taylor and Francis, New York, NY, USA, 2012.

G. W. S. Blair, “An equation for the flow of blood, plasma and serum through glass capillaries,” Nature, vol. 183, no. 4661, pp. 613–614, 1959.

A. L. Copley, “Apparent viscosity and wall adherence of blood systems,” in Flow Properties of Blood and Other Biological Systems, A. L. Copley and G. Stainsly, Eds., Pergamon Press, Oxford, UK, 1960.

N. Casson, “Rheology of disperse systems,” in Flow Equation for Pigment Oil Suspensions of the Printing Ink Type. Rheology of Disperse Systems, C. C. Mill, Ed., pp. 84–102, Pergamon Press, London, UK, 1959.

E. W. Merrill, A. M. Benis, E. R. Gilliland, T. K. Sherwood, and E. W. Salzman, “Pressure-flow relations of human blood in hollow fibers at low flow rates,” Journal of Applied Physiology, vol. 20, no. 5, pp. 954–967, 1965.

S. Charm and G. Kurland, “Viscometry of human blood for shear rates of 0-100,000 sec⁻¹,” Nature, vol. 206, no. 4984, pp. 617–618, 1965.

G. W. S. Blair and D. C. Spanner, An Introduction to Biorheology, Elsevier Scientific, Oxford, UK, 1974.

J. Aroesty and J. F. Gross, “Pulsatile flow in small blood vessels. I. Casson theory,” Biorheology, vol. 9, no. 1, pp. 33–43, 1972.

P. Chaturani and R. P. Samy, “Pulsatile flow of Casson's fluid through stenosed arteries with applications to blood flow,” Biorheology, vol. 23, no. 5, pp. 499–511, 1986.

P. Chaturani and V. R. Ponnalagar Samy, “A study of non-Newtonian aspects of blood flow through stenosed arteries and its applications in arterial diseases,” Biorheology, vol. 22, no. 6, pp. 521–531, 1985.

J. C. Misra and G. C. Shit, “Blood flow through arteries in a pathological state: a theoretical study,” International Journal of Engineering Science, vol. 44, no. 10, pp. 662–671, 2006.

D. S. Sankar, “Two-fluid nonlinear mathematical model for pulsatile blood flow through stenosed arteries,” Bulletin of the Malaysian Mathematical Sciences Society, vol. 35, no. 2A, pp. 487–498, 2012.

D. S. Sankar and K. Hemalatha, “Pulsatile flow of Herschel-Bulkley fluid through stenosed arteries—a mathematical model,” International Journal of Non-Linear Mechanics, vol. 41, no. 8, pp. 979–990, 2006.

S. U. Siddiqui, N. K. Verma, and R. S. Gupta, “A mathematical model for pulsatile flow of Herschel-Bulkley fluid through stenosed arteries,” Journal of Electronic Science and Technology, vol. 4, pp. 49–466, 2010.

D. S. Sankar, “Perturbation analysis for blood flow in stenosed arteries under body acceleration,” International Journal of Nonlinear Sciences and Numerical Simulation, vol. 11, no. 8, pp. 631–653, 2010.