Journal of Applied Mathematics
Volume 2019 (2019), Article ID 6272101, 1 page
https://doi.org/10.1155/2019/6272101

Corrigendum

Corrigendum to “Study of Two-Sided Similarity Methods Using a Radiation “Switch on” Imploding Shock in a Magnetic Field”

J. R. A. J. NiCastro

Systems Science Research Group, P.O. Box 4051 Walnut Creek CA., 94596, USA

Correspondence should be addressed to J. R. A. J. NiCastro; jrajnic@earthlink.net

Received 19 May 2019; Accepted 18 June 2019; Published 15 July 2019

Copyright © 2019 J. R. A. J. NiCastro. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Study of Two-Sided Similarity Methods Using a Radiation “Switch on” Imploding Shock in a Magnetic Field” [1], there were errors in the equation formatting that should be corrected as follows.

The left hand side of equation is the standard negative cylindrical divergence of the magnetic field gradient and should have been presented as indicated

Equations labeled are three separate standard equations and should have been presented with semicolons and spaces so they appear as distinct equations as indicated.

References

J. R. A. J. NiCastro, “Study of two-sided similarity methods using a radiation “switch on” imploding shock in a magnetic field,” Journal of Applied Mathematics, vol. 2018, Article ID 9701268, 14 pages, 2018.