Journal of Analytical Methods in Chemistry

Volume 2013 (2013), Article ID 682134, 5 pages

http://dx.doi.org/10.1155/2013/682134

Research Article

Determination of L-Argininamide Based on Water-Soluble Fluorescent Conjugated Polymer-Aptamer

Hongliang Guan¹ and Zhike He²

¹School of Environment and Civil Engineering, Wuhan Institute of Technology, Wuhan 430074, China

²Key Laboratory of Analytical Chemistry for Biology and Medicine (Ministry of Education), College of Chemistry and Molecular Sciences, Wuhan University, Wuhan 430072, China

Received 31 May 2013; Revised 19 July 2013; Accepted 22 July 2013

Academic Editor: Sang Soo Hah

Copyright © 2013 Hongliang Guan and Zhike He. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Water-soluble fluorescent conjugated polymer is a promising material which could be used as an optical platform in highly sensitive molecular sensors. In this paper, a simple label-free DNA sensor, which consisted of a poly(3-alkoxy-4-methylthiophene) and an aptamer, was used to detect L-argininamide (L-Arm). Due to the specific binding reaction between L-Arm and its aptamer, the proposed method can easily determinate the L-Arm through the recovery of fluorescence without any modification. Other ions or similar molecules had little effect on the detection. Moreover, there was a linear relationship between fluorescence intensity and the concentration of L-Arm. The detection limit of L-Arm was as low as 4.7 nM.

1. Introduction

Recently, the use of water soluble fluorescent conjugated polymers (CPs) as either chemical or biological sensing elements has received wide interest [1–5]. CPs contain a large number of absorbing and delocalized molecular units, and the transfer of excitation energy along the whole backbone of the CP to the energy/electron acceptor results in an amplification of fluorescence signals. Therefore, CPs have been successfully employed in the detection of various substances including DNA, RNA, protein, metal ions, and even pH and temperature [6–9].

Aptamer, a kind of one single-stranded DNA or RNA sequences, can be synthesized with the systematic evolution of ligands by the exponential enrichment (SELEX) procedure [10, 11]. The unique properties of aptamer is that it can bind with a variety of targets ranging from small molecules, proteins, and even to cells at very high affinity. Unlike ELISA, immunobead assay, and western blotting, some unspecific binding will occur in such cases, aptamers provide decisive advantages. First, they are more resistant against denaturation and degradation. Second, their binding affinities and specificities can be manipulated easily and improved by rational design or by techniques of molecular evolution. Therefore, aptamer is widely utilized as recognition molecular for detecting a variety of targets ranging from small molecules, proteins, and even cells [12–17].

In this paper, we propose utilizing water-soluble fluorescent polythiophene derivative and aptamer for detecting L-Arm. On one hand, thiophene polymer can be easily prepared through oxidation of the corresponding monomers; on the other hand, thiophene polymer can detect, transduce, and possibly amplify chemical, biological, and physical changes into measurable optical or electrical signals with very high sensitivity [18–21].

2. Materials and Methods

Poly(1H-imidazolium-1-methyl-3-{2-[(4-methyl-3-thienyl)-oxy]ethyl})chloride (PT) was synthesized according to the previously published literatures [18]. The stock solution of PT (2 × 10⁻⁴ M, per repeat unit) was dissolved in pure water and used by appropriate dilution, all the oligonucleotides (aptamer, A1, A2, A3, and A4, listed in Table 1. Of the four aptamers, A3 was an unrelated one that was designed for control experiment) solutions were prepared in 10 mM Tris-HCl (pH 7.4, containing 0.01 M NaCl) buffer solution. For fluorescence assay, in 5 mL eppendorf tube, a 20 μL of PT solution was added to 4 mL Tris-HCl aqueous buffer solution, followed by the addition of 10 μL aptamer (A1–A4) and L-Arm, respectively. The final concentration of PT was 1.0 × 10⁻⁶ M, L-Arm was 1.0 × 10⁻⁶ M, and aptamer was 3.3 × 10⁻⁸ M. The mixtures were incubated in water at 45°C for reaction and detection.

Table 1: Aptamer sequences used in the experiment from the literature [22].

Name
Sequence
Conformation

A1
ACCGATCGAAACGTAGCGCCTTCGATCGGT
Hairpin

A2
AGCGATCGAACGTCACCGGATTCGATCGCT
Hairpin

A3
AGACCAGGGCAAACGGTAGGTGAGTGGTCT
Hairpin

A4
GATCGAAACGTAGTCTCCCGATCGCATCGT
Linear

L-Arm and all oligonucleotides were purchased from a biological engineering cooperation. The concentration of DNA was determined by measuring the absorbance at 260 nm in a 3 mL quartz cuvette. Tris(hydroxymethyl)aminomethane (Tris) was purchased from a chemical company. Unless other specified, the rest reagents were analytical grade and used without further purification. The water used was purified through a purification system (≥18 MΩ). Fluorescence measurements were acquired in 3-mL quartz using a luminescence spectrometer equipped with a temperature-controlled cuvette holder and a circulating bath. The pH of solution was measured with a pH meter.

3. Results and Discussion

As shown in Figure 1, at room temperature, mainly due to the electrostatic attraction between positively charged PT and negatively charged aptamer, the fluorescence of PT in each solution was weak, even in the presence of L-Arm (Figure 2). when the solution was heated to 45°C, the fluorescence of PT was recovered to a certain extent. As shown in Figure 3, the fluorescence intensity of PT in the solution containing the hairpin conformation aptamer A1, PT, and L-Arm was the highest, followed by A2 and A3, and the fluorescence of solution containing the linear conformation aptamer A4 showed no pronounced change. Therefore, A1 was chosen as the best candidate for the detection of L-Arm. Besides the different fluorescence intensity, an evident red shift was also observed. Unlike detection of mismatched or perfectly matched ssDNA in the published literature [23], in which the maximum emission is restored to be at 520 nm, in this experiment, the maximum emission of PT was located at 560 nm.

Figure 1: The fluorescence spectra of thiophene polymer in a different aptamer solution. The concentrations of polymer and aptamer were 1.0 × 10⁻⁶ M and 3.3 × 10⁻⁸ M. Tris-HCl was 0.01 M and contained 0.1 M NaCl, pH 7.4 at room temperature.

Figure 2: The fluorescence spectra of thiophene polymer in different aptamer and L-Arm solutions. The concentrations of polymer, L-Arm, and aptamer were 1.0 × 10−6 M, 1.0 × 10−6 M, and 3.3 × 10−8 M, respectively. Tris-HCl was 0.01 M and contained 0.1 M NaCl, pH 7.4 at room temperature.

Figure 3: The fluorescence spectra of thiophene polymer in a different aptamer solution. The concentrations of polymer, L-Arm, and aptamer were 1.0 × 10⁻⁶ M, 1.0 × 10⁻⁶ M, and 3.3 × 10⁻⁸ M, respectively. Tris-HCl was 0.01 M and contained 0.1 M NaCl, pH 7.4. Detection temperature was 45°C.

3.1. The Effect of Temperature on the Fluorescence

Only under a certain temperature, PT, L-Arm and A1 could constitute a stable complex, and the fluorescence of the system recovered to maximum level. Therefore, proper reaction temperature was important for fluorescence recovery. As shown in Figure 4, with the increase of temperature, the fluorescence intensity of the system enhanced gradually, especially in the range of 45°C–50°C, and the fluorescence intensity reached the maximum. However, when the temperature rose higher, the fluorescence intensity of the system decreased a little. One possible reason was that the structure of the system might be destroyed under the higher temperature. Therefore, the temperature of 45°C was chosen for the experiment.

Figure 4: The influence of temperature on the fluorescence intensity. The concentrations of polymer, L-Arm, and A1 were 1.0 × 10−6 M, 1.0 × 10−6 M, and 3.3 × 10−8 M, respectively. Tris-HCl was 0.01 M and contained 0.1 M NaCl, pH 7.4. Detection temperature was 45°C.

3.2. The Influence of pH

pH of the buffer system was another factor which could have potential impact on the intensity of fluorescence. In order to investigate the influence on recovery efficiency, a different pH value of the buffer solution was prepared for the experiment. Figure 5 indicated that the neutral pH was helpful for the recovery of the fluorescence. In the following experiments, the buffer of pH 7.4 was used for the detection.

Figure 5: The influence of buffer on the fluorescence intensity. The concentration of polymer, L-Arm and A1 were 1.0 × 10−6 M, 1.0 × 10−6 M and 3.3 × 10−8 M, respectively. Tris-HCl was 0.01 M contained 0.1 M NaCl. Detection temperature was 45°C.

3.3. The Mechanism Discussion

Under room temperature, even with the addition of L-Arm to the solution consisting of A1 and polymer, the fluorescence of the system could not be recovered. Only under a certain circumstance, for example, after heating, A1, polymer, and L-Arm developed a loop formation (Figure 6), and the bases matched with each other to form a hydrophobic region and a closer structure, and the fluorescence of the system could be recovered. Moreover, L-Arm played a vital role for stabilizing the structure via hydrogen bond with the right aptamer. The aptamer with loop, or other aptamer without loop, even under the previously mentioned conditions, could not form a more stable structure, and thus the fluorescence of the system would not recover completely.

Figure 6: Schematic description of the interaction between aptamer, polymer and L-Arm.

3.4. Linear Relationship and Detection Range

Since the addition of L-Arm could make the fluorescence recovery, it was hoped that the aptamer and polymer composite could quantitatively reflect the amount of L-Arm added. As shown in Figures 7 and 8, by monitoring the fluorescence intensity at 514 nm, a good linear relationship was obtained in the range from 1.0 × 10⁻⁸ M to 1.0 × 10⁻⁶ M. The limit of detection at an S/N ratio of 3 was 4.7 nM.

Figure 7: Fluorescence spectra of the system after the addition of different concentration of L-Arm.

Figure 8: The linear plots of increased fluorescence intensity at the different concentration of L-Arm.

3.5. Specific Investigation

In order to verify the specific detection of the aptamer to L-Arm, three controlled experiments with addition of K⁺, arginine, and BSA (bovine serum albumin) were carried out under identical conditions. In the previous studies, single-stranded DNA with G-rich sequences was able to fold into secondary structures quadruplex via intramolecular hydrogen-bonding interactions in the presence of K⁺ [24]. When the potassium ion specifically bound to the G-quadruplex DNA, the fluorescence of the system was recovered to the high point by using cationic polyfluorene. In this experiment, the binding sequence A1 also contained plenty of guanine. Arginine, an amino, whose structure was very similar to that of L-Arm and BSA, a commonly used protein in the lab, was also chosen for deciding the binding specificity. In these cases (seen in Figure 9), the addition of K⁺, arginine, and BSA could not render the fluorescence recover, and only in the presence of L-Arm, the fluorescence of the system could recover to the maximum, which indicated that the polymer and aptamer system could offer a specific approach for detection of L-Arm.

Figure 9: The effect of different disturbances on the inflorescence of the system.

The concentrations of polymer, L-Arm, A1, K⁺, Arg, and BSA were 1.0 × 10⁻⁶ M, 1.0 × 10⁻⁶ M, 3.3 × 10⁻⁸ M, 1.0 × 10⁻⁶ M, 1.0 × 10⁻⁶ M, and 1.0 × 10⁻⁶ M, respectively. Tris-HCl was 0.01 M and contained 0.1 M NaCl, pH 7.4. Detection temperature was 45°C.

4. Conclusion

In summary, we have developed an exceptionally simple, rapid, and specific method for detection of L-Arm without any complicated protocols or laborious modification. When aptamer, a special oligonucleotide, quenched the fluorescence of the polymer, the addition of L-arm could make the fluorescence recover under a certain condition. The quenching and recovery mechanisms are ascribed to the electrostatic interactions and energy transfer between polymer and aptamer. Moreover, the recovered emission intensity is proportion to the concentration of L-Arm, whereas a new homogeneous assay measurement for L-Arm is established with a LOD as low as 4.7 nM. Since other substances did not have the obvious influence on the fluorescence of the system, the method could be applied for specific detection of L-Arm.

Acknowledgments

This work was supported by the National Science Foundation of China (20575046), the Science Fund for Creative Research Groups of NSFC (20621502), and the Scientific Research Fund of Wuhan Institute of Technology (13102051).

References

L. Chen, D. W. McBranch, H.-L. Wang, R. Helgeson, F. Wudl, and D. G. Whitten, “Highly sensitive biological and chemical sensors based on reversible fluorescence quenching in a conjugated polymer,” Proceedings of the National Academy of Sciences of the United States of America, vol. 96, no. 22, pp. 12287–12292, 1999.

S. W. Thomas III, G. D. Joly, and T. M. Swager, “Chemical sensors based on amplifying fluorescent conjugated polymers,” Chemical Reviews, vol. 107, no. 4, pp. 1339–1386, 2007.

A. Duarte, K.-Y. Pu, B. Liu, and G. C. Bazan, “Recent advances in conjugated polyelectrolytes for emerging optoelectronic applications,” Chemistry of Materials, vol. 23, no. 3, pp. 501–515, 2011.

E. S. Childress, C. A. Roberts, D. Y. Sherwood, C. L. M. Leguyader, and E. J. Harbron, “Ratiometric fluorescence detection of mercury ions in water by conjugated polymer nanoparticles,” Analytical Chemistry, vol. 84, no. 3, pp. 1235–1239, 2012.

Y. Cheng, Q. Du, L. Wang, H. Jia, and Z. Li, “Fluorescently cationic conjugated polymer as an indicator of ligase chain reaction for sensitive and homogeneous detection of single nucleotide polymorphism,” Analytical Chemistry, vol. 84, no. 8, pp. 3739–3744, 2012.

L. A. Stewart, L. H. M. Rydzewska, G. F. Keogh, and R. S. G. Knight, “Systematic review of therapeutic interventions in human prion disease,” Neurology, vol. 70, no. 15, pp. 1272–1281, 2008.

K. Enomoto, K.-I. Uwabe, S. Naito et al., “A double epitope tag for quantification of recombinant protein using fluorescence resonance energy transfer,” Analytical Biochemistry, vol. 380, no. 2, pp. 249–256, 2008.

H. Lu, Y. Tang, W. Xu, D. Zhang, S. Wang, and D. Zhu, “Highly selective fluorescence detection for mercury (II) ions in aqueous solution using water soluble conjugated polyelectrolytes,” Macromolecular Rapid Communications, vol. 29, no. 17, pp. 1467–1471, 2008.

C. Xing, M. Yu, S. Wang, Z. Shi, Y. Li, and D. Zhu, “Fluorescence turn-on detection of nitric oxide in aqueous solution using cationic conjugated polyelectrolytes,” Macromolecular Rapid Communications, vol. 28, no. 3, pp. 241–245, 2007.

T. Hermann and D. J. Patel, “Adaptive recognition by nucleic acid aptamers,” Science, vol. 287, no. 5454, pp. 820–825, 2000.

K. Stadtherr, H. Wolf, and P. Lindner, “An aptamer-based protein biochip,” Analytical Chemistry, vol. 77, no. 11, pp. 3437–3443, 2005.

M. N. Stojanovic, P. de Prada, and D. W. Landry, “Aptamer-based folding fluorescent sensor for cocaine,” Journal of the American Chemical Society, vol. 123, no. 21, pp. 4928–4931, 2001.

S. D. Jhaveri, R. Kirby, R. Conrad et al., “Designed signaling aptamers that transduce molecular recognition to changes in fluorescence intensity,” Journal of the American Chemical Society, vol. 122, no. 11, pp. 2469–2473, 2000.

J. Wang, Y. Jiang, C. Zhou, and X. Fang, “Aptamer-based ATP assay using a luminescent light switching complex,” Analytical Chemistry, vol. 77, no. 11, pp. 3542–3546, 2005.

N. B. Sankaran, S. Nishizawa, T. Seino, K. Yoshimoto, and N. Teramae, “Abasic-site-containing oligodeoxynucleotides as aptamers for riboflavin,” Angewandte Chemie International Edition, vol. 45, no. 10, pp. 1563–1568, 2006.

D. Shangguan, Y. Li, Z. Tang, et al., “Aptamers evolved from live cells as effective molecular probes for cancer study,” Proceedings of the National Academy of Sciences of the United States of America, vol. 103, no. 32, pp. 11838–11843, 2006.

H.-A. Ho and M. Leclerc, “Optical sensors based on hybrid aptamer/conjugated polymer complexes,” Journal of the American Chemical Society, vol. 126, no. 5, pp. 1384–1387, 2004.

M. Chayer, K. Faïd, and M. Leclerc, “Highly conducting water-soluble polythiophene derivatives,” Chemistry of Materials, vol. 9, no. 12, pp. 2902–2905, 1997.

K. F. Karlsson, P. Ǎsberg, K. Peter, R. Nilsson, and O. Inganäs, “Interactions between a zwitterionic polythiophene derivative and oligonucleotides as resolved by fluorescence resonance energy transfer,” Chemistry of Materials, vol. 17, no. 16, pp. 4204–4211, 2005.

C. Li, M. Numata, M. Takeuchi, and S. Shinkai, “A sensitive colorimetric and fluorescent probe based on a polythiophene derivative for the detection of ATP,” Angewandte Chemie, vol. 117, no. 39, pp. 6529–6532, 2005.

H. Guan, P. Zhou, X. Zhou, and Z. He, “Sensitive and selective detection of aspartic acid and glutamic acid based on polythiophene-gold nanoparticles composite,” Talanta, vol. 77, no. 1, pp. 319–324, 2008.

X. Guo, Z. Liu, S. Liu, C. M. Bentzley, and M. F. Bruist, “Structural features of the L-argininamide-binding DNA aptamer studied with ESI-FTMS,” Analytical Chemistry, vol. 78, no. 20, pp. 7259–7266, 2006.

H. Guan, P. Zhou, S. Zeng, X. Zhou, Y. Wang, and Z. He, “Detection of deletion mutations in DNA using water-soluble cationic fluorescent thiophene copolymer,” Talanta, vol. 79, no. 2, pp. 153–158, 2009.

F. He, Y. Tang, S. Wang, Y. Li, and D. Zhu, “Fluorescent amplifying recognition for DNA G-quadruplex folding with a cationic conjugated polymer: a platform for homogeneous potassium detection,” Journal of the American Chemical Society, vol. 127, no. 35, pp. 12343–12346, 2005.