Journal of Analytical Methods in Chemistry
Volume 2016 (2016), Article ID 1813581, 6 pages
http://dx.doi.org/10.1155/2016/1813581

Research Article

The New TLC Method for Separation and Determination of Multicomponent Mixtures of Plant Extracts

Elżbieta Matysik,¹ Anna Woźniak,² Roman Paduch,³ Robert Rejdak,² Beata Polak,⁴ and Helena Donica⁵

¹Department of Analytical Chemistry, Medical University of Lublin, Chodźki 4A, 20-093 Lublin, Poland
²Department of General Ophthalmology, Medical University of Lublin, Chmielna 1, 20-079 Lublin, Poland
³Institute of Microbiology & Biotechnology, Department of Virology & Immunology, Maria Curie Sklodowska University, Akademicka 19, 20-033 Lublin, Poland
⁴Department of Physical Chemistry, Medical University of Lublin, Chodźki 4A, 20-093 Lublin, Poland
⁵Department of Biochemical Diagnostics, Medical University of Lublin, Staszica 16, 20-081 Lublin, Poland

Received 22 November 2015; Revised 15 January 2016; Accepted 18 January 2016

Academic Editor: Vito Verardo

Copyright © 2016 Elżbieta Matysik et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The new mode of two-dimensional gradient thin layer chromatography (MGD-2D TLC) has been presented. Short distance development of sample in the first dimension leads to formation of the preconcentrated narrow zones. They are consecutively separated in the second dimension with the mobile phase gradient in several steps of development until the eluent reaches the further end of the chromatographic plate. The use of the above-mentioned technique allows isolating and then identifying the compounds of various polarity from the multicomponent mixture. The practical application of two-dimensional gradient thin layer chromatography has been performed for isolation of the two plant (Juniperus and Thymus) oils components as the examples of test mixtures. The experiments have been carried out with the use of silica gel plates as well as a normal phase condition. The results of solute separation with isocratic one-dimensional thin layer chromatography system have been compared with those of two-dimensional gradient system. It has been observed that application of the latter mode leads to almost triplicated number of zones in comparison with the former one. It is purposeful to apply the proposed mode to control the purity of the dominant component or components of the mixture.

1. Introduction

The separation and determination of compounds in multicomponent mixtures, that is, plant extracts, are usually performed with the use of high performance liquid chromatography, HPLC (e.g., [1, 2]), or planar chromatography (e.g., [3–5]). The sample complicity often involves application of two-dimensional system in both techniques.

The comparison of solute and standard retentions (both measured as the partition coefficient, ) achieved during two individual analyses is the principal to the compound identification in 2D-HPLC. Similarly, in 2D-TLC, the spots of two mixtures (plant extract and standards) are separated with the use of two chromatographic plates [3–5]. Subsequently, the sample components are identified by comparison of their retardation factor () values with those of the separated standards.

The aforementioned technique has some drawbacks owing to the differences in conditions of the separation process onto two chromatographic plates, what may cause errors in identification of the components of the plant extract. It especially concerns compounds with similar polarity. Thus, zones of determined solutes may be contaminated with other compounds.

It is more rational to separate the plant extract and the mixture of standards parallel with the use of a single plate and identical conditions [6, 7]. The simultaneous separation of two samples (extract and the mixture of standards) applied onto the distinct ends of the chromatographic plate has been presented in [7]. Authors have separated both zones in two directions. The chromatographic plate containing solutes is developed in the first direction using a first mobile phase. Subsequently after eluent evaporation from the adsorbent layer, the chromatogram is developed in the perpendicular direction from two short sides of the plate (e.g., with the use of the horizontal chamber). After the second development, the separated extract and separated mixture of standards form mirror images. Both types of spots (separated sample compounds and standards) migrate identical distance from the line dividing the chromatogram onto two parts [7]. Such technique permits identifying the compounds of both samples by direct comparison.

The method described above sometimes fails to achieve complete separation of spots, especially those containing dominant and minor components. Moreover, there is poor separation of solutes of similar retention. This fact makes the qualitative and quantitative analyses of the mixture impossible.

Authors propose the modification of the above-mentioned method. The new technique leads to the preconcentration of the solute zones during two-dimensional plate developments and they are consecutively separated with the use of the mobile phase gradients and the progressive change of the development distance.

New method has been successfully verified by the separation of two plant extracts (Juniperi Oleum and Thymi Oleum).

2. Experimental

Chromatography was performed on 10 cm × 20 cm glass HPTLC plates coated with silica gel Si 60 F₂₅₄ (Merck, Darmstadt, Germany). Essential oils (Juniperi Oleum and Thymi Oleum) were obtained from Profarm Sp. z O.O. (Lębork, Poland) and dissolved in toluene to furnish 0.2% v/v solutions.

The organic solvents (toluene, ethyl acetate, and methanol) and sulphuric acid were purchased from Avantor Performance Materials (Poland, Gliwice), while the vanillin was obtained from Merck (Darmstadt, Germany), whereas anise aldehyde was received from Sigma-Aldrich (St. Louis, MO, USA).

15 μL of the toluene solutions of essential oils (Juniperi Oleum and Thymi Oleum) was applied as 1 cm zone on the  cm chromatographic plates by means of the Hamilton HPLC syringe.

2.1. Chromatographic Development

Chromatographic plates after spot applications were developed in a horizontal Teflon DS L or DS-II- chamber (Chromdes, Lublin, Poland) in the first direction in traditional way with mixture of toluene and ethyl acetate as the eluent. The development distances were varied from 6 to 10 cm. Then, the mobile phase has been evaporated. Subsequently, the plate was turned by 90°  and the separated zones were preconcentrated by development with a strong volatile solvent on the distance from 0.8 to 2 cm from the starting point. The chemical properties of investigated solutes influenced the type of eluent applied. Thus, the monoterpenes were developed with toluene or ethyl acetate, whereas more polar compounds, that is, polyphenols, required stronger eluent, that is, methanol or mixture of water and methanol. The preconcentration procedure was repeated until the zones were narrow and compact; after each repetition, the plate was dried. Then, the plate was developed in full distance in the perpendicular direction [8]. All experiments were conducted at room temperature (20°C).

2.2. Detection of Compounds

The spots of separated compounds were detected with anise aldehyde in sulphuric acid (0.5 mL of anise aldehyde, 10 mL glacial acetic acid, 85 mL methanol, and 5 mL 95% sulphuric acid) or with vanillin ethanol solution (1 g of vanillin, 100 mL 95% ethanol, and 10 mL 95% sulphuric (VI) acid).

The plate was heated to 100°C until the colour spots became visible.

The spots were detected with Desaga (Heidelberg, Germany) CD 60 densitometer (slit size 0.2 mm × 2.0 mm;  nm).

3. Results and Discussion

The new method, presented in experimental part procedure, has been applied to separate compounds of two essential oils, that is, Juniperus and Thymi. According to the literature, both investigated mixtures contain solutes of various polarities (e.g., monoterpenes, sesquiterpenes, and monoterpene alcohols) [9–11]. Various chromatographic techniques, that is, GC [12] or TLC with special detection mode (BioArena [10], MS [9], and bioautography [11]), have been employed for determination of Juniperus and Thymi oil compounds. However, till today, there is no information on applying the multiple gradient development for this purpose.

The plate containing the zones is developed in the first direction with isocratic elution (mixture of toluene and ethyl acetate) at the first stage of experiments. Juniperi oil contains essential amount of monoterpene alcohols [9] which requires more polar mobile phase (toluene and ethyl acetate; 94 : 6 v/v) in comparison to the Thymi oil (toluene and ethyl acetate; 97.5 : 2.5% v/v). The results of separation of Juniperi Oleum and Thymi Oleum are presented as photos in Figures 1 and 2, respectively. However, the purity of separated zones is unknown. Therefore, the development of the chromatogram in the perpendicular direction with gradient of the mobile phase is undertaken. The development programs for eluents realized with MGD-2D TLC have been determined experimentally and are presented in Tables 1 and 2 for Juniperi Oleum and for Thymi Oleum, correspondingly. Decreasing of the separation distances and simultaneously increasing of the mobile phase polarity during the multiple plate developments enhance the separation of the polar compound zones on one hand and keep nonpolar compound zones separated, on the other hand.

Table 1: The program used for four-step gradient elution for the development in second dimension for Juniperi Oleum.

Mobile phase
Step number 1
Step number 2
Step number 3
Step number 4

Toluene
99.0
97.0
96.0
92.0

Ethyl acetate
1.0
3.0
4.0
8.0

Development distance (cm)
10.0
9.5
8.0
6.0

The composition is given in % v/v.

Table 2: The program used for five-step gradient elution for the development in second dimension for Thymi Oleum.

Mobile phase
Step number 1
Step number 2
Step number 3
Step number 4
Step number 5

Toluene
100.0
99.0
98.0
97.0
97.0

Ethyl acetate
0.0
1.0
2.0
3.0
3.0

Development distance (cm)
10.0
9.0
9.0
8.0
8.0

The composition is given in % v/v.

Figure 1: 1D separation of Juniperi Oleum compounds. The mobile phase: toluene and ethyl acetate (94 : 6 v/v). The zones were derivatized with the anise aldehyde-sulphuric (VI) acid reagent.

(a)

(b)

Figure 2: The 1D-TLC separation of Thymi Oleum compounds. The mobile phase: toluene and ethyl acetate (97.5 : 2.5 v/v). The two modes of compounds derivatization: (a) anise aldehyde-sulphuric (VI) acid reagent and (b) vanillin in ethanol reagent.

The separation of Juniperi Oleum with MGD-2D-TLC technique is presented in Figure 3(a). The application of new mode of development leads to achieving five additional zones of compound number 6 from isocratic system (Figure 1) denoted as 6a, 6b, 6c, 6d, 6e, and 6f (densitogram, Figure 3(b)). Also, compound number 9 from one-dimensional development (Figure 1) turns to be the mixture since five additional spots are detected (see densitogram in Figure 3(c)).

(a)

(b)

(c)

Figure 3: (a) MGD-2D TLC separation of Juniperi Oleum compounds. The program of eluent for second dimension development is presented in Table 1. The spots were derivatized with the anise aldehyde-sulphuric (VI) acid reagent. (b) Densitogram of the separation of compound 6 ( from isocratic elution) into additional bands by means of MGD-2D-TLC. Peaks with 6e and 6f were not visible with the applied wavelength (560 nm). (c) Densitogram presenting the separation of compound number 9 (, from isocratic elution) into additional bands by means of MGD-2D TLC. Peaks with low values, not marked on the densitogram, were not visible with the naked eye. Their detection was performed by densitometry at the wavelength of 560 nm (compare Figures 1 and 3).

Correspondingly, Thymi Oleum is analysed with the new technique. The enhancement of the zone numbers is presented in Figure 4(a). Some of the identified solutes from one-dimensional development (Figure 2) such as compounds number 3 (thymol, ), number 4 (1,8-cyneole, ), number 6 (linalool, ), and number 8 (borneol, ) are separated into additional zones (number 3 into 3(a) and 3(b); numbers 4 and 8 into 4 extra zones; number 6 into 6 extra zones). The only pure zone turns to be carvacrol (compound number 2). Overlaid of Thymi Oleum separation densitograms obtained with MGD-2D TLC technique is presented in Figure 4(b).

(a)

(b)

Figure 4: (a) MGD-2D TLC chromatogram presenting the separation of Thymi Oleum compounds. The eluent gradient program for second dimension development is presented in Table 2. Solutes were derivatized with the anise aldehyde-sulphuric (VI) acid reagent. (b) Overlaid densitograms of the Thymi Oleum separations into additional bands by means of MGD-2D TLC. The eluent gradient program for second dimension development from Table 2.

The essential differences between single, isocratic development and MGD-2D-TLC of investigated oils are summarized in Tables 3 and 4. The application of MGD-2D TLC to Juniperi Oleum separation brings about the enhancement of number of separated spots from 13 (from 1D, isocratic development) into 34. What is more, the same effect was observed for the second separated oil. Only 11 zones were obtained by simple isocratic TLC separation of Thymi Oleum while in the new technique the number increased to 31.

Table 3: The comparison of efficiency of JuniperiOleum separation by means of two methods: isocratic elution and MGD-2D TLC. Compounds applied in order of decreasing value and increasing polarity.

Isocratic elution
MGD-2D TLC

Number of band

1
0.99
Band number

2
0.68
Band number

3
0.59
Band number

4
0.53
Band number 4

5
0.46
Band number 5

6
0.43
Band number

7
0.34
Band number 7

8
0.24
Band number

9
0.23
Band number

10
0.14
Band number 10

11
0.06
Band number 11

12
0.04
Band number 12

Table 4: The comparison of efficiency of ThymiOleum separation by means of two methods: isocratic elution and MGD-2D TLC. The identification of particular compounds was performed according to values given in the literature.

Isocratic elution
MGD-2D TLC

Number of band

Compound

1
0.99
Unknown
Band number

2
0.63
Carvacrol
Band number 2

3
0.61
Thymol
Band number

4
0.55
1,8-Cyneole
Band number

5
0.49
α-Terpineol
Band number 5

6
0.37
Linalool
Band number

7
0.26
p-Cymene
Band number 7

8
0.24
Borneol
Band number

9
0.11
Unknown
Band number 9

10
0.04
Unknown
Band number 10

11
0.01
Unknown
Band number

The detailed description of the novel MGD-2D TLC technique has been published in Polish Patent [8].

4. Conclusions

The successful application of the above-mentioned technique for separation of Juniperi Oleum and Thymi Oleum as model complex mixtures makes it promising to further investigations. Continuation of this study will consist in spectrophotometric estimation of purity of separated zones.

The presented results indicate that a determination of the purity of separated zones in planar chromatography cannot be based on a simple isocratic technique. Application of two-dimensional multiple gradient development leads to the isolation of minor compound in the presence of dominant one. Additionally, changes of the development distances make this technique promising for separation of polar compounds. New method enables also more reliable estimation of the pharmacological properties of the components (e.g., lipophilicity). What is more, compact, concentrated zones of solutes may be further investigated with the use of various detectors, for example, mass spectrometry or diode array spectrophotometry.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

References

Y.-K. Qiu, F.-F. Chen, L.-L. Zhang et al., “Two-dimensional preparative liquid chromatography system for preparative separation of minor amount components from complicated natural products,” Analytica Chimica Acta, vol. 820, pp. 176–186, 2014.

X. Y. Wang, J. F. Li, Y. M. Jian, Z. Wu, M. J. Fang, and Y. K. Qiu, “On-line comprehensive two-dimensional normal-phase liquid chromatography × reversed-phase liquid chromatography for preparative isolation of Peucedanum praeruptorum,” Journal of Chromatography A, vol. 1387, pp. 60–68, 2015.

M. A. Hawrył, R. Nowak, and M. Waksmundzka-Hajnos, “Two-dimensional thin-layer chromatographic determination of phenolic antioxidants from Eupatorium cannabinum extracts on cyano-bonded polar stationary phases,” Journal of Planar Chromatography, vol. 25, no. 5, pp. 394–402, 2012.

M. Kozyra and K. Głowniak, “Phenolic acids in extracts obtained from the flowering herbs of Cirsium vulgare (Savi) Ten. growing in Poland,” Acta Societatis Botanicorum Poloniae, vol. 82, no. 4, pp. 325–329, 2013.

M. A. Hawrył, M. A. Niemiec, and M. Waksmundzka-Hajnos, “Micro-two-dimensional TLC in search of selected Mentha sp. extracts for their composition and antioxidative activity,” Journal of Planar Chromatography, vol. 26, no. 2, pp. 141–146, 2013.

T. Tuzimski, “New procedure for analysis of complex mixtures by use of multidimensional planar chromatography in combination with diode-array scanning densitometry and high-performance liquid chromatography coupled with diode-array detection,” Journal of Planar Chromatography, vol. 23, no. 3, pp. 184–189, 2010.

G. Matysik, A. Skalska-Kamińska, B. Stefańczyk, M. Wójciak-Kosior, and D. Rapa, “Application of a new technique in two-dimensional TLC separation of multicomponent mixtures,” Journal of Planar Chromatography, vol. 21, no. 4, pp. 233–236, 2008.

E. G. Matysik, A. Woźniak, R. Paduch, R. Kocjan, and H. Donica, Polish Patent, PL (11) 218715 B1

N. G. Hădărugă, A. G. Branic, D. I. Hădărugă et al., “Comparative study of Juniperus communis and Juniperus virginiana essential oils: TLC and GC analysis,” Journal of Planar Chromatography, vol. 24, no. 2, pp. 130–135, 2011.

Á. M. Móricz, G. Horváth, P. Molnár et al., “Investigation of Thyme (Thymus vulgaris L.) essential oil by use of the BioArena system,” Journal of Planar Chromatography, vol. 23, no. 6, pp. 406–410, 2010.

G. Horvath, N. Jambor, A. Vegh et al., “Antimicrobial activity of essential oils: the possibilities of TLC—bioautography,” Flavour and Fragrance Journal, vol. 25, pp. 178–182, 2010.

M. Höferl, I. Stoilova, E. Schmidt et al., “Chemical composition and antioxidant properties of Juniper berry (Juniperus communis L.) essential oil. Action of the essential oil on the antioxidant protection of Saccharomyces cerevisiae model organism,” Antioxodants, vol. 3, no. 1, pp. 81–98, 2014.