Journal of Analytical Methods in Chemistry
Volume 2018 (2018), Article ID 8427580, 7 pages
https://doi.org/10.1155/2018/8427580

Research Article

Isolation of Aflatoxin B1 from Moldy Foods by Solid-Phase Extraction Combined with Bifunctional Ionic Liquid-Based Silicas

Luwei Fang, Minglei Tian, Xuemin Yan, and Wei Xiao

College of Chemistry and Environmental Engineering, Yangtze University, Jingzhou, Hubei 434023, China

Correspondence should be addressed to Minglei Tian; tianm086@126.com

Received 2 August 2018; Revised 12 October 2018; Accepted 16 October 2018; Published 8 November 2018

Academic Editor: Krishna K. Verma

Copyright © 2018 Luwei Fang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A solid-phase extraction method was developed by using new bifunctional ionic liquid-based silicas as sorbents to isolate aflatoxin B1 from moldy corn and peanut. Firstly, according to the adsorption efficiency, two sorbents imidazolium chloride-butylimidazolium chloride-based silica (Sil@BIm-Im) and imidazolium chloride-hexylimidazolium chloride-based silica (Sil@HIm-Im) were selected. The RSM was introduced to optimize adsorption conditions such as methanol/water ratio, time, and pH. Sil@HIm-Im, which had the highest adsorption efficiency, was used in SPE as a sorbent. After 2.0 mL of loading samples, washing solvents were optimized as 6.0 mL and 4.0 mL of water for corn and peanut, 2.0 mL of acetonitrile, and 3.0 mL of methanol. 3.0 mL of methanol/acetic acid (2.0% vol.) was investigated as an elution solvent. Finally, 0.009 μg/g and 0.023 μg/g of aflatoxin B1 were obtained in corn and peanut extract with recoveries of 80.0%–103.3% and RSDs of 2.37%–6.58%.

1. Introduction

Aflatoxins (AFs) such as B1, B2, G1, and G2 are natural secondary metabolites that are produced by molds [1]. AFs are found as contaminants in various agricultural commodities such as cereals, tree nuts, groundnut, and cottonseed [2]. They are considered the most serious threat to public health due to their carcinogenic and hepatotoxic, teratogenic and mutagenic effect in human and animals [3–5].

Various methods have been published to reduce or detoxify aflatoxins; however, no treatment has been found to be effective against aflatoxins [6]. Several chemicals such as oxidizing and reducing agents, acids or bases, salts, and chlorinating agents have been investigated to degrade or detoxify aflatoxin; however, the results of these treatments were not satisfactory [7–9]. Hence, some researchers applied various methods to detect AFs. Furthermore, chromatographic methods were applied to adsorb AFs. L. Sun reported a fluorescence anisotropy (FA) assay for detection of AFB1 binding [10]. Another pELISA method exhibited a high sensitivity for AFB1 visual detection with a limit of 12.5 pg/mL [11]. Mazaheri used HPLC with a C₁₈ column to detect aflatoxins in 71 rice samples, and 1.89 ng/g of AFB1 was found in all samples [12]. Herzallah detected aflatoxins in several food products using HPLC, and the contents were in the range from 0.15 to 8.32 μg/L [13]. Zahoor and Khan prepared magnetic carbon nanocomposites to adsorb aflatoxin from poultry feed. The adsorption time was 115.0 min at pH = 3.0 while 150.0 min at pH = 7.0 [14].

In the previous method, large amount of solvents especially organic solvents were regulated as another kind of pollutants in the process. So, solid-phase extraction (SPE) as one of the most convenient and high-performance separation technologies can help minimize the use of organic solvents [15]. In order to adsorb AFs, the selection of the sorbent is a key point because it can control analytical parameters such as adsorbed amount, selectivity, and affinity.

Ventura et al. used an Oasis HLB SPE cartridge with HPLC/MS to detect four aflatoxins in a herb, 2.0 mL of methanol/water (30 : 70, vol%) was used as a washing solvent, and 4.0 mL of methanol/water (80 : 20, vol%) was used as an elution solvent [16]. Liu et al. synthesized an aptamer-functionalized magnetic agarose microsphere and applied it in SPE to adsorb AFB1 and AFB2 with an HPLC-fluorescence detection. The binding capacity is 350.0 ng/g for AFB1 and 384.0 ng/g for AFB2, and 1.0 mL of methanol/eluting buffer (20 : 80, v/v) was used as an elution solvent [17].

However, low- or nontoxic solvent/sorbents are still needed urgently. Therefore, ionic liquids (ILs) were introduced and received many attentions. ILs, as green solvents with excellent chemical properties [18], are already employed as a modifier in the fields of analytical chemistry [19, 20], sample preparation [21, 22], organic synthesis [23–25], liquid-phase extraction [26–28], and chromatographic separations [29]. The characteristics, such as hydrophobicity, miscibility with several inorganic/organic solvents, and interactions between analyte and functional groups of the ionic liquids, are widely applied [30]. Some reports have examined the application of obtained ionic liquid-modified materials to separate familiar organic compounds [31, 32].

In this research, AFB1 was adsorbed using bifunctional ionic liquid-based silicas. During the adsorption, surface response methodology (RSM) with the Design-Expert software optimized three variable conditions such as methanol/water ratio, adsorption time, and pH. Finally, the sorbent isolated AFB1 from extracts of moldy corn and peanut with the SPE method. The work is expected to develop the SPE method based on unique sorbent and extend their potential application in the separation and purification of other compounds.

2. Materials and Methods

2.1. Materials

Silica (15–31 μm), (3-chloropropyl)trimethoxysilan (98%), imidazole (99%), 1-methylimidazole (99%), 1-ethylimidazole (98%), 1-butylimidazole (98%), 1,2-dichloroethane (99%), 1,4-dichlorobutane (98%), 1,6-dichlorohexane (99%), and aflatoxin B1 (>98%) were purchased from Aladdin Inc. (Shanghai, China). The HPLC grade of acetonitrile and methanol was from CINC High Purity Solvents Co. Ltd. (Shanghai, China). Other organic solvents such as acetone, ethanol, toluene, and triethylamine were supplied by Beilian Company (Tianjing, China), and purities were higher than 99.0%. Ultrapure water was produced by a purification machine (UPH-I-5, Youpu, China), and all organic solvents should be filtered before use.

2.2. Preparation of Bifunctional IL-Based Silicas

Silica was activated by stirring in 10.0% vol. HCl aqueous solution for 24 hr and washed by water until pH = 7.0. Then, the activated silica was synthesized by the following steps shown in Figure 1. Firstly, chlorine was modified on the silica surface by adding (3-chloropropyl)trimethoxysilane as a coupling compound. Subsequently, 30.0 g of activated silica, 40.0 mL of (3-chloropropyl)trimethoxysilane, and 80.0 mL of toluene were well stirred and heated to 100°C in a flask for 12 hr. The obtained powder (3-chloropropyl-based silica, Sil@Cl) was then washed with ethanol and fully dried. All obtained Sil@Cl, 25.0 g of imidazole, 20.0 mL of triethylamine, and 80.0 mL of toluene were mixed and synthesized in a flask for 8 hr under 100°C, and then, the silica@imizadole was obtained. After that, three flasks were prepared, and 8.0 g of silica@imizadole was mixed with 80.0 mL of toluene in each flask. Then, 10.0 mL of 1,4-dichlorobutane and 1,6-dichlorohexane were added into each flask, respectively. After all flasks were heated to 100°C for 12 hr, chlorinated IL-based silicas Sil@BIm-Cl and Sil@HIm-Cl were obtained. At last, 1.5 g of these two obtained silicas and different types of imidazoles were synthesized in 50.0 mL of toluene: Sil@BIm-Im (imidazolium chloride-butylimidazolium chloride-based silica), Sil@BIm-MIm (methyimidazolium chloride-butylimidazolium chloride-based silica), Sil@BIm-EIm (ethylimidazolium chloride-butylimidazolium chloride-based silica), Sil@BIm-BIm (double butylimidazolium chlorides-based silica), Sil@HIm-Im (imidazolium chloride-hexylimidazolium chloride-based silica), Sil@HIm-MIm (methylimidazolium chloride-hexylimidazolium chloride-based silica), Sil@HIm-EIm (ethylimidazolium chloride-hexylimidazolium chloride-based silica), and Sil@HIm-BIm (butylimidazolium chloride-hexylimidazolium chloride-based silica).

Figure 1: Synthesis process of IL-based silicas.

2.3. Apparatus

The characteristics of all obtained IL-based silicas were analyzed by FT-IR (Nicolet 6700, Thermo Fisher, Waltham, USA) in the range of 400–4000 cm⁻¹ with a scan rate of 20 scans/min and TGA (Labsys evo, Setaram, Caluire, France) with a heating rate of 10°C/min under N₂. The chromatographic conditions were as follows: HPLC (LC3000, CXTH, Beijing, China) with a TC-C18 column (4.6 × 250 mm, 5 μm, Agilent, USA), and acetonitrile/water (40 : 60, v/v) was used as the mobile phase. The flow rate, UV wavelength, injection volume, and column oven temperature were 0.8 mL/min, 365 nm, 5.0 μL, and 35°C, respectively.

2.4. Adsorbent Selection and Optimization of Conditions by RSM

First of all, 0.1 g of all IL-based silicas mixed with 1.0 mL of 0.1 μg/mL of aflatoxin B1 in methanol within 5.0 min at ambient temperature by the liquid-solid adsorption method and the adsorption amounts of all sorbents were detected by analyzing the concentration in liquid layers.

Then, the adsorption conditions were optimized by Design-Expert software (v.8.0.6, Stat-Ease, Inc, Minneapolis, USA). The BBD model in RSM was used, and according to physical and chemical properties of aflatoxin B1, three major factors such as methanol/water ratio, adsorption time, and pH, which can significantly affect the maximum adsorption amount, were selected. Three factors of the BBD were designated A, B, C and divided into three levels in Table 1. The codes −1, 0, and +1 were assigned as low, intermediate, and high values, respectively.

Table 1: Levels of independent variables used in BBD.

Variables
Level

−1
0
+1

Methanol/water (v : v) (A)
20/80
60/40
100/0

Adsorption time (min) (B)
5.0
17.5
30.0

pH (C)
2.0
4.5
7.0

2.5. Procedure of SPE

Figure 2 shows the process of SPE. 0.1 g of IL-based silicas was packed into an empty SPE cartridge (Ø 0.9 cm, Alltech, Deerfield, IL, USA). The SPE-Sil@IL cartridge was conditioned with 10.0 mL methanol. After the sample solution loading on the sorbents, hexane, water, acetonitrile, and methanol were used as washing solvents and methanol/acetic acid (2.0% vol.) as the elution. The solvents collected from the washing and elution steps were analyzed by HPLC.

Figure 2: Process of SPE and adsorption mechanism.

2.6. Preparation of Moldy Food Samples

Peanut and corn were stored under a high moisture aerobic ambient at 30°C for a month. Then, the moldy samples were ground to powder, and 25.0 g of them were dipped in 50.0 mL of methanol over 24 hr. The obtained extracts were filtered and stored at 4°C for further analysis.

3. Results and Discussion

3.1. Characterization

In the FT-IR spectra (Figure 3), silica showed a wide peak at 3429 cm⁻¹ and this peak belonged to the –OH group. In Sil@Cl, the –OH peak decreased and C-Cl peak at 695 cm⁻¹ appeared. After modification, the IL-based silicas showed the appearance of peaks nearby 1565 cm⁻¹ which is the fingerprint region of IL groups, and the C-Cl peak disappeared. Moreover, the vibration range of C-H group in alkanes is 2850–3000 cm⁻¹. So, the peaks at 2917 cm⁻¹ belonged to the carbon chain on the IL group, also the peak area increased with the carbon chain length increasing [33, 34].

Figure 3: FT-IR of silica and IL-based silicas.

Thermogravimetric analysis (TGA) can determine the thermostability of the additional groups on silica with the weight loss. Figure 4 shows that, under 700°C, the sorbents contained more functional IL groups that lost more weight from 12.80 to 21.26%. Both FT-IR and TGA results indicated that the bifunctional IL groups were successfully modified on silica.

Figure 4: TGA for silica and IL-based silicas.

3.2. Adsorbent Selection and Optimization of Conditions

First of all, the calibration curves were constructed using the chromatographic peak areas measured at several increasing concentrations of aflatoxin B1 ranging from 0.001 to 10.0 μg/mL. Good linearity was obtained, and the linear correlation equations were y = 1 × 10⁻⁷x − 4643 (R² = 0.994) (y is peak area and x is the concentration>).

Table 2 shows the adsorption amount of aflatoxin B1 on different sorbents. Because of the structure of aflatoxin B1, it was a hydrophobic compound and contained several oxygen groups, hydrogen groups, and benzene rings. So, between the IL group and aflatoxin B1, there were hydrogen and interactions. Also, the hydrophobicity of the carbon chains between two IL groups had strong interaction on aflatoxin B1. In this case, IL-based silicas obtained much more adsorbed amount than C₁₈. In addition, the carbon chain on the end of the IL group also had hydrophobicity. However, when the chain was too long, it would swing and may cover the inner IL group to weaken the effect and break chemical bonds. So, from the results, the adsorption amounts on IL with long carbon chain decreased. Hence, Sil@BIm-Im and Sil@HIm-Im were selected, and the optimized adsorption conditions of them were design by RSM.

Table 2: Adsorption amounts of aflatoxin B1 on 0.1 g of different sorbents within 5 min at ambient temperature.

Sorbent
Loading volume
Loading concentration
Adsorption amount (μg/g)

Sil@BIm-Im
1.0 mL
0.1 μg/mL in methanol
0.33

Sil@BIm-MIm
0.32

Sil@BIm-EIm
0.27

Sil@BIm-BIm
0.19

Sil@HIm-Im
0.32

Sil@HIm-MIm
0.31

Sil@HIm-EIm
0.25

Sil@HIm-BIm
0.18

C₁₈
0.19

According to the results from the designed experiments by software, the model proposed for the response of the adsorbed amounts of aflatoxin B1 was determined as Equations (1) and (2):

For both equations, the model F values higher than 39.59 and Prob>F less than 0.05 indicated that the models were significant. The value of R² = 0.9941 for Equation (1) and R² = 0.9807 for Equation (2) showed a high correlation degree between the observed and predicted adsorbed amounts. The software gave the following optimized conditions: methanol/water (96 : 4, vol%), 26.63 min of adsorption, and pH = 6.5 of Sil@BIm-Im; methanol/water (99 : 1, vol%), 29.73 min of adsorption, and pH = 6.8 of Sil@HIm-Im. Under the optimized conditions, the adsorption amount of Sil@HIm-Im is 13.46% higher than Sil@BIm-Im.

Then, the ambient temperature was changed on all sorbents. In Figure 5, the results showed that under high temperature, the adsorption efficiencies of all sorbents decreased. Hence, the appropriate temperature was 25°C for Sil@BIm-Im and 30°C for Sil@HIm-Im, respectively. Summarizing all above results, Sil@HIm-Im showed higher efficiency than other sorbents, and it was selected for the next step.

(a)

(b)

Figure 5: Adsorption amounts of IL-based silicas at different temperatures.

3.3. Isolation of Aflatoxin B1 from Extracts by SPE

Two microliters of the extract solution was loaded onto Sil@HIm-Im with 30.0 min adsorption. After loading, a washing step should be applied immediately to reduce the matrix interferences in separation.

First, 1.0 mL of hexane, water, ethanol, acetonitrile, and methanol were used to remove hydrophobic/hydrophilic and organic interference without aflatoxin B1. However, hexane and ethanol could remove almost nothing from the sorbent. So water and acetonitrile were selected. Then, the volumes of water and acetonitrile were increased to remove more interferences. The corn extract contained more water-soluble substances, so, it needed more water than the peanut extract. According to the obviously decreasing of interferences peak area in chromatograms, 6.0 mL and 4.0 mL of washing water was used for corn and peanut extracts, respectively. And 2.0 mL of acetonitrile was used for both extracts. Large amount of interferences was washed out by methanol; however, when the volume was larger than 3.0 mL, a small amount of aflatoxin B1 could be removed. So, 3.0 mL of methanol was selected.

Then, methanol/acetic acid (2.0% vol.) and acetonitrile/acetic acid (2.0% vol.) with a higher eluting strength were used as elution solvents. The results showed that 3.0 mL of methanol/acetic acid (2.0% vol.) had more efficiency than acetonitrile/acetic acid (2.0% vol.) and could elute all aflatoxin B1 from the sorbent. Figure 6 reveals that the aflatoxin B1 was successfully isolated from the extract. Finally, 0.009 μg/g and 0.023 μg/g of aflatoxin B1 were obtained in corn and peanut extracts, respectively.

Figure 6: Chromatograms of standard, extract, washing, and elution solutions.

3.4. Repeatability and Stability on the Performance

In corn and peanut extract solutions, a certain concentration of aflatoxin B1 was spiked and analyzed to calculate the recoveries. Assays of repeatability calculated as relative standard deviations (RSDs) were performed with Sil@HIm-Im by SPE process 5 times in a 5-day period. The recoveries and RSDs are presented in Table 3. Good recoveries of 80.0%–103.3% and RSDs of 2.37%–6.58% were obtained. The results mean that the sorbent is reliable for real samples.

Table 3: The recoveries and RSDs in real samples ().

Sample
Added (μg/g)
Founded (μg/g)
Recovery (%)
Intraday RSD (%)
Interday RSD (%)

Corn
0.000
0.009
—
2.37
3.13

0.010
0.009
90.0
4.35
4.56

0.030
0.037
93.3
4.58
4.63

0.050
0.058
98.0
5.44
5.86

0.100
0.111
102.0
5.87
6.03

Peanut
0.000
0.023
—
2.77
3.29

0.010
0.031
80.0
3.86
3.89

0.030
0.054
103.3
4.24
4.97

0.050
0.073
100.0
4.21
4.68

0.100
0.121
98.0
6.01
6.58

4. Conclusions

In this study, bifunctional ionic liquid-based silicas were created and applied in SPE to isolate aflatoxin B1 from moldy corn and peanut extracts. According to the adsorption amount by the standard solution, more aflatoxin B1 was adsorbed on Sil@BIm-Im and Sil@HIm-Im. With the designed experiment of RSM, Sil@HIm-Im was selected as the SPE sorbent, and the optimized conditions were methanol/water (99 : 1, vol%), 29.73 min of adsorption, and pH = 6.8. In addition, the ambient temperature was evaluated, and the results proved Sil@HIm-Im to be the SPE sorbent. Finally, washing by water and acetonitrile and eluting by 3.0 mL of methanol/acetic acid (2.0% vol.), 0.009 μg/g and 0.023 μg/g of aflatoxin B1 were obtained in corn and peanut extracts. The low deviation error, stable characteristics, and application demonstrated the sorbent to be a viable alternative tool for further researches.

Data Availability

The data given in Introduction to support the findings of this study have been deposited in the repository. All data given in Materials and Methods and Results and Discussion to support the findings of this study are included within the article.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This work was supported by the National Natural Science Foundation of China (Nos. 51503020 and 51874046) and by the program of China Scholarships Council (No. 201808420038).

References

A. Tarín, M. G. Rosell, and X. Guardino, “Use of high-performance liquid chromatography to assess airborne mycotoxins: aflatoxins and ochratoxin A,” Journal of Chromatographic A, vol. 1047, no. 2, pp. 235–240, 2004.

A. Pittet, “Natural occurrence of mycotoxins in foods and feeds-an updated review,” Revue de médecine vétérinaire, vol. 149, no. 6, pp. 479–492, 1998.

U. Maqbool, M. Ahmad, A. Haq, and M. M. Iqbal, “Determination of aflatoxin-B1 in poultry feed and its components employing enzyme linked immunosorbent assay (ELISA),” Toxicological Environmental and Chemistry Reviews, vol. 86, no. 4, pp. 213–218, 2004.

J. Wang, X. Shen, X. He et al., “Protective alteration in phase 1 and 2 metabolism of aflatoxin B1 by Oltipraz in residents of Qidong, People’s Republic of China,” Journal of the National Cancer Institute, vol. 91, no. 4, pp. 347–354, 1999.

C. P. Wild and P. C. Turner, “The toxicology of aflatoxins as a basis for public health decisions,” Mutagenesis, vol. 17, no. 6, pp. 471–481, 2002.

E. M. Binder, “Managing the risk of mycotoxins in modern feed production,” Animal Feed Science and Technology, vol. 133, no. 1-2, pp. 149–166, 2007.

S. Amezqueta, E. Gonzalez-Penas, M. Murillo-Arbizu, and A. L. Cerain, “Ochratoxin A decontamination: a review,” Food Control, vol. 20, no. 4, pp. 326–333, 2009.

W. A. Awad, K. Ghareeb, J. Böhm, and J. Zentek, “Decontamination and detoxification strategies for the Fusarium mycotoxin deoxynivalenol in animal feed and the effectiveness of microbial biodegradation,” Food Additives and Contaminants Part A, vol. 27, no. 4, pp. 510–520, 2010.

J. He, T. Zhou, J. C. Young, G. J. Boland, and P. M. Scott, “Chemical and biological transformations for detoxification of trichothecene mycotoxins in human and animal food chains: a review,” Trend in Food Science and Technology, vol. 21, no. 2, pp. 67–76, 2010.

L. Sun and Q. Zhao, “Direct fluorescence anisotropy approach for aflatoxin B1 detection and affinity binding study by using single tetramethylrhodamine labeled aptamer,” Talanta, vol. 189, pp. 442–450, 2018.

Y. Xiong, K. Pei, Y. Wu, H. Duan, W. Lai, and Y. Xiong, “Plasmonic ELISA based on enzyme-assisted etching of Au nanorods for the highly sensitive detection of aflatoxin B₁ in corn samples,” Sensors and Actuators B: Chemical, vol. 267, pp. 320–327, 2018.

M. Mazaheri, “Determination of aflatoxins in imported rice to Iran,” Food and Chemical Toxicology, vol. 47, no. 8, pp. 2064–2066, 2009.

S. M. Herzallah, “Determination of aflatoxins in eggs, milk, meat and meat products using HPLC fluorescent and UV detectors,” Food Chemistry, vol. 114, no. 3, pp. 1141–1146, 2009.

M. Zahoor and F. A. Khan, “Adsorption of aflatoxin B1 on magnetic carbon nanocomposites prepared from bagasse,” Arabian Journal of Chemistry, vol. 11, no. 5, pp. 729–738, 2018.

L. Wang, H. Yan, C. Yang, Z. Li, and F. Qiao, “Synthesis of mimic molecularly imprinted ordered mesoporous silica adsorbent by thermally reversible semi covalent approach for pipette-tip solid-phase extraction-liquid chromatography fluorescence determination of estradiol in milk,” Journal of Chromatogrphy A, vol. 1456, pp. 58–67, 2016.

M. Ventura, A. Gόmez, I. Anaya et al., “Determination of aflatoxins B1, G1, B2 and G2 in medicinal herbs by liquid chromatography–tandem mass spectrometry,” Journal of Chromatogrphy A, vol. 1048, no. 1, pp. 25–29, 2004.

H. Liu, A. Lu, H. Fu et al., “Affinity capture of aflatoxin B1 and B2 by aptamer-functionalized magnetic agarose microspheres prior to their determination by HPLC,” Microchimica Acta, vol. 185, no. 7, p. 326, 2018.

D. H. Zhang, S. Bai, M. Y. Ren, and Y. Sun, “Optimization of lipase-catalyzed enantioselective esterification of (±)-menthol in ionic liquid,” Food Chemistry, vol. 109, no. 1, pp. 72–80, 2008.

S. Pandey, “Analytical applications of room-temperature ionic liquids: a review of recent efforts,” Analytic Chimica Acta, vol. 556, no. 1, pp. 38–45, 2006.

J. Nawała, B. Dawidziuk, D. Dziedzic, D. Gordon, and S. Popiel, “Applications of ionic liquids in analytical chemistry with a particular emphasis on their use in solid-phase microextraction,” TrAC Trends in Analytical Chemistry, vol. 105, pp. 18–36, 2018.

J. F. Liu, G. B. Jiang, and J. Å. Jönsson, “Application of ionic liquids in analytical chemistry,” Trends in Analytical Chemistry, vol. 24, no. 1, pp. 20–27, 2005.

Z. Fan and H. Yu, “Determination of piperidinium ionic liquid cations in environmental water samples by solid phase extraction and hydrophilic interaction liquid chromatography,” Journal of Chromatography A, vol. 1559, pp. 136–140, 2018.

S. J. Nara, J. R. Harjani, and M. M. Salunkhe, “Friedel-crafts sulfonylation in 1-butyl-3-methylimidazolium chloroaluminate ionic liquids,” Journal of Organic Chemistry, vol. 66, no. 25, pp. 8616–8620, 2001.

T. M. Potewar, R. N. Nadaf, T. Daniel, R. J. Lahoti, and K. V. Srinivasan, “A novel one‐pot synthesis of 2-Aryl-4(3H)-Quinazolinones using room temperature ionic liquid as reaction medium as well as promoter,” Synthetic Communications, vol. 35, no. 2, pp. 231–241, 2007.

M. I. Nessim, M. T. Zaky, and M. A. Deyab, “Three new gemini ionic liquids: synthesis, characterizations and anticorrosion applications,” Journal of Molecular Liquids, vol. 266, pp. 703–710, 2018.

J. Liu, G. Jiang, Y. Chi, Y. Cai, Q. Zhou, and J. T. Hu, “Use of ionic liquids for liquid-phase microextraction of polycyclic aromatic hydrocarbons,” Analytical Chemistry, vol. 75, no. 21, pp. 5870–5876, 2003.

K. S. Khachatryan, S. V. Smirnova, I. I. Torocheshnikova, N. V. Shvedene, A. A. Formanovsky, and I. V. Pletnev, “Solvent extraction and extraction-voltammetric determination of phenols using room temperature ionic liquid,” Analytical and Bioanalytical Chemistry, vol. 381, no. 2, pp. 464–470, 2005.

M. Matsumiya, M. Sumi, Y. Uchino, and I. Yanagi, “Recovery of indium based on the combined methods of ionic liquid extraction and electrodeposition,” Separation and Purification Technology, vol. 201, pp. 25–29, 2018.

H. Yan, M. Gao, and J. Qiao, “New ionic liquid modified polymeric microspheres for solid-phase extraction of four Sudan dyes in foodstuff samples,” Journal of Agricultural and Food Chemistry, vol. 60, no. 27, pp. 6907–6912, 2012.

W. Bi, M. Tian, and K. H. Row, “Solid-phase extraction of matrine and oxymatrine from Sophora Flavescens Ait using amino-imidazolium polymer,” Journal of Separation Science, vol. 33, no. 12, pp. 1739–1745, 2010.

Y. Han, C. Yang, Y. Zhou, D. Han, and H. Yan, “Ionic liquid-hybrid molecularly imprinted material-filter solid-phase extraction coupled with HPLC for determination of 6-benzyladenine and 4-chlorophenoxyacetic acid in bean sprouts,” Journal of Agricultural and Food Chemistry, vol. 65, no. 8, pp. 1750–1757, 2017.

H. Chen, Y. Yuan, C. Xiang, H. Yan, Y. Han, and F. Qiao, “Graphene/multi-walled carbon nanotubes functionalized with an amine-terminated ionic liquid for determination of (Z)-3-(chloromethylene)-6-fluorothiochroman-4-one in urine,” Journal of Chromatography A, vol. 1474, pp. 23–31, 2016.

M. Tian, W. Bi, and K. H. Row, “Molecular imprinting in ionic liquid-modified porous polymer for recognitive separation of three tanshinones from Salvia miltiorrhiza Bunge,” Analytical and Bioanalytical Chemistry, vol. 399, no. 7, pp. 2495–2502, 2011.

T. Ramanathan, F. T. Fisher, R. S. Ruoff, and L. C. Brinson, “Amino-functionalized carbon nanotubes for binding to polymers and biological systems,” Chemistry of Materials, vol. 17, no. 6, pp. 1290–1295, 2005.