Journal of Chemistry
Volume 2019 (2019), Article ID 9730629, 1 page
https://doi.org/10.1155/2019/9730629

Corrigendum

Corrigendum to “Removal of Lead from Synthetic Solutions by Protonated Teleosts Biomass”

Journal of Chemistry

Received 28 January 2019; Accepted 28 January 2019; Published 28 April 2019

Copyright © 2019 Journal of Chemistry. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The article titled “Removal of Lead from Synthetic Solutions by Protonated Teleosts Biomass” [1] published in E-Journal of Chemistry in 2012 was found to contain material from published work without citation. The articles are as follows:

(i)M. H. Jnr and A. I. Spiff, “Effect of metal ion concentration on the biosorption of Pb2+ and Cd2+ by Caladium bicolor (wild cocoyam),” African Journal of Biotechnology, vol. 4, no. 2, pp. 191–196, 2005 [2].(ii)Y. Göksungur, S. Üren, and U. Güvenç, “Biosorption of copper ions by caustic treated waste baker’s yeast biomass,” Turkish Journal of Biology, vol. 27, pp. 23–29, 2003 [3].(iii)M. N. Zafar, I. Abbas, R. Nadeem, M. A. Sheikh, and M. A. Ghauri, “Removal of nickel onto alkali treated rice bran,” Water, Air, and Soil Pollution, vol. 197, no. 1–4, pp. 361–370, 2009, doi: 10.1007/s11270-008-9817-6 [4].(iv)P. King, N. Rakesh, S. Beenalahari, Y. Prasanna Kumar, and V. S. R. K. Prasad, “Removal of lead from aqueous solution using Syzygium cumini L.: Equilibrium and kinetic studies,” Journal of Hazardous Materials, vol. 142, no. 1–2, pp. 340–347, 2007, ISSN 0304–3894, doi: 10.1016/j.jhazmat.2006.08.027 [5].(v)M. Hussain Nasir, R. Nadeem, K. Akhtar, M. A. Hanif, and A. M. Khalid, “Efficacy of modified distillation sludge of rose (Rosa centifolia) petals for lead(II) and zinc(II) removal from aqueous solutions,” Journal of Hazardous Materials, vol. 147, no. 3, pp. 1006–1014, 2007, ISSN 0304–3894, doi: 10.1016/j.jhazmat.2007.01.131 [6].

The editorial board agreed to publish a corrigendum, but the corresponding author did not.

References

M. Aqeel Ashraf, M. Jamil Maah, and Y. Ismail, “Removal of lead from synthetic solutions by protonated teleosts biomass,” E-Journal of Chemistry, vol. 9, no. 1, pp. 345–353, 2012.

M. H. Jnr and A. I. Spiff, “Effect of metal ion concentration on the biosorption of Pb2+ and Cd2+ by Caladium bicolor (wild cocoyam),” African Journal of Biotechnology, vol. 4, no. 2, pp. 191–196, 2005.

Y. Göksungur, S. Üren, and U. Güvenç, “Biosorption of copper ions by caustic treated waste baker’s yeast biomass,” Turkish Journal of Biology, vol. 27, pp. 23–29, 2003.

M. N. Zafar, I. Abbas, R. Nadeem, M. A. Sheikh, and M. A. Ghauri, “Removal of Nickel onto Alkali treated Rice bran,” Water, Air, and Soil Pollution, vol. 197, no. 1–4, pp. 361–370, 2009.

P. King, N. Rakesh, S. Beenalahari, Y. Prasanna Kumar, and V. S. R. K. Prasad, “Removal of lead from aqueous solution using Syzygium cumini L.: Equilibrium and kinetic studies,” Journal of Hazardous Materials, vol. 142, no. 1–2, pp. 340–347, 2007.

M. Hussain Nasir, R. Nadeem, K. Akhtar, M. A. Hanif, and A. M. Khalid, “Efficacy of modified distillation sludge of rose (Rosa centifolia) petals for lead(II) and zinc(II) removal from aqueous solutions,” Journal of Hazardous Materials, vol. 147, no. 3, pp. 1006–1014, 2007.