Journal of Chemistry
Volume 2020 (2020), Article ID 1950645, 10 pages
https://doi.org/10.1155/2020/1950645

Research Article

Tunable Synthesis of Ultrathin BiOCl 2D Nanosheets for Efficient Photocatalytic Degradation of Carbamazepine upon Visible-Light Irradiation

Shuo Xu,¹ Xiaoya Gao,² Wenfeng Xu,¹ Pengfei Jin,¹ and Yongmei Kuang¹

¹Department of Pharmaceutical Science, Beijing Hospital, National Center of Gerontology, Institute of Geriatric Medicine, Chinese Academy of Medical Sciences, Beijing Key Laboratory of Drug Clinical Risk and Personalized Medication Evaluation, Beijing 100730, China
²Faculty of Environmental Science and Engineering, Kunming University of Science and Technology, Kunming 650500, China

Correspondence should be addressed to Shuo Xu; victoria06251226@163.com

Received 29 April 2020; Revised 8 July 2020; Accepted 15 July 2020; Published 13 August 2020

Guest Editor: Tapan Sarkar

Copyright © 2020 Shuo Xu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A series of ultrathin BiOCl 2D nanosheet photocatalysts were prepared by the TBAOH-assisted hydrolysis method in water. The effects of tetrabutylammonium hydroxide (TBAOH) dosages, chlorine source, preparation pH value, ultrasonic treatment, and magnetic stirring on the photocatalytic degradation dynamics of carbamazepine were examined under visible-light irradiation to optimize the preparation parameters. It was found that ultrathin BiOCl prepared with TBAOH dosages of 1 mmol and chlorine source of NaCl in the pH of 2 upon magnetic stirring of 6 h displayed the highest photocatalytic degradation rate constant (0.0038 min⁻¹) of carbamazepine, which is 7.6 times higher than that with the ordinary BiOCl (without TBAOH). To clarify the mechanism on the outstanding photocatalytic activity of ultrathin BiOCl, the elemental composition/state, micromorphology, and separation efficiency of photogenerated electron-hole pairs were investigated by X-ray photoelectron spectroscopy (XPS), scanning electron microscope (SEM), and photoluminescence (PL). Results showed that the presence of oxygen vacancy, ultrathin nanosheet structure, and improved separation efficiency of photogenerated electron-hole pairs contributed to the excellent photocatalytic degradation activity of ultrathin BiOCl. The obtained result provides a novel method to fabricate ultrathin BiOCl with excellent photocatalytic degradation activity of carbamazepine under visible-light irradiation.

1. Introduction

Pharmaceutical and personal care products (PPCPs) as a new type of pollutants have been of growing concerns because of the biological toxicity and biorefractory nature [1]. Particularly, an antiepileptic drug of carbamazepine is a typical representative of PPCPs [2]. Carbamazepine is hard to be degraded from current wastewater treatment processes and appears to be remarkably persistent in a variety of water bodies including surface water, effluent from sewage treatment plant, and even in drinking water. The presence of carbamazepine is always associated with chronic toxicity to human and ecological environment [3]. Therefore, it is urgent to find a green and environmentally friendly method to degrade carbamazepine in water.

Photocatalytic technology has been reported to effectively degrade environmental pollutants due to the production of highly active redox species, such as electron (e⁻), hole (h⁺), hydroxyl radical (·OH), and superoxide radical () [4–6]. Compared with the traditional physical adsorption method, the photocatalysis technology can not only completely mineralize many pollutants but also exhibit the advantages of simple operation, high efficiency, and low operation cost. More importantly, photocatalytic technology takes the green renewable energy solar energy as the driving force. Therefore, photocatalytic technology has been favored by researchers all over the world and is expected to become one of the effective methods to solve environmental crisis.

The core of photocatalytic technology is fabricating the efficient photocatalyst. Up to date, many new and efficient photocatalysts have been fabricated by researchers [7–11]. Bismuth oxychloride (BiOCl), as a new type of semiconductor materials, has attracted great attention due to its unique microstructure and good photocatalytic performance [12–14]. However, in practical applications, BiOCl still fails to respond to visible light, which restricted the application of solar energy to degrade environmental pollutants [15].

To fabricate visible-light-driven BiOCl, many strategies have been explored. With the assistance of other semiconductors, BiOCl composite heterojunction was always constructed to improve the photocatalytic activity upon visible-light irradiation. For example, Dong et al. prepared H-TiO₂/BiOCl heterojunction with improved photocatalytic activity under the visible light by a facile solvothermal method [16]. Elemental doping is also an efficient method to improve the visible-light-driven photocatalytic activity of BiOCl, since its intrinsic light absorption is improved. Recently, Xu et al. described a novel bulk doping strategy to extend the light by bulk W-doping of BiOCl [17]. However, these methods are associated with massive organic solvents, high cost, or cumbersome procedures.

This paper provided a new strategy to fabricate ultrathin BiOCl 2D nanosheets for efficient photocatalytic degradation of carbamazepine upon visible-light irradiation by regulating the growth process of BiOCl. To optimize the preparation parameters, the effects of tetrabutylammonium hydroxide (TBAOH) dosages, chlorine source, preparation pH value, ultrasonic treatment, and magnetic stirring on the photocatalytic degradation of carbamazepine were examined under visible-light irradiation. Finally, X-ray photoelectron spectroscopy (XPS), scanning electron microscope (SEM), and photoluminescence (PL) were employed to clarify the elemental composition/state, micromorphology, and separation efficiency of photogenerated electron-hole pairs of the as-prepared BiOCl samples.

2. Experimental

2.1. Preparation of Ultrathin BiOCl 2D Nanosheet Photocatalysts

BiOCl samples were synthesized using a facile hydrolysis method in water. Typically, TBAOH was dissolved in ultrapure water. Then, 1 mmol of Bi(NO₃)₃·5H₂O and KCl was introduced to the above TBAOH solution with ultrasonic treatment or magnetic stirring. Then, the white suspension was agitated at atmospheric environment to obtain precipitates. Finally, the precipitates were collected, washed, and dried in an oven.

To evaluate the effects of TBAOH dosages on the photocatalytic activity of BiOCl, the concentrations of TBAOH were set at 0, 0.5, 1, and 2 mmol.

To evaluate the effects of chlorine source on the photocatalytic activity, BiOCl samples were prepared by the same procedure except that KCl was changed to HCl, NaCl, and choline chloride.

The pH value of catalyst preparation reaction solution was tested on 1, 2, and 3 by changing the pH value with NaOH.

Furthermore, the ultrasonic treatment (1, 2, and 3 h) and magnetic stirring (3, 6, and 12 h) were also optimized.

BiOCl prepared in the optimal preparation conditions was denoted as ultrathin BiOCl. And the BiOCl sample prepared without TBAOH (TBAOH concentrations of 0) was denoted as ordinary BiOCl.

2.2. Characterization

The micromorphology of the samples was observed using SEM (America FEI, Quanta 200). XPS analysis (ESCALab250Xi, Al Ka) was used to examine the chemical composition and element state of the as-prepared BiOCl samples. The adventitious carbon signal (C1s peak) at 284.8 eV as an internal standard was used to calibrate the shift of the binding energy. The separation efficiency of photogenerated electron-hole pairs was evaluated by the PL spectrums using an Edinburgh FLS980 fluorescence spectrophotometer.

2.3. Photocatalytic Activity

The photocatalytic performance was evaluated by photocatalytic degradation of carbamazepine solution (2.5 mg/L). A 300 W xenon lamp with a 420 nm filter was used as the visible light source of the experiment. The liquid phase photocatalytic degradation of carbamazepine was carried out in a 50 mL of beaker, which was placed in a water bath pot to maintain 25°C throughout the reaction process. To examine the photocatalytic activity of the as-prepared BiOCl, 0.04 g of photocatalyst powders was added in the above carbamazepine solution. Before illumination, the solution was stirred in the dark for an hour to achieve the equilibrium of adsorption-desorption between carbamazepine and BiOCl photocatalyst powders. Then, the solution was irradiated upon visible light. The carbamazepine solution was sampled every 30 minutes (3 ml each time), which underwent centrifugation to remove the photocatalyst powders. Finally, the residual concentration was measured using an ultraviolet visible spectrophotometer (UV-vis, Puxi TU-1901).

The kinetics of photocatalytic degradation was evaluated by the apparent pseudo-first-order model expressed by following equation:

where C₀, C, and k are the original carbamazepine concentration (2.5 mg/L), carbamazepine concentration at reaction time t, and pseudo-first-order degradation rate constant.

3. Results and Discussion

3.1. Optimization of Preparation Parameters

3.1.1. TBAOH Dosages

Figure 1 shows the effects of TBAOH dosages on the carbamazepine degradation kinetics. It can be seen that the addition of TBAOH promoted the carbamazepine degradation kinetics under the photocatalytic reaction of BiOCl, as the degradation rate constant increased over the BiOCl samples prepared in the presence of TBAOH. When the TBAOH dosages increased from 0.5 to 1 mmol, TBAOH displayed a positive effect on the degradation of carbamazepine with the degradation rate constant of carbamazepine increasing significantly from 0.0016 to 0.0030 min⁻¹. However, the degradation kinetics became slow with a further increased TBAOH dosage from 1 to 2 mmol. The degradation rate constant of carbamazepine decreased to 0.0025 min⁻¹ upon the excited BiOCl prepared by adding TBAOH of 2 mmol. To sum up, the highest degradation rate constant of carbamazepine was obtained at 0.0030 min⁻¹. The absorption spectra for the degradation of carbamazepine at various times of irradiation are shown in Figure S1. As shown in the figure, the absorption spectra of carbamazepine decreased upon the light excited BiOCl. Hence, it is important to add TBAOH in the preparation procedure of BiOCl for the high degradation kinetics of carbamazepine. The role of TBAOH in regulating the growth process of BiOCl will be discussed further in the characterization results from XPS and SEM.

(a)

(b)

Figure 1: Effects of TBAOH dosages on the carbamazepine degradation kinetics.

3.1.2. Chlorine Source

For the preparation of BiOCl, both bismuth source and chlorine source were required. Because of low cost, Bi(NO₃)₃·5H₂O is the most widely used bismuth source, while chlorine source can be different based on the preparation route [18–21]. As reported in the literatures, HCl, NaCl, KCl, and choline chloride can provide chlorine to the fabrication of BiOCl. Chlorine source is important for the preparation of BiOCl, for it can coordinate with bismuth source, control the concentration of reaction species in the reaction system, and influence the dynamic behavior in the process of BiOCl crystallization, finally affecting the microstructure and determining its photocatalytic performance. Here, the effects of chlorine sources on the photocatalytic activity of BiOCl were evaluated according to the degradation kinetics of carbamazepine.

Figure 2 presents the degradation kinetics of carbamazepine by BiOCl prepared with different chlorine sources. As exhibited, the degradation kinetics is the highest in BiOCl prepared using NaCl as chlorine source, with a degradation rate constant of 0.0038 min⁻¹. The degradation rate constant of carbamazepine is 0.0018, 0.0034, and 0.0025 min⁻¹ in the BiOCl prepared using HCl, KCl, and choline chloride as chlorine source, respectively. It should be noted that the difference in photocatalytic degradation kinetics of BiOCl prepared in various chlorine sources did not originate from the alteration of pH caused by chlorine source, as the pH was adjusted to the same value during the preparation of BiOCl.

(a)

(b)

Figure 2: Effects of chlorine source on the carbamazepine degradation kinetics.

3.1.3. Effect of pH

Nucleation and crystallization process of BiOCl are highly dependent on the solution pH [22]. Hence, the effects of pH value within ranges of 1–3 on the degradation activity of BiOCl were examined under visible-light irradiation. As shown in Figure 3, the highest degradation kinetics of carbamazepine was found in the BiOCl prepared in solution pH value of 2. The degradation rate constant of carbamazepine is 0.0030, 0.0033, and 0.0031 min⁻¹ in the BiOCl prepared in pH value of 1, 2, and 3, respectively.

(a)

(b)

Figure 3: Effects of pH of reaction solution on the carbamazepine degradation kinetics.

The pH of catalyst preparation reaction solution (bismuth nitrate + TBAOH) was about 1 without adjustment (because of the existence of TBAOH, the catalyst preparation reaction solution gave pH 1). Then, NaOH was added into the reaction solution to adjust pH value from 2 to 3. In the preparation of BiOCl, it was found that white precipitates could be immediately formed after adding NaOH (the involved reaction is shown in the supplementary information files). Massive NaOH could speed up the nucleation and crystallization process excessively, which does not favor the controlled growth of BiOCl. So, NaOH was added cautiously during the preparation of BiOCl. And the pH values were tested within acid ranges of 1–3.

3.1.4. Effect of Ultrasonic Treatment or Magnetic Stirring

Ultrasonic treatment or magnetic stirring is the ordinary treatment in the growth process of photocatalytic material [23–25]. Here, effects of ultrasonic treatment or magnetic stirring on the photocatalytic activity were also evaluated. As shown in Figure 4, different times of ultrasonic treatment were detected on 1, 2, and 3 h. The highest degradation kinetics of carbamazepine was found in BiOCl prepared in ultrasonic treatment of 2 h, with a degradation rate constant of 0.0035 min⁻¹, which is higher than 0.0032 and 0.0029 min⁻¹ for BiOCl prepared in ultrasonic treatment of 1 and 3 h, respectively.

(a)

(b)

Figure 4: Effect of ultrasonic treatment on the carbamazepine degradation kinetics.

The magnetic stirring was also performed in the preparation of BiOCl, as shown in Figure 5. The degradation rate constants are 0.0032, 0.0038, and 0.0037 min⁻¹ in the BiOCl prepared in magnetic stirring of 3, 6, and 12 h, respectively. Obviously, BiOCl prepared in magnetic stirring of 6 h exhibited the highest photocatalytic degradation rate constants of carbamazepine under visible-light irradiation. This is also superior to the highest degradation rate constant of 0.0035 min⁻¹ in the BiOCl prepared in ultrasonic treatment of 2 h. Hence, magnetic stirring of 6 h was set as the optimal treatment in the growth process of BiOCl.

(a)

(b)

Figure 5: Effect of magnetic stirring on the carbamazepine degradation kinetics.

Taken together, the fastest degradation kinetics of carbamazepine can be obtained in the BiOCl prepared with TBAOH dosages of 1 mmoL and chlorine source of NaCl in the pH of 2 upon magnetic stirring of 6 h (denoted as ultrathin BiOCl). Ultrathin BiOCl displayed the highest photocatalytic degradation rate constant (0.0038 min⁻¹) of carbamazepine, which is 7.6 times higher than that with the ordinary BiOCl (prepared without TBAOH). To clarify the contributors to the outstanding photocatalytic activity, XPS, SEM, and PL were carried out to examine the elemental composition/state, micromorphologies, and separation efficiency of photogenerated electron-hole pairs.

3.2. Characterization

3.2.1. Chemical Composition and Elemental State

The chemical composition and elemental state in the samples were determined by XPS analysis, as shown in Figure 6. The XPS analysis suggested that only the elements of Bi, O, and Cl were found in the ordinary and ultrathin samples, which confirmed the formation of BiOCl with high purity. The high-resolution spectra of Bi 4f, Cl 2p, and O1s are shown in Figures 6(a)–6(d), respectively.

(a)

(b)

(c)

(d)

Figure 6: High-resolution Bi 4f (a), Cl 2p (b), and O1s (c, d) XPS spectra of ordinary BiOCl and ultrathin BiOCl.

It can be seen from Figure 6(a) that the spectra of Bi 4f were deconvoluted into two peaks in both ordinary BiOCl and ultrathin BiOCl. The two peaks were assigned to Bi 4f5/2 and Bi 4f7/2, respectively [26]. Compared with 159.2 and 164.5 eV in ordinary BiOCl, these two peaks shifted to lower binding energy of 159.0 and 164.3 eV in ultrathin BiOCl. Lower binding energy of Bi is classically attributed to the formation of lower charge Bi(3−x)+ ions caused by oxygen vacancies [27].

As shown in Figure 6(b), Cl 2p in ordinary BiOCl and ultrathin BiOCl samples also exhibited two peaks between 195.0 and 202.0 eV. The lower binding energy of 197.8 eV in ordinary BiOCl and 198.0 eV in ultrathin BiOCl corresponded to Cl 2p1/2, while Cl 2p3/2 was confirmed by the high binding energy of 199.4 and 199.7 eV in ordinary BiOCl and ultrathin BiOCl samples, respectively [28]. Compared with ordinary BiOCl, the two peaks of Cl 2p1/2 and Cl 2p3/2 shifted to relatively higher binding energy in the ultrathin BiOCl samples. The Cl peak at a higher binding energy may be explained by the following: Cl ions are more tightly bonded to ultrathin BiOCl due to the introduction of positively charged ions originated from the dissociation of TBAOH.

Figures 6(c) and 6(d) show the O1s spectra of ordinary BiOCl and ultrathin BiOCl samples, respectively. The O1s spectra can be deconvoluted into three peaks, namely, lattice oxygen, oxygen vacancy, and chemisorbed oxygen, which can be assigned to 530, 531.4, and 533.3 eV in the ordinary BiOCl samples [29]. And the three peaks shifted to 530.3, 531.5, and 533.1 eV in ultrathin BiOCl. Obviously, the O1s peak became larger in the ultrathin BiOCl samples. Particularly, the intensity of peak assigned to oxygen vacancy improved significantly in ultrathin BiOCl. This indicated that massive oxygen vacancies were introduced in the ultrathin BiOCl samples, which could be benefited from the addition of TBAOH. To further confirm the formation of the presence of oxygen vacancy, TPO was applied and is shown in Figure S2. As can be seen from the figure, both BiOCl samples show one peak centered at 87°C, which could be attributed to the oxidation of cation vacancies [30]. And this peak became much larger in ultrathin BiOCl than that in ordinary BiOCl, which indicated more oxygen vacancies in ultrathin BiOCl. This is in accordance with the XPS results. Taken together, both XPS and TPO confirm the formation of the presence of oxygen vacancy.

In the growth process of BiOCl, TBAOH acted as a structure-directing agent inducing the formation of oxygen vacancies. This is similar to the previous reported triethanolamine (TEOA), which induced the production of oxygen vacancies on the surface of BiOCl nanosheets [31]. The presence of oxygen vacancies is favored for the reduction of oxygen molecule to produce massive active species, which are important for the photocatalytic degradation of carbamazepine [32].

3.2.2. Microstructure and Morphology

The XRD patterns of BiOCl samples are shown in Figure S3. As shown in the figure, both ordinary BiOCl and ultrathin BiOCl exhibited tetragonal structure (JCPDS No. 85-0861) with high purity (no other impurity diffraction peaks). SEM images were taken to examine the microstructure and morphology of the as-prepared samples. Figures 7(a) and 7(c) present the microstructure and morphology of ordinary BiOCl in different magnifications. And images in Figures 7(b) and 7(d) were taken for ultrathin BiOCl. As shown in the figures, both BiOCl samples were composed of 2D nanosheet-shaped structures. In comparison with ordinary BiOCl, the nanosheets became much thinner and more uniform in ultrathin BiOCl.

Figure 7: SEM images of ordinary BiOCl (a, c) and ultrathin BiOCl (b, d) samples.

TEM images of ultrathin BiOCl and ordinary BiOCl are shown in the revised supplementary information files. As shown in Figure S4, the morphology of ultrathin BiOCl and ordinary BiOCl was composed by ultrathin nanosheets. In comparison with ordinary BiOCl, the lower contrast in the TEM images of ultrathin BiOCl suggested the thinner thickness, which is consistent with the SEM results. The average thickness of samples was characterized to approximately 1.5 nm by atomic force microscope (AFM, Figure S5). This can be ascribed by the TBAOH participation in the growth process of BiOCl. TBAOH can be dissociated to positively charged ions, facilitating its adsorption on the negative (001) plane. This retarded the (001) crystal growth and directed the formation of much thinner BiOCl nanosheets [21].

Generally, ultrathin BiOCl exhibits high surface area. The surface areas of BiOCl and BiOCl-T were determined to be 9.64 and 20.32 m²/g for ordinary BiOCl and ultrathin BiOCl, respectively. Larger surface area always means more active sites, so the improved surface area of ultrathin BiOCl could be favored for the photocatalytic degradation of carbamazepine.

3.2.3. Separation of Photogenerated Electron-Hole Pairs

The optical properties of ordinary BiOCl and ultrathin BiOCl photocatalysts were evaluated using UV-diffuse absorption spectra (DRS) technique, as shown in the supplementary information files (Figure S6). Obviously, the light absorption band edge shifted to the long wavelength region. To determine the visible-light responsibility, the energy gaps of the samples were calculated based on the UV-vis DRS of the Kubelka–Munk function versus the photo energy. The energy gaps of the samples were estimated to be 2.98 and 3.20 eV in ultrathin BiOCl and ordinary BiOCl, respectively. The narrow band gap in ultrathin BiOCl can be ascribed to the existence of oxygen vacancy, which formed a new Bi 6p electronic state in the forbidden band of BiOCl [33].

Upon irradiation, photogenerated electron-hole pairs can be formed. The photocatalytic activities of semiconductor materials are highly dependent on the separation of photogenerated electron-hole pairs, which can be measured by PL spectrum. PL emission signal is originated from the recombination of photogenerated electron-hole pairs. Hence, the stronger emission signal in PL corresponded to the higher recombination efficiency of photogenerated electron-hole pairs [34].

Figure 8 shows the PL emission spectra of the ordinary BiOCl and ultrathin BiOCl. As shown in the figure, ultrathin BiOCl displayed significantly diminished PL emission intensity. This indicated the decreased recombination rate of photogenerated electron-hole pairs and increased separation efficiency of photogenerated electron-hole pairs. Hence, the improved separation efficiency of photogenerated electron-hole pairs contributed to the excellent photocatalytic activity of ultrathin BiOCl.

Figure 8: PL spectra of ordinary BiOCl and ultrathin BiOCl samples.

The photocatalytic degradation mechanism was systematically studied based on the different radical scavengers and N₂ purging. As shown in Figure S7, AgNO₃ decreased the photocatalytic degradation of CBZ indicating the importance of e⁻ in the degradation reaction. The involvement of h⁺ was confirmed by the reduced photocatalytic degradation efficiency by adding HCOONa. Importantly, was produced in the CBZ degradation process, for IPA hampered the photocatalytic degradation of CBZ. In General, is hard to be generated in BiOCl because of the more negative redox potential of BiV/BiIII (+1.59 eV) than /OH (+1.99 eV). The production of ·OH in ultrathin BiOCl could be benefited from the ultrathin nanosheet structure, which shortens the transfer path of e⁻. This promoted the generation of ·OH through multielectron reduction of O₂. In this reaction process, O₂ is a crucial factor, which was supported by N₂ purging. Taken together, the active species of e⁻, h⁺, and dominated the photocatalytic degradation of CBZ over ultrathin BiOCl.

4. Conclusions

In summary, a series of ultrathin BiOCl 2D nanosheet photocatalysts were readily synthesized by the TBAOH-assisted hydrolysis method in water. The preparation parameters were optimized to TBAOH dosages of 1 mmoL and chlorine source of NaCl in the pH of 2 upon magnetic stirring of 6 h. The obtained ultrathin BiOCl displayed the highest photocatalytic degradation rate constant (0.0038 min⁻¹) of carbamazepine, which is 7.6 times higher than that with the ordinary BiOCl. From the characterization of XPS, SEM, and PL, it was found that the presence of oxygen vacancy, ultrathin nanosheet structure, and improved separation efficiency of photogenerated electron-hole pairs contributed to the excellent photocatalytic degradation activity of ultrathin BiOCl. The obtained result provides a new strategy of regulating the growth process of BiOCl to fabricate ultrathin nanosheet structures with excellent photocatalytic degradation activity of carbamazepine under visible-light irradiation.

Data Availability

The experimental data used to support the findings of this study are included in the article. Other data are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Authors’ Contributions

Shuo Xu and Xiaoya Gao contributed equally to this study.

Acknowledgments

The authors gratefully acknowledge the financial support of the High-Level Scientific Research Foundation for Talent Introduction (10978172).

Supplementary Materials

Figure S1: the absorption spectra for the degradation of carbamazepine over ultrathin BiOCl. Figure S2: the absorption spectra for the degradation of carbamazepine over ultrathin BiOCl. Figure S3: XRD patterns of the as-synthesized BiOCl samples. Figure S4: TEM images of the as-synthesized BiOCl samples. Figure S5: the average thickness of ultrathin BiOCl samples characterized by AFM. Figure S6: UV-vis diffuse reflection spectra of the as-synthesized BiOCl samples. Figure S7: photocatalytic degradation CBZ over the as-synthesized BiOCl samples in the presence of various radicals scavengers. Figure S8: effect of initial pH on CBZ degradation. Figure S9: photocatalytic degradation CBZ over the BiOCl formed in the catalyst preparation reaction solution pH of 8. (Supplementary Materials)

References

C.-H. Shen, X.-J. Wen, Z.-H. Fei, Z.-T. Liu, and Q.-M. Mu, “Visible-light-driven activation of peroxymonosulfate for accelerating ciprofloxacin degradation using CeO₂/Co₃O₄ p-n heterojunction photocatalysts,” Chemical Engineering Journal, vol. 391, p. 123612, 2020.

G. J. Akorede, S. F. Ambali, M. l. G. Hudu et al., “Protective effect of vitamin C on chronic carbamazepine-induced reproductive toxicity in male wistar rats,” Toxicology Reports, vol. 7, pp. 269–276, 2020.

M. Nkoom, G. Lu, J. Liu, H. Yang, and H. Dong, “Bioconcentration of the antiepileptic drug carbamazepine and its physiological and biochemical effects on Daphnia magna,” Ecotoxicology and Environmental Safety, vol. 172, pp. 11–18, 2019.

X.-J. Wen, C.-H. Shen, C.-G. Niu et al., “Attachment of Ag/AgCl nanoparticles on CdMoO4 microspheres for effective degradation of doxycycline under visible light irradiation: degradation pathways and mineralization activity,” Journal of Molecular Liquids, vol. 288, p. 111063, 2019.

D. Zhang, S. Liang, S. Yao et al., “Highly efficient visible/NIR photocatalytic activity and mechanism of Yb3+/Er3+ co-doped Bi4O5I2 up-conversion photocatalyst,” Separation and Purification Technology, vol. 248, p. 117040, 2020.

X.-J. Wen, C.-H. Shen, Z.-H. Fei et al., “Recent developments on AgI based heterojunction photocatalytic systems in photocatalytic application,” Chemical Engineering Journal, vol. 383, p. 123083, 2020.

D. Zhang, C. Su, H. Li, X. Pu, and Y. Geng, “Synthesis and enhanced piezophotocatalytic activity of Ag₂O/K0.5Na0.5NbO₃ composites,” Journal of Physics and Chemistry of Solids, vol. 139, p. 109326, 2020.

S. Liang, D. Zhang, X. Yao et al., “Deposition-precipitation synthesis of Yb³⁺/Er³⁺ co-doped BiOBr/AgBr heterojunction photocatalysts with enhanced photocatalytic activity under Vis/NIR light irradiation,” Separation and Purification Technology, vol. 238, p. 116450, 2020.

X.-J. Wen, Q. Qian-Lu, X.-X. Lv et al., “Photocatalytic degradation of sulfamethazine using a direct Z-Scheme AgI/Bi₄V₂O₁₁ photocatalyst: mineralization activity, degradation pathways and promoted charge separation mechanism,” Journal of Hazardous Materials, vol. 385, p. 121508, 2020.

D. Kong, D. Yin, D. Zhang et al., “Noble metal-free 0D-1D NiCoP/Mn0.3Cd0.7S nanocomposites for highly efficient photocatalytic H₂ evolution under visible-light irradiation,” Nanotechnology, vol. 31, no. 30, p. 305701, 2020.

D. Zhang, Y. Tang, X. Qiu et al., “Use of synergistic effects of the co-catalyst, p-n heterojunction, and porous structure for improvement of visible-light photocatalytic H₂ evolution in porous Ni₂O₃/Mn0.2Cd0.8S/Cu₃P@Cu₂S,” Journal of Alloys and Compounds, vol. 845, Article ID 155569, 2020.

H. Liu, J. Huang, J. Chen, J. Zhong, J. Li, and D. Ma, “Influence of different solvents on the preparation and photocatalytic property of BiOCl toward decontamination of phenol and perfluorooctanoic acid,” Chemical Physics Letters, vol. 748, p. 137401, 2020.

J. Wang and Z. Zhang, “Co-precipitation synthesis and photocatalytic properties of BiOCl microflowers,” Optik, vol. 204, p. 164149, 2020.

Y. Wang, Y. Wang, X.-m. Song, Y. Zhang, and T. Ma, “BiOCl-based photocathode for photocatalytic fuel cell,” Applied Surface Science, vol. 506, p. 144949, 2020.

Z. Long, G. Xian, G. Zhang, T. Zhang, and X. Li, “BiOCl-Bi₁₂O₁₇Cl2 nanocomposite with high visible-light photocatalytic activity prepared by an ultrasonic hydrothermal method for removing dye and pharmaceutical,” Chinese Journal of Catalysis, vol. 41, no. 3, pp. 464–473, 2020.

H. Dong, M. Xiao, J. Li et al., “Construction of H-TiO₂/BiOCl heterojunction with improved photocatalytic activity under the visible and near-infrared light,” Journal of Photochemistry and Photobiology A: Chemistry, vol. 392, p. 112369, 2020.

K. Xu, J. Shen, D. Xu et al., “Molten-salt-mediated synthesis of bulk W doped BiOCl with highly enhanced visible-light photocatalytic performances,” Applied Surface Science, vol. 495, p. 143595, 2019.

F. T. Li, Q. Wang, X. J. Wang et al., “In-situ one-step synthesis of novel BiOCl/Bi₂₄O₃₁Cl₁₀ heterojunctions via self-combustion of ionic liquid with enhanced visible-light photocatalytic activities,” Applied Catalysis B-Environmental, vol. 150–151, pp. 574–584, 2014.

Y. Y. Wang, W. J. Peng, L. Y. Chai, and Y. H. Qin, “Study on preparation of sheet BiOCl powder by the method of bismuth nitrate transformation and hydrolysis,” Hunan Metting., vol. 31, pp. 20–27, 2003.

X. Zhang, Z. Ai, F. Jia, and L. Zhang, “Generalized one-pot synthesis, characterization, and photocatalytic activity of hierarchical BiOX (X = Cl, Br, I) nanoplate microspheres,” The Journal of Physical Chemistry C, vol. 112, no. 3, pp. 747–753, 2008.

J. Ma, X. Liu, J. Lian, X. Duan, and W. Zheng, “Ionothermal synthesis of BiOCl nanostructures via a long-chain ionic liquid precursor route,” Crystal Growth & Design, vol. 10, no. 6, pp. 2522–2527, 2010.

J. Jiang, K. Zhao, X. Xiao, and L. Zhang, “Synthesis and facet-dependent photoreactivity of BiOCl single-crystalline nanosheets,” Journal of the American Chemical Society, vol. 134, no. 10, pp. 4473–4476, 2012.

X. Gao, X. Zhang, Y. Wang, S. Peng, B. Yue, and C. Fan, “Rapid synthesis of hierarchical BiOCl microspheres for efficient photocatalytic degradation of carbamazepine under simulated solar irradiation,” Chemical Engineering Journal, vol. 263, pp. 419–426, 2015.

R. Li, J. Liu, X. Zhang et al., “Iodide-modified Bi₄O₅Br₂ photocatalyst with tunable conduction band position for efficient visible-light decontamination of pollutants,” Chemical Engineering Journal, vol. 339, pp. 42–50, 2018.

J. Liu, R. Li, X. Zu et al., “Photocatalytic conversion of nitrogen to ammonia with water on triphase interfaces of hydrophilic-hydrophobic composite Bi₄O₅Br₂/ZIF-8,” Chemical Engineering Journal, vol. 371, pp. 796–803, 2019.

X. Gao, G. Tang, W. Peng, Q. Guo, and Y. Luo, “Surprise in the phosphate modification of BiOCl with oxygen vacancy: in situ construction of hierarchical Z-scheme BiOCl-OV-BiPO₄ photocatalyst for the degradation of carbamazepine,” Chemical Engineering Journal, vol. 360, pp. 1320–1329, 2019.

H. Li, J. Shi, K. Zhao, and L. Zhang, “Sustainable molecular oxygen activation with oxygen vacancies on the {001} facets of BiOCl nanosheets under solar light,” Nanoscale, vol. 6, no. 23, pp. 14168–14173, 2014.

F. Dong, Y. Sun, M. Fu, W. Zhongbiao, and S.C. Lee, “Room temperature synthesis and highly enhanced visible light photocatalytic activity of porous BiOI/BiOCl composites nanoplates microflowers,” Journal of Materials Chemistry, vol. 219–220, pp. 26–34, 2012.

Z. Song, X. Dong, N. Wang et al., “Efficient photocatalytic defluorination of perfluorooctanoic acid over BiOCl nanosheets via a hole direct oxidation mechanism,” Chemical Engineering Journal, vol. 317, pp. 925–934, 2017.

B. Bonnetot, V. Rakic, T. Yuzhakova, C. Guimon, and A. Auroux, “Preparation and characterization of Me₂O₃−CeO₂ (Me = B, Al, Ga, in) mixed oxide catalysts. 2. Preparation by sol-gel method,” Chemistry of Materials, vol. 20, pp. 1585–1596, 2008.

X. Zeng, X. Gong, Y. Wan, R. He, and Z. Xu, “formation of oxygen vacancies on the {010} facets of BiOCl and visible light activity for degradation of ciprofloxacin,” Chemical Research in Chinese Universities, vol. 34, no. 5, pp. 711–718, 2018.

X. Gao, W. Peng, G. Tang, Q. Guo, and Y. Luo, “Highly efficient and visible-light-driven BiOCl for photocatalytic degradation of carbamazepine,” Journal of Alloys and Compounds, vol. 757, pp. 455–465, 2018.

W. L. Huang, “Electronic structures and optical properties of BiOX (X = F, Cl, Br, I) via DFT calculations,” Journal of Computational Chemistry, vol. 30, no. 12, pp. 1882–1891, 2009.

Y. Lei, G. Wang, S. Song, W. Fan, and H. Zhang, “Synthesis, characterization and assembly of BiOCl nanostructure and their photocatalytic properties,” CrystEngComm, vol. 11, no. 9, pp. 1857–1862, 2009.