Journal of Diabetes Research
Volume 2016 (2016), Article ID 1897517, 7 pages
http://dx.doi.org/10.1155/2016/1897517

Research Article

Knowledge and Self-Reported Practice of Insulin Injection Device Disposal among Diabetes Patients in Gondar Town, Ethiopia: A Cross-Sectional Study

Abebe Basazn Mekuria,¹ Begashaw Melaku Gebresillassie,² Daniel Asfaw Erku,² Kaleab Taye Haile,³ and Eshetie Melese Birru¹

¹Department of Pharmacology, College of Medicine and Health Sciences, University of Gondar, Chechela Street, Lideta Subcity Kebele 16, Gondar, Ethiopia
²Department of Clinical Pharmacy, School of Pharmacy, University of Gondar, Chechela Street, Lideta Subcity Kebele 16, Gondar, Ethiopia
³Department of Pharmaceutics, School of Pharmacy, University of Gondar, Chechela Street, Lideta Subcity Kebele 16, Gondar, Ethiopia

Received 4 July 2016; Accepted 28 August 2016

Academic Editor: Hiroshi Okamoto

Copyright © 2016 Abebe Basazn Mekuria et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Background. Incorrect sharp disposal practices may expose the public to needle-stick injuries. The present study aimed at assessing the knowledge and practice of diabetic patients towards insulin injection device disposal in Gondar town, Ethiopia. Methods. A cross-sectional study was employed on insulin requiring diabetes patients who visited the diabetes clinic at Gondar University Referral Hospital (GURH) from February 1 to March 28, 2016. Frequencies, percentages, and ANOVA (analysis of variance) and Student’s t-test were used to analyze variables. Results. About half of the participants (49.5%) had poor knowledge towards safe insulin injection waste disposal. More than two-thirds (80.7%) of respondents had poor practice and 64.3% of respondents did not put insulin needle and lancets into the household garbage. 31% of respondents threw sharps on street when they travel outside. Respondents living in urban areas had a higher mean of knowledge and practice score than those who live in rural area. Conclusions. This study revealed that knowledge and practice of diabetic patients were low towards safe insulin injection waste disposal in study area. Healthcare providers should also be aware of safe disposing system and counsel patients on appropriate disposal of used syringes.

1. Introduction

Diabetes mellitus is a metabolic disorder characterized by chronic hyperglycemia [1]. It is a common chronic disease its management needs regular blood tests and insulin injections [2]. The management mostly takes place by self-administration of insulin at home. Various kinds of medical instruments, like insulin pens, needles, and syringes, as parts of self-care, are used [3]. Sharps have been defined by World Health Organization as “items that could cause cuts or puncture wounds, including needles, hypodermic needles, scalpel, and other blades, knives, infusion sets, saws, broken glass, and nail” [4].

Proper way of disposing sharps is one of the important, but often neglected, components of proper injection techniques [5]. In some countries, reuse of nonsterile insulin injection tools was a common malpractice in society [6]. Incorrect sharp disposal practices among diabetes patients and members of their family lead to needle-stick injuries among rag pickers, domestic waste handlers, and the community [7]. Injuries from contaminated needles and sharps present a concern in society today since they may increase risk for the transmission of blood-borne pathogens, such as human immunodeficiency virus, hepatitis B, and hepatitis C [6–8]. The barriers to safe disposal of sharps by diabetes patients include lack of information about how and where to dispose, lack of proper advice from healthcare practitioners, wrong perception on sharp disposal, and self-administration of insulin by diabetic patients [9, 10].

Study done in different countries showed that proportion of various kinds of sharps thrown into the household bin varied from 46.9% to 67.6%. Only in less than 10% of cases specific containers were used to dispose insulin injection waste [6]. Other studies done in developed countries have also showed improper sharp disposal practices among diabetes patients to be as high as 80–90% [10, 11]. A study from Pakistan showed that more than 90% patients discarded injection devices into the household bin [12]. However, there is a paucity of data regarding the knowledge and practice of Ethiopian diabetes patients towards insulin injection device disposal. The present study aimed at assessing the knowledge and practice of diabetic patients towards insulin injection device disposal in Gondar town, Ethiopia.

2. Materials and Methods

2.1. Study Design and Setting

A cross-sectional study was employed on insulin requiring diabetes patients who visited the diabetes clinic at Gondar University Referral Hospital (GURH) from February to March 2016. GURH is located in Gondar town, Northwest Ethiopia, 738 km away from Addis Ababa (the capital city of Ethiopia). It is one of the oldest and pioneering referral hospitals in Ethiopia with a range of specialists including a diabetes illness follow-up care clinic, which currently provides free service for more than 5,000 diabetic patients annually on outpatient level.

2.2. Population and Sampling

All insulin requiring type 1 and type 2 diabetes mellitus patients who visited the diabetes clinic of GURH from February 1 to March 28, 2016, for control of blood sugar and medication refill were included in the study. We chose the 2-month follow-up period for data collection to avoid duplication of the cases as patients return to the clinic every 2 months. About 720 patients visited the clinic in the 2-month period. Every second person encountered and who meet the inclusion criteria was included. Thus, a total of 210 study subjects were selected through a systematic sampling procedure (study subjects were selected from the source population according to a random starting point and a fixed periodic interval).

2.3. Data Collection and Management

Data collection was performed by three well trained nurses through interviewer-administered questionnaires. The questionnaire was designed after a thorough literature review of the relevant available studies [9, 13]. The content validity of the questionnaire was confirmed by a team of experts including two endocrinologists and a senior nurse. The questionnaire was first written in English and translated to local language (Amharic) which is then translated back to English in order to ensure that the translated version gives the proper meaning. The questionnaire was pretested on 15 participants prior to the gross data collection, which were not included in the final analysis, and relevant modifications were instituted prior to commencement of actual data collection. The final questionnaire consisted of 46 items which were divided into two parts. Part one assesses the sociodemographic and treatment related characteristics of respondents including age, sex, marital status, educational level, age at diagnosis, duration of insulin use, and family history of DM. Part two includes questions regarding the knowledge and practice towards insulin injection device disposal. Patients’ knowledge was assessed using 12 dichotomous (true/false) questions about sharp use, reuse, and sharp waste disposal. The statements had only one “correct” option and the respondents got 1 score for correct answer and 0 score for incorrect answer. The obtained score of knowledge was then classified using mean and standard deviation as “Good Knowledge” (score of 8–12), “Moderate Knowledge” (score of 4–7), and “Poor Knowledge” (score of 0–3). Patients’ practices were assessed using 12 questions on using household garbage bags for disposal, frequency of needle reuse, and information seeking of patients regarding insulin ejection device disposal, which were answered as either “yes” or “no.” A score of 1–8 was considered “Negative Practice” while a score of 9–12 was considered “Positive Practice.”

2.4. Statistical Analysis

The final data collection tool was ensured for completeness, and responses were entered into and analyzed by the Statistical Package for the Social Sciences (SPSS) software version 21.0 for Windows. Frequencies and percentages were used to express different variables. One-way ANOVA and Student’s -test were used to compare groups. All statistical tests were performed using 0.05 as the level of significance.

2.5. Ethical Considerations

This study was approved by the ethical committee of University of Gondar, School of Pharmacy. Informed consent was also obtained from each participant before conducting this study. Participants’ information obtained was kept confidential.

3. Results

Of the 210 respondents, 56.2% were males and 39.5% was in the age group of 20–39 years with the mean ± SD of years. Majority of the respondents were Orthodox Christians (62.4%) and urban residents (53.3%). Among the respondents, 170 (80.9%) were diabetes type 1 patients and 125 (59.5%) had family history of DM. More than half of the respondents (60.5%) use insulin for more than 5 years. Other patients’ sociodemographic and clinical characteristics are shown in Tables 1 and 2, respectively.

Table 1: Sociodemographic characteristics of respondents, Gondar, 2016.

Variable
Frequency (%)

Sex

Male
118 (56.2%)

Female
92 (43.8%)

Age, in years

<19
6 (2.9%)

20–39
83 (39.5%)

40–59
72 (34.3%)

>60
49 (23.3%)

Residence

Urban
112 (53.3%)

Rural
98 (46.7%)

Marital status

Ever married
174 (82.8%)

Unmarried
36 (17.2%)

Employment status

Unemployed
113 (53.8%)

Employed
97 (46.2%)

Educational status

Illiterate
93 (44.2%)

Primary school
36 (17.1%)

Secondary school
50 (23.8%)

Collage/university
31 (14.8%)

Average monthly income (in USD)

<75
115 (54.8%)

75–150
73 (34.9%)

>150
22 (10.5%)

Table 2: Disease and treatment characteristics of respondents ().

Variable
Frequency (%)

Type of DM

Type 2
40 (19.1%)

Type 1
170 (80.9%)

Family history of DM

Absent
85 (40.5%)

Present
125 (59.5%)

Duration of insulin use

<1 year
44 (20.9%)

1–5 years
39 (18.6%)

>5 years
127 (60.5%)

Daily dosing schedule for insulin

Once
5 (2.4%)

Twice
184 (87.6%)

Types of insulin injection device used

Insulin pen
8 (3.8%)

Needle with separate syringe
42 (20%)

Insulin syringe
160 (76.2%)

More than 2 times
21 (10%)

Source of health information

Physicians
153 (72.8%)

Nurses
38 (18.1%)

Others

Frequency of physician visit in the last 6 months

Once in a month
108 (51.4%)

Once in 3 months
82 (39%)

Once in 6 months
13 (6.2%)

Only when getting sick
7 (3.3%)

Pharmacists and physiotherapists.

The mean knowledge score was 6.7, which fall within our definition of “Moderate Knowledge.” About half of the participants (49.5%) had poor knowledge, 29.5% had medium level of knowledge, and the remaining 21% of respondents had good knowledge about insulin injection device disposal. Percentages of correct and incorrect answers to questions on knowledge towards insulin injection device disposal are shown in Table 3. About two thirds of respondents (63.3%) did not know how to dispose lancets after use and 56.7% respondents said that insulin injection device cannot be recycled like plastics. More than two thirds of respondents (72.5%) cited doctors as the primary source of acquiring information about insulin injection device disposal.

Table 3: Knowledge of respondents towards insulin injection device disposal ().

Statement
Correct (%)
Incorrect (%)

The sharp waste produced at home is infectious
128 (61.0%)
82 (39.0%)

One can reuse needles and lancets if they are still sharp and clean
122 (58.1%)
88 (49.1%)

The needles and lancets can be cleaned by spirit swab and reused
109 (51.9%)
101 (48.1%)

One can also use someone else needle for injecting insulin after cleaning with spirit
119 (56.7%)
91 (43.3%)

Needle should be recapped after use and before throwing away in bin.
96 (45.7%)
114 (54.3%)

Needle should be broken away from syringe and collected in puncture proof bottles
88 (41.9%)
122 (58.1%)

Lancets should not be recapped after use and before throwing in waste bin
68 (32.4%)
142 (67.6%)

One should bend the lancet tip after use and before throwing in waste bin
77 (36.7%)
133 (63.3%)

Sharps like needles and lancets can cause injury if disposed in public places like parks, streets and so forth
100 (47.6%)
110 (52.4%)

The sharps in household waste can never cause injury to rag pickers and garbage handlers
104 (49.5%)
106 (50.5%)

Used needles and syringes can be misused by rag pickers
66 (31.4%)
144 (68.6%)

Sharps like needles can be recycled like plastics
199 (56.7%)
90 (42.9%)

Negative statement and answer false scored.

Analysis showed that more than two thirds (80.7%) of respondents had poor practice and most of respondents (64.3%) did not put insulin needle and lancets into the household garbage bags. Similarly, about 31% of respondents threw sharps on street when they travel outside. Furthermore, majority of the respondents (79%) did not ask their healthcare providers about disposal of insulin injection syringes. Interestingly, 57.1% of respondents bend needle and sharps after usage (Table 4).

Table 4: Respondents’ practices regarding insulin injection device waste disposal ().

Frequency

Practice score levels

Positive practice
40 (19.3%)

Negative practice
170 (80.7%)

Place of insulin injection device disposal

Garbage
76 (36.2%)

Burned
7 (3.3%)

Buried in the ground
43 (20.5%)

Toilet
84 (40%)

Numbers of needles thrown away in one week

0–7
152 (72.4%)

7–14
31 (14.8%)

>14
27 (12.9%)

Bend the needle and sharp after use

No
90 (42.9%)

Yes
120 (57.1%)

Recap the needle after injecting insulin

No
73 (34.8%)

Yes
137 (62.2%)

Ask the healthcare provider about disposal of insulin syringes

No
166 (79%)

Yes
44 (20.1%)

One-way ANOVA with post hoc test showed significant difference in knowledge and practice of respondents towards insulin injection device disposal among rural and urban residents where respondents living in urban areas had a higher mean knowledge and practice score (mean: 6.81 (0.86), value 0.003 and mean: 8.88 (0.54), value 0.001, resp.) than those who live in rural areas (mean: 4.89 (0.77) and 5.45 (0.61), resp.). The overall knowledge and practice score was higher in those who join college or university (mean: 7.89 (0.73), value 0.020) than in those who are illiterate (mean: 5.23 (0.85)). Respondents with a family history of DM patients had a significantly higher knowledge score (mean: 8.61 (0.99), value 0.026) than those who did not have a family history of DM (mean: 6.34 (0.97)). Type of DM and duration of insulin use also affect the overall knowledge and practice where respondents with type 1 DM (mean: 8.23 (0.77), value 0.000 and mean: 9.98 (0.68), value 0.005, resp.) and who use insulin for more than 5 years (mean: 9.12 (0.99), value 0.006 and mean: 9.13 (0.14), value 0.000, resp.) had a higher knowledge and practice mean scores than those who had type 2 DM (mean: 6.09 (0.81) and 5.45 (0.60), resp.) and use insulin for less than 1 year (mean: 6.43 (0.83) and 5.78 (0.66), resp.). The knowledge and practice of respondents who visit their physician and get information more than two times (mean: 8.23 (0.91), value 0.031 and mean: 9.78 (0.71), value 0.001 resp.) were higher than those who visit their physicians only when they get sick and do not have information (mean: 5.76 (0.76) and 4.12 (0.60), resp.) (Table 5).

Table 5: Mean knowledge and practice scores of respondents according to different characteristics ().

Variable
Total knowledge score
Total practice score

Mean (SD)
value
Mean (SD)
value

Sex

Male
6.02 (0.86)
0.189
7.44 (0.59)
0.273

Female
6.54 (0.79)
7.91 (0.68)

Age, in years

<19
5.98 (0.86)
0.752
5.50 (0.63)
0.441

20–39
6.02 (0.75)
5.01 (0.64)

40–59
5.77 (0.88)
6.33 (0.61)

>60
5.42 (0.81)
7.44 (0.68)

Residence

Urban
6.81 (0.86)
0.003
8.88 (0.54)
0.001

Rural
4.89 (0.77)
5.45 (0.61)

Marital status

Ever married
7.21 (0.89)
0.891
6.77 (0.63)
0.386

Unmarried
6.99 (0.83)
6.12 (0.65)

Employment status

Unemployed
6.55 (0.71)
0.389
5.59 (0.67)
0.501

Employed
6.49 (0.66)
6.32 (0.84)

Educational status

Illiterate
5.23 (0.85)
0.020
5.22 (0.70)

Primary school
6.09 (0.75)
8.12 (0.53)

Secondary school
7.44 (0.91)
8.77 (0.61)

College/university
7.89 (0.73)
9.97 (0.78)

Average monthly income

<1000
5.99 (0.21)

6.78 (0.67)

1000–2900
6.07 (0.72)
6.45 (0.62)

>3000
6.72 (0.74)
8.23 (0.61)

Type of DM

Type 1
8.23 (0.77)
0.000
9.98 (0.68)
0.005

Type 2
6.09 (0.81)
5.45 (0.60)

Family history of DM

Present
8.61 (0.99)

8.12 (0.58)
0.322

Absent
6.34 (0.97)
8.55 (0.64)

Duration of insulin use

<1 year
6.43 (0.83)
0.006
5.78 (0.66)

1–5 years
7.02 (0.69)
8.82 (0.39)

>5 years
9.12 (0.99)
9.13 (0.14)

Frequency of physician visit in the last 6 months

Once
6.56 (0.14)

6.89 (0.60)
0.001

Twice
6.89 (0.83)
8.12 (0.68)

More than twice
8.23 (0.91)
9.78 (0.71)

Only when getting sick
5.76 (0.76)
4.12 (0.60)

Statistically significant ().

4. Discussion

This study assessed the knowledge and practice of diabetic patients toward insulin injection device disposal in Gondar town, which is located Northwest Ethiopia. The disposal of insulin injection is ignored by most health practitioners and governments. This exposes patients to dispose injection syringes everywhere. Syringe disposal without effective waste disposal system opens a new portal of transmission of blood-borne pathogen from patients to general community [14–20]. Disposal of used injection equipment at open place in rural areas could increase the risk of transmission to children, who play with syringes and can get pricked [21], and this correlated with transmission of blood-borne infection like HIV, HBV, and HCV to community [22–25].

In the present study, half of the participants (49.5%) had poor knowledge, 29.5% had medium level of knowledge, and the remaining 21% of respondents had good knowledge about insulin injection device disposal. This finding was of comparably higher values than the study conducted in Delhi, India, where those who had poor knowledge were 31 (10.3%), was of lower values in those who had moderate knowledge (65.9%), and was of similar values in those who had high level of knowledge (23.8%) [26]. In this survey, about two thirds of respondents (63.3%) did not know how to dispose lancets after use. This finding is of similar value to that of a study conducted in UK (64.9%) [27] but of a lower value than that of a study done in India (96.4%) [26].

Regarding the source of information, in this study 72.5% cited doctors, 18.1% cited nurses, and none of them cited pharmacist as the primary source of acquiring information about insulin injection device disposal. But a study done in Virginia in 2010, pharmacists and nurses, 25.0% and 40.0%, were cited as the primary source of acquiring information, respectively [28]. This might have been the reason of the results obtained in Ethiopia, where patients traditionally believe physicians, rather than pharmacists or nurses, are the source of health information. The current study revealed that 80.7% of respondents had poor practice of insulin device disposal. This finding was much higher compared to other studies (31.0%) [26]. This might be due to the fact that our country has low social media coverage in health sector and suffers from absence of public health education and absence of safe disposing system, and less concern is given by the government to proper waste disposal.

In the present study, about 40% respondents had disposed of insulin injection device in the toilet. However, the UK Diabetes Guidelines recommended the use of opaque hard plastic containers for disposing sharp waste [29]. This finding suggested that in the study area there is malpractice of disposing insulin injection waste. On the other hand, one third of patients 36.2% disposed of insulin injection device directly into household garbage bin. This finding is similar to another study done in Stafford, where 35.1% of patients disposed of their lancets and syringes into household garbage bin [27]. However, it was of lower value than those of a study done in Virginian 50% and France 49.9% [28, 30]. 72.4% of diabetic patients in our study never recap insulin syringe during disposal. This finding was in agreement with another study conducted in Saudi Arabia, in which 74.0% never recap the needle after administration [31].

This study showed the significant difference in knowledge and practice among urban and rural residents toward insulin injection waste disposal. The urban residents had better knowledge and practice with mean 6.81 (0.86), and mean 8.88 (0.54), , respectively, than rural residents in Gondar town. This might be due to low contact time for counseling and absence of safe disposing option in rural area and healthcare practitioners in rural area had no good disposing practice. This finding was in agreement with a study done in Murree, Pakistan, which showed that 60% of rural health practitioners disposed of insulin injection needle at an open place [23, 32].

Respondents who join college or university had significantly higher overall mean score of knowledge and practice than those who were illiterate. This may be because they had a better chance to get information from courses and social media than those who are illiterate. However, study conducted in South Africa reported that there were no significant associations between education level and correct disposal of insulin injection waste [33]. This study revealed that there is a significant difference in knowledge and practice mean score between patients who visited and received advice from physician and who did not visit and did not receive advice frequently (who visited the physician only when getting sick) from the physician. This finding was in agreement with a study done in North East Essex, where there were statistically significant differences in practice and knowledge between patients receiving and not receiving advice on sharps disposal (AOR = 6.36 [95% CI 2.04–23.28], ) [26, 33]. This indicated that education is necessary for diabetic patients to practice good disposal of insulin injection waste. This finding was also supported by studies done in India and USA showing that education received from healthcare providers played a very important role, as shown by significant correlation [13, 26].

5. Limitation of Study

The study has some limitations that should be taken into account while interpreting the results. This study is conducted in only one diabetic center; the results found regarding insulin injection waste disposal may not be representative of all Ethiopian diabetic patients. As the study design is cross-sectional and depends on self-reported assessment, under- or overreporting is very likely.

6. Conclusion

The knowledge and practice of diabetic patients were low towards safe insulin injection waste disposal in study area. The study revealed that knowledge and practice of diabetic patients toward safe insulin injection disposing had strong association with rural residence, education level, type of DM, duration of insulin use, family history of diabetic illness, and education received from healthcare practitioners. Currently, there is no needle-disposal law or strong safe disposing system in Ethiopia provided by either local administration or ministry of health and environment. This serious issue requires urgent attention from the government to ensure the presence of safe disposal system and that the sharps are no longer disposed in the household bin or public locations like parks, buildings, or streets. Healthcare providers should also be aware of safe disposing system and counsel patients on appropriate disposal of used syringes.

Competing Interests

All of the authors declare that there is no conflict of interests regarding this work.

Acknowledgments

The authors acknowledge the support of the School of Pharmacy, University of Gondar, in facilitating the data collection process and also acknowledge all individuals who assisted them during data collection.

References

K. G. M. M. Alberti and P. Z. Zimmet, “Definition, diagnosis and classification of diabetes mellitus and its complications. Part 1: diagnosis and classification of diabetes mellitus. Provisional report of a WHO consultation,” Diabetic Medicine, vol. 15, no. 7, pp. 539–553, 1998.

G. E. Macalino, K. W. Springer, Z. S. Rahman, D. Vlahov, and T. S. Jones, “Community-based programs for safe disposal of used needles and syringes,” Journal of Acquired Immune Deficiency Syndromes and Human Retrovirology, vol. 18, pp. S111–S119, 1998.

M. A. Stewart, “Effective physician patient communication and health outcomes: a review,” Canadian Medical Association Journal, vol. 152, no. 9, pp. 1423–1433, 1995.

World Health Organization, “Status of health-care waste management in selected countries of the Western Pacific Region,” 2015, http://apps.who.int/iris/bitstream/10665/208230/1/9789290617228_eng.pdf

A. Majumdar, J. Sahoo, G. Roy, and S. Kamalanathan, “Improper sharp disposal practices among diabetes patients in home care settings: need for concern?” Indian Journal of Endocrinology and Metabolism, vol. 19, no. 3, pp. 420–425, 2015.

M. Kermode, W. Holmes, B. Langkham, M. S. Thomas, and S. Gifford, “Safer injections, fewer infections: injection safety in rural north India,” Tropical Medicine & International Health, vol. 10, no. 5, pp. 423–432, 2005.

CDC, Healthcare-Associated Hepatitis B and C Outbreaks Reported to the Centers for Disease Control and Prevention (CDC) in 2008–2013, CDC, Atlanta, Ga, USA, http://www.cdc.gov/hepatitis/outbreaks/healthcarehepoutbreaktable.htm

K. T. Musselman, B. L. Sicat, and M. H. Thomas, “Patients' knowledge of and practices relating to the disposal of used insulin needles,” INNOVATIONS in Pharmacy, vol. 1, no. 2, article 20, 2010, http://pubs.lib.umn.edu/innovations/vol1/iss2/7

K. Berkowitz, K. Ernst, V. Dunbar, and D. Ziemer, “Syringe disposal practices among insulin users,” The Diabetes Educator, vol. 45, no. 1, pp. 135–140, 1996.

J. Costello and A. Parikh, “The sticking point: diabetic sharps disposal practices in the community,” Journal of General Internal Medicine, vol. 28, no. 7, pp. 868–869, 2013.

D. Govender and A. Ross, “Sharps disposal practices among diabetic patients using insulin,” South African Medical Journal, vol. 102, no. 3, pp. 163–164, 2012.

O. Ishtiaq, A. M. Qadri, S. Mehar et al., “Disposal of syringes, needles, and lancets used by diabetic patients in Pakistan,” Journal of Infection and Public Health, vol. 5, no. 2, pp. 182–188, 2012.

D. E. McConville and E. M. Hamilton, “Syringe disposal practices and gender differences,” The Diabetes Educator, vol. 28, no. 1, pp. 91–98, 2002.

L. Simonsen, A. Kane, J. Lloyd, M. Zaffran, and M. Kane, “Unsafe injections in the developing world and transmission of bloodborne pathogens: a review,” Bulletin of the World Health Organization, vol. 77, no. 10, pp. 789–800, 1999.

M. L. Williams, S. A. McCurdy, A. M. Bowen et al., “HIV seroprevalence in a sample of Tanzanian intravenous drug users,” AIDS Education and Prevention, vol. 21, no. 5, pp. 474–483, 2009.

V. M. Quan, V. F. Go, V. Nam le, A. Bergenstrom, N. P. Thuoc, and J. Zenilman, “Risks for HIV, HBV, and HCV infections among male injection drug users in northern Vietnam: a case-control study,” AIDS Care, vol. 21, no. 1, pp. 7–16, 2009.

J. Mahanta, B. Borkakoty, H. K. Das, and P. K. Chelleng, “The risk of HIV and HCV infections among injection drug users in northeast India,” AIDS Care, vol. 21, no. 11, pp. 1420–1424, 2009.

WHO, “A safe injection does no harm to recipient, does not expose the health worker to avoidable risk and poses no threat to the third party,” Report of the WHO Technet Meeting, Washington, DC, USA, May-June 1994, WHO, Geneva, Switzerland, 1994.

A. Battersby, R. Feilden, and C. Nelson, “Sterilizable syringes: excessive risk or cost-effective option?” Bulletin of the World Health Organization, vol. 77, no. 10, pp. 812–819, 1999.

B. Aylward, J. Lloyd, M. Zaifran et al., “Reducing risk of unsafe injections in immunization programmes: financial and operational implications for various injection technologies,” Bulletin of the World Health Organization, vol. 73, no. 4, pp. 531–540, 1995.

N. Z. Janjua, “Injection practices and sharp waste disposal by general practitioners of Murree, Pakistan,” The Journal of the Pakistan Medical Association, vol. 53, no. 3, pp. 107–111, 2003.

S. Reid, “Estimating the burden of disease from unsafe injections in India: a cost-benefit assessment of the auto-disable syringe in a country with low blood-borne virus prevalence,” Indian Journal of Community Medicine, vol. 37, no. 2, pp. 89–94, 2012.

N. Z. Janjua, H. B. Hamza, M. Islam et al., “Health care risk factors among women and personal behaviours among men explain the high prevalence of hepatitis C virus infection in Karachi, Pakistan,” Journal of Viral Hepatitis, vol. 17, no. 5, pp. 317–326, 2010.

J. L. Gerberding, “Management of occupational exposures to blood-borne viruses,” The New England Journal of Medicine, vol. 332, no. 7, pp. 444–451, 1995.

A. Kotwal, R. Priya, R. Thakur, V. Gupta, J. Kotwal, and T. Seth, “Injection practices in a metropolis of North India: perceptions, determinants and issues of safety,” Indian Journal of Medical Sciences, vol. 58, no. 8, pp. 334–344, 2004.

P. S. Ajit and S. C. Robert, “Knowledge, attitude and practices (kap) on disposal of sharp waste, used for home management of type-2 diabetes mellitus, in New Delhi,” India Health Research, vol. 25, no. 3, pp. 135–140, 2011.

B. Olowokure, H. V. Duggal, and L. E. Armitage, “The disposal of used sharps by diabetic patients living at home,” International Journal of Environmental Health Research, vol. 13, no. 2, pp. 117–123, 2003.

T. M. Kerri, L. S. Brigitte, H. T. Michelle, and E. H. Spencer, “Patients' knowledge of and practices relating to the disposal of used insulin needles,” Innovations in Pharmacy, vol. 1, no. 2, pp. 20–30, 2010.

Diabetes UK, Sharps disposal, 2001, https://www.diabetes.org.uk/sharps

B. Bouhanick, S. Hadjadj, and L. Weekers, “What do the needles, syringes, lancets and reagent strips of diabetic patients become in the absence of a common attitude? About 1070 questionnaires in diabetic clinics,” Diabetes and Metabolism, vol. 26, no. 4, pp. 288–293, 2000.

A. A. Albarraq, “Safe use and disposal of injections: Saudi Health Providers’ Perception,” Pharmacology & Pharmacy, vol. 5, no. 2, pp. 153–159, 2014.

K. Anand, C. S. Panadav, and S. K. Kapoor, “Injection use in a village in North India,” Nail Mcdi India, vol. 57, no. 10, pp. 1821–1832, 1821.

G. Crawshaw, D. J. Irwin, and J. Button, “Disposal of syringes, needles, and lancets used by diabetic patients in North East Essex,” Communicable Disease and Public Health, vol. 5, no. 2, pp. 134–137, 2002.