Journal of Engineering
Volume 2017 (2017), Article ID 3906268, 1 page
https://doi.org/10.1155/2017/3906268

Retraction

Retracted: Power Consumption, Mixing Time, and Oxygen Mass Transfer in a Gas-Liquid Contactor Stirred with a Dual Impeller for Different Spacing

Journal of Engineering

Received 9 April 2017; Accepted 9 April 2017; Published 11 May 2017

Copyright © 2017 Journal of Engineering. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

At the request of the author, the article titled “Power Consumption, Mixing Time, and Oxygen Mass Transfer in a Gas-Liquid Contactor Stirred with a Dual Impeller for Different Spacing” [1] has been retracted. The data presented in the article were published without the permission of the University of Toulouse.

References

H. M. Issa, “Power consumption, mixing time, and oxygen mass transfer in a gas-liquid contactor stirred with a dual impeller for different spacing,” Journal of Engineering, vol. 2016, Article ID 3954305, 7 pages, 2016.