Journal of Healthcare Engineering
Volume 2018 (2018), Article ID 6874765, 8 pages
https://doi.org/10.1155/2018/6874765

Research Article

Comparison of Machine-Learning Classification Models for Glaucoma Management

Guangzhou An,1,2 Kazuko Omodaka,³ Satoru Tsuda,³ Yukihiro Shiga,³ Naoko Takada,³ Tsutomu Kikawa,¹ Toru Nakazawa,3,4 Hideo Yokota,1,4 and Masahiro Akiba1,2

¹R&D Division, Topcon Corporation, Tokyo, Japan
²Cloud-Based Eye Disease Diagnosis Joint Research Team, RIKEN Center for Advanced Photonics, RIKEN, Wako, Japan
³Tohoku University Graduate School of Medicine, Sendai, Japan
⁴Image Processing Research Team, RIKEN Center for Advanced Photonics, RIKEN, Wako, Japan

Correspondence should be addressed to Masahiro Akiba; m-akiba@topcon.co.jp

Received 27 December 2017; Revised 6 April 2018; Accepted 18 April 2018; Published 19 June 2018

Academic Editor: Altaf Hussain

Copyright © 2018 Guangzhou An et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This study develops an objective machine-learning classification model for classifying glaucomatous optic discs and reveals the classificatory criteria to assist in clinical glaucoma management. In this study, 163 glaucoma eyes were labelled with four optic disc types by three glaucoma specialists and then randomly separated into training and test data. All the images of these eyes were captured using optical coherence tomography and laser speckle flowgraphy to quantify the ocular structure and blood-flow-related parameters. A total of 91 parameters were extracted from each eye along with the patients’ background information. Machine-learning classifiers, including the neural network (NN), naïve Bayes (NB), support vector machine (SVM), and gradient boosted decision trees (GBDT), were trained to build the classification models, and a hybrid feature selection method that combines minimum redundancy maximum relevance and genetic-algorithm-based feature selection was applied to find the most valid and relevant features for NN, NB, and SVM. A comparison of the performance of the three machine-learning classification models showed that the NN had the best classification performance with a validated accuracy of 87.8% using only nine ocular parameters. These selected quantified parameters enabled the trained NN to classify glaucomatous optic discs with relatively high performance without requiring color fundus images.

1. Introduction

Glaucoma is a disease that causes progressive damage of the optic nerves, and it is the leading cause of blindness in Japan. The neurodegeneration is irreversible, and patients may not be aware of it until its later stages; thus, early diagnosis and treatment are essential to prevent blindness. The optic disc is the point of exit for all retinal nerve fibers to the brain, and thus, it is important to observe the optic disc in glaucoma management. Besides intraocular pressure, which is an evidenced and treatable influencing factor, glaucoma is considered to be a multifactorial disease; some of these factors are myopia, ocular blood flow, and oxidative stress [1]. However, there are no clear guidelines for the treatments. Nicolela proposed a guideline for identifying a glaucomatous optic disc based on its shape [2]. Nicolela’s classification contains four types of glaucoma: local ischemic type (focal ischemic (FI)), age-related hardening type (senile sclerotic (SS)), myopic type (myopic (MY)), and generalized enlargement (GE) [2]. Many studies have shown that this classification is helpful for understanding glaucoma pathogenesis [3–5]. Clinically, doctors always diagnose glaucoma by reading color fundus photos and subjectively identifying the specific optic disc type for glaucoma management. Unfortunately, some doctors have reported unmatched cases that make it difficult to decide further glaucoma treatment. Thus, accurate and objective methods are required for classifying optic discs. Meanwhile, it is necessary to reveal classificatory criteria because a comprehensive classification result should be provided to the doctors for them to accurately decide the course of the clinical treatment.

Machine learning has been used increasingly in medical applications such as computer-aided diagnosis. Because machine learning can determine relationships among input parameters and labels, many studies have used it for classifying glaucoma and healthy eyes [6–8]. However, relevant studies for glaucoma management have not been conducted yet, and more research efforts are required.

In this study, we aim to build a machine-learning classification model for objectively identifying glaucomatous disc-type parameters; then, such disc-type parameters are clinically discussed and compared with doctors’ criteria.

2. Materials and Methods

2.1. Materials

In this study, we recruited 163 eyes from 105 glaucoma patients under a protocol approved by the Institutional Review Board (IRB) (Wako3 26-4). All these eyes were reviewed and classified into four categories by three glaucoma specialists according to Nicolela’s definition. With the development of measuring techniques, many methodologies are available for observing the optic disc, such as shape and eye circulation. Compared with color fundus, optical coherence tomography (OCT) based on low-coherence interferometry can image the tissue morphology with micrometer resolution, and therefore, it is being used widely in the ophthalmological field (Figure 1). By using integrated layer analysis software (DRI OCT Atlantis FastMap version 9.30), 48 ocular parameters relevant to the circumpapillary retinal nerve fiber layer thickness (cpRNFLT) and optic disc morphology were quantified [9–11]. The evaluation result against OCT segmentation has been published online as a whitepaper (available at http://www.topcon.co.jp/eyecare/handout) [12].

(a)

(b)

(c)

Figure 1: Quantification from optical coherence tomography images. (a) Cross-sectional OCT image at a yellow line in (c), where green lines in (a) show the detected layer information for calculating the retinal nerve fiber layer (RNFL) thickness; (b) RNFL thickness map, where the number indicates the thickness in micrometers in 12 sectors around the optic disc and cyan and magenta circles show automatically detected disc and cup boundaries; (c) a color fundus photo of the optic disc area.

Laser speckle flowgraphy (LSFG) allows for the quantitative estimation of blood-flow-related parameters in the optic nerve head by using the laser speckle phenomenon (Figure 2). Thirty-six parameters quantified from its analysis software were also extracted.

(a)

(b)

Figure 2: Laser speckle flowgraphy images. LSFG snapshot of (a) a healthy eye and (b) a glaucoma eye. LSFG uses the mean blur rate as an indicator of blood flow. The colormap shows blood-flow-related information in the optic disc with the right-hand-side scale bar, where the blue color indicates lower blood flow and the red color indicates higher blood flow.

Seven demographic parameters, such as gender, age, and spherical equivalent, were also extracted among the 91 quantified ocular parameters for each eye after rudimentary judgement of various ocular parameters, as shown in Table 1.

Table 1: Extracted ocular parameters.

No.
Quantification data
Features

1
Patient’s background data
Gender

2
Age

3
Spherical equivalent

4
Mean deviation

5
Pattern standard deviation

6
Internal ocular pressure

7
Central corneal thickness

8
Optic disc shape parameters obtained from OCT
Disc area

9
Cup area

10
Rim area

11
Vertical disc diameter

12
Horizontal disc diameter

13
Vertical cup/disc diameter ratio

14
Horizontal cup/disc diameter ratio

15
Cup/disc area ratio

16
Rim/disc area ratio

17
Maximum cup depth

18
Average cup depth

19–24
Average rim/disc area ratio (six sectors)

25
Rim decentering area ratio

26
Horizontal disc angle

27
Disc height difference

28
Retinal pigment epithelium (RPE) height difference

29
Disc tilt angle

30
cpRNFLT average thickness obtained from OCT
Average cpRNFLT

31–34
cpRNFLT (quadrants)

35
Difference in cpRNFLT (superior and inferior in four sectors)

36–41
cpRNFLT (six sectors)

42
Rim decentering cpRNFLT ratio

43
Difference in cpRNFLT (temporal superior and temporal inferior in six sectors)

44–55
cpRNFLT (clockwise sectors)

56
Ocular blood flow parameters obtained from LSFG
Average in all (tissue)

57–60
Average in quadrants (tissue)

61
Skewness in all (tissue)

62–65
Skewness in quadrants (tissue)

66
Blowout score in all (tissue)

67–70
Blowout score in quadrants (tissue)

71
Blowout time in all (tissue)

72–75
Blowout time in quadrants (tissue)

76
Rising rate in all (tissue)

77–80
Rising rate in quadrants (tissue)

81
Flow acceleration index in all (tissue)

82–85
Flow acceleration index in quadrants (tissue)

86
Acceleration time index in all (tissue)

87–90
Acceleration time index in quadrants (tissue)

91
Average ratio of blood stream

2.2. Feature Selection

In machine learning, feature selection (FS) helps to (1) improve the classification performance by avoiding overfitting, (2) build a time-saving model, and (3) make the built model more understandable to humans. FS methods can be categorized into three types depending on their selection mechanism: filters, wrappers, and embedded types. Filters use general characteristics such as correlation to remove irrelevant features without using any machine-learning algorithms. Minimum redundancy maximum relevance (mRMR), one type of a filter method, is based on mutual information; it has been widely used recently because it assesses the trade-off of maximizing the relevance between each feature and label and minimizing the feature redundancy [13]. Wrappers use classifiers to evaluate the performance and to search for the best combination of features. Embedded methods are quite similar to wrappers in that they also use a machine-learning model; however, they differ from wrappers in that they perform FS as a part of the machine learning. In wrappers, a heuristic search shows higher performance but is too time-consuming, especially for a large number of features. Thus, instead of brute-force selection, more efficient strategies have been developed, such as genetic-algorithm-based feature selection (GAFS) using randomness that mimics natural evolution [14]. Filters are often used in combination with heuristic wrappers for principal selection [15]. In this study, we used a hybrid FS scheme that combines mRMR and a genetic-algorithm-based method. We also applied gradient boosted decision trees (GBDT), which is an embedded method, to compare the effects of the FS schemes.

2.3. Machine-Learning Classifiers

Various classifiers have been used to compare different FS schemes in detail. Naïve Bayes (NB) is a simple probabilistic classifier based on Bayes’ rule. NB considers all features to be independent of the probability of a label. Support vector machine (SVM) is a supervised machine-learning algorithm that transforms the feature space to a much higher dimension by using kernel functions and finds a linear boundary to achieve the maximum margin between two classes. In this study, we explored SVM with radial basis function (RBF) kernels. A neural network (NN) models the neurons and synapse of the brain, and it enables problems to be processed nonlinearly by identifying the correlation between features and labels.

In this study, we explored the effect of FS on the above three classification classifiers for GAFS. Separately, GBDT, decision trees as the weak learner capable of calculating the feature importance, are applied for comparison with the GAFS schemes.

2.4. Proposed Approach

First, we divided all the eyes into two groups: training data () and test data (). With training data, mRMR was first used to find the candidate features (15 features), and then, GAFS with NB, SVM, and NN was applied to find the most valid features and classifiers. To compare the performance of FS and machine-learning classifiers, we used Cohen’s kappa of 10-fold cross-validation (CV) for training data as the evaluation criteria (Figure 3). GBDT was trained with the training data without using mRMR and also evaluated with Cohen’s kappa of 10-fold CV. Finally, all the developed models were validated by using the test data.

Figure 3: Flow chart of the proposed approach (GAFS).

Table 2 lists the parameters used in GAFS.

Table 2: Parameters used in GAFS.

GAFS parameter
Value

Population size
20

Crossover probability
0.7

Mutation probability
0.2

Selection type
Tournament of size 2

Number of generations
1000

Early stopping
Used

3. Results and Discussion

Table 3 shows the top 10 contributing quantified parameters ranked by GBDT. Cohen’s kappa of 10-fold CV is 0.83 (Figure 4).

Table 3: Feature importance calculated by GBDT (top 10).

No.
Features
Feature importance

1
Horizontal disc angle
1.000

2
Spherical equivalent
0.723

3
Average cup depth
0.427

4
Nasal rim/disc area ratio
0.284

5
Age
0.145

6
cpRNFLT (superior sector in four sectors)
0.136

7
cpRNFLT (temporal superior sector in six sectors)
0.127

8
Cup area
0.040

9
Maximum cup depth
0.038

10
Superior nasal rim/disc area ratio
0.038

(a)

(b)

(c)

Figure 4: Performance change of classification using different numbers of features. (a) Support vector machine; (b) neural network; (c) naïve Bayes.

The best Cohen’s kappa of 10-fold CV for SVM, NB, and CV was 0.871, 0.852, and 0.902, respectively, which are better than that of GBDT. Furthermore, Table 4 lists the results of the selected features for each model. This table shows the common parameters for three classifiers, such as age, spherical equivalent, nasal rim/disc area ratio, horizontal disc angle, average cup depth, and cpRNFLT (superior sector in four sectors), which are the six most contributing features calculated by GBDT. Our new classifier shows higher accuracy for such a classification compared to the regression model with Cohen’s kappa of 0.73 that was demonstrated in a previous study [10]. Figure 5 shows the box-and-whisker plot of the common features, and these features appear to help discriminate different optic discs, consistent with previous clinical findings. Generally, MY disc type has a low spherical equivalent and tilts resulting in a high horizontal disc angle; it is associated with the onset of glaucoma at a younger age. On the contrary, GE discs generally have a thin nasal rim and a large average cup depth and cup area, while SS discs have a small average cup depth and are associated with the onset of glaucoma at an older age. FI discs showed thickening of the cpRNFL in the superior sector in the four sectors [11].

Table 4: Selected features using different classifiers in GAFS.

SVM
NB
NN

Cohen’s kappa
0.871
0.852
0.902

Common features
Age

Spherical equivalent

Nasal rim/disc area ratio

Horizontal disc angle

Average cup depth

cpRNFLT (superior in four sectors)

Individual features
cpRNFLT (temporal superior in six sectors)
Disc horizontal diameter
cpRNFLT (temporal superior in six sectors)

Maximum height difference

Cup area

Horizontal disc diameter

Maximum cup depth

(a)

(b)

(c)

(d)

(e)

(f)

Figure 5: Box-and-whisker plots of common features: (a) cpRNFLT (superior sector in the four sectors); (b) cup area; (c) age; (d) horizontal disc angle; (e) nasal rim/disc area ratio; (f) spherical equivalent.

The NN with just a single hidden layer (number of units: 8) was the best classifier for this problem, in which the nine most valuable ocular parameters were chosen by hybrid FS (Figure 6). Seven parameters (horizontal disc angle, cup area, cpRNFLT (temporal superior in six sectors), average cup depth, nasal rim/disc ratio, maximum cup depth, and cpRNFLT (superior in four sectors)) were extracted from OCT, and two parameters (spherical equivalent and age) pertained to patients’ demographic data. This shows the possibility of performing this classification by using only the OCT data set. The contribution of each selected parameter was also calculated by using the weights for each unit in the trained NN (Figure 6) [16]. Doctors can classify and check optic disc types using these features along with their contribution values and not just by reading the color fundus images.

Figure 6: Contribution of each selected feature to Nicolela’s classification. Selected features (9 features) when using the NN were sorted by the contribution calculated with the weights of each unit in the NN. The horizontal disc angle had the highest contribution for classifying optic discs.

In this study, two additional experiments were performed to validate the current classifier. First, the selected features were investigated by comparing the results obtained from the combination of mRMR and brute-force selection. In brute-force selection, all possibilities are tried one after another until the best accuracy is obtained. As a result, we obtained the same classification parameters and performance as those of the hybrid FS used in this study. Even though the same results were obtained, it should be noted that the calculation time of brute-force selection was ∼120 times that of the proposed method. Second, all data were shuffled to regenerate the training data and test data randomly. We found that the hybrid FS had the highest classification performance in the NN (Cohen’s kappa: 0.902) with a different combination of features () in which six ocular parameters, namely, spherical equivalent, cup area, maximum cup depth, average cup depth, cpRNFLT (superior sector in four sectors), and horizontal disc angle, were the common features before and after the shuffling of data. Instead of cpRNFLT (temporal superior sector in six sectors), nasal rim/disc area ratio, and age, the hybrid FS found three new features, namely, RPE height difference, superior nasal rim/disc area ratio, and cup/disc area ratio. Because unselected features after shuffling have high correlations with any feature in the new feature combination, the classification performance did not decrease significantly; for example, the correlation value of the nasal rim/disc area ratio and superior nasal rim/disc area ratio was 0.864, whereas that of the horizontal disc angle and RPE height difference was 0.804.

The proposed model can calculate the confidence of the prediction (Figure 7). When validating the prediction with the test data by using the highest one as the prediction, the overall accuracy was 87.8%. With regard to failure prediction examples, we found that the developed classification model classified the correct answer as the second choice in most cases (Figure 7(e)). If the second choice is also considered to be correct, the accuracy was 95.9%. In some cases, specialists also narrow down the answer to two or more, such as FI and MY optic discs (Figure 7(e)) because FI optic discs clinically always have myopic characteristics as do the MY type. Thus, our machine-learning classification model might well reflect the actual clinical problem, and the prediction calculated by this approach can assist doctors in understanding the glaucomatous optic disc shape among glaucomatous subjects.

(a)

(b)

(c)

(d)

(e)

Figure 7: Prediction examples obtained using the NN: (a) successful example of prediction for FI and color fundus photo, (b) successful example of prediction for GE and color fundus photo, (c) successful example of prediction for MY and color fundus photo, (d) successful example of prediction for SS and color fundus photo, and (e) failure example of prediction and color fundus photo.

There are some limitations in this study. First, we did not use deep learning, which is widely used in classification of affected and healthy eyes with clinical images [17–19]. Deep learning is being recognized as a powerful method for automatically designing effective features directly from the images, when the data are sufficient, which could not be accomplished in this study unfortunately. Second, a single NN with just one hidden layer may not yield good performance. In the future, we will try to combine features learned by the deep learning approach from OCT, LSFG, and color fundus images with the quantified parameters and increase the hidden layers to improve the performance after collecting more data.

4. Conclusions

The results show that the proposed approach can objectively classify the glaucomatous optic disc shape with FS and NN by using quantified ocular parameters obtained from ophthalmic examination equipment. The confidence of each predicted optic disc type and the obtained contributing ocular parameters can assist in daily clinical glaucoma treatment.

Conflicts of Interest

Guangzhou An, Tsutomu Kikawa, and Masahiro Akiba are employees of TOPCON Corporation.

References

T. Nakazawa, “Ocular blood flow and influencing factors for glaucoma,” Asia-Pacific Journal of Ophthalmology, vol. 5, no. 1, pp. 38–44, 2016.

M. T. Nicolela and S. M. Drance, “Various glaucomatous optic nerve appearances: clinical correlations,” Ophthalmology, vol. 103, no. 4, pp. 640–649, 1996.

K. Omodaka, N. Takada, T. Yamaguchi, H. Takahashi, M. Araie, and T. Nakazawa, “Characteristic correlations of the structure-function relationship in different glaucomatous disc types,” Japanese Journal of Ophthalmology, vol. 59, no. 4, pp. 223–229, 2015.

T. Nakazawa, M. Shimura, M. Ryu et al., “Progression of visual field defects in eyes with different optic disc appearances in patients with normal tension glaucoma,” Journal of Glaucoma, vol. 21, no. 6, pp. 426–430, 2012.

T. Nakazawa, N. Chiba, K. Omodaka et al., “Association between optic nerve blood flow and objective examinations in glaucoma patients with generalized enlargement disc type,” Clinical Ophthalmology, vol. 5, pp. 1549–1556, 2011.

S. J. Kim, K. J. Cho, and S. Oh, “Development of machine learning models for diagnosis of glaucoma,” PLoS One, vol. 12, no. 5, Article ID e0177726, 2017.

K. Chan, T. W. Lee, P. A. Sample, M. H. Goldbaum, R. N. Weinreb, and T. J. Sejnowski, “Comparison of machine learning and traditional classifiers in glaucoma diagnosis,” IEEE Transactions on Biomedical Engineering, vol. 49, no. 9, pp. 963–974, 2002.

D. Bizios, A. Heijl, J. L. Hougaar, and B. Bengtsson, “Machine learning classifiers for glaucoma diagnosis based on classification of retinal nerve fibre layer thickness parameters measured by Stratus OCT,” Acta Ophthalmologica, vol. 88, no. 1, pp. 44–52, 2010.

C. K. Leung, W. M. Chan, Y. L. Hui et al., “Analysis of retinal nerve fiber layer and optic nerve head in glaucoma with different reference plane offsets, using optical coherence tomography,” Investigative Opthalmology & Visual Science, vol. 46, no. 3, pp. 891–899, 2005.

N. Takada, K. Omodaka, T. Kikawa et al., “OCT-based quantification and classification of optic disc structure in glaucoma patients,” PLoS One, vol. 11, no. 8, Article ID e0160226, 2016.

K. Omodaka, G. An, S. Tsuda et al., “Classification of optic disc shape in glaucoma using machine learning based on quantified ocular parameters,” PLoS One, vol. 12, no. 12, Article ID e0190012, 2017.

Q. Yang, C. A. Reisman, A. Wang et al., “Automated layer segmentation of macular OCT images using dual-scale gradient information,” Optics Express, vol. 18, no. 20, pp. 21293–21307, 2010.

H. Peng, F. Long, and C. Ding, “Feature selection based on mutual information: criteria of max-dependency, max-relevance, and min-redundancy,” IEEE Transactions on Pattern Analysis and Machine Intelligence, vol. 27, no. 8, pp. 1226–1238, 2005.

J. Yang and V. Hanovar, “Feature subset selection using genetic algorithm,” IEEE Intelligent Systems, vol. 13, no. 2, pp. 44–49, 1998.

A. E. Akadi, A. Amine, A. E. Ouardighi, and D. Aboutajdine, “A two-stage gene selection scheme utilizing MRMR filter and GA wrapper,” Knowledge and Information Systems, vol. 26, no. 3, pp. 487–500, 2011.

L. Milne, “Feature selection using neural networks contribution measures,” in Proceedings of the Eighth Australian Joint Conference on Artificial Intelligence, Canberra, ACT, Australia, November 1995.

C. S. Lee, A. J. Tyring, N. P. Deruyter, Y. Wu, A. Rokem, and A. Y. Lee, “Deep-learning based, automated segmentation of macular edema in optical coherence tomography,” Biomedical Optics Express, vol. 8, no. 7, pp. 3440–3448, 2017.

D. S. W. Ting, C. Y. L. Cheung, G. Lim et al., “Development and validation of a deep learning system for diabetic retinopathy and related eye diseases using retinal images from multiethnic populations with diabetes,” JAMA, vol. 318, no. 22, pp. 2211–2223, 2017.

E. Rahimy, “Deep learning applications in ophthalmology,” Current Opinion in Ophthalmology, vol. 29, no. 3, pp. 254–260, 2018.