Journal of Interventional Cardiology
Volume 2020 (2020), Article ID 2475930, 12 pages
https://doi.org/10.1155/2020/2475930

Research Article

Clinical Implications of Bifurcation Angles in Left Main Bifurcation Intervention Using a Two-Stent Technique

You-Jeong Ki,¹ Ji Hyun Jung,¹ Jung-Kyu Han,¹ Sukkeun Hong,² Jang Hyun Cho,³ Hyeon-Cheol Gwon,⁴ Sung Yun Lee,⁵ Jay Young Rhew,⁶ Jei Keon Chae,⁷ In-Ho Chae,⁸ Han-Mo Yang,¹ Kyung Woo Park,¹ Hyun-Jae Kang,¹ Bon-Kwon Koo,¹ and Hyo-Soo Kim¹

¹Cardiovascular Center, Seoul National University Hospital, Seoul 03080, Republic of Korea
²Division of Cardiology, Department of Internal Medicine, Sejong General Hospital, Bucheon 14754, Republic of Korea
³Department of Internal Medicine, St. Carollo Hospital, Sunchon 57931, Republic of Korea
⁴Heart Vascular Stroke Institute, Samsung Medical Center, Sungkyunkwan University School of Medicine, Seoul 06351, Republic of Korea
⁵Inje University Ilsan Paik Hospital, Goyang 10380, Republic of Korea
⁶Division of Cardiology, Department of Internal Medicine, Presbyterian Medical Center, Jeonju 54987, Republic of Korea
⁷Chonbuk National University Hospital, Jeonju 54907, Republic of Korea
⁸Seoul National University Bundang Hospital, Sungnam 13620, Republic of Korea

Correspondence should be addressed to Jung-Kyu Han; hpcrates@gmail.com

Received 2 November 2019; Revised 8 June 2020; Accepted 22 June 2020; Published 13 July 2020

Academic Editor: Thach N. Nguyen

Copyright © 2020 You-Jeong Ki et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Objectives. The aim of this study was to assess the clinical impact of 3 bifurcation angles in left main (LM) bifurcation treated with the 2-stent technique. Background. Data are limited regarding the impact of bifurcation angles after LM percutaneous coronary intervention (PCI). Methods. Using patient-level 4 multicenter registries in Korea, 462 patients undergoing LM bifurcation PCI with the 2-stent technique were identified (181 crush, 167 T-stenting; 63% 1st generation drug-eluting stent (DES), 37% 2nd generation DES). Three bifurcation angles, between the LM and left anterior descending (LAD), the LM and left circumflex (LCX), and the LAD and LCX, were measured. The primary outcome was target lesion failure (TLF), a composite of cardiac death, myocardial infarction, and target lesion revascularization (TLR). Results. In patients treated with the crush technique, the best cutoff value (BCV) to predict TLF was 152° of the LM-LAD angle. In the crush group, a significantly higher TLF rate, mostly driven by TLR, was observed in the LM-LAD angle ≥152° group compared with the <152° group (35.7% vs. 14.6%; adjusted hazard ratio 3.476; 95% confidence interval 1.612–7.492). An LM-LAD angle ≥152° was an independent predictor of TLF. In the T-stenting, no bifurcation angle affected the clinical outcomes. Conclusions. In LM bifurcation PCI using the 2-stent technique, wide LM-LAD angle (≥152°) was associated with a greater risk of TLF in the crush, whereas none of the bifurcation angles affected T-stenting outcomes.

1. Introduction

Bifurcation disease remains a challenging lesion subset posing a higher risk of adverse events in the drug-eluting stent (DES) era [1, 2]. Although use of the provisional 1-stent technique has been widely recommended for percutaneous coronary intervention (PCI) of bifurcation lesions [3–6], the 2-stent technique is frequently necessary and justified [7], especially in left main (LM) bifurcation disease because of the importance of preserving the left circumflex (LCX) artery [8]. Among the potential factors affecting clinical outcomes of LM bifurcation PCI, bifurcation angle has drawn interventionists’ interest. However, its impact has not yet been fully elucidated. Practically, one of the important factors in the stent strategy selection process is bifurcation angle: for example, T-stenting is considered appropriate for bifurcation with a near 90° angle between the main branch (MB) and side branch (SB) [3]. However, this practice is based on theoretical assumption without thorough validation using real-world data. Moreover, a few previous studies regarding bifurcation angle used heterogeneous definitions of the angle and reported controversial data [9–17]. Here, we sought to comprehensively assess the clinical impact of 3 different bifurcation angles (angles between the LM and the left anterior descending (LAD) artery, between the LM and the LCX, and between the LAD and the LCX) in patients undergoing LM bifurcation PCI using the 2-stent technique. Because visual estimation is widely adopted to assess bifurcation angles and determine a type of 2-stent technique in real-world practice, we used 2-dimensional quantitative coronary angiography (QCA) to measure bifurcation angles, results of which should be applied to daily practice.

2. Materials and Methods

2.1. Study Population

We analyzed patient-level pooled data from 4 multicenter registries in South Korea (Figure 1). The COBIS (COronary BIfurcation Stenting) II registry (NCT01642992) is a retrospective multicenter registry of individuals with coronary bifurcation lesions who underwent PCI with DES. Consecutive patients from 19 major coronary intervention centers in Korea were enrolled in this study between 2003 and 2010. The inclusion criteria were (1) age ≥18 years; (2) coronary bifurcation lesions treated with DES; and (3) a side branch or LCX reference diameter ≥2.3 mm and at least stentable with a 2.5 mm stent. The exclusion criteria were (1) protected LM disease (previous coronary artery bypass grafting in the LAD or LCX territory); (2) cardiogenic shock; and (3) history of cardiopulmonary resuscitation in the same hospitalization. The Seoul National University Hospital (SNUH) LM registry is a retrospective registry of patients undergoing PCI of bifurcation lesions at SNUH. From 2010 through 2015, a total of 565 patients were enrolled in this registry. The EXCELLENT (Efficacy of Xience/Promus Versus Cypher in rEducing Late Loss After stENTing) Registry (NCT00960648) and RESOLUTE-Korea (Registry to Evaluate the Efficacy of Zotarolimus-Eluting Stent) (NCT00960908) are multicenter prospective registries that consecutively enrolled 3,056 patients treated with everolimus-eluting stents (Xience V/Promus) from 29 centers (not sirolimus-eluting stents (Cypher)) and 1,998 patients treated with zotarolimus-eluting stents (Endeavor Resolute) from 25 centers, respectively, from 2008 through 2010. A total of 462 consecutive patients with LM bifurcation disease who underwent PCI using 2-stent strategies were identified: 181 were treated with the crush technique (22.2% classic, 63.2% mini-crush, and 14.6% other crush technique), 167 with T-stenting technique (14.4% classic T-stenting, 84.8% modified T or T and protrusion (TAP), and 0.8% inverted T-stenting), 32 with the culotte technique, and 81 with the kissing technique (Figure 1). This study complied with the provisions of the Declaration of Helsinki. The study protocol was approved by the institutional review board of each participating center. All patients provided written informed consent.

Figure 1: Study population from 4 multicenter registries. EES, everolimus-eluting stent(s); LM, left main; PCI, percutaneous coronary intervention; TAP, T and protrusion; ZES-R, zotarolimus-eluting resolute stent.

2.2. PCI Procedure

Coronary intervention was performed according to current standard procedural guidelines. The treatment strategy, details of the antiplatelet regimen, use of intravascular ultrasound, and choice of the specific DES type were left to the operator’s discretion.

2.3. Definitions and Outcomes

The primary outcome was target lesion failure (TLF), a composite of cardiac death, myocardial infarction (MI), or target lesion revascularization (TLR). Secondary outcomes were patient-oriented composite outcome (POCO, a composite of all-cause death, any MI, stroke or any revascularization, individual elements of TLF and POCO, target vessel revascularization (TVR), and definite or probable stent thrombosis according to the Academic Research Consortium definitions.

To reflect real-world practice, bifurcation angle was measured in an angiographic view with clear separation of bifurcation and least foreshortening, usually the left anterior oblique (LAO) caudal view. First, virtual lines were drawn as vectors extending from the branch origin. Next, the angles between LM and LAD (LM-LAD, angle C according to the European Bifurcation Club definition [18]), LAD and LCX (LAD-LCX, angle B), and LM and LCX (LM-LCX, angle A) were measured (Figure 2). The bifurcation angles were measured from preprocedural angiographic images. These bifurcation angles were independently assessed by 2 different cardiologists. The coefficient of variations (CVs) was calculated to determine the interobserver reliabilities for each bifurcation angle. Each CV was 20.0, 26.7, and 16.7, for the angle between LM and LCX, the angle between LAD and LCX, and the angle between LM and LAD, respectively, in our laboratory. The interobserver agreement for agreement on the wide angle between LM and LAD was 81.7% (Cohen’s kappa = 0.553). The definition of procedural success was defined as a final residual stenosis <30% with TIMI flow grade 3 in either the main branch or the side branch.

(a)

(b)

Figure 2: Measurement of left main bifurcation angles. Virtual lines were drawn from the branch origin under the LAO caudal view, and the 3 bifurcation angles were measured. LAD, left anterior descending artery; LAO, left anterior oblique; LCX, left circumflex artery; and LM, left main.

2.4. Statistical Analysis

Data are expressed as numbers and percentages for categorical variables and as mean ± standard deviation (SD) for continuous variables. The differences in characteristics between groups were compared using chi-square tests for categorical variables and Student’s t-test or one-way analysis of variance for continuous variables. Regarding categorical variables, the Fisher exact test was used when any expected cell count was less than 5 (not resulting from missing rows or columns in a larger table). To determine the best cutoff bifurcation angle to predict TLF, receiver operating characteristic (ROC) curve analysis was performed. In order to get the optimal cutoff values, we used the Youden index (= Sensitivity + Specificity − 1). The time-dependent event rate was estimated by the Kaplan–Meier method and compared with the log-rank test. If the combined end points occurred in one patient, the first event was counted. The Cox proportional hazard model was used to calculate the hazard ratios (HRs) for the endpoints. A multivariable Cox regression model was used to adjust for uneven distribution of baseline characteristics and to find independent predictors of the clinical outcome. Variables with in the univariate analysis were included in multivariable Cox regression model. The final included variables are as follows: in the crush group, wide angle of LM-LAD (≥152°), MV calcification, long SB lesion (>5 mm), high SYNTAX score (≥33), final kissing ballooning (FKB), and true bifurcation And in the T-stenting group, current smoker, low LV systolic function (<50%), MV calcification, and long SB lesion (>5 mm). The final models were determined by the enter method. Results are reported as 95% confidence intervals (CIs). A two-sided value of was considered significant for all probability values. SPSS version 22 (IBM SPSS Statistics, Chicago, IL, USA) was used for the statistical analyses.

3. Results

3.1. Baseline Clinical, Angiographic, and Procedural Characteristics

Of the 462 patients, 37% took the 2nd generation DES, and the remainder, the 1st generation DES. Because the majority of the study population underwent PCI using the crush technique or T-stenting, our study focused on these techniques. Baseline characteristics were similar between the crush technique and T-stenting group except for clinical manifestations: the acute coronary syndrome rate was higher in the crush group (crush versus T-stenting; 72.4% versus 54.5%; ) (Table 1). Interestingly, although the choice between crush and T-stenting is generally determined based on LAD-LCX angle, the data from this real-world patient-level pooled registry showed no differences in bifurcation angles between the 2 groups (LM-LAD, 150.0 versus 155.2; , LM-LCX, 121.1 versus 120.8; , LAD-LCX, 82.0 versus 80.1; , crush versus T-stenting, respectively).

Table 1: Baseline clinical, angiographic, and procedural characteristics of the study population.

Clinical characteristics
Total (n = 348)
Crush (n = 181)
T-stenting (n = 167)
value

Age, years
64.4 ± 10.0
64.4 ± 9.9
64.5 ± 10.2
0.944

Male
207 (59.5)
110 (60.8)
97 (58.1)
0.610

Diabetes mellitus
112 (32.2)
59 (32.6)
53 (31.7)
0.864

Hypertension
203 (58.3)
107 (59.1)
96 (57.5)
0.758

Dyslipidemia
105 (30.2)
47 (26.0)
58 (34.7)
0.075

Peripheral vascular disease
9 (2.6)
5 (2.8)
4 (2.4)
1.000

Chronic kidney disease
30 (8.6)
19 (10.5)
11 (6.6)
0.194

Current smoker
74 (21.3)
42 (23.2)
32 (19.2)
0.357

Previous myocardial infarction
27 (7.8)
16 (8.8)
11 (6.6)
0.433

Previous cerebrovascular event
29 (8.3)
18 (9.9)
11 (6.6)
0.258

Previous PCI
79 (22.7)
47 (26.0)
32 (19.2)
0.130

Previous CABG
6 (1.7)
4 (2.2)
2 (1.2)
0.686

Family history of CAD
15 (4.3)
8 (4.4)
7 (4.2)
0.917

LV ejection fraction, %
58.2 ± 11.8
58.7 ± 12.2
57.5 ± 11.2
0.411

Clinical Manifestation

0.005

STEMI
22 (6.3)
11 (6.1)
11 (6.6)

NSTEMI
35 (10.1)
26 (14.4)
9 (5.4)

Unstable angina
165 (47.4)
94 (51.9)
71 (42.5)

Stable angina
117 (33.6)
47 (26.0)
70 (41.9)

Silent ischemia
8 (2.3)
3 (1.7)
5 (3.0)

Angiographic and Procedural Characteristics

Angle of LM-LAD
152.4 (135.0–166.0)
150.0 (134.0–165.9)
155.2 (138.0–166.3)
0.061

Angle of LM-LCX
121.0 (105.4–137.0)
121.1 (106.6–139.1)
120.8 (105.0–136.2)
0.215

Angle of LAD-LCX
81.0 (64.0–102.0)
82.0 (64.0–105.0)
80.1 (64.2–101.0)
0.505

SYNTAX Score

0.019

Low score (0–22)
120 (34.7)
59 (32.6)
61 (37.0)

Intermediate score (23–32)
151 (43.6)
72 (39.8)
79 (47.9)

High score (≥33)
75 (21.7)
50 (39.8)
25 (15.2)

Medina classification

0.084

True Bifurcation

1.1.1
161 (46.4)
76 (42.0)
85 (50.9)

1.0.1
33 (9.5)
21 (11.6)
12 (7.2)

0.1.1
66 (14.3)
22 (12.2)
27 (16.2)

Nontrue Bifurcation

1.0.0
9 (2.6)
4 (2.2)
5 (3.0)

0.1.0
26 (7.5)
16 (8.8)
10 (6.0)

1.1.0
38 (11.0)
17 (9.4)
21 (12.7)

0.0.1
31 (9.3)
25 (13.8)
6 (3.6)

DES Type

0.146

SES
151 (43.4)
81 (44.8)
70 (41.9)

PES
63 (18.1)
33 (18.2)
30 (18.0)

ZES
58 (16.7)
26 (14.4)
32 (19.2)

EES
56 (16.1)
34 (18.8)
22 (13.2)

BP-BES
18 (5.2)
6 (3.3)
12 (7.2)

Stent Type

0.636

First generation DES
217 (62.4)
115 (63.5)
102 (61.1)

Second generation DES
131 (37.6)
66 (36.5)
65 (38.9)

LAD stent diameter
3.4 ± 0.4
3.4 ± 0.4
3.4 ± 0.4
0.167

LCX stent diameter
3.0 ± 0.4
3.0 ± 0.4
3.1 ± 0.4
0.047

Values are mean ± SD, median (interquartile ranges, 25th–75th), or n (%) (per-patient analysis). Chronic kidney disease defined as a glomerular filtration rate (GFR) < 60 ml/min/1.73 m². BP-BES, biodegradable polymer biolimus-eluting stent; CABG, coronary artery bypass grafting; CAD, coronary artery disease; DES, drug-eluting stent; EES, everolimus-eluting stent; LAD, left anterior descending artery; LCX, left circumflex artery; LM, left main; LV, left ventricle; NSTEMI, non-ST-segment elevation myocardial infarction; PCI, percutaneous coronary intervention; PES, paclitaxel-eluting stent; SES, sirolimus-eluting stent; STEMI, ST-segment elevation myocardial infarction; ZES, zotarolimus-eluting stent.

The median follow-up duration was 1,048 days (interquartile range (IQR), 641–1,578) for the whole population, 1,050 days (IQR, 671–1,598) for the crush group, and 1,095 days (IQR, 728–1,577) for the T-stenting group. ROC curve analysis revealed that an LM-LAD bifurcation angle of 152° is the best cutoff value to predict TLF in the crush group (area under the curve, 0.628; 95% CI, 0.552 to 0.698; ) (Figure 3). No significant cutoffs were found in other angles in the crush group. In contrast, no cutoff values were identified to predict TLF in any angles in the T-stenting group. Among patients receiving the crush technique, the prevalence of dyslipidemia was higher in the LM-LAD ≥152° group (Table 2). Among patients receiving T-stenting, the prevalence of hypertension and previous MI were higher in the LM-LAD ≥152° group than in the <152° group. Other clinical characteristics were not statistically different between the 2 groups in each technique. Angiographic and procedural characteristics were statistically similar between the 2 groups in each technique except for main vessel (MV) calcification in the crush technique and bifurcation angles in both (Table 3).

(a)

(b)

Figure 3: Receiver operating characteristic curves showing sensitivity of each angle for predicting TLF risk in patients treated with (a) crush and (b) T-stenting technique. An LM-LAD angle of 152° was the best cutoff value for predicting TLF in the crush group. None of the bifurcation angles had a significant cutoff value in the T-stenting group. AUC, area under the curve; BCV, best cutoff value; CI, confidence interval; LAD, left anterior descending artery; LCX, left circumflex artery; LM, left main; TLF, target lesion failure.

Table 2: Baseline clinical characteristics in patients treated with the 2-stent technique using the crush technique or T-stenting in LM bifurcation.

Crush (n = 181)
T-stenting (n = 167)

LM-LAD angle ≥152° (n = 84)
LM-LAD angle <152° (n = 96)
value
LM-LAD angle ≥152° (n = 93)
LM-LAD angle <152° (n = 71)
value

Age, years
63.1 ± 11.1
65.4 ± 8.6
0.124
65.0 ± 9.0
64.0 ± 11.5
0.535

Male
55 (65.5)
54 (56.3)
0.224
57 (61.3)
37 (52.1)
0.239

Diabetes mellitus
24 (28.6)
35 (36.5)
0.271
33 (35.5)
18 (25.4)
0.165

Hypertension
48 (57.1)
58 (60.4)
0.384
60 (64.5)
35 (49.3)
0.050

Dyslipidemia
28 (33.3)
19 (19.8)
0.029
30 (32.3)
27 (38.0)
0.442

Peripheral vascular disease
2 (2.4)
3 (3.1)
1.000
4 (4.3)
0 (0)
0.134

Chronic kidney disease
7 (8.3)
12 (12.5)
0.468
6 (6.5)
5 (7.0)
1.000

Current smoker
23 (27.4)
19 (19.8)
0.289
22 (23.7)
9 (12.7)
0.075

Previous myocardial infarction
5 (6.0)
11 (11.5)
0.294
10 (10.8)
1 (1.4)
0.024

Previous cerebrovascular event
10 (11.9)
8 (8.3)
0.464
6 (6.5)
4 (5.6)
1.000

Previous PCI
20 (23.8)
27 (28.1)
0.610
22 (23.7)
10 (14.1)
0.125

Previous CABG
2 (2.4)
2 (2.1)
1.000
2 (2.2)
0 (0)
0.506

Family history of CAD
4 (4.8)
4 (4.2)
1.000
4 (4.3)
2 (2.8)
0.699

LV ejection fraction, %
59.8 ± 12.4
57.8 ± 12.1
0.310
57.9 ± 9.7
57.9 ± 12.6
0.985

Clinical Manifestation

0.359

0.645

STEMI
7 (8.3)
4 (4.2)

7 (7.5)
4 (5.6)

NSTEMI
13 (15.5)
13 (13.5)

6 (6.5)
2 (2.8)

Unstable angina
41 (48.8)
41 (54.2)

41 (44.1)
30 (42.3)

Stable angina
23 (27.4)
27 (28.1)

39 (42.0)
31 (43.7)

Values are mean ± standard deviations, median (interquartile ranges, 25th–75th), or n (%) (per-patient analysis). Chronic kidney disease defined as a glomerular filtration rate (GFR) < 60 ml/min/1.73 m². CABG, coronary artery bypass grafting; CAD, coronary artery disease; LAD, left anterior descending artery; LM, left main; LV, left ventricle; NSTEMI, non-ST-segment elevation myocardial infarction; PCI, percutaneous coronary intervention; STEMI, ST-segment elevation myocardial infarction.

Table 3: Angiographic and procedural characteristics in patients treated with the 2-stent technique using the crush technique or T-stenting in LM Bifurcation.

Crush
T-stenting

LM-LAD angle ≥152° (n = 84)
LM-LAD angle <152° (n = 96)
value
LM-LAD angle ≥152° (n = 93)
LM-LAD angle <152° (n = 71)
value

Angle of LM-LAD
166.4 (158.5–175.1)
134.0 (120.5–143.2)
<0.001
165.0 (157.6–173.3)
136.1 (125.0–142.0)
<0.001

Angle of LM-LCX
116.2 (104.1–131.8)
125.5 (108.7–143.0)
0.009
120.1 (104.0–132.7)
121.0 (107.0–137.0)
0.495

Angle of LAD-LCX
68.3 (55.8–86.7)
94.5 (79.5–116.5)
<0.001
71.9 (60.4–85.1)
96.0 (76.1–109.8)
<0.001

SYNTAX Score

0.972

0.690

Low score (0–22)
27 (32.1)
31 (32.2)

32 (34.8)
28 (40.0)

Intermediate score (23–32)
33 (39.3)
39 (40.6)

47 (51.1)
31 (44.3)

High score (≥33)
24 (28.6)
26 (27.1)

13 (14.1)
11 (15.7)

Medina Classification

0.603

0.475

True bifurcation

1.1.1
38 (45.2)
38 (39.6)

42 (45.2)
42 (59.2)

1.0.1
10 (11.9)
11 (11.5)

7 (7.5)
5 (7.0)

0.1.1
9 (10.7)
13 (13.5)

18 (19.4)
9 (12.7)

Nontrue bifurcation

1.0.0
2 (2.4)
2 (2.1)

2 (2.2)
2 (2.8)

0.1.0
6 (7.1)
10 (10.4)

7 (7.5)
3 (4.2)

1.1.0
5 (6.0)
12 (12.5)

12 (12.9)
8 (11.3)

0.0.1
14 (16.7)
10 (10.4)

5 (5.4)
1 (1.4)

DES Type

0.609

0.775

SES
40 (47.6)
41 (42.7)

43 (46.2)
27 (38.0)

PES
18 (21.4)
15 (15.6)

15 (16.1)
15 (21.1)

ZES
9 (10.7)
16 (16.7)

13 (14.3)
9 (12.7)

EES
15 (17.9)
19 (19.8)

15 (16.1)
14 (19.7)

BP-BES
0 (0)
1 (1.0)

6 (6.5)
6 (8.5)

Stent Type

0.267

0.442

First generation DES
60 (71.4)
60 (62.5)

63 (67.7)
44 (62.0)

Second generation DES
24 (28.6)
36 (37.5)

30 (32.3)
27 (38.0)

LAD stent diameter
3.4 ± 0.4
3.5 ± 0.4
0.408
3.4 ± 0.4
3.4 ± 0.4
0.655

LCX stent diameter
3.0 ± 0.3
3.0 ± 0.3
0.990
3.2 ± 0.5
3.2 ± 0.4
0.410

IVUS-guided PCI
53 (63.1)
53 (55.2)
0.293
66 (71.0)
49 (69.0)
0.787

Rotablation
0 (0)
1 (1.0)
1.000
1 (1.1)
1 (1.4)
1.000

Final kissing ballooning
65 (83.3)
73 (83.0)
0.948
73 (90.1)
60 (96.8)
0.187

Conversion from provisional stenting
0/76 (0)
3/75 (4.0)
0.120
60/79 (75.9)
47/53 (88.7)
0.067

Main vessel procedural success
84/84 (100.0)
95/96 (99.0)
1.000
93/93 (100.0)
70/70 (100.0)
NA

Side branch procedural success
84/84 (100.0)
95/96 (99.0)
1.000
93/93 (100.0)
68/70 (97.1)
0.183

Preintervention QCA

MV RD, mm
3.2 ± 0.4
3.2 ± 0.5
0.602
3.3 ± 0.5
3.2 ± 0.6
0.718

SB RD, mm
2.6 ± 0.4
2.7 ± 0.4
0.262
2.9 ± 0.5
2.7 ± 0.6
0.114

MV MLD, mm
1.2 ± 0.6
1.2 ± 0.6
0.719
1.2 ± 0.6
1.1 ± 0.5
0.324

SB MLD, mm
1.2 ± 0.6
1.1 ± 0.6
0.572
1.3 ± 0.6
1.1 ± 0.5
0.055

MV diameter stenosis, %
62.1 ± 17.2
64.4 ± 16.0
0.359
62.2 ± 18.1
64.8 ± 17.8
0.354

SB diameter stenosis, %
56.2 ± 20.5
59.4 ± 20.5
0.306
54.1 ± 19.4
58.5 ± 18.4
0.161

MV lesion length, mm
21.5 ± 17.5
25.4 ± 20.3
0.175
20.4 ± 14.0
20.1 ± 14.9
0.911

SB lesion length, mm
12.8 ± 11.4
12.6 ± 11.8
0.919
9.9 ± 10.4
11.9 ± 12.3
0.260

MV calcification
22 (26.2)
42 (43.8)
0.019
36 (38.7)
28 (40.0)
0.867

SB calcification
15 (17.9)
21 (21.9)
0.577
21 (22.6)
14 (20.0)
0.671

Postintervention QCA

MV RD, mm
3.2 ± 0.5
3.2 ± 0.6
0.806
3.5 ± 0.6
3.3 ± 0.6
0.167

SB RD, mm
2.7 ± 0.5
2.7 ± 0.5
0.753
2.9 ± 0.5
2.8 ± 0.5
0.214

MV MLD, mm
2.8 ± 0.5
2.7 ± 0.5
0.492
2.7 ± 0.5
2.9 ± 0.6
0.521

SB MLD, mm
2.5 ± 0.5
2.5 ± 0.5
0.416
2.7 ± 0.6
2.6 ± 0.5
0.292

MV diameter stenosis, %
14.6 ± 11.5
16.3 ± 11.8
0.387
15.3 ± 11.4
14.7 ± 9.7
0.765

SB diameter stenosis, %
6.2 ± 17.8
7.9 ± 14.7
0.537
9.1 ± 13.8
8.3 ± 12.6
0.735

Values are mean ± standard deviations, median (interquartile ranges, 25th–75th), or n (%) (per-patient analysis). BP-BES, biodegradable polymer biolimus-eluting stent; DES, drug-eluting stent; EES, everolimus-eluting stent; IVUS, intravascular ultrasound; LAD, left anterior descending artery; LCX, left circumflex artery; LM, left main; MLD, minimal lumen diameter; MV, main vessel; PCI, percutaneous coronary intervention; PES, paclitaxel-eluting stent; QCA, quantitative coronary angiography; RD, reference diameter; SB, side branch; SES, sirolimus-eluting stent; ZES, zotarolimus-eluting stent.

3.2. Clinical Outcomes Depending on Bifurcation Angles in Each Technique

TLF more frequently occurred in the LM-LAD angle ≥152° group than in the <152° group among patients treated with the crush technique (LM-LAD angle ≥152° versus <152°; 35.7% versus 14.6%, respectively; adjusted HR, 3.476; 95% CI, 1.612 to 7.492; ). In contrast, the incidence of TLF was not affected by an LM-LAD angle ≥152° or <152° in patients treated with the T-stenting technique (LM-LAD angle ≥152° versus <152°; 20.4% versus 22.5%; adjusted HR, 0.730; 95% CI, 0.200 to 2.663; ) (Figure 4(a), Table 4). The incidences of POCO, any revascularization, TLR, and TVR were significantly higher in the LM-LAD angle ≥152° group among patients treated with the crush technique. However, the incidences of other clinical outcomes were also similar between the 2 groups of patients treated with the T-stenting technique (Table 4). TLR occurred in 19.3% (n = 35) and 14.4% (n = 24) of the crush group and T-stenting group, respectively (). Among the patients whose location of TLR sites was available, there were no statistical differences in TLR sites between the LM-LAD angle ≥152° and <152° group (Supplementary Table 1). When the crush technique was compared with T-stenting in the LM-LAD angle ≥152° and <152° group, respectively, the crush technique showed a higher tendency of TLF than T-stenting in the LM-LAD angle ≥152° group (Supplementary Figure 1).

(a)

(b)

Figure 4: Clinical impact of bifurcation angle after LM PCI using the crush technique versus T-stenting. (a) The clinical impact of LM-LAD angle after left main percutaneous coronary intervention using the crush technique versus T-stenting. (b) The clinical impact of the LAD-LCX angle after left main percutaneous coronary intervention using the crush technique versus T-stenting. HR, hazard ratio; LAD, left anterior descending artery; LCX, left circumflex artery; LM, left main; and PCI, percutaneous coronary intervention. The left column represents the crush strategy, and the right column represents the T-stenting strategy.

Table 4: Adjusted hazard ratios of wide (≥152°) compared with narrow LM-LAD angle (<152°) in patients treated with the crush technique and with T-stenting.

Crush strategy
LM-LAD angle ≥152°
LM-LAD angle <152°
Adjusted HR (95% CI)
P value

Target lesion failure
30 (35.7)
14 (14.6)
3.476 (1.612–7.492)
0.001

Patient-oriented composite outcome†
38 (45.2)
27 (28.1)
2.061 (1.126–3.772)
0.019

All-cause death
7 (8.3)
11 (11.5)
0.517 (0.126–2.118)
0.360

Cardiac death
5 (6.0)
3 (3.1)
4.661 (0.182–119.518)
0.352

Spontaneous MI
3 (3.6)
1 (1.0)
5.506 (0.118–257.567)
0.385

Any revascularization
31 (36.9)
17 (17.7)
2.849 (1.379–5.889)
0.005

Target lesion revascularization
24 (28.6)
11 (11.5)
3.758 (1.602–8.817)
0.002

Target vessel revascularization
30 (35.7)
14 (14.6)
2.404 (1.117–5.176)
0.025

Definite or probable stent thrombosis
4 (4.8)
2 (2.1)
1.885 (0.203–17.534)
0.577

T-Stent Strategy

Target lesion failure
19 (20.4)
16 (22.5)
0.730 (0.200–2.663)
0.633

Patient-oriented composite outcome
26 (28.0)
27 (38.0)
0.745 (0.291–1.907)
0.539

All-cause death
12 (12.9)
9 (12.7)
0.714 (0.152–3.351)
0.669

Cardiac death
6 (6.5)
4 (5.6)
0.501 (0.024–10.478)
0.656

Spontaneous MI
3 (3.2)
2 (2.8)
0 (0-indefinite)
0.881

Any revascularization
17 (18.3)
17 (23.9)
1.326 (0.393–4.466)
0.649

Target lesion revascularization
14 (15.1)
10 (14.1)
0.660 (0.118–3.686)
0.636

Target vessel revascularization
17 (18.3)
15 (21.1)
1.578 (0.383–6.498)
0.527

Definite or probable stent thrombosis
4 (4.3)
2 (2.8)
0.182 (0.002–18.727)
0.471

Target lesion failure defined as a composite of cardiac death, myocardial infarction, or target lesion revascularization. Patient-oriented composite outcomes defined as a composite of cardiac death, myocardial infarction, stroke, or any revascularization. Variables included in the Cox proportional hazard regression model were wide LM-LAD angle (≥152°), wide LAD-LCX angle (≥70°), diabetes mellitus, dyslipidemia, current smoker, low LV systolic function (<50%), chronic kidney disease, acute coronary syndrome, main vessel calcification, long side branch lesion (>5 mm), high SYNTAX score (≥33), and final kissing ballooning. CI, confidence interval; HR, hazard ratio; LAD, left anterior descending artery; LCX, left circumflex artery; LM, left main; LV, left ventricle; MI, myocardial infarction.

In real-world practice, interventionists choose between T-stenting and crush techniques based on LAD-LCX angle, not LM-LAD. For bifurcation lesions with a LAD-LCX angle close to a right angle, the so-called wide LAD-LCX angle, T-stenting is preferred. In contrast, for a lesion with a narrow LAD-LCX angle, the crush technique is preferred. In this regard, the whole study population was reclassified by an LAD-LCX angle of 70°. However, the data showed that the incidence of TLF was not affected by an LAD-LCX angle ≥70° or <70° using either technique (Figure 4(b)).

Multivariable regression analysis revealed that an LM-LAD angle ≥152° was an independent predictor of TLF in the crush technique, whereas MV calcification was independent predictors of TLF in the T-stenting technique (Table 5). Neither the type of bifurcation (true or nontrue) nor generation of stent was an independent predictor of TLF in both techniques.

Table 5: Independent predictors of TLF in patients treated with the crush technique and T-stenting.

Univariable analysis
Multivariable analysis

HR (95% CI)
value
HR (95% CI)
value

Crush Technique

Wide angle of LM-LAD (≥152°)
2.50 (1.32–4.73)
0.005
2.57 (1.34–4.90)
0.004

Wide angle of LAD-LCX (≥70°)
1.01 (0.54–1.90)
0.983
—
—

Diabetes mellitus
1.18 (0.63–2.19)
0.613
—
—

Dyslipidemia
1.27 (0.67–2.40)
0.461
—
—

Current smoker
0.96 (0.46–1.99)
0.907
—
—

Low LV systolic function (<50%)
1.27 (0.62–2.58)
0.509
—
—

Chronic kidney disease
1.36 (0.53–3.47)
0.521
—
—

Acute coronary syndrome
1.20 (0.63–2.28)
0.577
—
—

MV calcification
1.55 (0.85–2.81)
0.152
1.60 (0.86–3.00)
0.138

Long SB lesion (>5 mm)
1.98 (0.92–4.26)
0.081
1.57 (0.70–3.51)
0.275

High SYNTAX score (≥33)
2.52 (1.16–5.46)
0.019
1.80 (0.97–3.33)
0.062

Final kissing ballooning
0.97 (0.41–2.34)
0.953
—
—

IVUS-guided PCI
0.95 (0.52–1.73)
0.874
—
—

True bifurcation
1.63 (0.82–3.22)
0.162
1.28 (0.63–2.61)
0.501

2nd generation DES
1.42 (0.73–2.76)
0.308
—
—

T-stenting technique

Wide angle of LM-LAD (≥152°)
0.85 (0.44–1.67)
0.641
—
—

Wide angle of LAD-LCX (≥70°)
1.53 (0.73–3.18)
0.258
—
—

Diabetes mellitus
0.97 (0.46–2.01)
0.926
—
—

Dyslipidemia
1.17 (0.59–2.33)
0.656
—
—

Current smoker
2.17 (1.04–4.52)
0.039
1.94 (0.82–4.58)
0.129

Low LV systolic function (<50%)
2.33 (1.01–5.37)
0.047
2.08 (0.86–5.00)
0.103

Chronic kidney disease
1.50 (0.46–4.91)
0.506
—
—

Acute coronary syndrome
0.83 (0.42–1.61)
0.578
—
—

MV calcification
2.31 (1.18–4.52)
0.014
2.78 (1.20–6.41)
0.017

Long SB lesion (>5 mm)
1.81 (0.85–3.87)
0.125
1.12 (0.47–2.70)
0.796

High SYNTAX score (≥33)
1.68 (0.34–3.41)
0.912
—
—

Final kissing ballooning
0.75 (0.18–3.17)
0.694
—
—

IVUS-guided PCI
0.94 (0.45–1.96)
0.859
—
—

True bifurcation
1.47 (0.64–3.36)
0.365
—
—

2nd generation DES
0.87 (0.44–1.72)
0.697
—
—

CI, confidence interval; DES, drug-eluting stent; HR, hazard ratio; LAD, left anterior descending artery; LCX, left circumflex artery; LM, left main; LV, left ventricle; MV, main vessel; SB, side branch; TLF, target lesion failure.

4. Discussion

To our knowledge, this is the first study to comprehensively evaluate the impact of 3 bifurcation angles in patients with LM bifurcation disease using the 2-stent strategy. The main findings of our study are as follows: (1) wide LM-LAD angle (≥152°) is associated with poor outcomes in LM bifurcation PCI using the crush technique and (2) outcomes of T-stenting in LM bifurcation lesion were not affected by any bifurcation angle.

There are several critical limitations in previous studies regarding angles of bifurcation PCI. First, bifurcation angle in other studies did not mean the same angle. Some studies referred to the angle between the MB and the SB (angle B) [16, 17, 19, 20], while others focused on the angle between the MV and the SB (angle A) [21]. Second, most dealt with non-LM bifurcation lesions [9, 16, 22, 23]. Third, some analyzed data from patients treated with the 1-stent strategy [24]. Fourth, all studies that suggested the bifurcation angle cutoff value for predicting poor outcomes arbitrarily selected the angles. Fifth, timing of measuring the angles (i.e., the systolic or diastolic phase, before or after PCI) was not standardized or specified in previous studies. As a result, previous studies showed mixed results as follows:

Dzavik et al. demonstrated that wide bifurcation angle (≥50°) was an independent predictor of major adverse cardiovascular events (MACE), a composite of death, MI, and TLR, in 133 patients treated with the crush technique [9]. In this study, only 6.0% of patients had LM disease. Furthermore, among them, it is unclear how many cases had LM disease as a main target for bifurcation PCI. A bifurcation angle of 50° was selected to stratify the study population because it was a median angle. This article is one of the earliest studies of angle in bifurcation PCI. Thereafter, it has been referred to in many articles as a study showing a negative impact of wide bifurcation angle between the MB and the SB (angle B). In fact, according to Section 2 of the article, this study defined the bifurcation angle as an angle between the MV and the SB (angle A). Thus, a bifurcation angle ≥50° in this study actually meant angle A < 130°. The same group also showed that a wide bifurcation angle (≥50°) was associated with a lower rate of MACE (death, MI, or TVR) for Canadian Cardiovascular Society (CCS) class ≥2 angina-free survival in patients treated with crush or Culotte stenting (n = 140) [10]. Only 5.7% of patients had LM disease as the main bifurcation target. Interestingly, outcomes of patients with MV stenting only (n = 266) were not affected by bifurcation angle. Again, although this study has been frequently misinterpreted as the one focusing on angle B (between the MB and the SB), it actually studied angle A (between the MV and the SB). Therefore, a bifurcation angle ≥50° in this study indicated an angle A < 130°. In the other study performed by the same group [11], the authors again demonstrated that a wide bifurcation angle (≥50°), indicating an angle A < 130°, was associated with a lower risk of MACE (death, MI, or TVR) or CCS class ≥2 angina in patients treated with crush or Culotte stenting (n = 360). Of the cohort, 3.1% of patients had LM disease as a main bifurcation target.

Adriaenssens et al. revealed that an increasing angle B (between the MB and the SB) was an independent predictor of angiographic restenosis in patients undergoing Culotte stenting (n = 134) [12]. This study excluded bifurcation interventions in the LM artery. Chen et al. analyzed 37 patients with unprotected LM bifurcation lesions treated with crush or double kissing (DK) crush stenting [13]. The data showed that an increasing bifurcation angle B (between the MB and the SB) was an independent predictor of TLR. The same group also demonstrated that an increasing bifurcation angle B was associated with a higher risk of MACE (cardiac death, MI, or TLR) in patients treated with crush stenting in another study (n = 230) [14]. This study included 33 cases (14.3%) of LM bifurcation interventions.

Interestingly, the same group compared the impact of a wide bifurcation angle B (≥60°) and narrow-angle B (<60°) in patients treated with crush or DK crush stenting (n = 220) in the other study and found that bifurcation angle B did not influence the clinical outcomes including MACE (cardiac death, MI, or TLR) [15]. A total of 15.2% of the study population underwent LM bifurcation intervention in this study. Yang et al. divided the patients undergoing bifurcation PCI into wide- and narrow-angle groups using median bifurcation angle B (50°) in their study (n = 1,432) [16]. The incidences of MACE (cardiac death, MI, or TLR) and TLR were not significantly different between the 2 groups. Although the study population was relatively large, this study focused on only non-LM bifurcation lesions. Furthermore, the vast majority of patients (84.5%) were treated with the 1-stent technique. Girasis et al. stratified the patients receiving LM bifurcation PCI by tertiles of angle B (<82°, 82–106°, ≥107°) [17]. The results showed that angle B did not affect the rate of major adverse cardiac and cerebrovascular events (a composite of all-cause death, cerebrovascular accident, MI, or repeat revascularization) in patients treated with 1 stent (n = 75) and those treated with ≥2 stents (n = 110).

In summary, previous studies reported mixed results with mixed definitions of bifurcation angle.

The current study comprehensively analyzed the impact of each of 3 bifurcation angles on clinical outcomes in patients receiving LM bifurcation PCI with DES using the major 2-stent techniques (crush and T-stenting). Our data revealed that a wide LM-LAD (angle C) was an independent predictor of worse outcomes in the crush technique, whereas bifurcation angle did not affect the T-stenting outcomes. The cutoff value of an LM-LAD of 152° for predicting TLF was statistically determined using ROC curve analysis.

The current practical guides recommend a provisional approach with a simple crossover technique using a 1-stent rather than an upfront 2-stent technique [3, 25]. However, considering the diameter of the LCX artery, the area it supplies, and the significance of its flow preservation, an LM bifurcation lesion is the bifurcation where the need for use of the 2-stent strategy is underscored compared to other bifurcations. Our study provides useful information for LM bifurcation PCI using the 2-stent technique.

The reason why a wide LM-LAD angle (≥152°) is associated with poor crush technique outcomes is unclear. The first possible explanation for our findings is the potential uneven expansion of kissing balloons. In bifurcation lesions with a wide LM-LAD angle, a kissing balloon in LM-LAD can be easily straightened, whereas a bending force may be placed on the opposite side of a balloon in LM-LCX, resulting in uneven expansion. This effect may be prominent in the crush technique, in which the optimization of crushed struts may be more important than in T-stenting. Although FKB was not a predictor of events (Table 5) in the crush group, it may be because kissing ballooning could not be adequately performed in patients taking FKB. Second, crush of the side branch stent in the bifurcation with a wide LM-LAD angle could be incomplete due to weak force of the straightened balloon (Figure 5(a)). Third, in the bifurcation with a wide LM-LAD angle, relatively lower shear stress area could be generated in the lateral side of LM where the crushed stent struts are located (Figure 5(a)). In contrast, in the bifurcation with a narrow LM-LAD angle, shear stress could be ideally distributed (Figure 5(b)). All these potential mechanisms are hypotheses from scientific speculation which need validation with further studies.

(a)

(b)

Figure 5: Schematic diagrams of LM bifurcation according to different LM-LAD angles. Blue ovals mean the balloon catheter, gray rectangles mean the stent, and arrows indicate wall shear stress. (a) Wide LM-LAD angle. (b) Narrow LM-LAD angle. LAD, left anterior descending artery; LCX, left circumflex artery; and LM, left main.

5. Limitations

The current study has some limitations. First, because this study was based on registry data, there are intrinsic limitations of nonrandomized comparisons including biased distribution of risk factors and lesion characteristics and possible influences of unmeasured confounding factors despite multivariable adjustment. Second, the selection of stenting techniques was left entirely to the operator’s discretion, reflecting the registry nature of our study. This may cause selection bias, although clinical, angiographic, and procedural characteristics were fairly evenly distributed across the groups (Tables 2 and 3). In addition, the outcomes of LM bifurcation PCI could be dependent on the expertise of the operator. However, this variable was not available in our pooled registry. Third, we used 2-dimensional QCA to measure bifurcation angles. Three-dimensional QCA was recently suggested as a useful tool for the accurate and precise measurement of bifurcation angles. However, we think that 2-dimensional QCA may better reflect the results of daily practice since visual estimation remains the most frequently and widely adopted method in the real world. Fourth, this study was conducted with relatively small numbers of study population. However, to our knowledge, this is the largest study investing the impact of bifurcation angles in LM bifurcation treated with the two-stent technique. Fifth, about two-thirds of the study population in our study received the 1st generation DES. Although multivariable regression analysis showed the generation of DES was not an independent predictor of TLF (Table 5), high proportion of the 1st generation DES may not reflect good outcomes of the current practice. Lastly, the underlying mechanisms for poor outcomes in a wide LM-LAD angle were limited. Further studies using in vitro or in silico models are warranted.

6. Conclusions

In patients undergoing LM bifurcation PCI using the 2-stent technique with DES, a wide LM-LAD angle (≥152°) was associated with a greater risk of TLF in patients treated with the crush technique, mainly driven by an increased TLR rate, whereas none of the bifurcation angles affected T-stenting outcomes.

Data Availability

The clinical and procedural data used to support the findings of this study are included within the article.

Conflicts of Interest

There are no relevant conflicts of interest.

Authors’ Contributions

You-Jeong Ki and Ji Hyun Jung contributed equally to this work.

Acknowledgments

This study was supported by Seoul National University Hospital (grant nos. 06-2011-3680, 06-2011-3280, and 06-2010-1560).

Supplementary Materials

Supplementary Table 1. Target lesion revascularization sites in each left main bifurcation group. Supplementary Figure 1. TLF according to the stent techniques in patients with wide (≥152°) and narrow LM-LAD angle (<152°). (Supplementary Materials)

References

G. W. Stone, J. F. Sabik, P. W. Serruys et al., “Everolimus-eluting stents or bypass surgery for left main coronary artery disease,” New England Journal of Medicine, vol. 375, no. 23, pp. 2223–2235, 2016.

T. Mäkikallio, N. R. Holm, M. Lindsay et al., “Percutaneous coronary angioplasty versus coronary artery bypass grafting in treatment of unprotected left main stenosis (NOBLE): a prospective, randomised, open-label, non-inferiority trial,” The Lancet, vol. 388, no. 10061, pp. 2743–2752, 2016.

J. F. Lassen, N. R. Holm, G. Stankovic et al., “Percutaneous coronary intervention for coronary bifurcation disease: consensus from the first 10 years of the European Bifurcation Club meetings,” EuroIntervention, vol. 10, no. 5, pp. 545–560, 2014.

J. F. Lassen, F. Burzotta, A. Banning et al., “Percutaneous coronary intervention for the left main stem and other bifurcation lesions: 12th consensus document from the European Bifurcation Club,” EuroIntervention, vol. 13, no. 13, pp. 1540–1553, 2018.

W. Karrowni, N. Makki, A. S. Dhaliwal et al., “Single versus double stenting for unprotected left main coronary artery bifurcation lesions: a systematic review and meta-analysis,” The Journal of Invasive Cardiology, vol. 26, no. 6, pp. 229–233, 2014.

D. G. Katritsis, A. Theodorakakos, I. Pantos, M. Gavaises, N. Karcanias, and E. P. Efstathopoulos, “Flow patterns at stented coronary bifurcations,” Circulation: Cardiovascular Interventions, vol. 5, no. 4, pp. 530–539, 2012.

S. L. Chen, I. Sheiban, B. Xu et al., “Impact of the complexity of bifurcation lesions treated with drug-eluting stents,” JACC: Cardiovascular Interventions, vol. 7, no. 11, pp. 1266–1276, 2014.

Y. Louvard, T. Lefèvre, and M. C. Morice, “Percutaneous coronary intervention for bifurcation coronary disease,” Heart, vol. 90, no. 6, pp. 713–722, 2004.

V. Dzavik, R. Kharbanda, J. Ivanov et al., “Predictors of long-term outcome after crush stenting of coronary bifurcation lesions: importance of the bifurcation angle,” American Heart Journal, vol. 152, no. 4, pp. 762–769, 2006.

N. Collins, P. H. Seidelin, P. Daly et al., “Long-term outcomes after percutaneous coronary intervention of bifurcation narrowings,” The American Journal of Cardiology, vol. 102, no. 4, pp. 404–410, 2008.

X. Freixa, A. A. Almasood, N. Asif et al., “Long-term outcomes using a two-stent technique for the treatment of coronary bifurcations,” International Journal of Cardiology, vol. 168, no. 1, pp. 446–451, 2013.

T. Adriaenssens, R. A. Byrne, A. Dibra et al., “Culotte stenting technique in coronary bifurcation disease: angiographic follow-up using dedicated quantitative coronary angiographic analysis and 12-month clinical outcomes,” European Heart Journal, vol. 29, no. 23, pp. 2868–2876, 2008.

S. Chen, J. Zhang, F. Ye et al., “Final kissing balloon inflation by classic crush stenting did not improve the clinical outcomes for the treatment of unprotected left main bifurcation lesions: the importance of double-kissing crush technique,” Catheterization and Cardiovascular Interventions, vol. 71, no. 2, pp. 166–172, 2008.

S.-L. Chen, J.-j. Zhang, F. Ye et al., “Crush stenting with drug-eluting stents: relevance of coronary bifurcation lesion location on angiographic and clinical outcomes,” Clinical Cardiology, vol. 33, no. 12, pp. E32–E39, 2010.

S.-L. Chen, J.-J. Zhang, F. Ye et al., “Effect of coronary bifurcation angle on clinical outcomes in Chinese patients treated with crush stenting: a subgroup analysis from DKCRUSH-1 bifurcation study,” Chinese Medical Journal, vol. 122, no. 4, pp. 396–402, 2009.

J. H. Yang, Y. B. Song, P. S. Song et al., “Impact of coronary bifurcation angle on clinical outcomes after percutaneous coronary intervention in real-world practice: results from the COBIS registry,” Cardiology, vol. 122, no. 4, pp. 216–224, 2012.

C. Girasis, V. Farooq, R. Diletti et al., “Impact of 3-dimensional bifurcation angle on 5-year outcome of patients after percutaneous coronary intervention for left main coronary artery disease,” JACC: Cardiovascular Interventions, vol. 6, no. 12, pp. 1250–1260, 2013.

Y. Louvard, M. Thomas, V. Dzavik et al., “Classification of coronary artery bifurcation lesions and treatments: time for a consensus!,” Catheterization and Cardiovascular Interventions, vol. 71, no. 2, pp. 175–183, 2008.

P. S. Song, Y. B. Song, J. M. Lee et al., “Major predictors of long-term clinical outcomes after percutaneous coronary intervention for coronary bifurcation lesions with 2-stent strategy,” JACC: Cardiovascular Interventions, vol. 9, no. 18, pp. 1879–1886, 2016.

J. A. Ormiston, E. Currie, M. W. I. Webster et al., “Drug-eluting stents for coronary bifurcations: insights into the crush technique,” Catheterization and Cardiovascular Interventions, vol. 63, no. 3, pp. 332–336, 2004.

C. Girasis, P. W. Serruys, Y. Onuma et al., “3-Dimensional bifurcation angle Analysis in patients with left main disease,” JACC: Cardiovascular Interventions, vol. 3, no. 1, pp. 41–48, 2010.

D. Zhang, B. Xu, D. Yin et al., “How bifurcation angle impacts the fate of side branch after main vessel stenting: a retrospective analysis of 1,200 consecutive bifurcation lesions in a single center,” Catheterization and Cardiovascular Interventions, vol. 85, no. S1, pp. 706–715, 2015.

T. Naganuma, A. Latib, S. Basavarajaiah et al., “The long-term clinical outcome of T-stenting and small protrusion technique for coronary bifurcation lesions,” JACC: Cardiovascular Interventions, vol. 6, no. 6, pp. 554–561, 2013.

K. Amemiya, T. Domei, M. Iwabuchi et al., “Impact of the bifurcation angle on major cardiac events after cross-over single stent strategy in unprotected left main bifurcation lesions: 3-dimensional quantitative coronary angiographic analysis,” American Journal of Cardiovascular Disease, vol. 4, no. 4, pp. 168–176, 2014.

T. Rab, I. Sheiban, Y. Louvard, F. J. Sawaya, J. J. Zhang, and S. L. Chen, “Current interventions for the left main bifurcation,” JACC: Cardiovascular Interventions, vol. 10, no. 9, pp. 849–865, 2017.