Journal of Nanomaterials

Volume 2013 (2013), Article ID 184345, 6 pages

http://dx.doi.org/10.1155/2013/184345

Research Article

Improvement of NO Gas Sensing Properties of Polyaniline/MWCNT Composite by Photocatalytic Effect of TiO₂

Jumi Yun,¹ Sonyeo Jeon,² and Hyung-Il Kim²

¹Research and Education Center of Carbon Resources, Kyushu University, 6-1 Kasugakoen, Kasuga, Fukuoka 816-8580, Japan

²Department of Fine Chemical Engineering and Applied Chemistry, BK21-E2M, Chungnam National University, Daejeon 305-764, Republic of Korea

Received 1 August 2013; Accepted 3 September 2013

Academic Editor: Ji Sun Im

Copyright © 2013 Jumi Yun et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The highly sensitive and rapid NO gas sensor was prepared with polyaniline/TiO₂/carbon nanotube composites. Aniline was polymerized on the surface of carbon nanotube (p-type semiconductor) with embedding TiO₂. The gas sensing property was measured by the changes of electrical resistance without or with UV irradiation to investigate the photodegradation of NO by TiO₂. The photo-degraded products such as HNO₂, NO₂, and HNO₃, which were adsorbed on the PANi-coated carbon nanotubes, resulted in the decreased electrical resistance in the p-type semiconductors of carbon nanotube and polyaniline. The advantages of TiO₂ photocatalyst in gas sensing were apparent in the improvement in both sensitivity and response rate.

1. Introduction

The demand of gas sensors has been increased extensively due to the increasing numbers of power plants, waste incinerators, and combustion engines. gases such as NO, N₂O and NO₂, which produce the nitric and nitrous acids, cause the acid rain and the photochemical smog. These gases are formed by combustion of fossil fuels at high temperature in the chemical processes. emissions generally consist of 90–95% NO with the remainder being N₂O, and NO₂ [1–4]. According to the American Conference of Governmental Industrial Hygienist (ACGIH), the threshold limit values (TLV) for NO is 25 ppm [5]. Therefore, the efficient gas sensing materials have been studied widely for the detection of very low gas concentration. Gas sensing materials can be classified mainly into two types, organic and inorganic materials. The metal oxides are used as gas sensing materials for long time due to their relatively low cost, high sensitivities, rapid response times, and simple sensing method. Nevertheless, there still exist some problems such as high working temperature of 150–350°C for SnO₂ and 673–723 K for ZnO causing the practical limits in actual applications [6, 7].

The conducting polymers, which work excellently at room temperature, have attracted much attention as new classes of sensing materials. Among the conducting polymers, polyaniline (PANi) is frequently used because of its ease of synthesis, unique electrical properties, environmental stability (in acidic condition), and intrinsic redox reaction [8]. Conductivity of polyaniline depends on its ability to transport charge carriers along the polymer backbone. However, the problems of conducting polymer as gas sensing materials are their inferiorities in processing ability, chemical stability, and mechanical strength [9]. The heterojunction between organic and inorganic materials has been studied in order to solve the problems in conducting polymers [10].

Carbon nanotubes (CNTs) have the extraordinary electrical and mechanical properties with one-dimensional structure [11]. The large surface area of CNTs is beneficial to the large gas absorptive capacity expecting the faster response and higher sensitivity even at lower operating temperatures [12, 13]. The composites of PANi/CNTs have also been investigated widely as gas sensing materials by many researchers [14–16]. However, these composites still need improvement in both sensitivity and response time to be applied in highly efficient gas sensor. The main reason is the weak and slow interactions between sensing materials and target gas resulting in the lower sensitivity and slower response.

In this study, the modification of PANi/CNTs sensing materials was carried out with the photocatalyst TiO₂ in order to induce the stronger and faster chemical reactions between target gas and TiO₂. Upon exposure to UV light, electron-hole pairs are generated in the conduction and valance bands of TiO₂. Photo-generated holes are strong oxidants (~3.0 V) and can completely decompose most pollutants in air and water. NO is oxidized by TiO₂ to nitric acid (HNO₃) in air [17, 18]. The effect of TiO₂ additive on NO gas sensing properties of PANi/CNTs composites was studied in terms of photodegradation reaction, sensitivity, and response of gas sensors.

2. Materials and Methods

2.1. Preparation of PANi/MWCNT/TiO₂ Composite

Aniline, ammonium persulfate (APS), and hydrochloride (HCl) were obtained from Aldrich. Aniline was distilled in vacuum before use. Multiwalled carbon nanotubes (MWCNTs) (95% purity, average diameter  nm) were obtained from Aldrich. MWCNTs were used as the template for the in situ polymerization of aniline. The polymerization of aniline was carried out in the distilled water using HCl as oxidant of aniline and APS as initiator. 0.5 g of oxyfluorinated MWCNTs was dispersed in 30 mL water and ultrasonicated for 1 h as explained in our previous works [19, 20]. 0.5 mL of aniline monomer was dropped into the MWCNTs dispersion and stirred continuously for 10 min. 0.5 mL of HCl and 0.2 g of TiO₂ (anatase phase, average particle size <25 nm, 99.7%, Aldrich) were then added in the aniline/MWCNT mixture. 0.5 g of APS dissolved in 10 mL distilled water was slowly added in the aniline/MWCNT/TiO₂ mixture to initiate the polymerization. The polymerization was carried out for 6 h at 0°C with constant mechanical stirring. The synthesized PANi/MWCNT/TiO₂ nanocomposites were filtered and rinsed several times with the distilled water, methanol, and acetone, respectively. The nanocomposite powders were dried under vacuum at 40°C for 24 h. Four different samples were prepared such as PANi, PANi/MWCNT, PANi/TiO₂, and PANi/MWCNT/TiO₂ named as PA, PC, PT, and PCT, respectively.

2.2. Measurement of Gas Sensitivity

In order to evaluate the gas sensing properties of composites, the electrical resistance was measured using a programmable electrometer (Keithley 6514). The gas sensing device was prepared by using two Pt electrodes and a SiO₂ plate as shown in previous work [12, 21]. The electrical resistance was measured in a stainless steel chamber with a volume of 1500 cm³. The chamber was connected to gas cylinders (NO and wet air with a relative humidity of 50%), and the gas sensor sample was placed in a sealed vacuum chamber at a pressure of 1 × 10−6 mbar. Air was injected initially into the chamber in order to stabilize the electrical resistance of the sensor. The gaseous mixture containing 25 ppm NO in air was injected into the chamber at a fixed rate of 500 sccm and the resultant change in the electrical resistance of gas sensor was measured at °C. The chamber was covered with a circulating water tube in order to maintain a constant temperature. The adsorbed gases on the gas sensor samples were removed by heating the specimens to 100°C at a pressure of 1 × 10−6 mbar for 5 min [12, 21]. Recovery testing was carried out three times.

2.3. Characterization of Samples

Field emission scanning electron microscope (FE-SEM, Hitachi, S-5500) was used to investigate the surface morphology of the prepared gas sensors. SEM images were taken without prior treatment in order to ensure the acquisition of accurate images. X-ray diffraction patterns of the samples were obtained on an XRD apparatus (D/MAX-2200 Ultima/PC, Rigaku, Japan) in order to investigate the phases and crystal structures of TiO₂.

3. Results and Discussion

3.1. Surface Morphologies of Samples

FE-SEM images of the surface morphologies of samples are presented in Figure 1. PA sample showed the aggregated PANi phases of the uniform-sized spherical type. The average size of PANi spherical phases was measured as  nm (average value measured five times) by the computer program installed in FE-SEM apparatus. The uniformly coated PANi on MWCNTs was observed for PC sample as shown in Figure 1(b). The average thickness of PANi coating layer was around  nm considering the average diameter of MWCNTs ( nm). PANi was also coated on TiO₂ particles but was aggregated to some extent as shown in Figure 1(c). PCT sample showed the TiO₂ particles dispersed on the PANi-coated MWCNTs as shown in Figure 1(d).

(a)

(b)

(c)

(d)

Figure 1: FE-SEM images of (a) PA, (b) PC, (c) PT, and (d) PCT samples.

3.2. XRD Analysis of Samples

XRD patterns of four prepared samples are presented in Figure 2. The original carbon peaks were observed at 002 position which is attributed to the well-oriented carbon structure for MWCNT [22, 23]. PA also showed the original peak of PANi clearly [24]. XRD pattern of TiO₂ showed the characteristics of anatase TiO₂ phase with a tetragonal structure which possessed the photocatalytic properties [25, 26]. All XRD peaks of PCT samples can be attributed to the diffraction of PANi, TiO₂, and MWCNTs.

Figure 2: XRD patterns of the prepared samples.

3.3. NO Gas Sensing Behavior by Resistive Response

The NO gas sensing behavior of the samples was determined by monitoring the electrical resistance and presented in Figures 3 and 4. The resultant sensitivities were expressed as according to the following equation [27, 28]:

where and are the resistance measured in air and 25 ppm of NO, respectively. The NO gas sensing behavior in the absence of UV irradiation is shown in Figure 3. The electrical resistance decreased upon NO gas exposure for all the samples in accordance with the typical characteristics of a p-type semiconductor. The decrease in the electrical resistance is attributed to the electron charge transfer between NO gas and the surface of PANi/MWCNT p-type semiconductors. The electrons are known to travel from p-type semiconductor to NO gas (oxidizing gas) resulting in the reduced electrical resistance [29–31]. The TiO₂ photocatalyst did not contribute to the NO gas sensing behavior directly because the metal oxide-based semiconductors were generally operated at high temperature [6, 7]. However, even the composite with n-type semiconductor TiO₂ showed some decrease in the electrical resistance. Among the various gas sensing materials, the highest sensitivity was observed for the PC sample which showed 13% change in the electrical resistance. This high sensitivity was attributed to the interaction of MWCNTs with PANi, leading to the expansion of compact PANi chains into more stretched conformations and resulting in the decrease of electric resistance. The improved gas sensing performance of PANi/CNT composite was also studied by the other group [32].

Figure 3: NO gas sensing behavior of various samples in the absence of UV irradiation.

Figure 4: NO gas sensing behavior of various samples under UV irradiation.

Totally different trends in the NO gas sensing behavior were observed under UV irradiation as shown in Figure 4. The addition of TiO₂ in the gas sensing material improved the sensitivity of NO gas sensor significantly. PCT sample showed the highest sensitivity indicating 23.5% change in the electrical resistance. This result was attributed to the decomposition of NO gas by the photocatalytic reaction of TiO₂ under UV irradiation [30, 33] as follows:

The electrons in TiO₂ are excited from the valence band to the conduction band under UV irradiation, generating the electron-hole pairs, which can recombine or initiate the redox reactions. Holes are trapped by water (H₂O) or hydroxyl groups () that are adsorbed on the surface of material, producing the hydroxyl radicals (). The electrons reduce the adsorbed oxygen, resulting in the formation of superoxide ions (). Therefore, OH and O groups on the surface of TiO₂ play an important role in NO adsorption and oxidation [30].

Three different states are observed during the photocatalytic oxidation of NO [34, 35]. The primary oxidation product is HNO₂ in the initial state. In the transient state, HNO₂ is oxidized to NO₂, which is subsequently oxidized to HNO₃. As a result, the products of NO decomposition are HNO₂, NO₂, and HNO₃. The photocatalytic decomposition products are adsorbed effectively on the PANi-coated MWCNTs because of the high gas adsorption capacity by high specific surface areas and pore volume of MWCNTs [12, 13] and the hydrophilicity of PANi polymer [36]. Although MWCNT provide the high porosity for gas adsorption, its hydrophobicity results in the poor adsorption of hydrophilic gases such as HNO₂, NO₂, and HNO₃. Therefore, the composite with PANi is beneficial for the adsorption of hydrophilic gases resulting in the decreased electrical resistance and the increased sensitivity of gas sensor. The photocatalytic activity of TiO₂ is maximized due to the effective suppression of the electron-hole pairs combination by conductive MWCNT and PANi. The large and rapid changes in electrical resistance upon NO gas adsorption under UV irradiation are attributed to the combination effects of improved conductivity of PANi/MWCNT composite and effective adsorption of photocatalytic decomposition products on MWCNTs.

The decomposition products, which were adsorbed on the sensing materials, were indirectly investigated by monitoring the variation in pH of the desorbing solution. The desorbed acidic HNO₃ may reduce the pH of desorbing solution. The adsorbed products were dissolved in water (20 mL) by putting PCT sample (0.2 g) under agitation at room temperature for 4 h. The pH of PCT suspension changed from 7.2 to 4.8 after desorbing the adsorbed products on PCT sample, indicating that the acidic molecules were adsorbed on the porous MWCNTs.

3.4. Recovery Properties of Gas Sensor

Figure 5 presents the reproducibility of the PCT gas sensor which showed the highest gas sensitivity. Perfect reproducibility was observed for the PCT sample due to the excellent gas desorption properties during the recovery process, which was performed at lower temperature of 100°C. The adsorption of NO gas on the PCT sample with relatively weak interaction was beneficial to the excellent recovery property of gas sensor.

Figure 5: Reproducibility of NO gas sensing behavior of PCT sample under UV irradiation.

4. Conclusions

The high-performance NO gas sensor was prepared by PANi/MWCNT/TiO₂ composite using in situ polymerization method. The gas sensing behavior was evaluated by measuring the changes in electrical resistance upon NO gas adsorption without or with UV irradiation to investigate the photodegradation effects of NO gas by TiO₂. The electrical resistance was decreased by p-type semiconductors of MWCNT and polyaniline. The TiO₂ photocatalyst improved both sensitivity and response of the PANi/MWCNT/TiO₂ gas sensor greatly. The improvement in gas sensing behavior was attributed to the effective photocatalytic decomposition of NO gas into HNO₂, NO₂, and HNO₃ acidic gases by TiO₂ and the effective adsorption on the hydrophilic sites of PANi-coated MWCNTs resulting in the decreased electrical resistance. PANi/MWCNT/TiO₂ gas sensor showed excellent reproducibility in gas sensing behavior during the recovery process at lower temperature of 100°C.

References

B. T. Marquis and J. F. Vetelino, “A semiconducting metal oxide sensor array for the detection of NOx and NH₃,” Sensors and Actuators B, vol. 77, no. 1-2, pp. 100–110, 2001.

L. Chen and S. C. Tsang, “Ag doped WO₃-based powder sensor for the detection of NO gas in air,” Sensors and Actuators B, vol. 89, no. 1-2, pp. 68–75, 2003.

W. Zhang, H. Uchida, T. Katsube, T. Nakatsubo, and Y. Nishioka, “A novel semiconductor NO gas sensor operating at room temperature,” Sensors and Actuators B, vol. 49, no. 1-2, pp. 58–62, 1998.

P. Schmidt-Zhang, W. Zhang, F. Gerlach, K. Ahlborn, and U. Guth, “Electrochemical investigations on multi-metallic electrodes for amperometric NO gas sensors,” Sensors and Actuators B, vol. 108, no. 1-2, pp. 797–802, 2005.

M. Penza, C. Martucci, and G. Cassano, “NOx gas sensing characteristics of WO₃ thin films activated by noble metals (Pd, Pt, Au) layers,” Sensors and Actuators B, vol. 50, no. 1, pp. 52–59, 1998.

R. C. Ionescu, A. Vancu, and F. Buta, “Diode-like SnO₂ gas detection devices,” Sensors and Actuators B, vol. 43, no. 1–3, pp. 126–131, 1997.

T. Seiyama, H. Futata, F. Era, and N. Yamazoe, “Detection of gases by an activated semiconductive sensor,” Journal of Materials Science, vol. 8, pp. 63–65, 1972.

J. B. Yadav, S. V. Jhadav, R. K. Puri, and V. Puri, “Properties of vacuum evaporated vapour chopped polyaniline thin film: effect of synthesis method,” Journal of Physics, vol. 114, no. 1, Article ID 012037, 2008.

M. Matsuguchi, A. Okamoto, and Y. Sakai, “Effect of humidity on NH₃ gas sensitivity of polyaniline blend films,” Sensors and Actuators B, vol. 94, no. 1, pp. 46–52, 2003.

D. S. Dhawale, R. R. Salunkhe, U. M. Patil, K. V. Gurav, A. M. More, and C. D. Lokhande, “Room temperature liquefied petroleum gas (LPG) sensor based on p-polyaniline/n-TiO₂ heterojunction,” Sensors and Actuators B, vol. 134, no. 2, pp. 988–992, 2008.

S. M. Lee, K. H. An, Y. H. Lee, G. Seifert, and T. Frauenheim, “A hydrogen storage mechanism in single-walled carbon nanotubes,” Journal of the American Chemical Society, vol. 123, no. 21, pp. 5059–5063, 2001.

J. S. Im, S. C. Kang, B. C. Bai et al., “Thermal fluorination effects on carbon nanotubes for preparation of a high-performance gas sensor,” Carbon, vol. 49, no. 7, pp. 2235–2244, 2011.

J. S. Im, S. C. Kang, B. C. Bai, J. K. Suh, and Y. S. Lee, “Effect of thermal fluorination on the hydrogen storage capacity of multi-walled carbon nanotubes,” International Journal of Hydrogen Energy, vol. 36, no. 2, pp. 1560–1567, 2011.

S. Srivastava, S. S. Sharma, S. Agrawal, S. Kumar, M. Singh, and Y. K. Vijay, “Study of chemiresistor type CNT doped polyaniline gas sensor,” Synthetic Metals, vol. 160, no. 5-6, pp. 529–534, 2010.

P. Lobotka, P. Kunzo, E. Kovacova et al., “Thin polyaniline and polyaniline/carbon nanocomposite films for gas sensing,” Thin Solid Films, vol. 519, no. 12, pp. 4123–4127, 2011.

K. P. Yoo, K. H. Kwon, N. K. Min, M. J. Lee, and C. J. Lee, “Effects of O₂ plasma treatment on NH₃ sensing characteristics of multiwall carbon nanotube/polyaniline composite films,” Sensors and Actuators B, vol. 143, no. 1, pp. 333–340, 2009.

T. Ueda, K. Takahashi, F. Mitsugi, and T. Ikegami, “Preparation of single-walled carbon nanotube/TiO₂ hybrid atmospheric gas sensor operated at ambient temperature,” Diamond and Related Materials, vol. 18, no. 2-3, pp. 493–496, 2009.

S. H. Chien, M. C. Kuo, C. H. Lu, and K. N. Lu, “Spectroscopic studies of NO reduction on Pt/TiO₂ catalysts,” Catalysis Today, vol. 97, no. 2-3, pp. 121–127, 2004.

J. Yun, J. S. Im, Y. S. Lee, and H. I. Kim, “Effect of oxyfluorination on electromagnetic interference shielding behavior of MWCNT/PVA/PAAc composite microcapsules,” European Polymer Journal, vol. 46, no. 5, pp. 900–909, 2010.

J. Yun, J. S. Im, Y. S. Lee, T. S. Bae, Y. M. Lim, and H. I. Kim, “pH and electro-responsive release behavior of MWCNT/PVA/PAAc composite microcapsules,” Colloids and Surfaces A, vol. 368, no. 1–3, pp. 23–30, 2010.

J. S. Im, S. C. Kang, S. H. Lee, and Y. S. Lee, “Improved gas sensing of electrospun carbon fibers based on pore structure, conductivity and surface modification,” Carbon, vol. 48, no. 9, pp. 2573–2581, 2010.

B. Y. Jibril and A. Y. Atta, “Activated carbon incorporated with first-row transition metals as catalysts in hydrogen production from propane,” International Journal of Hydrogen Energy, vol. 36, no. 10, pp. 5951–5959, 2011.

J. S. Im, M. I. Kim, and Y. S. Lee, “Preparation of PAN-based electrospun nanofiber webs containing TiO₂ for photocatalytic degradation,” Materials Letters, vol. 62, no. 21-22, pp. 3652–3655, 2008.

H. Wang, R. Wang, L. Wang, and X. Tian, “Preparation of multi-core/single-shell OA-Fe₃O₄/PANI bifunctional nanoparticles via miniemulsion polymerization,” Colloids and Surfaces A, vol. 384, no. 1–3, pp. 624–629, 2011.

S. K. Lee, E. Jeong, J. S. Im, and Y. S. Lee, “Electrochemical characterization of hybrid semiconductor-based, dye-sensitized solar cells,” Korean Journal of Chemical Engineering, vol. 49, pp. 175–180, 2011.

S. K. Lee and Y. S. Lee, “Energy conversion efficiency of TiO₂ dye-sensitized solar cells with WO₃ additive,” Journal of the Korean Industrial and Engineering Chemistry, vol. 22, no. 1, pp. 26–30, 2011.

M. Penza, R. Rossi, M. Alvisi et al., “Pt- and Pd-nanoclusters functionalized carbon nanotubes networked films for sub-ppm gas sensors,” Sensors and Actuators B, vol. 135, no. 1, pp. 289–297, 2008.

H. Q. Nguyen and J. S. Huh, “Behavior of single-walled carbon nanotube-based gas sensors at various temperatures of treatment and operation,” Sensors and Actuators B, vol. 117, no. 2, pp. 426–430, 2006.

T. Ueda, M. M. H. Bhuiyan, H. Norimatsu, S. Katsuki, T. Ikegami, and F. Mitsugi, “Development of carbon nanotube-based gas sensors for NOx gas detection working at low temperature,” Physica E, vol. 40, no. 7, pp. 2272–2277, 2008.

D. H. Nguyen, V. Q. Nguyen, Y. S. Cho, and D. Kim, “Porous single-wall carbon nanotube films formed by in Situ arc-discharge deposition for gas sensors application,” Sensors and Actuators B, vol. 135, no. 2, pp. 656–663, 2009.

P. Bondavalli, P. Legagneux, and D. Pribat, “Carbon nanotubes based transistors as gas sensors: state of the art and critical review,” Sensors and Actuators B, vol. 140, no. 1, pp. 304–318, 2009.

S. Srivastava, S. S. Sharma, S. Kumar, S. Agrawal, M. Singh, and Y. K. Vijay, “Characterization of gas sensing behavior of multi walled carbon nanotube polyaniline composite films,” International Journal of Hydrogen Energy, vol. 34, no. 19, pp. 8444–8450, 2009.

G. Peng, E. Trock, and H. Haick, “Detecting simulated patterns of lung cancer biomarkers by random network of single-walled carbon nanotubes coated with nonpolymeric organic materials,” Nano Letters, vol. 8, no. 11, pp. 3631–3635, 2008.

J. Andzelm, N. Govind, and A. Maiti, “Nanotube-based gas sensors—role of structural defects,” Chemical Physics Letters, vol. 421, no. 1–3, pp. 58–62, 2006.

L. Valentini, F. Mercuri, I. Armentano et al., “Role of defects on the gas sensing properties of carbon nanotubes thin films: experiment and theory,” Chemical Physics Letters, vol. 387, no. 4–6, pp. 356–361, 2004.

M. A. Molina, C. R. Rivarola, and C. A. Barbero, “Effect of copolymerization and semi-interpenetration with conducting polyanilines on the physicochemical properties of poly(N-isopropylacrylamide) based thermosensitive hydrogels,” European Polymer Journal, vol. 47, no. 10, pp. 1977–1984, 2011.