Journal of Nanomaterials

Volume 2013 (2013), Article ID 378919, 5 pages

http://dx.doi.org/10.1155/2013/378919

Research Article

Template-Free Synthesis of Porous Cu₂O Nanospheres at Room Temperature and Investigation on Their Adsorption Property

Ying Zhang, Dong Wang, Xu Zhang, and Fengyu Qu

Key Laboratory of Design and Synthesis of Functional Materials and Green Catalysis, Colleges of Heilongjiang Province and College of Chemistry and Chemical Engineering, Harbin Normal University, Harbin, Heilongjiang 150025, China

Received 13 November 2013; Accepted 22 November 2013

Academic Editor: Xiang Wu

Copyright © 2013 Ying Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Porous cuprous oxide (Cu₂O) nanospheres composed of small nanoparticles with diameters at 10~20 nm were successfully synthesized without surfactant at room temperature within 5 min. The products were characterized by X-ray diffraction (XRD), field-emission scanning electron microscopy (FESEM), high resolution transmission electron microscopy (HRTEM), selected area electron diffraction (SAED), N₂ adsorption-desorption, and Fourier transform infrared (FT-IR) spectrum. The adsorption ability of the as-prepared products towards methyl orange (MO) as the pollutant was investigated and FT-IR spectrum was employed to identify the adsorbed species. In addition, the reusability of the as-prepared products was studied as well.

1. Introduction

As a p-type semiconductor material, cuprous oxide (Cu₂O) has been paid much attention owing to its fundamental significance and widespread potential applications in solar cells, gas sensors, Li-ion battery, and catalysis [1–5]. Cu₂O usually grows into large microcrystals which possess low specific surface area [6], resulting in the limitation of the application of Cu₂O. Generally, the intrinsic properties of an inorganic nanomaterial could be tuned by controlling its size and microstructure to some extent [7–13]. Therefore, it is necessary to explore easy method to synthesize cuprous oxide with relatively large surface area. Recently, porous nanostructures have received more and more attention because they are exceptionally useful in sensor [14], catalysis [15], and dye-sensitized solar cells [16] due to their high surface area, tunable pore size, and adjustable framework [17]. So far, several methods have been reported to prepare porous Cu₂O nanostructures [18–21]; however, the structure control of the Cu₂O nanocrystals in these reports often relies on organic capping agent to direct the growth of porous structure, thus leading to an environmental burden. In addition, most of these methods involve either elevated temperature or complex process in the preparation of porous Cu₂O nanostructures. Therefore, it is highly desirable to develop a facile template-free route at room temperature to synthesize porous Cu₂O nanostructures.

Herein, we present a green and convenient approach for the synthesis of porous Cu₂O nanospheres assembled from nanoparticles without surfactant at room temperature. In this protocol, only Cu(CH₃COO)₂, NaOH, ascorbic acid, and distilled water were used and the product possesses a relative large specific surface area. So it is a highly ideal synthetic route to produce porous Cu₂O nanomaterials under environmentally benign conditions. Moreover, the as-prepared products exhibit a good adsorption ability towards methyl orange (MO) as the pollutant.

2. Experimental Details

2.1. Synthesis of Porous Cu₂O Nanospheres

All of the chemical reagents were of analytical grade and used without further purification. In a typical procedure, 1 mmoL Cu(Ac)₂·H₂O was firstly dissolved in 20 mL of NaOH aqueous solution () under constant magnetical stirring. And blue Cu(OH)₂ precipitates appeared immediately. Then 1 mmoL ascorbic acid was added and the solution was magnetically stirred for 5 min at ambient conditions. During the process, the color of the reaction mixture turned from blue into dark yellow, then yellow, and orange, which implied the formation of Cu₂O. At last, the precipitates were separated from the solution by centrifugation at 4000 rpm for 5 min. Then the precipitates were washed with distilled water and absolute ethanol sufficiently and dried in vacuum for several hours.

2.2. Characterization

The crystal structure and phase composition of the sample were characterized using X-ray powder diffraction (XRD, Rigaku D/max-2600/PC, CuKα radiation, λ = 1.54056 Å, 40 kV, 150 mA). The morphology of the products was examined by a field emission scanning electron microscope (FESEM, HITACHI S-4800 electron microscope) operated at 15.0 kV. High resolution transmission electron microscopy (HRTEM) images were recorded on JEOL JEM-2100 microscope. The N₂ adsorption-desorption isotherms at 77 K were measured using a Quantachrome NOVA 2000E analyzer. Before measuring, the samples were degassed at 393 K for 12 h. Surface areas and pore size distributions were calculated using the Brunauer-Emmett-Teller (BET) and Barrett-Joyner-Halenda (BJH) models, respectively. UV-Vis spectra were taken on a Lambda 45 spectrophotometer. Fourier transform infrared spectroscopy (FT-IR, Bruker, vertex 80) was employed to characterize the residual MO on the porous Cu₂O nanospheres after adsorption.

2.3. Adsorption Property Measurement

Different amounts of porous Cu₂O nanospheres (0.02 g–0.12 g) were dispersed into an aqueous solution of methyl orange (MO, 200 mL, 30 mg/L) and the mixed solution was magnetically stirred in the dark. 5 mL of suspension was collected at each regular interval and centrifuged to remove the adsorbent powder in order to analyze the adsorption rate of MO by monitoring dye decolorization at the maximum absorption wavelength, using a UV/Vis spectrometer.

The separated porous Cu₂O nanospheres were washed with distilled water and absolute ethanol, respectively, for three times to remove the residual organic species as thoroughly as possible and reused for the next run.

3. Results and Discussion

The phase and purity of the products were firstly investigated by XRD. Figure 1 shows a typical XRD pattern of the sample. All of the reflection peaks in this pattern can be readily indexed to a pure cubic phase of Cu₂O (JCPDS no. 05-0667). Relatively, wide diffraction peaks imply that the size of the particles is small.

Figure 1: XRD pattern of the as-prepared product.

The morphology of the products was observed by SEM. Figure 2(a) is a typical low magnified SEM image of the sample, showing that a large quantity of spherical particles with a narrow size distribution was achieved. The high magnified SEM image (Figure 2(b)) demonstrates that the spherical shaped particles possess an average diameter about 400 nm, and the surfaces of the spheres are rough and porous since they are constructed by aggregation of a lot of small particles with diameters 10~20 nm, as confirmed by the TEM image (Figure 2(c)). Based on the EM images with different magnifications, it is clear that pores were distributed on both the surface and the interior of the Cu₂O nanospheres that permits the rapid penetration of the adsorbates from the outside to the inside for deep adsorptions. The aggregating feature is further confirmed by HRTEM image (Figure 2(d)), in which randomly oriented lattice fringes can be found, indicating that the porous spheres are composed of nanocrystals with different growth directions. Circles in the SAED pattern (inset in Figure 2(d)) further show the polycrystalline nature of the porous Cu₂O nanospheres; that is, the crystal planes of the small Cu₂O nanoparticles are randomly oriented.

(a)

(b)

(c)

(d)

Figure 2: EM images with different magnifications: (a) low magnification SEM image of the sample, (b) high magnification SEM image of the sample, (c) TEM image of the sample, and (d) HRTEM image taken at the edge of porous nanospheres and the corresponding SAED pattern (inset).

The N₂ adsorption and desorption isotherms of the porous Cu₂O nanospheres are provided in Figure 3. The specific surface area is calculated to be 26.67 m²g⁻¹. Moreover, the corresponding pore size distribution (the inset of Figure 3) shows a peak pore diameter of 10 nm with pores up to 60 nm in size. Such porous structure provides efficient transport pathways to the interior cavities and is in favor of adsorption.

Figure 3: The N₂ adsorption and desorption isotherms and the pore size distribution curve (inset) of the porous Cu₂O nanospheres.

To demonstrate the potential application of the as-prepared porous Cu₂O nanospheres, we investigated its adsorption ability with methyl orange (MO) as the pollutant. The adsorption was carried out by dispersing different amount of porous Cu₂O nanospheres in the solution of MO in the dark for various durations under constant stirring. After centrifugation, the UV-Vis absorption of the supernatant was measured and the characteristic band of MO at about 464 nm was selected to monitor the adsorption behavior. As shown in Figure 4, the same trend can be seen that the concentration of the MO progressively decreases following the adsorption time within 120 min and is kept constant beyond 120 min when the amount of Cu₂O nanospheres was from 0.02 to 0.12 g. Obviously, the adsorption capacity of the porous nanospheres is saturated at about 120 min, which is much shorter than the saturation time of reported polyhedral Cu₂O on adsorption of MO under identical conditions [22]. The more the amount of the porous nanospheres is used, the larger is the adsorption rate. However, the adsorption behaviors are very similar when the used amount of the porous Cu₂O nanospheres is 0.10 g and 0.12 g, the concentration of MO lowered by about 60% after about 20 min of adsorption, and the final adsorption rate could reach about 95% when the adsorption time is 120 min. Obviously, the optimum using amount of the as-prepared adsorbent is around 0.1 g.

Figure 4: Adsorption curves of the aqueous solution of methyl orange (30 mg L⁻¹, 200 mL) in the presence of Cu₂O (0.05 g–0.12 g) at different intervals, where denotes the concentrations of MO changing following adsorption time and denotes the initial concentration of MO.

Since the adsorption experiments were carried out in the dark, the decolorization of the MO solution must result from the adsorption of Cu₂O particles, which is further corroborated by the FTIR analysis. As shown by curve (a) in Figure 5, the FTIR spectrum of the porous Cu₂O nanospheres before adsorption exhibits two strong vibration bands. The band at 630 cm⁻¹ corresponds to the Cu–O bond [23] (optically active lattice vibration in the oxide), and the peak at 1628 cm⁻¹ is attributed to the –OH bending vibration, which originates from the surface-adsorbed H₂O. In comparison with the FTIR spectrum of the pure Cu₂O nanospheres, some new peaks appear after adsorption (curve (b) in Figure 5). Combined with the FTIR spectrum of pure MO (curve (c) in Figure 5), the new peaks can be assigned to the characteristic vibrations of MO. The peaks at 1446 and 1372 cm⁻¹ are the signals from the methyl group. The peaks at 817 and 843 cm⁻¹ result from the absorption peaks of C–H bonds of di-substituted benzene. The peaks at 697 cm⁻¹, 1029 cm⁻¹, and 1120 cm⁻¹ come from the vibrations of the sulfonic group [24]. Thus, the FTIR characterization results provide solid evidence for the adsorption of MO on the porous Cu₂O nanospheres.

Figure 5: The FTIR spectra of (a) porous Cu₂O nanospheres, (b) porous Cu₂O nanospheres after the MO adsorption, and (c) the pure MO.

Cycling use as well as maintaining high adsorption ability of adsorbent is a critical issue toward long-term adsorption applications. Therefore, the stability of the as-synthesized Cu₂O adsorbent was evaluated by performing the recycle experiments for adsorbing MO under identical conditions and the results are shown in Figure 6. After five cycles, the adsorption rate does not decrease apparently, indicating that the adsorbent possesses high adsorption stability.

Figure 6: Cycling tests of adsorption ability of the porous Cu₂O nanospheres towards MO.

4. Conclusion

In summary, porous Cu₂O nanospheres composed of small nanoparticles with diameters 10~20 nm have been successfully prepared through an environmental benign method in the absence of template within 5 min at room temperature. The BET surface area of the sample is 26.67 m²g⁻¹ and the average pore diameter is ca. 10 nm. The porous nanospheres exhibit good adsorption property and stability towards MO as the pollutant, and the initial adsorption rate could reach about 95% within 120 min under optimum conditions.

Acknowledgments

This work was financially supported by Supporting Plan Project for Youth Scholar Backbone of General Colleges and Universities of Heilongjiang Province (no. 1155G27), Plan for Scientific Innovation Talent of Harbin Science and Technology Bureau (no. 2010RFQXS071), Preresearch Fund for Technological Development of Harbin Normal University (no. 10XYG-08), and Program for Scientific and Technological Innovation Team Construction in Universities of Heilongjiang Province (no. 2011TD010).

References

A. O. Musa, T. Akomolafe, and M. J. Carter, “Production of cuprous oxide, a solar cell material, by thermal oxidation and a study of its physical and electrical properties,” Solar Energy Materials and Solar Cells, vol. 51, no. 3-4, pp. 305–316, 1998.

S. K. Baek, K. R. Lee, and H. K. Cho, “Oxide p-n heterojunction of Cu₂O/ZnO nanowires and their photovoltaic performance,” Journal of Nanomaterials, vol. 2013, Article ID 421371, 7 pages, 2013.

J. T. Zhang, J. F. Liu, Q. Peng, X. Wang, and Y. Li, “Nearly monodisperse Cu₂O and CuO nanospheres: preparation and applications for sensitive gas sensors,” Chemistry of Materials, vol. 18, no. 4, pp. 867–871, 2006.

W. Liu, G. Chen, G. He, and W. Zhang, “Synthesis of starfish-like Cu₂O nanocrystals through γ-irradiation and their application in lithium-ion batteries,” Journal of Nanoparticle Research, vol. 13, no. 7, pp. 2705–2713, 2011.

B. White, M. Yin, A. Hall et al., “Complete CO oxidation over Cu₂O nanoparticles supported on silica gel,” Nano Letters, vol. 6, no. 9, pp. 2095–2098, 2006.

Z. M. Yang, S. D. Sun, C. C. Kong, X. P. Song, and B. J. Ding, “Designated-tailoring on {100} facets of Cu₂O nanostructures: from octahedral to its different truncated forms,” Journal of Nanomaterials, vol. 2010, Article ID 710584, 11 pages, 2010.

A. P. Alivisatos, “Semiconductor clusters, nanocrystals, and quantum dots,” Science, vol. 271, no. 5251, pp. 933–937, 1996.

M. A. El-Sayed, “Some interesting properties of metals confined in time and nanometer space of different shapes,” Accounts of Chemical Research, vol. 34, no. 4, pp. 257–264, 2001.

B. X. Jia, W. N. Jia, X. Wu, and F. Y. Qu, “Hierarchical porous SnO₂ microflowersphotocatalyst,” Science of Advanced Materials, vol. 4, pp. 1127–1133, 2012.

B. X. Jia, W. N. Jia, Y. L. Ma, X. Wu, and F. Y. Qu, “SnO₂ core-shell microspheres with excellent photocatalytic properties,” Science of Advanced Materials, vol. 4, pp. 702–707, 2012.

Y. Lei, F. Y. Qu, and X. Wu, “Assembling ZnO nanorods into microflowers through a facile solution strategy: morphology control and cathodoluminescence properties,” Nano-Micro Letters, vol. 4, pp. 45–51, 2012.

Z. L. Zhang, J. Wang, Z. Yu, F. Y. Qu, and X. Wu, “Assembling SnO nanosheets into microhydrangeas:gas phase synthesis and their optical property,” Nano-Micro Letters, vol. 4, pp. 215–219, 2012.

B. X. Jia, W. N. Jia, J. Wang, F. Y. Qu, and X. Wu, “Growth of thin sheet assembled hierarchical ZnO nanostructures,” Journal of Nanomaterials, vol. 2012, Article ID 796815, 5 pages, 2012.

V. S.-Y. Lin, K. Motesharei, K.-P. S. Dancil, M. J. Sailor, and M. R. Ghadiri, “A porous silicon-based optical interferometric biosensor,” Science, vol. 278, no. 5339, pp. 840–843, 1997.

Z.-R. Tian, W. Tong, J.-Y. Wang, N.-G. Duan, V. V. Krishnan, and S. L. Suib, “Manganese oxide mesoporous structures: mixed-valent semiconducting catalysts,” Science, vol. 276, no. 5314, pp. 926–930, 1997.

H.-H. Wang, C. Su, H.-S. Chen et al., “Preparation of nanoporous TiO₂ electrodes for dye-sensitized solar cells,” Journal of Nanomaterials, vol. 2011, Article ID 547103, 7 pages, 2011.

A.-H. Lu and F. Schüth, “Nanocasting: a versatile strategy for creating nanostructured porous materials,” Advanced Materials, vol. 18, no. 14, pp. 1793–1805, 2006.

Y. M. Sui, Y. Zeng, L. L. Fu et al., “Low-temperature synthesis of porous hollow structured Cu₂O for photocatalytic activity and gas sensor application,” RSC Advances, vol. 3, no. 40, pp. 18651–18660, 2013.

J. Zou, J. N. Ma, J. Z. Jiang, Y. X. Zhang, L. Li, and Q. J. Wan, “Synthesis of three-dimensional porous Cu₂O microspheres by template-free solvothermal method,” Micro & Nano Letters, vol. 8, no. 4, pp. 197–200, 2013.

L. Xu, L.-P. Jiang, and J.-J. Zhu, “Sonochemical synthesis and photocatalysis of porous Cu₂O nanospheres with controllable structures,” Nanotechnology, vol. 20, no. 4, Article ID 045605, 2009.

Y. Yuan, L. Y. Zhang, J. Wang et al., “Preparation of hollow porous Cu₂O microspheres and photocatalytic activity under visible light irradiation,” Nanoscale Research Letters, vol. 7, pp. 347–352, 2012.

D.-F. Zhang, H. Zhang, L. Guo, K. Zheng, X.-D. Han, and Z. Zhang, “Delicate control of crystallographic facet-oriented Cu₂O nanocrystals and the correlated adsorption ability,” Journal of Materials Chemistry, vol. 19, no. 29, pp. 5220–5225, 2009.

Z. C. Orel, A. Anžlovar, G. Dražić, and M. Žigon, “Cuprous oxide nanowires prepared by an additive-free polyol process,” Crystal Growth & Design, vol. 7, no. 2, pp. 453–458, 2007.

F. Chen, Y. Xie, J. J. He, and J. C. Zhao, “Photo-Fenton degradation of dye in methanolic solution under both UV and visible irradiation,” Journal of Photochemistry and Photobiology A, vol. 138, no. 2, pp. 139–146, 2001.