Journal of Nanomaterials

Volume 2013 (2013), Article ID 858935, 11 pages

http://dx.doi.org/10.1155/2013/858935

Research Article

Electrodeposition, Characterization, and Corrosion Stability of Nanostructured Anodic Oxides on New Ti-15Zr-5Nb Alloy Surface

Jose M. Calderon Moreno, Cora Vasilescu, Silviu Iulian Drob, Monica Popa, Paula Drob, and Ecaterina Vasilescu

Romanian Academy, Institute of Physical Chemistry “Ilie Murgulescu,” Splaiul Independentei 202, 060021 Bucharest, Romania

Received 11 February 2013; Accepted 20 March 2013

Academic Editor: Mohamed Bououdina

Copyright © 2013 Jose M. Calderon Moreno et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

A new Ti-15Zr-5Nb alloy with suitable microstructure and mechanical properties was processed by galvanostatic anodization in 0.3 M H₃PO₄ solution and a continuous nanostructured layer of protective TiO₂ oxide was electrodeposited. The obtained anatase oxide layer has a nanotubes-like porosity (SEM observations) and contains significant amount of phosphorus in phosphotitanate compound embedded in the oxide lattice (Raman, FT-IR, SEM, and EDX analysis). This layer composition can stimulate the formation of the bone and its porosity can offer a good scaffold for bone cell adhesion. The electrochemical behaviour, corrosion stability, and variations of the open circuit potentials, , and corresponding open circuit potential gradients, , for 1500 soaking hours in Ringer solutions of 3.21, 7.58, and 8.91 pH values were studied. The anodized layer was more resistant, stable (from EIS spectra), and was formed from an inner barrier insulating layer that assures the very good alloy corrosion resistance and an outer porous layer that provides the good conditions for cell development. The nanostructured alloy has higher corrosion stability, namely, a more reduced quantity of ions released and a lower toxicity than that of the bare one. The monitoring of and showed the enhancement and stabilizing of the long-term passive state of the anodized alloy and, respectively, no possibility at galvanic corrosion.

1. Introduction

Titanium and its alloys are used as orthopaedic and dental implants due to their good mechanical and anticorrosive properties and biocompatibility. However, it is an increasing necessity to obtain new alloys with a low elastic modulus, close to that of the human bone (10–40 GPa) [1], and based only on nontoxic, nonallergic, biocompatible elements as Zr, Nb, and Ta [2, 3]. Titanium alloys containing these biocompatible metals are relatively bioinert and the implant-bone integration is a longer process than that of the bone healing.

The alloy bioactivity depends on its surface chemistry, topography, porosity, and roughness; a rough surface enhances the contact with the bone and improves the bioactive bone-binding activity. Thus, surface treatments that form thin or thick, uniform, resistant, porous, rough layers on the implant surface and also incorporate constituent elements of the human bone (calcium and phosphorus) or protective compounds (phosphates, hydroxyapatite) are applied in the last time [4–7]. Electrochemical anodic or cathodic deposition of the oxide layers is an important, cheap, efficient method to increase the protective and osseointegrative properties of the titanium alloys; oxide nanotubes are formed on the alloy surface being a good matrix for bone cell colonization [8].

Electrochemical potentiostatic anodization technique was performed on Ti and its alloys in different solutions, and controlling the polarization parameters, the bioactive TiO₂ nanotubes were obtained enhancing the alloy biocompatibility [9–14].

Electrochemical galvanostatic anodization method was accomplished on Ti and some of its binary, ternary, and quaternary alloy surfaces using especially acidic solutions; varying solution composition, pH, temperature, and anodizing parameters, biofunctionalized surfaces were realized [15–17].

To obtain a biocompatible surface is a complex problem because must be an alloy containing only nontoxic, nonallergic, biocompatible elements, having very good mechanical properties and then must be taken into consideration the most favorable method adapted for the improvement of its bioactivity.

In this paper, a new Ti-15Zr-5Nb alloy was elaborated to satisfy the most important requirements of an implant material; this alloy (containing only nontoxic and nonallergic elements) has an microstructure, type Widmanstatten, a low Young’s modulus (82.69 GPa), and a good correlation between its mechanical properties and corrosion resistance. Its biocompatibility and anticorrosive properties were enhanced by galvanostatic anodization in 0.3 M H₃PO₄ (orthophosphoric acid) solution assuring the formation of a continuous nanostructured layer of protective TiO₂ oxide; this layer incorporated phosphorus as phosphotitanate () ions, increasing the alloy bioactivity.

2. Experimental Details

2.1. Materials

The new Ti-15Zr-5Nb alloy was obtained by vacuum, cold-crucible, semilevitation melting; alloy composition is (%wt.) 0.011% H₂; 0.02% N₂; 0.12% O₂; 0.052% Mg; 0.00235% Ca; 0.00831% Cr; 0.02048% Fe; 0.0077% Ni; 0.0181% Ta; 14.97% Zr; 5.111% Nb; balance Ti. From as-cast ingots were cut cylindrical samples for experiments.

2.2. Electrodeposition of the Nanostructured Oxide Layer

Before the anodic galvanostatic processing, the samples were ground with metallographic paper till 2000 grade to eliminate any surface defects and then were ground with metallographic paper of 600 grades to assure the necessary roughness and were washed with bidistilled water. Then, the samples were ultrasonically degreased in acetone and bidistilled water (for 15 min), dried in air, and fixed in a Stern-Makrides mount system. The anodic galvanostatic polarization was applied by a DC power source (MATRIX, China) that supplied current densities of 5 mA/cm² and 10 mA/cm² between the working electrode (Ti-15Zr-5Nb alloy) and auxiliary electrode (Pt); these current densities were constantly maintained for different time periods of 15, 30, 45, and 60 min. The anodization solution was orthophosphoric acid (H₃PO₄) of 0.3 M and 1 M concentrations; three processing parameters were varied: the solution concentration, current density, and time; different oxide layers were obtained and the nanostructured surface with the most favorable structural and morphological properties was selected and its electrochemical behaviour, corrosion stability, and long-term behaviour in different simulated physiological solutions were studied.

2.3. Characterization of the Nanostructured Oxide Layer

Composition of the obtained layers was verified by Raman microscopy and Fourier transform infrared (FT-IR) analysis.

Raman spectra were measured at room temperature using a LABRam Jobin Yvon (Japan) equipment. Acquisition time was 40 s; the green line (λ = 514.5 nm) of Ar⁺ laser was used to excite Raman spectra at a power of ~20 mW. Measurements were carried out under a microscope, with a 90x microscope objective; the laser spot size was around 1-2 μm. Raman measurements covered the range between 100 and 1100 cm⁻¹.

FT-IR spectra were registered as a resolution of 4 cm⁻¹, over the frequency range from 1400 to 600 cm⁻¹, using a spectrophotometer model Nicolet 6700 FTIR (USA). The spectra were taken from thin transparent (~20 mg/cm²) KBr pellets containing approximately 0.5% wt samples. Pellets were prepared by compacting and vacuum pressing of an intimate mixture obtained by grinding 1 mg of substance in 200 mg KBr.

The morphology, microstructure, and elemental composition of the nanostructured electrodeposited layer were analyzed by scanning electron microscopy (SEM) using a Quanta 3D FEG apparatus (The Nederland) working at an accelerating voltage of 20 kV and equipped with an energy dispersive X-ray (EDX) spectrometer.

2.4. Electrochemical Behaviour of Bare and Anodized Ti-15Zr-5Nb Alloys

The electrochemical behaviour of the anodized Ti-15Zr-5Nb alloy was examined in comparison with the bare alloy in Ringer solution of different pH values (acid pH = 3.21, obtained by HCl addition; neutral pH = 7.58, normal; alkaline pH = 8.91, obtained by KOH addition) that simulate the severe functional conditions from the human body: in the case of surgery, the pH decreases till 3-4 value [18, 19] and must long time to come back to 7.4 value; in the case of inflammations or infections, the pH can increase till 9 value [20]. Ringer solution composition was (g/L) NaCl—6.8; KCl—0.4; CaCl₂—0.2; MgSO₄7H₂O—0.2048; NaH₂PO₄·H₂O—0.1438; NaHCO₃—1.1; glucose—1. The working temperature was 37° ± 1°C.

The electrochemical behaviour was studied by cyclic potentiodynamic polarization method and electrochemical impedance spectroscopy (EIS).

The cyclic potentiodynamic measurements were applied beginning from −0.5 V till +2 V (versus saturated calomel electrode, SCE) at a scan rate of 1 mV/s. Voltalab 80 equipment (Radiometer, France) with its VoltaMaster 4 program was used. From voltammograms, the main electrochemical parameters that characterize the bare and anodized Ti-15Zr-5Nb alloy behaviour were determined: —corrosion potential (like zero current potential); —passivation potential (the potential value at which the current becomes constant); —tendency to passivation (low values show a rapid, easy passivation); —passive potential range (potential range for constant current, plateau range; larger potential range proves a more resistant material); —passive current density (lower values indicate a more protective passive layer).

EIS measurements were carried out at open circuit potential- with the same VoltaLab 80 equipment; Nyquist and Bode spectra were recorded applying sine wave of 5 mHz in the frequency range from 100 mHz to 100 kHz, with 7 points per decade. The electric equivalent circuit was fitted using nonlinear least square ZVIEW program.

2.5. Corrosion Stability of Bare and Anodized Ti-15Zr-5Nb Alloys

Linear polarization measurements were performed for ±50 mV around the open circuit potential at a scan rate of 1 mV/s, using the same Voltalab 80 equipment. From Tafel representation, the VoltaMaster 4 program directly supplied the values of the corrosion current density—, corrosion rate—, and polarization resistance—; the total quantity (ng/cm²) of ions released in biofluid was calculated [21, 22] as

where = corrosion rate in mm/year.

2.6. Long-Term Behaviour of Bare and Anodized Ti-15Zr-5Nb Alloys

The long-term behaviour of bare and anodized alloys was monitored by the measurements of the open circuit potentials— (with a performing Hewlett-Packard multimeter) at regular time periods, till 1500 soaking hours in Ringer solutions. The shift of to more positive values shows the increase of the thickness of oxide passive film and lower corrosion rate [23]. The decrease of value suggests dissolution processes at the interface and its subsequent increase, the formation of new oxide layer [23]. Also, taking into consideration that the human biofluid pH can vary from acid to alkaline values, different pH values can appear along the implant surface; thus, will have various values on different zones of the implant, producing potential gradients—Δ—that can initiate galvanic cells and can accelerate the implant corrosion; simulating these conditions, the following gradients were calculated [24–26]:

Also, the time variations of Δ values were registered with the aim of evaluating the possible susceptibility to galvanic or local corrosion.

3. Results and Discussion

3.1. Characterization of the Alloy Nanostructured Surface

Composition of the electrodeposited layer was determined from Raman spectra and FT-IR analysis. The morphology, microstructure, and elemental composition of the surface layer were analyzed by SEM and EDX methods.

3.1.1. Characterization of the Alloy Surface Galvanostatically Anodized in 0.3 M H₃PO₄ for 45 min. at a Current Density of 10 mA/cm²

SEM observations of the alloy surface after galvanostatic anodization (Figure 1) revealed the formation of a layer showing two hierarchical features: hill-like protuberances with a typical width between 5 and 10 μm (Figure 1(a)), where the layer is locally thicker, and nanotube-like porosity with diameters in the one to a few hundred manometers (Figure 1(b)). The chemical analysis by EDX determined that the nanostructured layer contains significant amount of P and O, as well as the constituent alloy elements (Figure 2).

(a)

(b)

Figure 1: SEM micrographs of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 0.3 M H₃PO₄ solution for 45 min. at 10 mA/cm²: (a) hill-like protuberances; (b) nanotube-like porosity.

Figure 2: EDX spectrum of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 0.3 M H₃PO₄ solution for 45 min. at 10 mA/cm².

Raman microspectroscopy is especially suitable for the analysis of the presence of oxides [27, 28] and/or phosphates, [29–31] even if present as nanocrystalline or secondary phases in surface layers, difficult to detect by other methods. Raman measurements (Figure 3) clearly showed the existence of titanium oxide with anatase-like structure, indicated by the existence of a strong band at 149 cm⁻¹, coincident with the main vibrational band of anatase. The significant shift from reported values at ~142–145 cm⁻¹ [27, 28] of different anatase nanoparticles with dimensions between 12 and 30 nm and the width of the main band clearly indicate smaller dimensions of the anatase nanocrystallites nucleated in the anodized surface layer. Besides, the additional spectral features reveal a substantial modification of the crystalline structure of anatase during anodization in H₃PO₄: the wide bands centered at ~400 cm⁻¹ and at ~600 cm⁻¹ cannot be unambiguously matched with the secondary features of anatase at 395 cm⁻¹ () and 638 cm⁻¹ () [27, 28], while the () band at 515 cm⁻¹ is not present and the band at 195 cm⁻¹ is masked by the wide main band. Different authors have reported similar wide Raman bands in titania modified layers containing phosphorus, either as phosphate () or as pyrophosphate () groups, embedded in the O–Ti(Nb)–O oxidized surface layer [32, 33] and caused by modification of Ti–O–Ti bonds into P–O–Ti and P–O–P bonds in the oxide lattice. Raman analysis of the anodized surface, on the other hand, found no evidence of the presence of the group characteristic main vibrational band at ~1000 cm⁻¹ [29–31].

Figure 3: Raman spectrum of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 0.3 M H₃PO₄ solution for 45 min. at 10 mA/cm².

Because the sensitivity of Raman method for Ti–O bonding is significantly higher than that for phosphate bonds, we used FT-IR vibrational spectroscopy to investigate the presence of phosphate groups, in order to complete the compositional analysis of the electrodeposited films. The two wide bands, centered at ~800 cm⁻¹ and 1100 cm⁻¹, detected by FT-IR (Figure 4) can only be attributed to the bending mode of the P–O–P bonds in phosphotitanate glass oxide, due to the incorporation of P⁵⁺ ions [33, 34] into the oxide coating, promoted by the acidic conditions.

Figure 4: FT-IR spectrum of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 0.3 M H₃PO₄ solution for 45 min. at 10 mA/cm².

We can conclude that the layer electrodeposited in 0.3 M H₃PO₄ solution is formed by anatase oxide that contains phosphorus as ion in phosphotitanate compound, phosphorus being the main inorganic component of the human bone thus stimulating the formation of bone [35]. Also, this nanolayer has a nanotube-like porosity that can provide a good scaffold for the bone cell development [35].

3.1.2. Characterization of the Alloy Surface Galvanostatically Anodized in 1 M H₃PO₄ for 45 min. at a Current Density of 10 mA/cm²

The analysis of the galvanostatic anodization Ti-15Zr-5Nb alloy surface by vibrational Raman (Figure 5) and FT-IR (Figure 6) spectroscopies detected the same composition of the electrodeposited layer, namely, TiO₂ anatase oxide, modified with phosphorus as pyrophosphate bonds in titania-based oxide.

Figure 5: Raman spectrum of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 1 M H₃PO₄ solution for 45 min. at 10 mA/cm².

Figure 6: FT-IR spectrum of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 1 M H₃PO4 solution for 45 min. at 10 mA/cm².

SEM micrographs (Figure 7) of the sample processed electrochemically in 1 M H₃PO₄ showed the deposition of loose aggregates (Figure 7(b)) of submicron sized particles on top of the porous layer (Figure 7(a)). The additional features have the same composition of the continuous passivating layer, as determined from the EDX analysis (Figure 8). It results in the fact that in 1 M H₃PO₄ solution was obtained a nanolayer with lower microstructural properties.

(a)

(b)

Figure 7: SEM micrographs of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 1 M H₃PO₄ solution for 45 min. at 10 mA/cm².

Figure 8: EDX spectrum of Ti-15Zr-5Nb alloy surface galvanostatically anodized in 1 M H₃PO₄ solution for 45 min.

From the previous experimental results, it appears that the most favorable properties of Ti-15Zr-5Nb alloy surface were obtained by the galvanostatic anodization in 0.3 M H₃PO₄ solution for 45 min. at 10 mA/cm². The electrochemical behaviour, corrosion stability, and long-term behaviour of the alloy surface processed by this method will be studied later on (named anodized alloy).

3.2. Electrochemical Behaviour of the Bare and Anodized Alloys in Ringer Solutions of Different pH Values

Electrochemical behaviour of the bare and anodized alloys in Ringer solutions of 3.21, 7.58, and 8.91 pH values was determined from cyclic potentiodynamic and EIS measurements.

3.2.1. Electrochemical Behaviour from Cyclic Potentiodynamic Measurements

Cyclic potentiodynamic curves from Figure 9 make evident a nobler behaviour of the anodized alloy than that of the bare one, because all the electrochemical parameters (Table 1) have more favorable values [10, 15]:

(i)corrosion, and passivation, potentials have more electropositive values and passive current densities, are lower, showing a more protective, more resistant nanostructured layer on the anodized alloy surface [23],(ii)tendency to passivation, , has lower values indicating that the processed alloy is more easily, more rapidly passivated, as a result of the existence of the electrodeposited nanolayer that improves the protective properties of the native passive layer by its thickening [23, 25].

Table 1: Main electrochemical parameters for bare and anodized Ti-15Zr-5Nb alloys obtained in Ringer solutions at 37°C.

Ti-15Zr-5Nb
(mV)
(mV)
(mV)
(mV)
(A/cm²)

Ringer pH = 3.21

Bare

>2000
150
3.9

Anodized

>2000
100
1.9

Ringer pH = 7.58

Bare

0
>2000
200
1.0

Anodized

0
>2000
100
0.9

Ringer pH = 8.91

Bare

>2000
150
4.1

Anodized

>2000
100
2.0

Figure 9: Cyclic potentiodynamic curves for bare and anodized Ti-15Zr-5Nb alloys recorded in Ringer solutions at 37°C.

In acid and alkaline Ringer solutions, the main electrochemical parameters presented slightly more unfavorable values both for the bare and the anodized alloys due to the slight higher aggressivity of these solutions; nevertheless, the anodized alloy revealed a very good passive behaviour.

3.2.2. Electrochemical Behaviour from EIS Measurements

Nyquist spectra (Zreal versus Zimag) exhibited semicircles with large curvature radii (Figure 10) that describe a capacitive behaviour, a resistant passive film [15, 36, 37]. Because the curvature radii have higher values for the anodized alloy, it results in the fact that its passive film is more resistant. The impedance values for the electrochemical anodized alloy exceed two times the values for the bare alloy; these results indicate a very protective nanostructured layer [15, 36, 37].

Figure 10: Nyquist spectra for bare and anodized Ti-15Zr-5Nb alloys recorded in Ringer solutions at 37°C.

Bode spectra (phase angle versus log ) displayed both for bare and anodized alloys (Figure 11) phase angles around the value of −90° that represent a capacitive behaviour, a passive film like an electric insulator [16]. Same better behaviour of the anodized alloy than that of the bare one resulted:

(i)in Ringer solution of pH = 3.21; the bare alloy presents two phase angles at −81° and −79°, and the anodized one higher values at −83° and −81° that denote a better capacitive behaviour for the nanostructured alloy;(ii)in Ringer solution of pH = 7.58; the phase angles have values of −84° and −80° for the bare alloy and of −86° and −82° for the anodized alloy, namely, a more insulating passive film existing on the nanostructured alloy surface;(iii)in Ringer solution of pH = 8.91; values of −79° and −76° were registered for the bare alloy and of −81° and −78° for the anodized alloy.

Figure 11: Bode spectra for bare and anodized Ti-15Zr-5Nb alloys recorded in Ringer solutions at 37°C.

Those two phase angles indicate a protective film formed by two layers: an inner barrier insulating layer characterized by the higher phase angle in the low frequency range and an outer porous layer represented by the lower phase angle in the intermediate frequency range; through this porous layer can penetrate the aggressive ions from the physiological solutions and can corrode the inner compact layer, but, in the same time, in these pores can be incorporated calcium and phosphorous ions from biofluid that can provide a good scaffold for the bone cell adhesion [38].

According to the literature [39, 40], an electric equivalent circuit with two time constants (Figure 12) was modeled: the first time constant illustrates the inner barrier layer by its resistance, , and capacitance, ; the second time constant refers to the outer porous layer by its resistance, , and capacitance, .

Figure 12: Electric equivalent circuit with two time constants.

The inner barrier layer resistances, , and the porous layer resistances, , of the anodized alloy are higher than those of the bare one (Table 2), showing that the galvanostatic processing generated a more resistant nanolayer; this fact is confirmed by the values of the frequency independent parameters and which are bigger for the processed alloy, indicating a better capacitor ( represents an ideal capacitor), namely, superior protective properties [39]. Barrier layer resistances, , for both bare and anodized alloys have values of about 100 times higher than those of the porous layer, , proving that the barrier layer assures the alloy good resistance against the physiological solution aggressivity [41, 42]; on the other hand, lower values of denote that the porous layer has inferior protective properties, permitting the diffusion and incorporation of the ions from the biofluid through and into this layer [36, 43]; thus, this porous layer provides the necessary conditions for the interactions of the alloy with human fluid, namely, the bioactivity of the surface layer [43].

Table 2: Fitting parameters of the two time constants electric equivalent circuit.

Ti-15Zr-5Nb
()
()
()

()
()

Ringer pH = 3.21

Bare
14.2

0.96

0.90

Anodized
14.8

0.98

0.91

Ringer pH = 7.58

Bare
13.6

0.97

0.91

Anodized
15.1

0.99

0.93

Ringer pH = 8.91

Bare
14.5

0.95

0.90

Anodized
14.9

0.97

0.92

3.3. Corrosion Stability of the Bare and Anodized Alloys in Ringer Solutions of Different pH Values

The corrosion stability of the bare and anodized alloys was appreciated from the values of the corrosion current densities, , corrosion, , and ion release rates and polarization resistances, (Table 3), obtained from Tafel representations. The main corrosion parameters have better values for the anodized alloy than those for the bare one:

(i)corrosion current densities, , corrosion, , and ion release rates have lower values that show a better resistance to corrosion and implicitly a more reduced quantity of ions released in biofluid, namely, a lower toxicity [21, 22];(ii)polarization resistance, , has higher values (of about 10 times, order MΩ·cm²) that prove a more resistant layer [23, 25].

Table 3: Main corrosion parameters for bare and anodized Ti-15Zr-5Nb alloys obtained in Ringer solutions at 37°C.

Ti-15Zr-5Nb
(A/cm²)
(m/Y)
Resistance class
Ion release (ng/cm²)
()

Ringer pH = 3.21

Bare
0.081
0.751
PS
76.3
330

Anodized
0.029
0.269
PS
27.33
1295

Ringer pH = 7.58

Bare
0.039
0.358
PS
36.4
397

Anodized
0.0054
0.050
PS
5.08
3020

Ringer pH = 8.91

Bare
0.071
0.657
PS
66.75
305

Anodized
0.019
0.175
PS
17.78
1380

PS: perfect stable.

Though, in acid and alkaline Ringer solutions, both the bare and the anodized alloys have a little higher corrosion rates, their values are placed in the “Perfect Stable” resistance class, indicating a very good anticorrosive resistance. The best corrosion resistance for the processed alloy resulted in neutral Ringer solution, normal conditions from the human body.

3.4. Long-Term Behaviour of the Bare and Anodized Alloys in Ringer Solutions of Different pH Values

The long-term behaviour of the bare and anodized alloys was determined from the monitoring of the open circuit potentials, , and corresponding open circuit potential gradients, Δ, for 1500 soaking hours in Ringer solutions of acid (3.21), neutral (7.58), and alkaline (8.91) pH values (Figure 13).

Figure 13: Monitoring of the open circuit potentials for bare and anodized Ti-15Zr-5Nb alloy in Ringer solutions at 37°C.

The open circuit potentials for the anodized alloy shifted to more positive values in time, showing the increase of its protective nanolayer thickness [23]. had more electropositive values for the anodized alloy than those for the bare one, which reveal more protective nanolayers [15, 16, 23]. Also, these potentials reached almost constant values after about 700 h, demonstrating more resistant, stable state [23].

The open circuit potential gradients, Δ, have very low values (Table 4) that cannot generate galvanic corrosion. Many authors [44, 45] showed that only differences of 600–700 mV can initiate and maintain galvanic cells; therefore, both the bare and the anodized alloys cannot corrode by galvanic corrosion, even in the case of large differences in the biofluid pH values between 3.21 and 8.91 (Δ) that could appear on the alloy surface in its long-term “working life” as implant.

Table 4: Potential gradients for bare and anodized Ti-15Zr-5Nb alloys obtained in Ringer solutions at 37°C.

Ti-15Zr-5Nb
Time (h)
(mV)
(mV)
(mV)

Bare
24

+10
+108

500

+10
+81

1000

+8
+80

1500

+10
+80

Anodized
24

+20
+20

500

+10
+41

1000

+10
+80

1500

+10
+80

4. Conclusions

The new Ti-15Zr-5Nb alloy surface was nanostructured by galvanostatic anodization in 0.3 M H₃PO₄ solution. The obtained layer has a nanotube-like porosity, revealed by SEM, and it is formed of anatase-like small crystallites, with added phosphorus as phosphotitanate, determined by Raman spectroscopy, FT-IR, and EDX analyses; this composition can stimulate the formation of the bone and the porosity can offer a good scaffold for the bone cell attachment. Cyclic potentiodynamic curves make evident a nobler behaviour of the anodized alloy than that of the bare one, as a result of the existence of the nanostructured layer that improves the protective properties of the native passive film by its thickening. EIS spectra revealed a better capacitive behaviour, a more insulating protective film electrodeposited on the alloy surface; the nanostructured film is formed by two layers: an inner barrier layer that assures the alloy very good anticorrosive resistance and an outer porous layer that can provide the good conditions for the bone cell adhesion. Corrosion and ion release rates have lower values showing a better resistance to corrosion and implicitly a more reduced quantity of ions released in biofluid, namely, a lower toxicity of the anodized alloy. The open circuit potentials for the nanostructured alloy shifted to more positive values in time, indicating the increase of its protective layer thickness. The open circuit potential gradients have very low values that cannot generate galvanic corrosion.

Acknowledgments

This work was supported by Romanian UEFISCDI, Project no. IDEI 278/2010. Also, support of the EU (ERDF) and Romanian Government Infrastructure POS-CCE O 2.2.1 project INFRANANOCHEM no. 19/2009 is gratefully acknowledged.

References

P. K. Zysset, X. E. Guo, C. E. Hoffler, K. E. Moore, and S. A. Goldstein, “Mechanical properties of human trabecular bone lamellae quantified by nanoindentation,” Technology and Health Care, vol. 6, no. 5-6, pp. 429–432, 1998.

E. Eisenbarth, D. Velten, M. Müller, R. Thull, and J. Breme, “Biocompatibility of β-stabilizing elements of titanium alloys,” Biomaterials, vol. 25, no. 26, pp. 5705–5713, 2004.

P. Thomsen, C. Larsson, L. E. Ericson, L. Sennerby, J. Lausmaa, and B. Kasemo, “Structure of the interface between rabbit cortical bone and implants of gold, zirconium and titanium,” Journal of Materials Science: Materials in Medicine, vol. 8, no. 11, pp. 653–665, 1997.

S. Tanaka, H. Tobimatsu, Y. Maruyama, T. Tanaki, and G. Jerkiewicz, “Preparation and characterization of microporous layers on titanium,” ACS Applied Materials & Interfaces, vol. 1, no. 9, pp. 2312–2319, 2009.

A. Zeller, A. Musyanovych, M. Kappl et al., “Nanostructured coatings by adhesion of phosphonated polystyrene particles onto titanium surface for implant material applications,” ACS Applied Materials & Interfaces, vol. 2, no. 8, pp. 2421–2428, 2010.

A. Nakahira, T. Kubo, and C. Numako, “TiO₂-derived titanate nanotubes by hydrothermal process with acid treatments and their microstructural evaluation,” ACS Applied Materials & Interfaces, vol. 2, no. 9, pp. 2611–2616, 2010.

P. He, J. Tao, J. Xue, and Y. Chen, “Cytotoxicity property of nano-TiO₂ sol and nano-TiO₂ powder,” Journal of Nanomaterials, vol. 2011, Article ID 261605, 8 pages, 2011.

J. Park, S. Bauer, K. Von Der Mark, and P. Schmuki, “Nanosize and vitality: TiO₂ nanotube diameter directs cell fate,” Nano Letters, vol. 7, no. 6, pp. 1686–1691, 2007.

T. Dey, P. Roy, B. Fabry, and P. Schmuki, “Anodic mesoporous TiO₂ layer on Ti for enhanced formation of biomimetic hydroxyapatite,” Acta Biomaterialia, vol. 7, no. 4, pp. 1873–1879, 2011.

H. H. Park, I. S. Park, K. S. Kim et al., “Bioactive and electrochemical characterization of TiO₂ nanotubes on titanium via anodic oxidation,” Electrochimica Acta, vol. 55, no. 20, pp. 6109–6114, 2010.

Y. Shibata, D. Suzuki, S. Omori et al., “The characteristics of in vitro biological activity of titanium surfaces anodically oxidized in chloride solutions,” Biomaterials, vol. 31, no. 33, pp. 8546–8555, 2010.

F. M. B. Hassan, H. Nanjo, S. Venkatachalam, M. Kanakubo, and T. Ebina, “Effect of the solvent on growth of titania nanotubes prepared by anodization of Ti in HCl,” Electrochimica Acta, vol. 55, no. 9, pp. 3130–3137, 2010.

E. Peláez-Abellán, L. Rocha-Sousa, W. D. Müller, and A. C. Guastaldi, “Electrochemical stability of anodic titanium oxide films grown at potentials higher than 3 V in a simulated physiological solution,” Corrosion Science, vol. 49, no. 3, pp. 1645–1655, 2007.

J. C. Mirza Rosca, M. V. Popa, E. Vasilescu, P. Drob, C. Vasilescu, and S. I. Drob, “Effects of electrochemical and thermal oxidation on the behaviour of some biomaterials in simulated body fluids,” Revue Roumaine de Chimie, vol. 55, no. 10, pp. 639–646, 2010.

R. Narayanan and S. K. Seshadri, “Phosphoric acid anodization of Ti-6Al-4V—structural and corrosion aspects,” Corrosion Science, vol. 49, no. 2, pp. 542–558, 2007.

S. K. Poznyak, A. D. Lisenkov, M. G. S. Ferreira, A. I. Kulak, and M. L. Zheludkevich, “Impedance behaviour of anodic TiO₂ films prepared by galvanostatic anodisation and powerful pulsed discharge in electrolyte,” Electrochimica Acta, vol. 76, pp. 453–461, 2012.

Z. Li, C. Ning, D. Ding, H. Liu, and L. Huang, “Biological properties of Ti-Nb-Zr-O nanostructures grown on Ti35Nb5Zr alloy,” Journal of Nanomaterials, vol. 2012, Article ID 834042, 7 pages, 2012.

T. Hanawa, “In vivo metallic biomaterials and surface modification,” Materials Science and Engineering A, vol. 267, no. 2, pp. 260–266, 1999.

Z. Cai, H. Nakajima, M. Woldu, A. Berglund, M. Bergman, and T. Okabe, “In vitro corrosion resistance of titanium made using different fabrication methods,” Biomaterials, vol. 20, no. 2, pp. 183–190, 1999.

R. Van Noort, “Titanium: the implant material of today,” Journal of Materials Science, vol. 22, no. 11, pp. 3801–3811, 1987.

E. Vasilescu, P. Drob, D. Raducanu et al., “Effect of thermo-mechanical processing on the corrosion resistance of Ti6Al4V alloys in biofluids,” Corrosion Science, vol. 51, no. 12, pp. 2885–2896, 2009.

E. Vasilescu, P. Drob, D. Raducanu et al., “In vitro biocompatibility and corrosion resistance of a new implant titanium base alloy,” Journal of Materials Science: Materials in Medicine, vol. 21, no. 6, pp. 1959–1968, 2010.

D. J. Blackwood, A. W. C. Chua, K. H. W. Seah, R. Thampuran, and S. H. Teoh, “Corrosion behaviour of porous titanium-graphite composites designed for surgical implants,” Corrosion Science, vol. 42, no. 3, pp. 481–503, 2000.

M. V. Popa, I. Demetrescu, E. Vasilescu et al., “Corrosion susceptibility of implant materials Ti-5Al-4V and Ti-6Al-4Fe in artificial extra-cellular fluids,” Electrochimica Acta, vol. 49, no. 13, pp. 2113–2121, 2004.

V. D. Cojocaru, D. Raducanu, I. Cinca et al., “Improvement of the corrosion resistance and structural and mechanical properties of a titanium base alloy by thermo-mechanical processing,” Materials and Corrosion, 2012.

M. V. Popa, I. Demetrescu, S. H. Suh et al., “Monitoring of titanium base alloys-biofluids interface,” Bioelectrochemistry, vol. 71, no. 2, pp. 126–134, 2007.

V. G. Pol, S. H. Kang, J. M. Calderon-Moreno, C. S. Johnson, and M. M. Thackeray, “Autogenic reactions for preparing carbon-encapsulated, nanoparticulate TiO₂ electrodes for lithium-ion batteries,” Journal of Power Sources, vol. 195, no. 15, pp. 5039–5043, 2010.

H. C. Choi, Y. M. Jung, and S. B. Kim, “Size effects in the Raman spectra of TiO₂ nanoparticles,” Vibrational Spectroscopy, vol. 37, no. 1, pp. 33–38, 2005.

M. V. Popa, J. M. C. Moreno, M. Popa et al., “Electrochemical deposition of bioactive coatings on Ti and Ti-6Al-4V surfaces,” Surface and Coatings Technology, vol. 205, no. 20, pp. 4776–4783, 2011.

M. Popa, E. Vasilescu, P. Drob et al., “Biomimetic deposition of nanocrystalline hydroxyapatite coatings on non-allergic Ti-20Nb-10Zr-5Ta and stability of the coated alloy in body fluids,” Journal of American Ceramic Society, vol. 95, no. 12, pp. 3807–3814, 2012.

P. N. de Aza, F. Guitian, C. Santos, S. de Aza, R. Cusco, and L. Artus, “Vibrational properties of calcium phosphate compounds. 2. Comparison between hydroxyapatite and β-tricalcium phosphate,” Chemistry of Materials, vol. 9, no. 4, pp. 916–922, 1997.

Y. Zhao, G. Zhu, X. Jiao, W. Liu, and W. Pang, “Template synthesis and characterization of a new 2-D layered titanium phosphate,” Journal of Materials Chemistry, vol. 10, no. 2, pp. 463–467, 2000.

T. Masui, H. Hirai, N. Imanaka, and G. Y. Adachi, “New sunscreen materials based on amorphous cerium and titanium phosphate,” Journal of Alloys and Compounds, vol. 408–412, pp. 1141–1144, 2006.

H. J. De Jager and L. C. Prinsloo, “The dehydration of phosphates monitored by DSC/TGA and in situ Raman spectroscopy,” Thermochimica Acta, vol. 376, no. 2, pp. 187–196, 2001.

M. P. Neupane, Y. K. Kim, I. S. Park, S. J. Lee, M. H. Lee, and T. S. Bae, “Effect of electrolyte pH on the structure and in vitro osteoblasts response to anodic titanium oxide,” Metals and Materials International, vol. 14, no. 5, pp. 607–613, 2008.

S. L. Assis, S. Wolynec, and I. Costa, “The electrochemical behaviour of Ti-13Nb-13Zr alloy in various solutions,” Materials and Corrosion, vol. 59, no. 9, pp. 739–743, 2008.

A. Robin, O. A. S. Carvalho, S. G. Schneider, and S. Schneider, “Corrosion behavior of Ti-xNb-13Zr alloys in Ringer's solution,” Materials and Corrosion, vol. 59, no. 12, pp. 929–933, 2008.

R. Z. Legeros, S. Lin, R. Rohanizadeh, D. Mijares, and J. P. Legeros, “Biphasic calcium phosphate bioceramics: preparation, properties and applications,” Journal of Materials Science: Materials in Medicine, vol. 14, no. 3, pp. 201–209, 2003.

Y.-H. Jeong, H.-C. Choe, and W. A. Brantley, “Electrochemical and surface behavior of hydroxyapatite/Ti film on nanotubular Ti-35Nb-xZr alloys,” Applied Surface Science, vol. 258, no. 6, pp. 2129–2136, 2012.

M. T. Woldemedhin, D. Raabe, and A. W. Hassel, “Characterization of thin anodic oxides of Ti-Nb alloys by electrochemical impedance spectroscopy,” Electrochimica Acta, vol. 82, pp. 324–332, 2012.

I. Milošev, T. Kosec, and H. H. Strehblow, “XPS and EIS study of the passive film formed on orthopaedic Ti-6Al-7Nb alloy in Hank's physiological solution,” Electrochimica Acta, vol. 53, no. 9, pp. 3547–3558, 2008.

V. A. Alves, R. Q. Reis, I. C. B. Santos et al., “In situ impedance spectroscopy study of the electrochemical corrosion of Ti and Ti-6Al-4V in simulated body fluid at 25°C and 37°C,” Corrosion Science, vol. 51, no. 10, pp. 2473–2482, 2009.

S. Tamilselvi and N. Rajendran, “In vitro corrosion behaviour of Ti-5Al-2Nb-1Ta alloy in Hanks solution,” Materials and Corrosion, vol. 58, no. 4, pp. 285–289, 2007.

E. Blasco-Tamarit, A. Igual-Muñoz, J. G. Antón, and D. M. García-García, “Galvanic corrosion of titanium coupled to welded titanium in LiBr solutions at different temperatures,” Corrosion Science, vol. 51, no. 5, pp. 1095–1102, 2009.

G. Sheela, M. Ramasamy, C. R. K. Rao, and M. Pushpavanam, “Electrochemical assessment on corrosion behaviour of electrochemically joined dissimilar metal joints,” Bulletin of Electrochemistry, vol. 17, no. 8, pp. 347–350, 2001.