Journal of Nanomaterials
Volume 2015 (2015), Article ID 127498, 9 pages
http://dx.doi.org/10.1155/2015/127498

Research Article

Synthesis, Characteristics, and Material Properties Dataset of Bi:DyIG-Oxide Garnet-Type Nanocomposites

M. Nur-E-Alam, Mikhail Vasiliev, and Kamal Alameh

Electron Science Research Institute, Edith Cowan University, 270 Joondalup Drive, Joondalup, WA 6027, Australia

Received 10 April 2015; Accepted 14 May 2015

Academic Editor: Enrico Bergamaschi

Copyright © 2015 M. Nur-E-Alam et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The fabrication, annealing crystallization processes, and material properties of (Bi,Dy)₃(Fe,Ga)₅O₁₂:Bi₂O₃ nanocomposites are investigated and summarized. The stoichiometry of these nanocomposites is optimized for magnetooptic applications using the approach of stoichiometry adjustment (implemented by means of varying RF power densities applied to the sputtering targets used to prepare the nanocomposite thin films). The crystallization processes for all developed batches of as-deposited films are carried out by annealing runs at different temperatures and process durations. This paper describes the methodologies used to optimize the compositions (by calculating the volumetric fractions of excess bismuth oxide to be mixed with the garnet-stoichiometry species during cosputtering processes) and to obtain the optical and magnetooptical properties data and presents the materials properties summary of garnet-bismuth oxide thin film composites as well.

1. Introduction

The development of new photonic materials (including Bi-substituted iron garnet compounds) is required to keep up with the technological demands and challenges of today’s world, especially because most innovative technologies require more advanced, high-performance, stable, functional, and specialized low-cost materials. Bismuth-substituted iron garnets are used as magnetooptic (MO) functional materials for various emerging and existing applications in integrated optics and photonics. However, these are still limited to using bulk garnet layers. Most of the high-speed optical communication systems work in the near-infrared spectral region, where MO garnet materials can perform particularly well. Visible-range devices such as magnetooptic imagers and magnetic field sensing devices often employ Bi-substituted iron garnets due to their extraordinary MO properties. These materials are also very promising for the development of magnetic photonic crystals, magnetoplasmonic crystals, and the production of nanostructured magnetic field landscapes for cold atom manipulation, MO waveguides, and ultrafast optoelectronic devices, such as light intensity switches and modulators for optical communications [1–8]. These substances have been studied since the 1960s, and multiple groups worldwide have been working on customizing the various garnet materials properties by synthesizing garnet films and nanocrystals of different nominal compositions [1, 2, 9–19]. The authors of this paper have previously reported on the synthesis and characterization of Bi-substituted iron garnets of composition type (Bi,Dy)₃(Fe,Ga)₅O₁₂ and also on their improved MO quality factors. The latter has been achieved by fabricating garnet-Bi₂O₃ nanocomposites having a combination of remarkable physical properties, which showed great promise for applications in next-generation integrated optics, nanophotonics, and also in reconfigurable photonics [2]. These new garnet-type materials developed by synthesizing garnet-oxide nanocomposites are relatively easy to integrate into the existing integrated optics manufacturing processes and can assist in achieving cost-efficiency by providing the functional materials, which are technologically compatible with the presently used material combinations. The latter is due to (i) the very good compatibility of sputtering processes with many other microfabrication technologies and (ii) the relatively moderate process temperature needed for the synthesis of these garnet-oxide materials. These new garnet materials will have influence on numerous industries in the future, because most of the innovative technologies requiring these advanced materials will be easy to implement and less costly. The dataset generated in this paper is based on our materials research and development activities conducted during the past couple of years in the area of garnet thin films synthesis.

In particular, this paper reports on the summary of materials’ composition optimization, process parameter-related data including the data describing the sputtering and annealing processes, characteristic material-related properties, and also the annealing effects on their optical and MO performance. The characteristic data obtained for several optimized garnet-oxide composites represent the outcomes of our experimental efforts and provide a set of information resources for the production of thin film garnets of high optical quality and impressive MO performance that will likely be required for many advanced integrated optics and photonics applications.

2. Methodologies

2.1. Sample Preparation

Bismuth-substituted (Dy,Ga) doped iron garnet-bismuth oxide composite films (multiple deposition batches) were prepared on glass (Corning 1737) and monocrystalline gadolinium gallium garnet (GGG) substrates using an RF magnetron cosputtering technique in low-pressure (1-2 mTorr) pure-argon plasma with no extra oxygen input. The process parameters and conditions used to deposit (nonreactively) the garnet-oxide composites from two separate targets (oxide-mix-based (BiDy)₃(FeGa)₅O₁₂ and Bi₂O₃) are summarized in Table 1. Before depositing any composite garnet layers, the presputtering processes for both garnet and bismuth oxide targets were performed at least for 10–30 minutes to bring them into stable sputtering conditions and also to measure the partial deposition rates of materials. The deposition rates were monitored and measured during all presputtering processes by using a well-calibrated quartz crystal microbalance sensor.

Table 1: RF magnetron cosputtering process parameters and conditions used to fabricate various magnetooptic garnet-oxide thin films of type (Bi₂Dy₁Fe₄Ga₁O₁₂:Bi₂O₃).

Process parameters used for thin film garnets preparation
Values & comments

Sputtering target compositions
Bi₂Dy₁O₁₂ (where and 0.7) and Bi₂O3 (the materials’ purity was 99.99% for all targets)

Dimensions of targets
3′′ dia. × 0.125′′ thick, bonded to 0.125′′ Cu backing plates

Sputter gas and pressure
Argon (Ar.), (total) = 1-2 mTorr

Base pressure inside vacuum chamber
(base) < 1–4  Torr

RF power densities for garnets
3.3–7 W/cm² (150–320 W)

RF power densities for Bi₂O₃
0.44–3.96 W/cm² (20–180 W)

Substrate temperature
250–400°C

Partial deposition rates for garnets
3.5–9.0 nm/min

Partial deposition rates for Bi₂O₃
1.2–5.0 nm/min

Annealing temperature
490–680°C

Annealing process duration
(<1)–180 minutes, with the ramp-up/ramp-down rates of 3–5°C/min when using a conventional box-furnace-type temperature-controlled air-atmosphere oven-annealing system (Sentro Tech, Inc., USA)

Properties characterized
Optical, magnetic, and MO properties of all nanocomposite films

Characterization techniques used
Spectrophotometry, custom thin film optimization software, Thorlabs PAX visible-range polarimetry system in conjunction with a custom-made calibrated electromagnet, and transmission-mode polarization microscopy (Leitz Orthoplan).

The deposition rates of both component materials (garnet and Bi₂O₃) were controlled by varying the RF power densities applied by RF power generators through automatic impedance-matching networks to the sputtering targets. This composition-control methodology enabled obtaining the optimized sample compositions by using the material design considerations, as well as trial and error. The estimated amounts of the volumetric fraction of excess bismuth oxide (since some Bi₂O₃ was already present within garnet targets) were calculated by using the partial deposition rates from both targets observed during the presputtering processes. The basic formula that was used to calculate the vol.% fraction of excess bismuth oxide in our composite-type layers (in as-deposited samples, before any phase changes took place during annealing) is shown in the following [20]:

The samples composition adjustments trialed (the amounts of excess bismuth oxide added into the composite layers) as well as their best-obtained performance (specific Faraday rotation and MO figures of merit measured across the visible spectral range) from all batches of composites are summarized in Tables 2 and 3. The growth rate of composite garnet-oxide layers and the layer thicknesses were monitored during the deposition processes using a quartz crystal microbalance sensor and a custom-made in situ real-time laser reflectometry system (designed and made at Edith Cowan University) integrated with the sputtering system (KVS-T 4065, Korea Vacuum Technology Ltd.). The actual films’ growth rate always slightly varied from that observed and measured during the presputtering process. This might have been due to the slow temperature increases at the sputtering target surfaces expected to occur during the relatively long sputtering deposition processes. The actual layer thicknesses were reconfirmed by fitting of their optical transmission spectra obtained using a spectrophotometer to their modeled transmission spectra using an in-house built specialized software package (based on NET Framework’s Managed C++) which allows us to perform the modeling and measured-data comparison of the transmission, reflection, and absorption spectra of thin film materials (single-layer or multilayer type) as well as design optimized magnetic photonic crystals (MPC) structures [20]. All batches of composite (as-deposited) layers containing up to nearly 50 vol.% of excess Bi₂O₃ sputtered onto GGG (111) and glass (Corning 1737) (typical layer thickness was 500–1100 nm) were annealed using a conventional oven-annealing system. Samples from each batch were subjected to several trials of annealing processes using different temperatures and time duration to find the optimized annealing regimes for the particular batch of samples. The optimization of annealing regimes was extremely important for the garnet films to achieve the desired physical properties (optical and magnetic). It was also found that the optimized annealing regimes for the composite garnet-oxide layers were significantly dependent on the films’ composition. We were able to optimize the annealing regimes (in terms of the process temperature and time duration) for each batch of newly synthesized materials. Furthermore, it was found that the “thermal processing windows” most suitable for crystallizing the garnet-oxide composites, as was confirmed by the excellent combinations of the films’ properties demonstrated in most batches. The estimated absolute accuracy of temperature measurement was about ±10°C which did not affect significantly the repeatability of the properties seen in the annealed garnet-oxide films of different compositions, even in films having very large volumetric contents of excess bismuth oxide.

Table 2: Summary of the composition adjustments used to fabricate several batches of Bi₂Dy₁Fe₄Ga₁O₁₂:Bi₂O₃ garnet-oxide composite films on GGG and glass (Corning 1737) substrates and the best performance characteristics obtained in films from each batch in terms of the specific Faraday rotation and MO figure of merit measured across the visible spectral region.

Samples description and composition-adjustment data
Best performance achieved in samples prepared on GGG substrates
Best performance achieved in samples prepared on glass (Corning 1737) substrates

Composition type
Deposition rate of garnet (nm/min)
Deposition rate of Bi₂O₃ (nm/min)
Total (garnet + oxide) deposition rate (nm/min)
Vol. % of Bi₂O₃ in composite films
Faraday rotation per film thickness (deg/µm)
MO figure of merit (/α) (deg)
Faraday rotation per film thickness (deg/µm)
MO figure of merit (/α) (deg)

532 nm
635 nm
532 nm
635 nm
532 nm
635 nm
532 nm
635 nm

300 W Bi₂Dy₁Fe₄Ga₁O₁₂
8.33
—
8.33
—
7.4
1.99
14.5
24.2
NC

150 W Bi₂Dy₁Fe₄Ga₁O₁₂ + 150 W Bi₂O₃
3.77
3.66
7.37
48.85
4.05
1.25
12.14
19.46
NC

300 W Bi₂Dy₁Fe₄Ga₁O₁₂ + 60 W Bi₂O₃
8.33
1.7
10.03
16.95
4.36
1.35
10.7
22.17
3.81
1.25
6.37
12.52

300 W Bi₂Dy₁Fe₄Ga₁O₁₂ + 90 W Bi₂O₃
8.33
2.53
10.86
23.33
9.8
2.6
25.7
42.5
9.36
2.37
29.52
39.34

300 W Bi₂Dy₁Fe₄Ga₁O₁₂ + 120 W Bi₂O₃
8.33
3.2
11.53
27.75
8.31
2.26
13.34
9.44
8.22
2.05
21.75
29.38

300 W Bi₂Dy₁Fe₄Ga₁O₁₂ + 180 W Bi₂O₃
8.33
4.11
12.44
33.04
1.17
0.23
1.87
1.28
NC

Not characterized.

Table 3: Summary of the composition adjustments used to fabricate several batches of Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ garnet-oxide composite films on GGG and glass (Corning 1737) substrates and the best performance obtained in the films of each batch in terms of the specific Faraday rotation and MO figure of merit measured across the visible spectral region.

Samples description and composition-adjustment data
Best performance achieved in samples prepared on GGG substrates
Best performance achieved in samples prepared on glass (Corning 1737) substrates

Composition type
Deposition rate of garnet (nm/min)
Deposition rate of Bi₂O₃ (nm/min)

Total (garnet + oxide) deposition rate (nm/min)
Vol. % of Bi₂O₃ in composite films
Faraday rotation per film thickness (deg/µm)
MO figure of merit (/α) (deg)
Faraday rotation per film thickness (deg/µm)
MO figure of merit (/α) (deg)

532 nm
635 nm
532 nm
635 nm
532 nm
635 nm
532 nm
635 nm

200 W Bi₂Dy₁Fe4.3Ga0.7O₁₂
5.33
—
5.33
—
4
1.1
7.9
11.4
NC

175 W Bi₂Dy₁Fe4.3Ga0.7O₁₂ + 25 W Bi₂O₃
4.77
1.65
6.12
26.96
9.5
2
19.5
10.2
NC

200 W Bi₂Dy₁Fe4.3Ga0.7O₁₂ + 25 W Bi₂O₃
5.33
1.65
6.98
23.64
10.12
0.85
29.2
22.1
7.88
2.0
15.5
12.05

250 W Bi₂Dy₁Fe4.3Ga0.7O₁₂ + 25 W Bi₂O₃
7.03
1.65
7.65
19
8.2
2.05
11.3
6.22
NC

300 W Bi₂Dy₁Fe4.3Ga0.7O₁₂ + 25 W Bi₂O₃
8.16
1.65
9.81
16.82
7
2.1
13.3
9.98
6.3
1.9
15.0
27.82

320 W Bi₂Dy₁Fe4.3Ga0.7O₁₂ + 20 W Bi₂O₃
8.96
1.2
10.16
11.81
2.4
1.1
8.9
12.4
4.47
1.2
10.5
19.41

Not characterized.

2.2. Sample Characterizations and Materials’ Performance Data Evaluation

The optical and MO properties of garnet materials are essentially important for the development of various multifunctional device applications in integrated optics devices and advanced photonics. The optical transmission spectra of MO garnet-oxide composite films were measured using an UV/Visible (Beckman Coulter DU640B) spectrophotometer and we determined the optical absorption spectra (a very important spectrally dependent dataset for all applications of thin film materials) using software-assisted rigorous point-by-point fitting of the measured transmission spectra. The real thicknesses of all garnet layers were also determined for each sample by using the iterative fitting of their measured transmission spectra to the theory-predicted spectra whilst accounting for the accurately measured spectral data for the dispersion of the refractive index and absorption coefficients, as reported by our group [21]. Significantly lower than typical literature-reported optical absorption coefficients were achieved in our RF-sputtered garnets and nanocomposites. A comparative study of optimized absorption coefficient spectra obtained after running various annealing processes for a range of garnet-oxide composites synthesized on two different substrate types (GGG and Corning 1737 glass) was presented in [2]. The MO quality (MO figure of merit) is defined as doubled ratio of the specific Faraday rotation to the optical absorption coefficient, and this quantity needs to be characterized spectrally by performing measurements at each particular wavelength. Specific Faraday rotations (and also magnetic hysteresis loop measurements) were performed for all of our annealed samples using a Thorlabs Inc. PAX optical polarimeter system in conjunction with a custom-made well-calibrated electromagnet system and two specific plane-polarized laser light sources (emitting at 532 nm and 635 nm). The following calculations were performed to obtain data for the specific Faraday rotation as well as for the MO figure merit of our annealed composite films:

where is optical absorption coefficient.

The MO figures of merit for all (annealed) samples were calculated taking into account the measurement errors in the films’ thickness (within estimated ± 5% accuracy) as well as in Faraday rotation angles. The estimated error bars for the MO figure of merit were calculated by considering the achievable maximum and also minimum error-affected -factors for each sample, using the upper and lower error limits relevant to the measurements of the films’ thickness as well as Faraday rotation angles. The record-high MO figures of merit (plotted with the error bars shown) obtained in our composite films were reported in [2]. Annealing crystallization studies (using either oven-annealing or rapid thermal annealing processes) of thin films are an important part of modern research in the field of garnet materials. The transformation of amorphous-phase garnets into the micro- or nanocrystalline phase requires careful process development and operator attention and can lead to obtaining samples which are either “underannealed” (showing small or even absent Faraday rotation) or “overannealed” (showing surface damage or material decomposition even with Faraday rotation). One batch of composite-type films of stoichiometry described by approximately 17 vol.% of added extra bismuth oxide was chosen to study the annealing process-dependent evolution of the obtained film properties. This study was conducted by performing the annealing runs for this batch of composite films at three different crystallization temperatures (550°C, 560°C, and 570°C) using a range of annealing process durations (up to 120 minutes). All annealed samples grown on GGG and glass substrates were characterized comprehensively and their recorded performance is summarized in Tables 4 and 5. (The crystal-structure properties of our garnet-oxide composites were characterized using X-ray diffractometry, and the magnetic domain patterns were observed in a range of materials using a transmission-mode polarization microscope. This data was published in other high-impact journals [2, 22].)

Table 4: Dataset obtained from the annealing study of Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ garnet-oxide composite films (having 17 vol.% of excess bismuth oxide) prepared on GGG substrates and the corresponding optical/MO properties measured at 532 nm and 635 nm.

Annealing temperature (°C)
Annealing process duration (min)
Properties measured at 532 nm
Properties measured at 635 nm

Specific Faraday rotation (deg/µm)
Absorption coefficients (cm⁻¹)
MO figure of merit (deg)
Specific Faraday rotation (deg/µm)
Absorption coefficients (cm⁻¹)
MO figure of merit (deg)

550
<1
NA
NC
NC
NC
NC
NC

15
NA
NC
NC
NC
NC
NC

22
0.63
9040
1.39
0.033
1458
0.50

27
7.2
5997
24
2.062
1130
36.49

30
4.23
8331
10.15
0.986
1473
13.38

45
5.65
6736
16.77
1.733
1484
23.35

60
6.71
8563
15.67
1.828
2769
13.20

90
6.35
7732
16.42
1.63
2153
15.14

560
4
NA
NC
NC
NC
NC
NC

7
3.60
8201
8.78
NC
NC
NC

12
7.04
6950
20.25
2.019
1700
23.75

15
6.9
6332
21.8
2.138
1382
30.94

22
7.07
6145
23.01
2.062
1365
30.21

26
6.51
8201
15.87
1.8
2572
13.99

30
6.38
7720
16.52
1.81
2162
16.74

45
7.31
6477
22.57
1.938
1449
26.75

52
7.07
8125
17.40
2.004
3337
12.01

60
6.45
9361
13.78
1.828
2347
15.57

90
6.97
7232
19.27
NC
NC
NC

570
1
2.9
8857
6.53
0.381
1867
4.08

2
7.03
5950
23.63
1.88
1097
34.27

4
7.02
6332
22.17
2.128
1021
41.60

6
7.1
9315
15.25
2.119
2922
14.50

8
7.56
10353
14.60
2.168
3519
12.32

9
6.98
8956
15.58
1.95
3213
12.13

12
7.5
11428
13.12
2.076
4131
10.05

Not annealed or Faraday rotation was below detection limit. NC: not characterized.

Table 5: Dataset obtained from the annealing study of Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ garnet-oxide composite films (having 17 vol.% of excess bismuth oxide) prepared on glass (Corning 1737) substrates and the corresponding optical/MO properties measured at 532 nm and 635 nm.

Annealing temperature (°C)
Annealing process duration (min)
Properties measured at 532 nm
Properties measured at 635 nm

Specific Faraday rotation (deg/µm)
Absorption coefficients (cm⁻¹)
MO figure of merit (deg)
Specific Faraday rotation (deg/µm)
Absorption coefficients (cm⁻¹)
MO figure of merit (deg)

550
<1
NA
NC
NC
NC
NC
NC

13
NA
NC
NC
NC
NC
NC

15
5.85
7564
15.46
NC
NC
NC

22
6.42
7221
17.78
2.024
1765
24.08

27
6.52
6671
19.54
2.41
1588
28.90

30
6.85
7072
19.37
2.35
1830
24.46

45
7.04
7495
18.78
2.395
2091
21.82

60
6.82
7495
18.19
2.343
1867
23.90

90
6.47
7228
17.90
2.31
1828
24.07

560
4
NA
NC
NC
NC
NC
NC

7
6.28
8209
15.30
NC
NC
NC

12
6.54
7942
16.46
2.34
2026
23.09

15
6.74
8163
16.51
2.071
2082
19.89

22
6.57
7911
16.60
2.195
1857
23.64

26
6.74
7682
17.55
2.08
1943
21.41

30
7.2
6568
21.93
2.247
1941
23.15

45
6.76
7858
17.20
2.73
2103
25.96

52
6.67
7949
16.78
2.185
2151
20.32

60
7.1
6027
23.56
2.219
1821
24.37

570
1
6.54
7873
16.61
2.07
2145
19.30

2
6.21
8167
15.20
2.257
2119
21.30

4
6.65
8068
16.48
2.23
2214
20.15

8
7
6881
20.35
2.267
1903
23.83

12
6.96
8064
17.26
2.295
2532
18.13

Not annealed or Faraday rotation was below detection limit. NC: not characterized.

The evaluation of optical and magnetooptical properties can only be partially helpful to understand the crystallization kinetics relevant to these garnet-type thin film materials if the extent of crystallization is quantified (in a simplified way) as the ratio of the specific Faraday rotation measured in films after running any given annealing process, to the maximum specific Faraday rotation at the same wavelength achieved in any given material/substrate system after running the process at the same annealing temperature with the “best-known” parameters. All specific Faraday rotation data obtained from the samples deposited onto GGG substrates were measured in the remnant magnetization states, in order to exclude the paramagnetic effects of 0.5 mm thick GGG substrates, which led to measuring slightly increased Faraday rotation angles when placed in the electromagnet’s saturation field of up to 2.5 kOe. For samples deposited onto Corning 1737 glass substrates, Faraday rotation data was taken at the saturation magnetization, even though all films maintained about 90% of Faraday rotation after being removed from the electromagnet. The data obtained may not be sufficient to derive accurately the activation energy of crystallization for Bi-substituted iron garnets and garnet-type nanocomposites; however these data reveal the general character and thermal dynamics of the annealing-induced isothermal-crystallization processes in these materials. A significant amount of characterization work was performed during this study, and the authors believe that it can provide a good source of data for further research efforts on the development of new garnet materials.

3. Discussion

Several batches of garnet-oxide composite-type thin films deposited onto both GGG and glass substrates were characterized and evaluated comprehensively. The results obtained describe a very promising class of garnet thin films of composition type (BiDy)₃(FeGa)₅O₁₂.

Good crystallinity properties, surface quality, and attractive magnetic and MO performance characteristics were observed in most sample batches. The data (presented in Tables 1–5) describe the methodology, parameters, and conditions relevant to the synthesis of performance-optimized garnet-oxide composite-type thin film materials and the ways of obtaining materials with specific properties. Figure 1 shows a glimpse into the obtained superior microstructural, magnetic, and magnetooptical properties in optimally annealed composite-type garnet films; (a) shows the XRD datasets of garnet-oxide layers of composition type (BiDy)₃(FeGa)₅O₁₂:Bi₂O₃ prepared on Corning 1737 glass substrates. The strong peaks for (221), (220), (321), (400), (420), (422), (521), (444), (640), (642), (800), and (842) reflections planes originated at the 2 (°) values 17.25, 19.95, 26.55, 28.35, 31.8, 34.95, 39.25, 50.35, 52.55, 54.65, 58.75, and 68.45, respectively, confirmed their good crystalline quality and also the presence of garnet phase with body-centered cubic lattice type. The diffraction peak found at 44.5° has revealed the XRD signature of Fe₃O₄ according to a search of JCPDS catalogue (JCPDS powder diffraction file number 28-0491) [23] which confirmed the hypothesis having larger visible-range optical absorption of sputtered garnet films [2]. The lattice parameter of crystallized Bi₂Dy₁Fe₄Ga₁O₁₂:Bi₂O₃ (23 vol.%) grown on GGG (111) substrate was calculated using the formula derived from the combination of Bragg’s equation and d-spacing expression and the calculated (averaged) lattice constant was found about 12.579 Å [22, 24]. The predicted stoichiometry for the garnet-oxide composite layer was Bi2.4Dy0.6Fe₄Ga₁O₁₂, and this was confirmed by EDX microanalysis results [20, 22]; (b) the measured nearly square hysteresis loop of Faraday rotation with high coercivity in Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ composite film (having an estimated 24 vol.% of excess Bi₂O₃) grown on a Corning 1737 glass substrate, showing different dynamics of the magnetization switching process in comparison with other films from the same batch sputtered onto GGG (111) substrates, revealed significant microstructural differences in layers grown onto different substrates type; and (c) shows the data on the time and temperature-dependent evolution of the measured MO figure of merits obtained in Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ (17 ± 2 vol.%) films prepared on glass substrates. The data point distributions within data clusters shown within the circles followed the expected trends of MO quality factors for this material type at each of the optimized annealing temperatures.

(a)

(b)

(c)

Figure 1: (a) XRD datasets of garnet-oxide layers of composition type (BiDy)₃(FeGa)₅O₁₂:Bi₂O₃ deposited onto Corning 1737 glass substrates, (b) hysteresis loop of specific Faraday rotation measured in Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ composite-type film (having estimated 24 vol.% of excess Bi₂O₃) grown on a Corning 1737 glass substrate, and (c) the evolution of measured MO figure of merit obtained in Bi₂Dy₁Fe4.3Ga0.7O₁₂:Bi₂O₃ (17 ± 2 vol.%) films prepared on glass substrates.

4. Conclusion

We have prepared and characterized a large number of garnet-oxide composite-type thin films grown on both GGG and glass substrates during a study conducted in the area of magnetooptic functional materials reported previously in a string of our publications. The properties dataset of garnet-oxide composite materials presented as well as the data related to the evolution of the optical and magnetooptical properties of particular batches of composite films occurring during annealing processes can be used as a guide for designing a range of optimized garnet-type thin film materials. This paper will be a useful reference for researchers working to produce functional magnetooptic garnet materials with application-specific material composition and properties suitable for a range of applications in integrated optics and photonics.

Conflict of Interests

The authors declare no conflict of interests.

Acknowledgment

The authors would like to acknowledge the extensive support for this work provided by the Electron Science Research Institute (ESRI), the Faculty of Health, Engineering and Science (FHES), Edith Cowan University (ECU), WA, Australia.

References

A. K. Zvezdin and V. A. Kotov, Modern Magnetooptics and Magnetooptical Materials, Institute of Physics Publishing, Bristol, UK, 1997.

M. Vasiliev, M. Nur-E-Alam, V. A. Kotov et al., “RF magnetron sputtered (BiDy)3(FeGa)5O12:Bi2O3 composite garnet-oxide materials possessing record magneto-optic quality in the visible spectral region,” Optics Express, vol. 17, no. 22, pp. 19519–19535, 2009.

S. Kahl, A. M. Grishin, S. I. Kharstev, K. Kawano, and J. S. Abell, “Bi₃Fe₅O₁₂ thin film visulaizer,” IEEE Transactions on Magnetics, vol. 3, no. 1, pp. 292–311, 2001.

Y. Sun, H. Yu, H. Liu, Y. Zhou, and Z. Xia, “Study on Pr-substituted bismuth-iron garnet crystallite and its magnetism,” Advanced Materials Research, vol. 415–417, pp. 495–498, 2012.

V. I. Belotelov, L. E. Kreilkamp, I. A. Akimov et al., “Plasmon-mediated magneto-optical transparency,” Nature Communications, vol. 4, article 2128, 2013.

V. Berzhansky, A. N. Shaposhnikov, A. V. Karavainikov et al., “The effect of Faraday rotation enhancement in nanolayered structures of Bi—substituted iron garnets,” Solid State Phenomena, vol. 200, pp. 233–238, 2013.

W. R. Eppler, B. K. Cheong, D. E. Laughlin, and M. H. Kryder, “Physical and magnetic microstructure of rapid thermally annealed thin film bismuth-doped garnets,” Journal of Applied Physics, vol. 75, no. 10, pp. 7093–7095, 1994.

A. Abdelrahman, M. Vasiliev, K. Alameh, and P. Hannaford, “Asymmetrical two-dimensional magnetic lattices for ultracold atoms,” Physical Review A, vol. 82, no. 1, Article ID 012320, 2010.

C. F. Buhrer, “Faraday rotation and dichroism of bismuth calcium vanadium iron garnet,” Journal of Applied Physics, vol. 40, no. 11, pp. 4500–4502, 1969.

G. B. Scott and D. E. Lacklison, “Magnetooptic properties and applications of bismuth substituted iron garnets,” IEEE Transactions on Magnetics, vol. 12, no. 4, pp. 292–311, 1976.

P. Hansen and J.-P. Krumme, “Magnetic and magneto-optical properties of garnet films,” Thin Solid Films, vol. 114, no. 1-2, pp. 69–107, 1984.

J.-P. Krumme, V. Doormann, and P. Willich, “Bismuth iron garnet films prepared by rf magnetron sputtering,” Journal of Applied Physics, vol. 57, no. 8, pp. 3885–3887, 1985.

M. Gomi, T. Tanida, and M. Abe, “RF sputtering of highly Bi-substituted garnet films on glass substrates for magneto-optic memory,” Journal of Applied Physics, vol. 57, no. 8, pp. 3888–3890, 1985.

T. Okuda, N. Koshizuka, K. Hayashi, T. Takahashi, H. Kotani, and H. Yamamoto, “Epitaxial growth of Bi-substituted yttrium iron garnet films by ion beam sputtering,” Journal of the Magnetics Society of Japan, vol. 11, pp. 179–182, 1987.

N. Adachi, V. P. Denysenkov, S. I. Khartsev, A. M. Grishin, and T. Okuda, “Epitaxial Bi₃Fe₅O₁₂ (001) films grown by pulsed laser deposition and reactive ion beam sputtering techniques,” Journal of Applied Physics, vol. 88, no. 1, pp. 2734–2739, 2000.

T. Okuda, T. Katayama, H. Kobayashi, N. Kobayashi, K. Satoh, and H. Yamamoto, “Magnetic properties of Bi₃Fe₅O₁₂ garnet,” Journal of Applied Physics, vol. 67, no. 9, pp. 4944–4946, 1990.

S. Kahl and A. M. Grishin, “Evolution of properties of epitaxial bismuth iron garnet films with increasing thickness,” Journal of Magnetism and Magnetic Materials, vol. 278, no. 1-2, pp. 244–255, 2004.

M. Huang and S. Zhang, “A new Bi-substituted rare-earth iron garnet for a wideband and temperature-stabilized optical isolator,” Journal of Materials Research, vol. 15, no. 8, pp. 1665–1668, 2000.

T. Tepper and C. A. Ross, “Pulsed laser deposition and refractive index measurement of fully substituted bismuth iron garnet films,” Journal of Crystal Growth, vol. 255, no. 3-4, pp. 324–331, 2003.

A. Mohammad, High performance magneto-optic garnet materials for integrated optics and photonics [Theses: Doctorates and Masters], 2012, Paper 528, http://ro.ecu.edu.au/theses/528.

P. C. Wo, P. R. Munroe, M. Vasiliev, Z. H. Xie, K. Alameh, and V. Kotov, “A novel technique for microstructure characterization of garnet films,” Optical Materials, vol. 32, no. 2, pp. 315–322, 2009.

M. Vasiliev, M. Nur-E-Alam, K. Alameh et al., “Annealing behaviour and crystal structure of RF-sputtered Bi-substituted dysprosium iron-garnet films having excess co-sputtered Bi-oxide content,” Journal of Physics D: Applied Physics, vol. 44, no. 7, Article ID 075002, 2011.

Joint Committee on Powder Diffraction Standards (JCPDS), Powder Diffraction Database and PCPDFWIN 1.30 Software, 1997

Z. Abbas, R. M. Al-Habashi, K. Khalid, and M. Maarof, “Garnet ferrite (Y₃Fe₅O₁₂) nanoparticles prepared via modified conventional mixing oxides (MCMO) method,” European Journal of Scientific Research, vol. 36, no. 2, pp. 154–160, 2009.