Journal of Nanomaterials
Volume 2018 (2018), Article ID 9512768, 8 pages
https://doi.org/10.1155/2018/9512768

Research Article

Oxidation of Copper Nanoparticles Protected with Different Coatings and Stored under Ambient Conditions

Noemi Jardón-Maximino,¹ Marissa Pérez-Alvarez,² Rubén Sierra-Ávila,¹ Carlos Alberto Ávila-Orta,¹ Enrique Jiménez-Regalado,¹ Angélica Mara Bello,³ Pablo González-Morones,¹ and Gregorio Cadenas-Pliego¹

¹Centro de Investigación en Química Aplicada, 25294 Saltillo, COAH, Mexico
²CONACyT Research Fellow-Instituto Mexicano del Petróleo, 07730 Ciudad de México, Mexico
³Tecnológico Nacional de México, Instituto Tecnológico de Orizaba, 94320 Orizaba, VER, Mexico

Correspondence should be addressed to Marissa Pérez-Alvarez; mperezal@conacyt.mx and Gregorio Cadenas-Pliego; gregorio.cadenas@ciqa.edu.mx

Received 8 June 2018; Revised 6 July 2018; Accepted 22 July 2018; Published 19 September 2018

Academic Editor: Xuping Sun

Copyright © 2018 Noemi Jardón-Maximino et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The synthesis of copper nanoparticles (Cu NPs) stable to chemical oxidation has attracted much attention due to their novel application possibilities. The physicochemical properties of Cu NPs define their utilization in diverse fields, including biological applications, solar cells, high conductivity inks for printed electronics, and other specific applications. In this study we present the synthesis of oxide-free Cu NPs by wet chemistry routes and their chemical oxidation during the storage exposed to ambient conditions. The Cu NPs synthesized in PAAm and AAm/glycerol presence exhibit no oxidation during synthesis and atmospheric conditions storage for 60 and 37 months, respectively. The obtained results compared with those coming from oxidation of partially passivated commercial Cu NPs at 99.8% purity, are presented. The role of the Cu NPs coating is critical to avoid oxidation, and it can be an important feature to achieve good dispersion in different polymers. The Cu NPs oxidation was studied by XRD, TGA, TEM, FTIR, and HR-TEM.

1. Introduction

In the last decade, studies related to synthesis and application of Cu NPs has been of great interest from the academic and industrial point of view, due to its large potential for the replacement of expensive metals like silver and gold nanoparticles in the production of antibacterial and conductive materials [1, 2]. Research regarding the use of Cu-based materials continues to grow in many diverse fields, for example, in 2018, its use in membranes for water purification [3], agriculture [4, 5], electronics [6, 7], catalysis [8–11], and so on, was reported.

Recently, our research group reported the synthesis of Cu NPs by chemical reduction in aqueous solution and thermal decomposition of copper precursors [12–14].

Several synthetic methods for the preparation of copper nanoparticles have been developed including thermal and sonochemical reduction [15], metal vapor synthesis (MVS) [16], electron beam irradiation [17], microwave irradiation [18], reverse micelles [19], pulsed laser ablation [20], chemical reduction in aqueous solution [21], and polyol process [22]. Most of the preparation methods have several factors that limit their use in the synthesis of metal particles, among these synthetic strategies, the wet chemical reduction is one of the most convenient methods because it has unique advantages over the other methods due to its versatility, the water is inexpensive, and has the ability to solubilize a wide variety of metallic salts, wherein the nanoparticles obtained by this method have well-defined shapes and sizes [23]. However, only in few cases Cu NPs are exclusively obtained; typically, they are obtained along with copper oxide II (CuO) and copper oxide I (Cu₂O) impurities due to relatively Cu⁰/Cu²⁺ low reduction potential.

Numerous methods for Cu NP synthesis have been reported using chemical reduction in aqueous solution. To prevent the copper nanoparticle oxidation, the use of stabilizers or agents such as water-soluble coating polymers, surfactants, or coordination ligands that have functional groups with the ability to form complexes with copper ions present in the medium is required [23]. Using hydrazine hydrate (N₂H₄·H₂O) as reducing agent aids the Cu NP protection due to the N₂ production during the oxidation process by eliminating the oxygen present in the reaction media.

Cu NP synthesis in polyallylamine (PAAm) presence using N₂H₄·H₂O as reducing agent for CuSO₄·5H₂O yields colloidal copper nanoparticles (oxide free) exhibiting large surface-enhanced Raman scattering (SERS) signals. Cu NPs are obtained without caring about argon or nitrogen environment inert atmosphere, the PAAm act as surface protectors, having the function of controlling size, size distribution, and shape of particles, and also preventing agglomeration thereof [24].

Using soluble polymers or surfactants as capping agents to prepare Cu nanoparticles in aqueous solutions is attractive because organic solvents are avoided and the corresponding pollutants are absent. However, until now, only few works have been done since Cu is easily oxidized, making it difficult to handle.

Other strategies to protect copper nanoparticles against chemical oxidation during preparation and storage is to perform the synthesis in a nonaqueous medium using a low concentration of metal precursor and typically they are made under inert atmospheres of Ar or N₂ [25]. Other methods synthesize Cu NPs in the absence of water and high temperature producing carbon-coated NPs. One example is the copper II carbonate reduction by glucose in solid state and 350°C temperature to produce Cu NPs with an amorphous carbon coating to avoid oxidation [26].

The Cu NP synthesis using a flame spray reactor under nitrogen atmosphere yields the continuous production of Cu NPs covered with approximately 1 nm carbon coating, protecting them from air-caused oxidation [27]. The Cu NP synthesis by thermal decomposition of copper (II) acetate in diphenyl ether in the presence of different capping ligand produces organically coated Cu NP air stable, after exposing the sample to air for 24 h [28].

The oxidation of different Cu NPs has been reported in the literature; however, these studies are incomplete, and learning about the initial oxidation and oxidation progress through time in different environmental conditions is needed. The value of this knowledge is to learn the oxidation degree of the Cu NPs after storage and to know the role of the coating in the chemical stability. In this study, we analyze the Cu NP oxidation synthesized by chemical reduction method in aqueous solution, having the presence of organic ligands and using N₂H₄·H₂O as reducing agent. Furthermore, the oxidation of partially passivated commercial Cu NPs with 99.8% purity is also studied.

The significance of this study lies in the general lack of characterization of Cu NPs after storage and later they are used without knowledge of the exact oxidation degree at the time of use. This common practice can produce altered and or diverse results in the Cu NP performance.

2. Experimental

2.1. Materials and Reagents

Copper (II) sulfate pentahydrate, hydrazine hydrate solution (50–60%), poly(allylamine) solution (PAAm) (Mw ~17,000, 20 wt% aqueous solution), allylamine (AAm) (98%), and sodium hydroxide (98.8%) were obtained from Sigma-Aldrich and were used without previous purification. Cu NPs partially passivated (25 nm, 99.8%) was obtained from SkySpring Nanomaterials Inc.

2.2. Synthesis of Copper Nanoparticles

The synthesis of copper nanoparticles was performed using wet chemical reduction.

2.2.1. Method 1

In a flat bottom flask, CuSO₄·5H₂O was added and dissolved in distilled water under magnetic stirring for 10 minutes at 60°C. PAAm was dissolved in distilled water and later was added in a dropwise manner and stirred for 10 minutes. Subsequently, a solution of 0.5 M NaOH was added dropwise; the reaction mixture was allowed to react for 30 minutes followed by the addition of hydrazine and constant stirring was maintained at 60°C. The nanoparticles were recovered by centrifugation at 15,000 rpm and 25°C, purification was realized after washing twice with distilled water and ethanol and finally dried at 60°C for 2 hours; the NPs were obtained as black powder y and labeled as Cu NPs 1 [12, 14].

2.2.2. Method 2

CuSO₄·5H₂O (20 g) was placed in a glass reactor and 200 ml of deionized water was added. The temperature was adjusted to 60°C and the mixture was stirred at 600 rpm. Glycerine (40 ml) was added using an addition funnel and after 3 min stirring; allylamine (78 ml) was immediately added followed by 30 min stirring. Finally, hydrazine (80 ml) was added dropwise, keeping temperature and stirring for 2 h and 30 min more. After this treatment, Cu NPs were purified following the previously described procedure. The Cu NPs are obtained as a red brown color powder and labeled as CuNPs 2.

2.2.3. Cu NP Storage

The Cu NPs obtained by the methods 1 and 2 were stored in polyethylene bags and were exposed to the air and light during the complete study. After opening, the commercial Cu NPs were stored in a Schlenk tube and kept under argon atmosphere. One small sample was stored in a glass vial and exposed to air and light conditions during the complete study.

2.3. Characterization Techniques

X-ray diffraction (XRD) technique was employed in order to know the oxidation state and chemical stability of the synthesized copper nanoparticles on a Siemens D-5000 diffractometer with a scanning interval in the 2θ range of 30 to 80°, with a scan speed of 0.02°/s, the radiation employed was copper Kα with a wavelength of 1.54056 Å, values of 25 mA and 35 kV were used for intensity and voltage, respectively. The average particle diameter was determined from the XRD diffractograms of each sample based on the Debye-Scherrer equation, taking the most intense peak for calculation [29, 30]. Transmission electron microscopy (TEM) was used in order to observe the morphology and particle size distribution of the copper samples on a FEI Titan high-resolution electron microscope operating at 300 kV.

Thermogravimetric analysis (TGA) was employed to analyze the thermal behavior of Cu particles and the thermal stability of coating using a Du Pont Instruments 951 analyzer. Operating conditions were a heating rate of 10°C/min., with a gas flow of 50 ml/min. The runs of the samples were carried out from 30°C to 600°C in N₂ atmosphere. Once 600°C was reached, N₂ atmosphere was changed for O₂.

Fourier transform infrared spectroscopy (FTIR) spectra of samples were recorded in a FTIR Spectrometer GX, PerkinElmer.

3. Results and Discussion

3.1. Cu NP Synthesis and Characterization

The Cu NP synthesis obtained by the chemical reduction method in aqueous media (methods 1 and 2) produces exclusively Cu NPs. When PAAm is used, the nanoparticles are obtained as black color powder with 5.1% ligand content and 76% yield, while using AAm and glycerol produces a red brown color, 1.3% ligand content and 86% yield. The Cu NPs were handled in air atmosphere since separation and purification processes. Finally, the products were stored in polyethylene bags in normal environmental conditions. Figure 1 shows the scheme of synthesis for the Cu NPs.

Figure 1: Synthesis of Cu NPs with different ligands.

The Cu NPs obtained by methods 1 and 2 were characterized immediately after synthesis by XRD, TGA, and TEM techniques. The X-ray diffraction patterns for both Cu NPs synthesized methods exhibit three reflections located at 2θ = 43.4, 50.5, and 74.0°, attributed to the (111), (200), and (220) crystal planes, respectively, belonging to pure copper with face-centered cubic symmetry (FCC) [31, 32] and corresponding to the diffraction pattern of metallic copper (JCPDS No. 04-0836) [33], as shown at the bottom of Figure 2.

Figure 2: XRD diffractograms of copper nanoparticles synthesized by chemical reduction method.

The XRD diffractograms of the particles obtained show no reflections that correspond to CuO NPs. A comparison with the standards shown at the bottom of the graph readily identifies each type of NPs (JCPDS.0254).

The X-ray characterization showed the protection capacity of the nitrogenated ligands during the synthesis and further handling to the Cu NPs avoiding oxidation when exposed to an open environment. Experimental data support several studies showing the protection feature of the presence of nitrogenated ligands (polymers and/or organic molecules); TGA characterization results provided more information on the thermal stability of the used ligands.

The Cu NPs obtained by methods 1 and 2 in PAAm and allylamine presence, respectively, were also characterized by TGA (Figure 3). The Cu NP thermogram obtained with the polymeric PAAm exhibited the highest mass loss in the 200°C and 494°C temperature range; the maximum degradation temperature of the polymeric covering was found in 440°C. The described thermic behavior is typical for polymers with thermic decomposition under 500°C temperature. The PAAm covering avoids oxidation of the Cu NPs up to 600°C; after this temperature, the nitrogen environment is exchanged to oxygen and a weight gain is observed as a result of the metallic copper oxidation. The thermogram of the synthesized Cu NPs in presence of the AAm ligand (Figure 3) shows a weight loss from 50°C until 260°C temperature, the maximum degradation temperature of the coating was found at 210°C, the value is lower compared to that observed for the PAAm coating. The temperature range for losing the Cu NPs covering suggests that this covering can be made of molecules used during the synthesis (AAm, H₂O y glycerol), this result shows the lack of polymerization for AAm as previously reported in basic media [14], and despite using a large amount of AAm, only a small amount is incorporated into the Cu NPs 2.

Figure 3: TGA thermograms of copper nanoparticles synthesized through chemical reduction with PAAm and AAm.

In studies done previously, ¹H NMR, FTIR, and GS-Ms techniques demonstrate that CuSO₄.5H₂O reduction in presence of AAm using N₂H₄/NaOH yields AAm polimerization and PAAm generation. New characterization using permeation chromatography (GPC) results show high molecular weight PAAM. These distinctive results suggest that basic media is an essential condition to favour AAm polymerization.

The PAAm-coated NP (CuNPs 1) characterization was performed by transmission electronic microscopy (TEM). The micrograph shows isolated particles with sizes between 20 and 30 nm and presenting a hemispheric morphology (Figure 4(a)). Also, the presence of agglomerates with diameters between 50 and 200 nm can be noticed, which are formed by subparticles with approximate sizes in the range of 18 to 50 nm. The black arrow points out the enlargement of a polycrystalline aggregate of nanoparticles whose surface is wrapped by a thin layer of PAAm with a thickness of about 5 nm, acting as a surface coating.

(a)

(b)

Figure 4: TEM micrographs of copper nanoparticles synthesized through chemical reduction.

The Cu NP micrographs obtained with AAm (CuNPs 2) showed particles with a well-defined morphology, sphere shaped, and particle size between 5 and 20 nm (Figure 4(b)). TEM analyses suggest that PAAm ligand favored the particle agglomeration (Figure 4(a)). This theory is self-sustaining if the amino groups present in the ligand are distributed along the polymer chain and are localized in a single region while the small molecules such as AAm and/or glycerol are totally free.

The Cu NP energy dispersive X-ray spectroscopy (EDS) analysis showed the presence of Cu as the main element and traces of carbon and oxygen were also found, nitrogen was not detected in any of the analyzed samples.

In order to obtain further evidence of the coating, the CuNPs were analyzed by high-resolution transmission electron microscopy (HR-TEM). By using this technique, it successfully detected isolated CuNPs 1 and CuNPs 2 exhibiting spherical morphology with a diameter of 29.3 nm and 22.6 nm, respectively (Figures 5(a) and 5(b)), HR-TEM image shows the coating the copper nanoparticles having a thickness less than 1 nm in both cases. The color of the coating is lighter in comparison to the copper nanoparticles one. The HR-TEM images of CuNPs 2 clearly exhibit the Cu lattice planes (Figure 5(b)); this characteristic is not observed in the CuNPs 1 (Figure 5(a)) because they show a greater amount of coating with respect to CuNPs 2 (5.1% versus 1.3%).

(a)

(b)

Figure 5: HR-TEM micrographs of copper nanoparticles synthesized through chemical reduction.

Analysis of CuNPs 1 and 2 by FTIR provided evidence of the presence of the coating on the NPs. The spectrum CuNPs1 presented three intense bands located at 983 cm⁻¹, 1449 cm⁻¹, and 1601 cm⁻¹; these values are very similar to those presented by commercial PAAm [14]. The FTIR spectrum corresponding to CuNPs 2 presented bands located at 613 cm⁻¹, 1108 cm⁻¹, 2922 cm⁻¹, and 3451 cm⁻¹; these bands are characteristic of glycerol presence [34]. An intense band was also detected in 1620 cm⁻¹ which could correspond to H₂O molecules that were not completely removed during the drying of the sample; the FTIR spectrum showed no clear evidence of the presence of AAm and PAAm.

3.2. Air-Stored Copper Nanoparticle Characterization

The commercial Cu NPs used in this study are sold in special packages to avoid air and light exposure; furthermore, they are partially passivated and possess 99.8% purity, this means only 0.2% of other elements can coat this kind of particles.

The commercial Cu NPs are immediately oxidized once exposed to air, and literature reports indicating traces of oxidized cupper content are commonly found. In this study, the commercial Cu NPs were exposed to air for 1 hour and later analyzed by X-ray diffraction. The diffraction pattern exhibited the typical reflections for metallic copper at 2θ = 43.4, 50.5, and 74.0°, attributed to the (111), (200), and (220) crystal planes, respectively (Figure 6). Furthermore, one small signal was detected indicating the beginning of the oxidative process (2θ = 36.9°). The EDS analysis detected copper as the main element and carbon and oxygen traces. The presence of oxygen confirms the partial oxidation of the metallic copper. The evidence of commercial Cu NP partial oxidation has been reported previously [35, 36].

Figure 6: XRD diffractograms of commercial Cu NPs.

The commercial Cu NPs stored in a glass vial without inert atmosphere were analyzed after some time. The diffraction patterns indicate the ineffectiveness of the coating to avoid the oxidation in this type of particles. After one month of storage, the diffraction pattern obtained show that the oxidation is stopped; this fact suggests a CuO coat formed on the particle surface, protecting the metallic copper nucleus. After 11 months of storage, the diffraction pattern showed CuO as the main component; low intensity peaks corresponding to Cu NPs were also observed. After 20 months of storage, it is extremely difficult to detect the Cu NP peaks, due to the oxidized copper present as a main component (Figure 6).

The TEM analysis of the commercial Cu NPs containing CuO as a main component (20 months) exhibited micrographs with a large amount of agglomerates where the spherical morphology of the original Cu NPs cannot be clearly observed (Figure 7).

Figure 7: TEM micrograph of commercial Cu NPs.

The EDS analysis also shows a clear information supporting the transformation of Cu NPs to CuO; the spectrum from a recently open sample and the other after 11 months of storage show significant increase of the peak corresponding to the oxygen atom.

The Cu NPs synthesized in PAAm and AAm presence were also stored in similar conditions and X-ray analyzed after fixed time. The diffraction patterns of the Cu NPs synthesized in presence of PAAm, after 60 months of storage under atmospheric conditions, do not present the typical peaks belonging to CuO and Cu₂O, suggesting that the polymeric PAAm ligand coating the NP surface prevents the NP oxidation (Figure 8(a)). Similar behavior was observed with the Cu NPs obtained in AAm presence; in this case, the analysis was done at 37 months of storage and evidence of strong oxidation was not detected (Figure 8(b)).

(a)

(b)

Figure 8: XRD diffractograms of Cu NPs synthesized by chemical reduction method.

The Cu NPs synthesized in PAAm and AAm presence exhibited higher stability in comparison with commercial Cu NPs, this suggest coordination of the nitrogen atoms to the metallic copper atom thus, avoiding the environmentally available oxygen atoms and water molecules attacking the copper. The lack of functional groups in commercial Cu NPs promotes the oxidation of these particles.

In order to verify the role played by the amino groups (-NH₂) in the protection of the metallic copper, commercial CuNPs were functionalized using PAAm in aqueous solution. Unfortunately, it was not possible to perform the functionalization because commercial CuNPs are oxidized immediately upon contact with the aqueous solution; this result suggests that the surface protection of the CuNPs must be carried out in situ, that is to say, during the Cu²⁺ reduction.

The stability of Cu NPs against oxidation can play an important role in several applications and should be especially important in the antimicrobial activity because metallic Cu NPs are more bioreactive compared to copper oxide NPs [37].

4. Conclusions

The synthesis of Cu NPs using the chemical reduction method in aqueous phase using hydrazine as reducing agent and in presence of organic ligands produces Cu NPs that remain stable when exposed to air which are able to be stored in normal environmental conditions. To our knowledge, there are no reports demonstrating that Cu NPs can be stored 3–5 years under environmental conditions without suffering oxidation. This significant feature can play an important role in those applications that require Cu NPs oxide free, such as electrical current conducting inks.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors gratefully acknowledge the financial support of CONACYT through Project 296395, CONACYT/Innovate UK through ACTin Project 268003 (México)/102729 (UK), and CONACYT/EU 7th CuVito Project 127151 (México)/263963 (EU). Noemi Jardón-Maximino wishes to thank CONACYT for the Scholarship no. 263275. Finally, the authors would like to thank V. Comparán-Padilla, G. Méndez-Padilla, and Myriam Lozano Estrada for their valuable technical support.

References

E. Butovsky, I. Perelshtein, and A. Gedanken, “Air stable core–shell multilayer metallic nanoparticles synthesized by RAPET: fabrication, characterization and suggested application,” Journal of Materials Chemistry, vol. 22, no. 30, p. 15025, 2012.

A. Nowak, J. Szade, E. Talik, M. Zubko, D. Wasikowski, and M. Dulski, “Physicochemical and antibacterial characterization of ionocity Ag/Cu powder nanoparticles,” Materials Characterization, vol. 117, pp. 9–16, 2016.

C. Ursino, R. Castro, E. Drioli, G. Lassaad, M. H. Albeirutty, and A. Figoli, “Progress of nanocomposite membranes for water treatment,” Membranes, vol. 8, no. 2, p. 18, 2018.

E. R. López, H. Ortega, G. Cadenas et al., “Foliar application of copper nanoparticles increases the fruit quality and the content of bioactive compounds in tomatoes,” Applied Sciences, vol. 8, no. 7, article 1020, 2018.

H. Hernández, S. González, A. Benavides, H. Ortega, G. Cadenas, and A. Juárez, “Effects of chitosan–PVA and Cu nanoparticles on the growth and antioxidant capacity of tomato under saline stress,” Molecules, vol. 23, no. 1, p. 178, 2018.

Z. Yu, C. Cui, B. Yang et al., “Size-controllable copper nanomaterials for flexible printed electronics,” Journal of Materials Science, vol. 53, no. 18, pp. 12988–12995, 2018.

N. K. Roy, C. S. Foong, and M. A. Cullinan, “Effect of size, morphology, and synthesis method on the thermal and sintering properties of copper nanoparticles for use in microscale additive manufacturing processes,” Additive Manufacturing, vol. 21, pp. 17–29, 2018.

N. Kaeffer, H. J. Liu, H. K. Lo, A. Fedorov, and C. Copére, “An N-heterocyclic carbene ligand promotes highly selective alkyne semihydrogenation with copper nanoparticles supported on passivated silica,” Chemical Science, vol. 9, no. 24, pp. 5366–5371, 2018.

Y. Zhang, C. Ye, C. Guo, C. Gan, and X. Tong, “In₂O₃-modified Cu/SiO₂ as an active and stable catalyst for the hydrogenation of methyl acetate to ethanol,” Chinese Journal of Catalysis, vol. 39, no. 1, pp. 99–108, 2018.

X. Ren, X. Ji, Y. Wei et al., “In situ electrochemical development of copper oxide nanocatalysts within a TCNQ nanowire array: a highly conductive electrocatalyst for the oxygen evolution reaction,” Chemical Communications, vol. 54, no. 12, pp. 1425–1428, 2018.

Z. Wang, H. Du, Z. Liu, H. Wang, A. M. Asiri, and X. Sun, “Interface engineering of a CeO₂–Cu₃P nanoarray for efficient alkaline hydrogen evolution,” Nanoscale, vol. 10, no. 5, pp. 2213–2217, 2018.

R. Sierra, M. Pérez, G. Cadenas et al., “Synthesis of Copper Nanoparticles Coated with Nitrogen Ligands,” Journal of Nanomaterials, vol. 2014, Article ID 361791, 8 pages, 2014.

R. Betancourt, P. Reyes, and B. Puente, “Synthesis of copper nanoparticles by thermal decomposition and their antimicrobial properties,” Journal of Nanomaterials, vol. 2014, Article ID 980545, 5 pages, 2014.

R. Sierra, M. Pérez, G. Cadenas et al., “Synthesis of copper nanoparticles using mixture of allylamine and polyallylamine,” Journal of Nanomaterials, vol. 2015, Article ID 367341, 9 pages, 2015.

N. Dhas, C. Raj, and A. Gedanken, “Synthesis, characterization, and properties of metallic copper Nanoparticles,” Chemistry of Materials, vol. 10, no. 5, pp. 1446–1452, 1998.

A. Ponce and K. Klabunde, “Chemical and catalytic activity of copper nanoparticles prepared via metal vapor synthesis,” Journal of Molecular Catalysis A: Chemical, vol. 225, no. 1, pp. 1–6, 2005.

R. Zhou, X. Wu, X. Hao, F. Zhou, H. Li, and W. Rao, “Influences of surfactants on the preparation of copper nanoparticles by electron beam irradiation,” Nuclear Instruments and Methods in Physics Research Section B: Beam Interactions with Materials and Atoms, vol. 266, no. 4, pp. 599–603, 2008.

H. Zhu, C. Zhang, and Y. Yin, “Rapid synthesis of copper nanoparticles by sodium hypophosphite reduction in ethylene glycol under microwave irradiation,” Journal of Crystal Growth, vol. 270, no. 3-4, pp. 722–728, 2004.

I. Lisiecki and M. Pileni, “Synthesis of copper metallic clusters using reverse micelles as microreactors,” Journal of the American Chemical Society, vol. 115, no. 10, pp. 3887–3896, 1993.

R. Tilaki, A. Iraji, and S. Mahdavi, “Size, composition and optical properties of copper nanoparticles prepared by laser ablation in liquids,” Applied Physics A, vol. 88, no. 2, pp. 415–419, 2007.

L. Quoc, J. Hwa, and C. Woo, “Copper nanoparticles incorporated with conducting polymer: efects of copper concentration and surfactants on the stability and conductivity,” Journal of Colloid and Interface Science, vol. 365, no. 1, pp. 103–109, 2012.

B. Park, S. Jeong, D. Kim, J. Moon, S. Lim, and J. Kim, “Synthesis and size control of monodisperse copper nanoparticles by polyol method,” Journal of Colloid and Interface Science, vol. 311, no. 2, pp. 417–424, 2007.

J. Yang, S. Yang, and T. Okamoto, “Synthesis of copper monolayer and particles at aqueous-organic interface,” Surface Science, vol. 600, pp. 318–320, 2006.

Y. Wang and T. Asefa, “Poly(allylamine)-stabilized colloidal copper nanoparticles: synthesis, morphology, and their surface-enhanced raman scattering properties,” Langmuir, vol. 26, no. 10, pp. 7469–7474, 2010.

S. Qiu, J. Dong, and J. Chen, “Preparation of Cu nanoparticles from water-in-oil microemulsions,” Journal of Colloid and Interface Science, vol. 216, no. 2, pp. 230–234, 1999.

J. Li and C. Liu, “Carbon-coated copper nanoparticles: synthesis, characterization and optical properties,” New Journal of Chemistry, vol. 33, no. 7, pp. 1474–1477, 2009.

N. Luechinger, E. Athanassiou, and W. Stark, “Graphene-stabilized copper nanoparticles as an air-stable substitute for silver and gold in low-cost ink-jet printable electronics,” Nanotechnology, vol. 19, no. 44, article 445201, 2008.

F. Effenberger, M. Sulca, M. Machini, R. Couto, P. Kiyohara, and G. Machado, “Copper nanoparticles synthesized by thermal decomposition in liquid phase: the influence of capping ligands on the synthesis and bactericidal activity,” Journal of Nanoparticle Research, vol. 16, no. 11, article 2588, 2014.

J. Langford and A. Wilson, “Scherrer after sixty years: a survey and some new results in the determination of crystallite size,” Journal of Applied Crystallography, vol. 11, no. 2, pp. 102–113, 1978.

A. Monshi, “Modified Scherrer equation to estimate more accurately nano-crystallite size using XRD,” World Journal of Nano Science and Engineering, vol. 2, no. 3, pp. 154–160, 2012.

O. Mondal, A. Datta, D. Chakravorty, and M. Pal, “Ultrafine narrow dispersed copper nanoparticles synthesized by a facile chemical reduction method,” MRS Communications, vol. 3, no. 2, pp. 91–95, 2013.

S. Saivova, S. Vorob’ev, R. Nokolaeva, and Y. Mikhlin, “Conditions for the formation of copper nanoparticles by reduction of copper(II) ions with hydrazine hydrate solutions,” Russian Journal of General Chemistry, vol. 80, no. 6, pp. 1122–1127, 2010.

Joint Committee on Powder Diffraction Standards, International Centre for Diffraction Data, Swarthmore, PA, USA, 1989.

C. H. Caicedo, G. Ayala, A. C. Agudelo, and R. A. Vargas, “Effect of glycerol on the electrical properties, phase behavior and water vapor permeability in films based on potato starch,” Revista Colombiana de Física, vol. 42, pp. 439–448, 2010.

L. Dobrzanski and I. Czaja, “Effect of nanowires and nanoparticles of copper on the structure and properties of the nanocomposite polymeric materials,” Archives of Materials Science and Engineering, vol. 75, pp. 18–29, 2015.

J. Kim and Y. Chung, “Copper nanoparticle-catalyzed cross-coupling of alkyl halides with Grignard reagents,” Chemical Communications, vol. 49, no. 94, pp. 11101–11103, 2013.

O. Akhavan and E. Ghandi, “Cu and CuO nanoparticles immobilized by silica thin films as antibacterial materials and photocatalysts,” Surface and Coating Technology, vol. 205, no. 1, pp. 219–223, 2010.