Journal of Nanomaterials
Volume 2019 (2019), Article ID 3108742, 5 pages
https://doi.org/10.1155/2019/3108742

Research Article

Facile Synthesis of Fe₂O₃ Nanomaterials from MIL-101(Fe) Template and Its Application in Lithium Ion Batteries

Chunyan Zhang,¹ Nianqiao Qin,¹ Jing Li,² Yan Tian,¹ and Hui Zhang²

¹Department of Applied Chemistry, Anhui Agricultural University, Hefei 230036, China
²School of Forestry & Landscape Architecture, Anhui Agricultural University, Hefei 230036, China

Correspondence should be addressed to Hui Zhang; zhanghuiahau@163.com

Received 1 July 2019; Accepted 14 August 2019; Published 8 September 2019

Guest Editor: Yunpan Ying

Copyright © 2019 Chunyan Zhang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Sponge-like porous Fe₂O₃ nanomaterials were obtained through the calcination process of the iron-based metal organic framework (MIL-101). As anode materials for lithium-ion batteries, thus, obtained products show a good electrochemical performance with a high specific capacity (1358 mA h g⁻¹ at 100 mA g⁻¹ in the initial cycle) and a relatively stable cycle performance (750 mA h g⁻¹ after 80 charge/discharge cycles). The superior cycling performance may be attributed to their special structure, which facilitates charge transfer and Li⁺ diffusion.

1. Introduction

The concept of promoting environmental protection and energy conservation becomes a hot topic, and renewable clean energy has attained global attentions. Lithium-ion batteries (LIBs), as one of the prominent energy storage systems, have been extensively studied and broadly utilized in many electronic devices owing to their high energy density and long cycling life [1, 2]. The low cost, chemically stable, and highly conductive graphite carbon is recognized as the leading electrode material for the anodes of commercial LIBs. However, the low capability of charge storage (theoretical capacity is only 372 mA h g⁻¹) limits further applications of graphite carbon in LIBs [3]. In order to meet the demands of ever-growing performance, developing new alternative anode materials has become an urgent task in building next-generation LIBs. Transition metal oxides (MxOy, M = Fe, Co, Zn, Mn, Mo, etc.) have been extensively investigated in a diverse range of applications in energy, environment, catalysis, and electronics fields [4]. Among the available alternative anode materials, iron oxides have attracted people’s attention because of nontoxicity, high corrosion resistance, and higher capacity as well as low processing cost [5–9]. However, high intrinsic resistance and the slow kinetics for ionic diffusion and charge transfer induce performance decay especially at high current densities, which seriously limited the application of Fe₂O₃ in Li-ion batteries. It has shown that Fe₂O₃ with nanostructures not only promotes ion diffusion and electron transfer but also effectively accommodates the large changes in volume that occurs during lithiation and delithiation to prevent the electrode disintegration. So far, a lot of attempts have been made to resolve the above issues by fabricating iron oxide nanostructure materials with optimized particle shapes, sizes, and component compositions [10–12]. MOF (metal-organic framework) as a novel class of organic-inorganic porous materials formed by strong bonds between organic ligands and metal ions has been used as precursors or templates for the synthesis of metal oxides by simple thermal decomposition. The MOF-derived nanomaterials exhibit relatively porous or hollow structures [13–15]. A rational design of MOF precursors with novel structures is highly desirable for the synthesis of high-performance electrode materials. For instance, Prussian blue (PB) microcubes were used as templates to prepare hollow Fe₂O₃ microboxes, which exhibited excellent cycling performance [16, 17].

Here, we present a simple and general MOF-assisted method for the fabrication of sponge-like Fe₂O₃ as anodes for LIBs. Firstly, MIL-101(Fe) nanopolyhedrons were formed by a one-pot hydrothermal method. Then, these nanopolyhedrons could be further converted to porous sponge-like nanoparticles through a subsequent annealing treatment in air. These nanoparticles exhibit good electrochemical performance when used as anodes for LIBs. The remarkable electrochemical properties may attribute to the porous structure which not only facilitate electron transport but also efficiently relieve the volume change caused by insertion/extraction of Li⁺. Therefore, the present study provides a simple way for the preparation of high-performance electrode materials for LIBs. And the method for the synthesis of Fe₂O₃ nanomaterials can be extended to the preparation of various MOF-derived functional nanocomposites for various energy-related applications.

2. Experimental Section

2.1. Preparation of the Electrode Materials

Dimethylformamide (DMF), ferric chloride (FeCl₃·6H₂O), terephthalic acid (TPA), and ethyl alcohol (EtOH) were obtained from Shanghai Chemical Reagent Co. Ltd. (P. R. China) and used without further treatment. Doubly distilled water was used for preparing solutions.

2.1.1. Synthesis of MIL-101(Fe)

MIL-101(Fe) nanopolyhedrons were prepared by a hydrothermal method based on the reported procedure with some modifications [18]. Specifically, 0.675 g of FeCl₃·6H₂O (2.5 mmol) and 0.21 g TPA (1.25 mmol) were mixed in 20 mL DMF, and the mixture was ultrasonicated for 20 min to make the solid full suspension. Next, the reaction mixture was loaded into a 50 mL Teflon-lined stainless steel autoclave and placed under static conditions at 110°C in an oven for 24 h. After naturally cooling down to room temperature, orange mud was obtained. Then, it was separated by centrifugation and washing with absolute DMF and EtOH to remove the raw materials. The product was vacuum-dried at 80°C for 120 min.

2.1.2. Synthesis of Fe₂O₃ Nanoparticles

The as-formed composite was placed in a ceramic boat and heated to 380°C in the muffle furnace for about 1 h under an ambient atmosphere at a ramp rate of 10°C min⁻¹. Upon naturally cooling down, red-brown powders of Fe₂O₃ were collected.

2.2. Characterization and Electrochemical Test of the Synthesized Materials

Characterization of these synthesized products by X-ray diffraction (XRD) using a DX-2700 X-ray diffractometer was equipped with a Cu Kα-sealed tube () and scanned in a range between 10° and 80°. Scanning electron microscopy (SEM) images were obtained by using a Hitachi S4800 scanning electron microscope operated at 10 kV. The transmission electron microscopy (TEM) images were carried out on JEM model 100SX electron microscopes (Japan Electron Co., Ltd.). Nitrogen adsorption-desorption isotherms were carried out with a Micromeritics TriStar II 3020 adsorption analyzer at 77 K. The electrochemical analysis was obtained with CR2016 coin-type half cells that were assembled in an Ar-filled glove box. The working electrode was fabricated in N-methyl-2-pyrrolidinone (NMP) by medley active materials, acetylene black, and polyvinylidene fluoride (PVDF) in a ratio of 8 : 1 : 1 (//). Copper foil, metallic lithium, and polyethylene film (Celgard, 2400) were employed as the collector, counter electrode, and separator, respectively. LiPF₆ (1 M) in the mixed solution of ethylene carbonate (EC) and dimethyl carbonate (DMC) (1 : 1 in volume ratio) was used as the electrolyte. The galvanostatic charge and discharge were performed on a battery testing system (CT-3008 W-5 V 10 mA, Neware Technology Co., Ltd., P. R. China) at various current densities between 0.01 and 3.0 V (vs. Li⁺/Li).

3. Results and Discussion

3.1. Morphologies and Structures of the Samples

As seen in the XRD patterns (Figure 1(a)), the MIL-101(Fe) composites exhibit the diffraction peaks located at , 5.0°, 8.9°, 9.5°, 10.6°, and 16.3° were observed, which was resembled with the existing researches [19]. This indicated that the synthesized powder is high-purity crystal. Figure 2(b) displays the XRD pattern of the calcined product; all the dominated diffraction peaks could be assigned to the hematite Fe₂O₃ (JCPDS No. 33-0664); besides, some weak diffraction peaks are indexed to Fe₃O₄ (JCPDS No. 65-3107) [10, 20].

(a)

(b)

Figure 1: XRD patterns for (a) as-prepared MIL-101(Fe) and (b) the calcined product.

(a)

(b)

Figure 2: (a) SEM and TEM image of MIL-101(Fe). (b) SEM image of the calcined product.

As shown in the SEM and TEM images in Figure 2(a), MIL-101(Fe) exhibited a regular octahedron shape with a rough surface, and the average size is about 600 nm. After being annealed under an ambient atmosphere, sponge-like porous Fe₂O₃ nanomaterials with a diameter of~ 600 nm were obtained, shown in Figure 2(b).

The porosities of the nanocomposites were further calculated by N₂ adsorption-desorption isotherms at 77 K shown in Figure 3. The sample shows a type IV isotherm, suggesting microporous material with mesoporous formed by close-packed nanoparticles. The Brunauer–Emmett–Teller (BET) pore volume and surface area of the product were calculated to be 0.288 cm³ g⁻¹ and 99.8 m² g⁻¹, respectively. Furthermore, the pore size is around 8 nm by using the Barrett-Joyner-Halenda (BJH) method.

Figure 3: N₂ adsorption-desorption isotherms of the calcined product at 77 K.

3.2. Electrochemical Performance

Subsequently, we evaluated the lithium storage properties of the prepared samples as anode materials in LIBs (Figure 4). The electrode exhibits good performance, giving capacities of 1358 mA h g⁻¹ in the first cycle at a current density of 100 mA g⁻¹, and shows very stable capacity retention of 750 mA h g⁻¹ for over 80 cycles. What is more, from the second cycle onwards, the coulombic efficiency remains nearly 100%, which indicates an excellent reversible capacity of this electrode material. The good cycling stability may be attributed to the nanosized structure and presence of the porous architecture, which lead to an increase in the electrode/electrolyte contact area and help to accommodate the strain of Li⁺ insertion/extraction [21].

Figure 4: Cycling performance and corresponding coulombic efficiency at a current density of 100 mA g⁻¹.

4. Conclusions

In summary, porous sponge-like Fe₂O₃ nanomaterials have been successfully fabricated by a facile method. The as-prepared products demonstrate superior lithium storage properties (1358 mA h g⁻¹ at 100 mA g⁻¹ in the initial cycle and 750 mA h g⁻¹ after 80 charge/discharge cycles) mostly due to the nanosized and porous structure, which substantially facilitate electronic/ionic transport and afford good structural stability upon cycling. This work provides a cost-effective route for the synthesis of porous materials; we hope it can also be expanded to other materials in a wider field.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this paper.

Authors’ Contributions

Chunyan Zhang and Nianqiao Qin contributed equally to this work.

Acknowledgments

This work is supported by the Key Research Project of the Natural Science Foundation of Anhui Provincial Universities (Grant Nos. KJ2019A0216, KJ2019A0200, and KJ2018A0161) and the Scientific Research Foundation of Anhui Agricultural University (Grant No. Wd2018-05).

References

R. Ding, K. Liu, X. Liu, Z. Li, C. Wang, and M. Chen, “Hollow Co₃O₄ nanosphere surrounded by N-doped graphitic carbon filled within multilayer-sandwiched graphene network: a high-performance anode for lithium storage,” Inorganic Chemistry, vol. 58, no. 5, pp. 3416–3424, 2019.

Y. Li, Y. Fu, W. Liu, Y. Song, and L. Wang, “Hollow Co-Co₃O₄@CNTs derived from ZIF-67 for lithium ion batteries,” Journal of Alloys and Compounds, vol. 784, pp. 439–446, 2019.

W. Liu, Y. Fu, Y. Li, S. Chen, Y. Song, and L. Wang, “Three-dimensional carbon foam surrounded by carbon nanotubes and Co-Co₃O₄ nanoparticles for stable lithium-ion batteries,” Composites Part B: Engineering, vol. 163, pp. 464–470, 2019.

H. H. Fan, L. Zhou, and H. H. Li, “2D Fe₂O₃ nanosheets with bi-continuous pores inherited from Fe-MOF precursors: an advanced anode material for Li-ion half/full batteries,” 2D Materials, vol. 6, no. 4, article 045022, 2019.

C. Zhang, J. Dai, P. Zhang et al., “Porous Fe₂O₃/ZnO composite derived from MOFs as an anode material for lithium ion batteries,” Ceramics International, vol. 42, no. 1, pp. 1044–1049, 2016.

W. Qi, X. Li, H. Li et al., “Sandwich-structured nanocomposites of N-doped graphene and nearly monodisperse Fe₃O₄ nanoparticles as high-performance Li-ion battery anodes,” Nano Research, vol. 10, no. 9, pp. 2923–2933, 2017.

F. Wang, C. Wang, H. Chen et al., “A composite of Fe₃O₄@ C and multilevel porous carbon as high-rate and long-life anode materials for lithium ion batteries,” Nanotechnology, vol. 30, no. 33, article 335701, 2019.

Y. Ding, B. Liu, R. Cai et al., “One-pot synthesis of α-Fe₂O₃ nanospindles as high-performance lithium-ion battery anodes,” Nano, vol. 13, no. 2, article 1850018, 2018.

Y. Zhang, Q. Li, J. Liu et al., “Hierarchical Fe₂O₃@C@MnO₂@C multishell nanocomposites for high performance lithium ion batteries and catalysts,” Langmuir, vol. 34, no. 18, pp. 5225–5233, 2018.

Z. Li, Y. Mao, Q. Tian, W. Zhang, and L. Yang, “Extremely facile preparation of high-performance Fe₂O₃ anode for lithium-ion batteries,” Journal of Alloys and Compounds, vol. 784, pp. 125–133, 2019.

M. S. Balogun, Z. Wu, Y. Luo et al., “High power density nitridated hematite (α-Fe₂O₃) nanorods as anode for high-performance flexible lithium ion batteries,” Journal of Power Sources, vol. 308, pp. 7–17, 2016.

M. Chen, E. Zhao, Q. Yan, Z. Hu, X. Xiao, and D. Chen, “The effect of crystal face of Fe₂O₃ on the electrochemical performance for lithium-ion batteries,” Scientific Reports, vol. 6, no. 1, article 29381, 2016.

J. Li, X. Wang, G. Zhao et al., “Metal–organic framework-based materials: superior adsorbents for the capture of toxic and radioactive metal ions,” Chemical Society Reviews, vol. 47, no. 7, pp. 2322–2356, 2018.

F. Ke, Y. Li, C. Zhang et al., “MOG-derived porous FeCo/C nanocomposites as a potential platform for enhanced catalytic activity and lithium-ion batteries performance,” Journal of Colloid and Interface Science, vol. 522, pp. 283–290, 2018.

C. Zhang, F. Ke, H. Xiao, H. Zhang, Y. Tian, and Y. Shen, “Well-designed hollow and porous Co₃O₄ microspheres used as an anode for Li-ion battery,” Journal of Solid State Electrochemistry, vol. 23, no. 8, pp. 2477–2482, 2019.

L. Zhang, H. B. Wu, S. Madhavi, H. H. Hng, and X. W. (. D.). Lou, “Formation of Fe₂O₃ microboxes with hierarchical shell structures from metal–organic frameworks and their lithium storage properties,” Journal of the American Chemical Society, vol. 134, no. 42, pp. 17388–17391, 2012.

C. Nie, X. Zhang, H. Ren et al., “Synthesis of manganese-based Prussian blue nanocubes with organic solvent as high-performance anodes for lithium-ion batteries,” European Journal of Inorganic Chemistry, vol. 2019, no. 28, pp. 3277–3286, 2019.

S. Li, S. Sun, H. Wu, C. Wei, and Y. Hu, “Effects of electron-donating groups on the photocatalytic reaction of MOFs,” Catalysis Science & Technology, vol. 8, no. 6, pp. 1696–1703, 2018.

H. Hu, H. Zhang, Y. Chen, Y. Chen, L. Zhuang, and H. Ou, “Enhanced photocatalysis degradation of organophosphorus flame retardant using MIL-101(Fe)/persulfate: effect of irradiation wavelength and real water matrixes,” Chemical Engineering Journal, vol. 368, pp. 273–284, 2019.

X. Li, Y. Ma, G. Cao, and Y. Qu, “FeOx @ carbon yolk/shell nanowires with tailored void spaces as stable and high-capacity anodes for lithium ion batteries,” Journal of Materials Chemistry A, vol. 4, no. 32, pp. 12487–12496, 2016.

J. Nai and X. W. Lou, “Hollow structures based on Prussian blue and its analogs for electrochemical energy storage and conversion,” Advanced Materials, article 1706825, 2018.