Journal of Nanomaterials
Volume 2020 (2020), Article ID 7373065, 2 pages
https://doi.org/10.1155/2020/7373065

Erratum

Erratum to “Dual-Drug-Loaded Silk Fibroin/PLGA Scaffolds for Potential Bone Regeneration Applications”

Jihang Yao,¹ Yilong Wang,² Wendi Ma,² Wenying Dong,² Mei Zhang,² and Dahui Sun¹

¹Norman Bethune First Hospital, Jilin University, Changchun 130021, China
²Alan G. MacDiarmid Laboratory, College of Chemistry, Jilin University, Changchun 130012, China

Correspondence should be addressed to Mei Zhang; zhangmei@jlu.edu.cn and Dahui Sun; sundahui1971@sina.com

Received 21 July 2020; Accepted 22 July 2020; Published 1 September 2020

Copyright © 2020 Jihang Yao et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Dual-Drug-Loaded Silk Fibroin/PLGA Scaffolds for Potential Bone Regeneration Applications” [1], there was an error in Figure 10. The corrected figure is shown below and is listed as Figure 1.

Figure 1: Representative staining of ALP on day 3: (a) SF/PLGA, (b) SF-DXM/PLGA, (c) SF/PLGA-rhBMP2, and (d) SF-DXM/PLGA-rhBMP2. Representative staining of ALP on day 7: (e) SF/PLGA, (f) SF-DXM/PLGA, (g) SF/PLGA-rhBMP2, and (h) SF-DXM/PLGA-rhBMP2. Representative staining of ARS on day 14: (i) SF/PLGA, (j) SF-DXM/PLGA, (k) SF/PLGA-rhBMP2, and (l) SF-DXM/PLGA-rhBMP2. The content of rhBMP2 is 25 μg. .

The error was introduced during the production process of the article, and Hindawi apologises for causing this error.

References

J. Yao, Y. Wang, W. Ma, W. Dong, M. Zhang, and D. Sun, “Dual-drug-loaded silk fibroin/PLGA scaffolds for potential bone regeneration applications,” Journal of Nanomaterials, vol. 2019, Article ID 8050413, 16 pages, 2019.