Journal of Nanomaterials
Volume 2020 (2020), Article ID 8902964, 1 page
https://doi.org/10.1155/2020/8902964

Retraction

Retracted: Photovoltaic Performance of ZnO Nanosheets Solar Cell Sensitized with Beta-Substituted Porphyrin

Journal of Nanomaterials

Received 21 August 2020; Accepted 21 August 2020; Published 11 December 2020

Copyright © 2020 Journal of Nanomaterials. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Journal of Nanomaterials has retracted the article titled “Photovoltaic Performance of ZnO Nanosheets Solar Cell Sensitized with Beta-Substituted Porphyrin” [1], at the request of the author as it is identical in the title and the technical content with another article [2] submitted to Solar Energy with the following information.

References

A. Mahesh, “Photovoltaic Performance of ZnO Nanosheets Solar Cell Sensitized with Beta-Substituted Porphyrin,” Journal of Nanomaterials, vol. 2011, Article ID 301873, 9 pages, 2011.

S. Suresh, A. Pandikumar, S. Murugesan, R. Ramaraj, and S. P. Raj, “Photovoltaic performance of solid-state solar cells based on ZnO nanosheets sensitized with low-cost metal-free organic dye,” Solar Energy, vol. 85, no. 9, pp. 1787–1793, 2011.