Journal of Nanotechnology
Volume 2018 (2018), Article ID 2031805, 5 pages
https://doi.org/10.1155/2018/2031805

Research Article

A First-Principles Study on Hydrogen Sensing Properties of Pristine and Mo-Doped Graphene

Shulin Yang,¹ Zhigao Lan,¹ Huoxi Xu,¹ Gui Lei,¹ Wei Xie,¹ and Qibin Gu²

¹School of Electronic Information, Hubei Key Laboratory for Processing and Application of Catalytic Materials, Huanggang Normal University, Huanggang 438000, China
²Department of Architecture and Material Engineering, Hubei University of Education, Wuhan 430205, China

Correspondence should be addressed to Zhigao Lan; lanzhg@hgnu.edu.cn and Qibin Gu; gqibin@hue.edu.cn

Received 29 March 2018; Accepted 29 July 2018; Published 5 September 2018

Academic Editor: Dmitriy A. Dikin

Copyright © 2018 Shulin Yang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

The adsorption of H₂ on the pristine and Mo-doped graphene was investigated by density functional theory (DFT) calculations. The structural and electronic properties of H₂-graphene systems were studied to understand the interaction between H₂ molecule and graphene-based material. Our calculation results showed the pristine graphene was not an ideal sensing material to detect H₂ molecule as it ran far away from the pristine graphene surface. Different with pristine graphene, the Mo-doped graphene presented much higher affinities to the H₂ molecule. It was found that the placed H₂ molecules could stably be chemisorbed on the Mo-doped graphene with high binding energy. The electronic property of Mo-doped graphene was significantly affected by the strong interaction and orbital hybridization between H₂ and Mo-doped graphene sheet. The H₂ molecule would capture more charges from the doped graphene than the pristine system, indicating the higher sensitivity for the graphene doped with Mo.

1. Introduction

Over the past decade, the two-dimensional layered graphene has inspired great interests due to its unique mechanical, optical, transport, and outstanding electronic properties since it was reported in by Professors Novoselov et al. [1]. It has been widely used in lithium-ion battery, solar cell, light emitting diodes, and gas sensors [2–4]. Previous studies showed that the intrinsic graphene could not have high efficiency to interact with the small gas molecules, such as CO, NO, NO, H₂S, CO₂, NH₃, and H₂, due to the inert nature of the π-electron conjugation formed by carbon atoms of graphene [5–8]. Several methods have been constructed to overcome this limitation. Among various methods, doping with transition metal has been confirmed to be proved to be one of the most facial and effective methods to improve the gas sensing property of graphene. Very recently, Cortés-Arriagada et al. has found that Fe-doped graphene (FeG) is a superior material for adsorption and sensing of CO, CO₂, SO₂, and H₂S compared to pristine graphene [9]. Clearly, the previous theoretical studies showed that metal dopant could be used to enhance the gas sensing behavior of graphene.

Hydrogen gas (H₂) has been considered to be an ideal energy resource, always used in the industrial processes and energy-generating devices [10, 11]. However, the light, colorless, odorless, and tasteless properties of H₂ make it easily leak out and difficultly be detected by humans. And, it has the high possibility of explosion due to the low ignition energy and wide flammable range [12, 13]. Therefore, it is of great importance to assemble the devices to detect and control their exposure. Recently, many studies have focused on the hydrogen sensing performance of carbon-based material theoretically and experimentally [14]. Lotfi and his coworkers have studied the enhanced adsorption of hydrogen gas on the transition metal-doped graphene [15]. Chanukorn has also reported that the graphene nanosheets doped with the group 8B transition metal could be used as a more reliable and efficient hydrogen sensor than the bare graphene [16]. Motivated by these research studies, we studied the interactions between hydrogen gas and Mo-doped graphene sheet (MoGs) in this work on the basis of density functional theory calculations. The calculation results showed that the adsorption of hydrogen molecules on the graphene sheet could also be enhanced through doping with Mo elements, leading to the higher sensitivity towards H₂.

2. Computational Details

All the density functional theory (DFT) calculations were performed with CASTEP in Materials Studio (Version 8.0) of Accelrys Inc. The graphene sheet is modeled using a certain number of graphene supercells, consisting of 72 atoms, with a vacuum spacing of 15 Å. The exchange correlation contribution to the total electronic energy was treated with the Perdue–Burke–Ernzerhof (PBE) functional. The cutoff energy of 550 eV is used in all relaxation processes. The k-point set in all the slabs is 4 × 4 × 1. The convergence criteria of optimization for the energy and force were 0.02 meV/atom and 0.05 eV/Å, respectively. The MoGs are constructed by replacing one C atom with one Mo atom (concentration of Mo 1.4% atomic ration). The optimized structures of pure graphene and MoGs are shown in Figure 1. C₁, C₂, and C₃ were used to label the three C atoms around the center C (Mo) atom, respectively. The calculation showed that the length of bond elongated from 1.419 Å for the three C–C bonds to 1.921 Å, 1.930 Å, and 1.926 Å for Mo–C₁, Mo–C₂, and Mo–C₃, respectively. The transformation of chargers within the adsorbed H₂ molecule and sensing material was studied through the calculation of electron density difference. The density of states of the constructed geometries was also investigated to research the interaction between the H₂ molecule and sensing material.

(a)

(b)

Figure 1: Optimized geometries of intrinsic and Mo-doped graphene: gray and light blue spheres are denoted as C and Mo, respectively.

3. Results and Discussion

Firstly, we have calculated the binding energy between the Mo atom with graphene sheet (Ebing) as follows: Ebing = EG + EMo − EMo-G, where EG, EMo, and EMo-G are defined as total energies of the graphene with one C vacancy, the single Mo atom, and the Mo-doped graphene, respectively [8]. The calculation results showed the binding energy of Mo in the Mo-doped graphene was ∼4.99 eV, indicating the possibility of Mo-doping. To investigate the interaction between the target gas molecule and our built-up material, one H₂ molecule was introduced into the system. There are four possible geometries constructed for the intrinsic and Mo-doped graphene systems: H₂ perpendicular to and parallel along X axis to the sensing surface (modes V1 and V2 for graphene and modes M1 and M2 for Mo-doped graphene). The optimized results are shown in Figure 2. The adsorption energy (Eads) of the established adsorption modes are calculated with the following equation:

where Eadsorbate-substrate is the total energy of the adsorbate-substrate system in the equilibrium state and Esubstrate and are the the total energies of the sensing material and adsorbed H₂ present, respectively [17]. The final adsorption energy for V1 and V2 are −0.056 and −0.048 eV, respectively, much lower than those for M1 (−0.55 eV) and M2 (−0.57 eV). The negative value of adsorption energy corresponds to a stable adsorption structure. Similar calculation results were also found in the studies of H₂CO in the Al-doped graphene and the H₂S in the Al-doped graphene sheet [18].

(a)

(b)

(c)

(d)

Figure 2: Calculations of structure of H₂ molecules (white color) on the graphene-based material surfaces (a) with H₂ perpendicular to graphene surface (V1); (b) with H₂ parallel along X axis to graphene surface (V2); (c) with H₂ perpendicular to Mo-doped graphene surface (M1); (d) with H₂ parallel along X axis to Mo-doped graphene surface (M2).

As can be seen in Figures 2(a) and 2(b), the H₂ molecules move farther away in modes A1 and A2 than those in modes M1 and M2 from the sensing material surface. The optimized results showed that the adsorption of H₂ does not have a significant effect in the structural distortion of intrinsic graphene. The bond lengths of C–C in both V1 and V2 slightly elongated to be 1.420 Å. Moreover, the length of the bond in the H₂ molecule remains 0.753 Å as the free-standing H₂ molecules, indicating that H₂ would not interact directly with intrinsic graphene surface. Our results agree well with the precious study [19]. Compared with intrinsic graphene system, the Mo–C bonds obtained from the initial structure with H₂ perpendicular to the doped surface were lengthened to be 1.927 Å, 1.977 Å, and 1.931 Å for Mo–C1, Mo–C2, and Mo–C3 in the mode M1 (shown in Figure 2(c)), respectively. The initial structures of a H₂ molecule adsorbed on the Mo-doped graphene are shown in Figure S1. It should be noted that we found the finally optimized geometries for the constructed modes of H₂ adsorbed on Mo-doped graphene being not affected by the orientation of the placed H₂ molecules. For the H₂ molecules parallel along X axis to the sensing surface, the corresponding values for Mo–C1, Mo–C2, and Mo–C3 bonds are 1.930 Å, 1.975 Å, and 1.931 Å, respectively. In the modes M1 and M2, the bond lengths of H₂ expand from original 0.735 Å to 0.857 Å and 0.858 Å, respectively. Based on the above research, it can be seen that the H₂ molecules have a stronger interaction with the MoGs. The larger elongation of Mo–C bond and higher adsorption energy of the Mo-doped system imply that the H₂ molecule has a chemical bond with the MoG sheet. Different with the doped system, the H₂ molecule only shows the physical adsorption on intrinsic graphene with weak van der Waals interaction between them [20].

Then, we study the accumulation of charges between the adsorbed H₂ and graphene systems with the method of calculating the deformation electron density. In the intrinsic graphene modes of V1 and V2, the majority of electron accumulations sites are distributed in the bond, as shown in Figure S2. The results mean that the bond in the intrinsic graphene and H₂ are of covalent nature. There is no obvious charge accumulation between H₂ and graphene observed. However, in the modes M1 and M2, the H₂ captures electrons from the doped graphene system, further confirming the binding between adsorbed H₂ and Mo-doped graphene. As can be seen in Figure 3, the H₂ molecules in modes M1 and M2 gain 0.28 e and 0.29 e, respectively. Accordingly, the Mo-dopant loses electronic charge of 0.27 e and 0.26 e in modes M1 and M2. The other charges mainly comes from the C neighbors. The calculated results reveal that the chemisorbed H₂ molecule in the modes M1 and M2 will capture electrons from the doped graphene, agreeing well with the results in previously studies [2, 21].

(a)

(b)

Figure 3: The plots of the deformation electron density for M1 and M2 modes (blue color: electron trap; yellow color: electron release).

The electronic densities of states (DOS) for the pristine and Mo-doped graphene systems were also studied to better understand the interaction between the H₂ molecule and sensing material (modes V1 and M1), as shown in Figure 4. The calculation results of modes V2 and M2 are shown in Figures S3 and S4, respectively. The molecular orbitals of the adsorbents are recognizable in the supercell DOS, meaning that there is no obvious hybridization between the H₂ molecule and intrinsic graphene sheet. The calculation results further prove the placed H₂ has little effect on the graphene state, indicating that the intrinsic graphene presents poor sensing performance to H₂ [20, 22]. In the doped systems of M1 and M2, the doped graphene state is obviously affected by the adsorption of the H₂ molecule. As can be seen, the electronic structure of the material changes a lot after the H₂ adsorbed on the material’s surface. The calculation of PDOS (partial density of states) for adsorbed H₂, Mo, and C atoms in the doped system is also shown in Figures 4(b) and S4. The adsorbed H₂ molecule obviously hybridizes with the doped Mo atom and carbon atoms of the graphene sheet [22–24]. And, the PDOS of H₂ also reveals the H₂ in M1 and M2 is no longer a free one compared with that in Figure S3, demonstrating the direct interaction between the H₂ molecule and Mo-doped graphene. The research implies that the hydrogen sensing performance could be enhanced through doping with Mo, and the Mo-doped graphene has the prospect of being an effective material to sensing the H₂ molecule.

(a)

(b)

Figure 4: The electronic density of state for (a) H₂-graphene system (Mode V1) and (b) H₂–Mo-doped graphene system (Mode M1) with preferred configuration.

4. Conclusion

The first-principles calculations of the interaction between H₂ and graphene-based material show that the H₂ sensing behavior of graphene can be highly enhanced by doping with Mo. The H₂ molecule runs away from the pristine graphene and is more likely to be physically adsorbed on intrinsic graphene due to weak van der Waals interaction between them. In contrast, there is clear evidence showing that H₂ molecules can be stably chemisorbed on the Mo-doped graphene with shorter distance from the sensing surface. Both the changes in the electronic structure and the orbital hybridization between H₂ and MoGs confirm the promising H₂ sensing property of the graphene doped with Mo. Therefore, our work gives a new insight into the design of hydrogen sensor based on the Mo-doped graphene.

Data Availability

The figure data used to support the findings of this study are included within the Supplementary Materials file.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Acknowledgments

This work was financially supported by the National Natural Science Foundation of China (Grant no. 51802109), the Science and Technology Research Project for Young Professionals of Education Department of Hubei Province (Grant no. Q20182903), the Priority Supported Majors of Huanggang Normal University (Grant no. 2018-3), and the Natural Science Foundation of Hubei Province in China (Grant no. 2013CFB014).

Supplementary Materials

Supplementary materials contain four main figures. Figure S1: the initial structures of a H₂ molecule adsorbed on the Mo-doped graphene with different orientations. Figure S2: the plots of the deformation electron density for built-up V1 and V2 modes. Figure S3: the electronic density of state (DOS) for the H₂-graphene system (mode V2). Figure S4: the electronic density of state (DOS) for the H₂-Mo-doped graphene system (Mode M2) with preferred configuration. (Supplementary Materials)

References

K. S. Novoselov, A. K. Geim, S. V. Morozov et al., “Electric field effect in atomically thin carbon films,” Science, vol. 306, no. 5696, pp. 666–669, 2004.

S. Nachimuthu, L. Po-Jung, and J.-C. Jiang, “Efficient hydrogen storage in boron doped graphene decorated by transition metals—a first-principles study,” Carbon, vol. 73, pp. 132–140, 2014.

B. Xu, J. Yin, Y. D. Xia, X. G. Wan, K. Jiang, and Z. G. Liu, “Electronic and magnetic properties of zigzag graphene nanoribbon with one edge saturated,” Applied Physics Letters, vol. 96, no. 16, Article ID 163102, 2010.

L. Zhang and Z. Xia, “Mechanisms of oxygen reduction reaction on nitrogen-doped graphene for fuel cells,” Journal of Physical Chemistry C, vol. 115, no. 22, pp. 11170–11176, 2011.

O. Leenaerts, B. Partoens, and F. M. Peeters, “Adsorption of H₂O, NH₃, CO, NO₂, and NO on graphene: a first-principles study,” Physical Review B, vol. 77, no. 12, Article ID 125416, 2008.

N. Suvansinpan, F. Hussain, G. Zhang, C. Cheng Hsin, Y. Cai, and Y.-W. Zhang, “Substitutionally doped phosphorene: electronic properties and gas sensing,” Nanotechnology, vol. 27, no. 6, Article ID 065708, 2016.

S. R. Ali and E. Abedini, “Chemisorption of NO on Pt-decorated graphene as modified nanostructure media: a first principles study,” Applied Surface Science, vol. 360, pp. 1041–1046, 2016.

L. Ma, J.-M. Zhang, K.-W. Xu, and J. Vincent, “A first-principles study on gas sensing properties of graphene and Pd-doped graphene,” Applied Surface Science, vol. 343, pp. 121–127, 2015.

D. Cortés-Arriagada, N. Villegas-Escobar, and D. E. Ortega, “Fe-doped graphene nanosheet as an adsorption platform of harmful gas molecules (CO, CO₂, SO₂ and H₂S), and the co-adsorption in O₂ environments,” Applied Surface Science, vol. 427, pp. 227–236, 2018.

H. Gu, Z. Wang, and Y. Hu, “Hydrogen gas sensors based on semiconductor oxide nanostructures,” Sensors, vol. 12, no. 5, pp. 5517–5550, 2012.

G. Liu, Z. Wang, Z. Chen et al., “Remarkably enhanced room-temperature hydrogen sensing of SnO₂ nanoflowers via vacuum annealing treatment,” Sensors, vol. 18, no. 4, p. 949, 2018.

S. Phanichphant, “Semiconductor metal oxides as hydrogen gas sensors,” Procedia Engineering, vol. 87, pp. 795–802, 2014.

Y. Wang, B. Liu, S. Xiao et al., “High performance and negative temperature coefficient of low temperature hydrogen gas sensors using palladium decorated tungsten oxide,” Journal of Materials Chemistry A, vol. 3, no. 3, pp. 1317–1324, 2015.

H.-p. Zhang, X.-g. Luo, L. Xiao-yang, X. Lu, and L. Yang, “Density functional theory calculations of hydrogen adsorption on Ti-, Zn-, Zr-, Al-, and N-doped and intrinsic graphene sheets,” International Journal of Hydrogen Energy, vol. 38, no. 33, pp. 14269–14275, 2013.

R. Lotfi and R. Saboohi, “A comparative study on hydrogen interaction with defective graphene structures doped by transition metals,” Physica E: Low-dimensional Systems and Nanostructures, vol. 60, pp. 104–111, 2014.

C. Tabtimsai, R. Wandee, and W. Banchob, “Hydrogen adsorption on graphene sheets doped with group 8B transition metal: a DFT investigation,” Vacuum, vol. 139, pp. 101–108, 2017.

S. Yang, Z. Wang, Y. Hu et al., “Defect-original room-temperature hydrogen sensing of MoO₃ nanoribbon: experimental and theoretical studies,” Sensors and Actuators B: Chemical, vol. 260, pp. 21–32, 2018.

M. Chi and Y.-P. Zhao, “Adsorption of formaldehyde molecule on the intrinsic and Al-doped graphene: a first principle study,” Computational Materials Science, vol. 46, no. 4, pp. 1085–1090, 2009.

H.-p. Zhang, X.-g. Luo, S. Hong-tao, L. Xiao-yan, X. Lu, and Y. Tang, “DFT study of adsorption and dissociation behavior of H₂S on Fe-doped graphene,” Applied Surface Science, vol. 317, pp. 511–516, 2014.

X.-Y. Liang, N. Ding, S.-P. Ng, and C.-M. L. Wu, “Adsorption of gas molecules on Ga-doped graphene and effect of applied electric field: a DFT study,” Applied Surface Science, vol. 411, pp. 11–17, 2017.

Z. M. Ao, A. D. Hernández-Nieves, F. M. Peeters, and S. Li, “The electric field as a novel switch for uptake/release of hydrogen for storage in nitrogen doped graphene,” Physical Chemistry Chemical Physics, vol. 14, no. 4, pp. 1463–1467, 2012.

Z. M. Ao, S. Li, and Q. Jiang, “Correlation of the applied electrical field and CO adsorption/desorption behavior on Al-doped graphene,” Solid State Communications, vol. 150, no. 13-14, pp. 680–683, 2010.

T. Zhang, Q. Xue, M. Shan et al., “Adsorption and catalytic activation of O₂ molecule on the surface of Au-doped graphene under an external electric field,” Journal of Physical Chemistry C, vol. 116, no. 37, pp. 19918–19924, 2012.

M. D. Ganji, S. Narges, A. Mahdi, and A. M. Ghorbanzadeh, “Pt-decorated graphene as superior media for H₂S adsorption: a first-principles study,” Applied Surface Science, vol. 261, pp. 697–704, 2012.