Journal of Ophthalmology

Volume 2013 (2013), Article ID 347801, 5 pages

http://dx.doi.org/10.1155/2013/347801

Clinical Study

In Vivo Comparison of 23- and 25-Gauge Sutureless Vitrectomy Incision Architecture Using Spectral Domain Optical Coherence Tomography

Anderson Teixeira,1,2,3 Flavio A. Rezende,4,5 Camila Salaroli,1,2 Nonato Souza,¹ Benedito Antonio Sousa,³ and Norma Allemann2,6

¹Teixeira Oftalmologia, SDS Bloco D No 27, Sala 306, 70392-901 Brasília, DF, Brazil

²Department of Ophthalmology, Universidade Federal de São Paulo, São Paulo, SP, Brazil

³Department of Ophthalmology, Universidade Católica de Brasília, Brasília, DF, Brazil

⁴Department of Ophthalmology, Hôpital Maisonneuve-Rosemont, Université de Montréal, Montréal, QC, Canada

⁵Department of Ophthalmology, Pontifícia Universidade Católica, Rio de Janeiro, RJ, Brazil

⁶Department of Ophthalmology, University of Illinois at Chicago, Chicago, IL, USA

Received 19 November 2012; Accepted 30 January 2013

Academic Editor: David A. Wilkie

Copyright © 2013 Anderson Teixeira et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. To investigate the in vivo incision architecture using spectral domain optical coherence tomography (SD-OCT) in 23-gauge and 25-gauge transconjunctival sutureless pars plana vitrectomy (TSPPV). Methods. A prospective observational study of 22 eyes of 22 patients that underwent three-port 25-gauge (10 eyes) or 23-gauge (12 eyes) TSPPV was performed. The three sclerotomies sites in each eye were analyzed by Corneal Adapter Model (CAM) RTVue SD-OCT (Optovue Inc., Fremont, CA, USA) with wound cross-section images (longitudinal and transversal) on days 1, 7, and 30 postoperatively. Transversal and longitudinal length, location, angle between the conjunctival surface tangent and the incision plane, and architecture deformations were evaluated. Results. All patients (22 eyes) completed the study and surgeries lasted less than 60 minutes. All wounds were obliquely performed, 23-gauge mean angle was 23 ± 5°, and 25-gauge angule was 21 ± 4°. Twenty-three-gauge sclerotomy transversal mean length was 1122 ± 242 μm and 25-gauge transversal sclerotomy mean length was 977 ± 174 μm; 23-gauge longitudinal mean length was 363 ± 42 μm and 25-gauge longitudinal sclerotomy mean length was 234 ±19 μm; 23-gauge open wound thickness mean was 61 ± 28 μm and 25-gauge open wound thickness mean was 22 ± 6 μm. All results were statistically significant (). No vitreous incarceration or silicone oil residue was observed in incision sites with both gauges. Conclusions. The 23-gauge and 25-gauge architectural wound constructions were well visualized using CAM SD-OCT. Statistical differences between the two gauges were observed throughout the study period.

1. Introduction

Transconjunctival sutureless pars plana vitrectomy (TSPPV) has considerably transformed the outlook of patient management in the field of retina and vitreous surgery since when described in 2002 [1, 2]. At first, the cannulas were introduced straight through the sclera at the sclerotomy sites in a perpendicular fashion. However, with this technique questions have been raised regarding to the true self-sealing characteristics of some of these TSPPV, with reports of increased hypotony and endophthalmitis rates associated [3–9]. The creation of the beveled opposed to a straight sclerotomy incision to prevent leakage through these sutureless wounds was a greater advantage for the procedure [10–14]. But the limitations of the instruments, fluidics, extensive flexibility of the instruments, and poor illumination caused by a small lumen 0.5 mm caliber reduced the use of 25-gauge TSPPV, even with advantages over the traditional techniques such as reduced surgical trauma, improved postoperative comfort, faster visual recovery, shorter operating times, and reduced postoperative astigmatism [2, 15, 16]. This procedure became increasingly most commonly used when 23-gauge TSPPV was introduced to overcome the limitations of 25-ga describe above [17–20].

However, there still exists debate of the self-sealing characteristics of TSPPV with respect to the best wound architecture construction. Recently, ultrasound biomicroscopy (UBM) [21] and time-domain optical coherence tomography (OCT) [22–24] have been used to evaluate wound architecture in vivo. The aim of this study was, therefore, to use the high-resolution anterior segment (AS) spectral domain OCT (SD-OCT) to investigate the wound architecture of both 23-ga and 25-gauge TSPPV in order to gain further insight into the sclerotomy wound construction.

2. Materials and Methods

Twenty-two consecutive patients (minimum age: 18 years old) have undergone primary TSPPV 23-gauge or 25-gauge using one-step Alcon/Grieshaber trocar cannula set (Alcon/Grieshaber, Alcon Laboratories, Inc., Fort Worth, TX, USA) and Accurus 400 VS vitreous machine (Alcon Laboratories, Inc., Fort Worth, TX, USA). In this study we used the new generation of the trocar cannula set that is composed of trocar and metal cannula, different from the oldest generation that is composed of polymer cannula for the 25-gauge set. The surgical parameters were for 23-gauge: 1800–2500 cuts per minute (CPM) and 200–400 mmHg of vacuum—using 3D parameter; and 25-gauge: 1800–2500 CPM and 400–600 mmHg of vacuum—using 3D parameter. Study participants were recruited from the clinical practices by the coauthors AT and CS according to a prospective study protocol approved by the institutional review board. Informed consent was obtained and documented for every participant. The study adhered to the tenets of Declaration of Helsinki. The eye was randomly selected for each gauge, and all TSPPV surgeries were performed by the same surgeon (AT), within less than 60 minutes. Exclusion criteria included history of previous pars plana vitrectomy surgery.

Demographics of patients, diagnoses, and type of procedures performed were also recorded. Anatomical outcomes and any postoperative complications, especially sclerotomy-related ones, were specifically evaluated. A spectral-domain OCT system (RTVue, Optovue Inc., Fremont, CA) with a corneal adaptor module (CAM) was used to image the sclerotomies on postoperative days 1, 7, and 30. A crossline scan pattern was used to measure the scleral incisions positioning the caliper mark perpendicularly to the limbus.

A conventional three-port vitrectomy was performed with a straight angled incision of 20 degrees to 30 degrees in all patients; the wound locations were superotemporal, superonasal, and inferotemporal in all eyes. Measurements of the transversal and longitudinal incision length and of the angle formed between the conjunctival surface tangent and the incision plane were taken; besides, information about location and architecture deformations was collected (Figure 1). SAS V9.1 programming language (SAS Institute Inc., Cary, NC, USA) was used for statistical analyses. Accepted level of significance for all tests was a P value of less than 0.05.

Figure 1: Images of the 25-gauge sclerotomies on postoperative. A cross line scan parameters of transverse and longitudinal measurements illustrated with a diagrams.

3. Results

Average patient age at time of surgery was 65.1 (range 36–83 years). Ten patients were men. Thirty 25-gauge sclerotomies of ten eyes and thirty-six 23-gauge sclerotomies of 12 eyes were analyzed. Indications for surgery were epiretinal membrane (4), rhegmatogenous retinal detachment (RD) (4), tractional RD (8), and macular hole (6). Combined phacoemulsification and IOL implantation through clear corneal incision were performed in 2 eyes with RD. All cataract incisions were performed after the infusion trocar was placed. 10–0 nylon suture was used at the corneal incision to prevent anterior chamber collapse during the cannula insertion. There was no failure in cannula insertion due to hypotony or anterior chamber collapse. In two patients with RD a silicone intraocular injection after vitrectomy (one for each gauge) was necessary. All patients with RD underwent TSPPV without scleral buckle.

No intraoperative suture placement was necessary and no patient had hypotony on the first postoperative day. The IOP was normal in all postoperative visits (range: 12 to 22 mmHg).

All three incisions of each eye were evaluated using SD-OCT to define incision on postoperative days 1, 7, and 30. Transversal and longitudinal length, location, angle formed between the conjunctival surface tangent and the incision plane, and architecture deformations were evaluated. All wounds were obliquely performed, 23-gauge mean incision angle was (range: 37 to 5 degrees), and in 25-gauge, (range: 31 to 4 degrees). Mean transversal sclerotomy length was  μm with 23-gauge (range: 1781 to 283) and  μm (range: 1650 to 174) with 25-gauge. Mean longitudinal sclerotomy length was  μm (range: 543 to 42) with 23-gauge, and  μm (range: 265 to 19) with 25-gauge. Mean open wound thickness was  μm (range: 543 to 42) with 23-gauge and  μm (range: 48 to 6) with 25-gauge. All results were statistically significant (). No vitreous incarceration or silicone oil residue was observed in incision sites with both gauges (Figures 2 and 3), and no architectural structure difference was observed comparing macular to RD cases. Tables 1 and 2 describe transversal and longitudinal results for all gauges.

Table 1: Transversal length of sclerotomy incisions after transconjunctival sutureless pars plana vitrectomy performed with 23-gauge and 25-gauge measured with SD-OCT at the postoperative followup.

23-gauge (microns)

Average ± SD
25-gauge (microns)

Average ± SD
value

Postoperative day 1

0.03

Postoperative day 7

0.04

Postoperative day 30

0.003

Total

0.04

Table 2: Longitudinal length of sclerotomy incisions after transconjunctival sutureless pars plana vitrectomy performed with 23-gauge and 25-gauge measured with SD-OCT at the postoperative followup.

23-gauge (microns)

Average SD
25-gauge (microns)

Average SD
value

Postoperative day 1

<0.001

Postoperative day 7

<0.001

Postoperative day 30

<0.001

Total

<0.001

Figure 2: Spectral domain OCT images (RTVue with a corneal adaptor module-CAM from Optovue Inc., Fremont, CA) at the postoperative period of 23-gauge sutureless pars plana vitrectomy. (A) Longitudinal (upper) and transversal (bottom) length measurement at the sclerotomy incision, on postoperative day 1. (B) Longitudinal (upper) and transversal (bottom) length measurement at the sclerotomy incision, on postoperative day 7. (C) Longitudinal (upper) and transversal (bottom) length measurement at the sclerotomy incision, on postoperative day 30.

Figure 3: Spectral domain OCT images (Optovue with Cornea Camera) at the postoperative period of 25-gauge sutureless pars plana vitrectomy. (A) Longitudinal (upper) and transversal (bottom) length measurement at the sclerotomy incision, on postoperative day 1. (B) Longitudinal (upper) and transversal (bottom) length measurement at the sclerotomy incision, on postoperative day 7. (C) Longitudinal (upper) and transversal (bottom) length measurement at the sclerotomy incision, on postoperative day 30.

4. Discussion

Chen first described sutureless self-sealing sclerotomies in 1996 [25]. After that, other authors have described their experience and technique modification [1, 2, 17, 26]. Twenty-three and 25-gauge tunnel incision cannulas require no suture because of a reduced diameter, 0.5 mm [1] and 0.72 mm [17], respectively, placed obliquely to the scleral surface. The longitudinal length of the sclerotomy was around 50% of the lumen diameter of the gauges. On postoperative days 1 and 30, the incision length showed low variance, suggesting that the scleral fibers were partially cut and partially dissected without damage, suggesting no variation during those days (Table 1).

Imaging exams, such as UBM [21] and AS-OCT, serve as a tool to produce clear cross-sectional images of the pars plana, including vitreous base. These regions are difficult to examine adequately using lenses and/or slit lamp, and it may be useful to locate the sclerotomy site [27]. Boker and Spitznas reported the use of UBM to examine the sclerotomy site after PPV [28]. In a series of 20 eyes of 19 patients, the entry sites were identified by UBM, and the authors concluded that UBM was useful in determining possible sources of complications after vitrectomy and could give further insight into the interactions between pars plana sclerotomy and anterior fibrovascular proliferation [29]. The major shortcoming of UBM is that the direct pressure of the open immersion cup on the incisions could alter the observed architecture and increase the potential risk of endophthalmitis, especially in the early postoperative period [22]. The risk of compression with the UBM exam can possibly be reduced using the ClearScan bag/balloon available.

Some authors demonstrated the importance of the oblique incisions in vitro studies where angled incisions were superior at histopathology and in AS-OCT [14, 23, 30]. Taban et al. using time domain AS-OCT imaging demonstrated that 23-gauge sutureless vitrectomy performed using oblique (angled) incisions provided adequate wound closure evident even on postoperative day one [23].

Anterior segment OCT is a noncontact and noninvasive imaging exam and considered for serial examination. Time domain AS-OCT is well suited to examine sutureless vitrectomy incisions in the immediate postoperative period, with adequate penetration depth and low resolution [22]. SD-OCT images obtained not only clearly showed the profile of the incisions with a high resolution that allowed accurate measurement of parameters such as incision length and angle, but also identified the fine architectural features identified by the authors as wound opening thickness. SD-OCT has a limitation related to depth.

In the present study, we were able to identify the three sclerotomy sites with SD-OCT using the corneal camera. All wounds were obliquely built with a safety angle of entrance, longitudinal diameter was close to 50% of the cannula lumen, and transversal wound length (distance between the external and internal scleral limits) was around 1 mm. There was an adequate wound closure with a hyporeflective signal corresponding to an open wound thick scar. All results were statistically significant showing difference between the wound architecture comparing sutureless vitrectomy with 23-gauge and 25-gauge.

Conflict of Interests

The authors declare no conflict of interests.

References

G. Y. Fujii, E. De Juan Jr., M. S. Humayun, et al., “A new 25-gauge instrument system for transconjunctival sutureless vitrectomy surgery,” Ophthalmology, vol. 109, no. 10, pp. 1807–1812, 2002.

G. Y. Fujii, E. De Juan, M. S. Humayun et al., “Initial experience using the transconjunctival sutureless vitrectomy system for vitreoretinal surgery,” Ophthalmology, vol. 109, no. 10, pp. 1814–1820, 2002.

D. Y. Kunimoto and R. S. Kaiser, “Incidence of endophthalmitis after 20- and 25-gauge vitrectomy,” Ophthalmology, vol. 114, no. 12, pp. 2133–2137, 2007.

S. Shaikh, S. Ho, P. P. Richmond, J. C. Olson, and C. D. Barnes, “Untoward outcomes in 25-gauge versus 20-gauge vitreoretinal surgery,” Retina, vol. 27, no. 8, pp. 1048–1053, 2007.

I. U. Scott, H. W. Flynn, S. Dev et al., “Endophthalmitis after 25-gauge and 20-gauge pars plana vitrectomy: incidence and outcomes,” Retina, vol. 28, no. 1, pp. 138–142, 2008.

N. Acar, Z. Kapran, Y. B. Unver, T. Altan, and S. Ozdogan, “Early postoperative hypotony after 25-gauge sutureless vitrectomy with straight incisions,” Retina, vol. 28, no. 4, pp. 545–552, 2008.

S. H. Byeon, Y. J. Lew, M. Kim, and O. W. Kwon, “Wound leakage and hypotony after 25-gauge sutureless vitrectomy: factors affecting postoperative intraocular pressure,” Ophthalmic Surgery, Lasers & Imaging, vol. 39, no. 2, pp. 94–99, 2008.

O. P. Gupta, E. D. Weichel, C. D. Regillo et al., “Postoperative complications associated with 25-gauge pars plana vitrectomy,” Ophthalmic Surgery Lasers and Imaging, vol. 38, no. 4, pp. 270–275, 2007.

L. Kellner, B. Wimpissinger, U. Stolba, W. Brannath, and S. Binder, “25-Gauge vs 20-gauge system for pars plana vitrectomy: a prospective randomised clinical trial,” British Journal of Ophthalmology, vol. 91, no. 7, pp. 945–948, 2007.

N. Acar, Z. Kapran, T. Altan, Y. B. Unver, S. Yurtsever, and Y. Kucuksumer, “Primary 25-gauge sutureless vitrectomy with oblique sclerotomies in pseudophakic retinal detachment,” Retina, vol. 28, no. 8, pp. 1068–1074, 2008.

L. López-Guajardo, J. Pareja-Esteban, and M. A. Teus-Guezala, “Oblique sclerotomy technique forprevention of incompetent wound closure in transconjunctival 25-gauge vitrectomy,” American Journal of Ophthalmology, vol. 141, no. 6, pp. 1154–1156, 2006.

M. Inoue, K. Shinoda, H. Shinoda, R. Kawamura, K. Suzuki, and S. Ishida, “Two-step oblique incision during 25-gauge vitrectomy reduces incidence of postoperative hypotony,” Clinical and Experimental Ophthalmology, vol. 35, no. 8, pp. 693–696, 2007.

H. Shimada, H. Nakashizuka, R. Mori, Y. Mizutani, and T. Hattori, “25-gauge scleral tunnel transconjunctival vitrectomy,” American Journal of Ophthalmology, vol. 142, no. 5, pp. 871–873, 2006.

R. P. Singh, H. Bando, O. F. M. Brasil, D. R. Williams, and P. K. Kaiser, “Evaluation of wound closure using different incision techniques with 23-gauge and 25-gauge microincision vitrectomy systems,” Retina, vol. 28, no. 2, pp. 242–248, 2008.

M. Nagpal, S. Wartikar, and K. Nagpal, “Comparison of clinical outcomes and wound dynamics of sclerotomy ports of 20, 25, and 23 gauge vitrectomy,” Retina, vol. 29, no. 2, pp. 225–231, 2009.

A. Yanyali, E. Celik, F. Horozoglu, and A. F. Nohutcu, “Corneal topographic changes after transconjunctival (25-gauge) sutureless vitrectomy,” American Journal of Ophthalmology, vol. 140, no. 5, pp. 939–941, 2005.

C. Eckardt, “Transconjunctival sutureless 23-gauge vitrectomy,” Retina, vol. 25, no. 2, pp. 208–211, 2005.

M. N. Lott, M. H. Manning, J. Singh, H. Zhang, H. Singh, and D. M. Marcus, “23-gauge vitrectomy in 100 eyes short-term visual outcomes and complications,” Retina, vol. 28, no. 9, pp. 1193–1200, 2008.

O. P. Gupta, A. C. Ho, P. K. Kaiser, et al., “Short-term outcomes of 23-gauge pars plana vitrectomy,” American Journal of Ophthalmology, vol. 146, pp. 193–197, 2008.

B. Parolini, F. Romanelli, G. Prigione, and G. Pertile, “Incidence of endophthalmitis in a large series of 23-gauge and 20-gauge transconjunctival pars plana vitrectomy,” Graefe's Archive for Clinical and Experimental Ophthalmology, vol. 247, no. 7, pp. 895–898, 2009.

A. Teixeira, N. Allemann, A. C. N. Yamada, F. Uno, A. Maia, and P. P. Bonomo, “Ultrasound biomicroscopy in recently postoperative 23-gauge transconjunctival vitrectomy sutureless self-sealing sclerotomy,” Retina, vol. 29, no. 9, pp. 1305–1309, 2009.

D. Chen, Y. Lian, L. Cui, F. Lu, Z. Ke, and Z. Song, “Sutureless vitrectomy incision architecture in the immediate postoperative period evaluated in vivo using optical coherence tomography,” Ophthalmology, vol. 117, no. 10, pp. 2003–2009, 2010.

M. Taban, S. Sharma, A. A. C. M. Ventura, and P. K. Kaiser, “Evaluation of wound closure in oblique 23-gauge sutureless sclerotomies with visante optical coherence tomography,” American Journal of Ophthalmology, vol. 147, no. 1, pp. 101.e1–107.e1, 2009.

R. Guthoff, H. Riederle, B. Meinhardt, and W. Goebel, “Subclinical choroidal detachment at sclerotomy sites after 23-gauge vitrectomy: analysis by anterior segment optical coherence tomography,” Ophthalmologica, vol. 224, no. 5, pp. 301–307, 2010.

J. C. Chen, “Sutureless pars plana vitrectomy through self-sealing sclerotomies,” Archives of Ophthalmology, vol. 114, no. 10, pp. 1273–1275, 1996.

A. K. H. Kwok, C. C. Y. Tham, D. S. C. Lam, M. Li, and J. C. Chen, “Modified sutureless sclerotomies in pars plana vitrectomy,” American Journal of Ophthalmology, vol. 127, no. 6, pp. 731–733, 1999.

J. Schmidt, G. W. Nietgen, and S. Brieden, “Self-sealing, sutureless sclerotomy in pars-plana vitrectomy,” Klinische Monatsblatter fur Augenheilkunde, vol. 215, no. 4, pp. 247–251, 1999.

T. Boker and M. Spitznas, “Ultrasound biomicroscopy for examination of the sclerotomy site after pars plana vitrectomy,” American Journal of Ophthalmology, vol. 118, no. 6, pp. 813–815, 1994.

R. Rahman, P. H. Rosen, C. Riddell, and H. Towler, “Self-sealing sclerotomies for sutureless pars plana vitrectomy,” Ophthalmic Surgery and Lasers, vol. 31, no. 6, pp. 462–466, 2000.

M. Taban, A. A. C. M. Ventura, S. Sharma, and P. K. Kaiser, “Dynamic evaluation of sutureless vitrectomy wounds: an optical coherence tomography and histopathology study,” Ophthalmology, vol. 115, no. 12, pp. 2221–2228, 2008.