Journal of Ophthalmology

Volume 2013 (2013), Article ID 974670, 4 pages

http://dx.doi.org/10.1155/2013/974670

Research Article

Bevacizumab for CRVO Associated CME: Effect of Timing and Frequency of Injections on Final Visual Outcome

Joseph Pikkel,1,2 Otzem Chassid,¹ Yumna Busool,¹ Ward Srour,¹ Adi Sharabi-Nov,³ and Itzchak Beiran4,5

¹Department of Ophthalmology, Ziv Medical Center, Safed, Israel

²Faculty of Medicine, Bar Ilan University, Safed, Israel

³Research Wing, Ziv Medical Center, Safed, Israel and Tel-Hai Academic College, Israel

⁴Department of Ophthalmology, Rambam Medical Center, Haifa, Israel

⁵The B. Rappaport Faculty of Medicine, Technion, Haifa, Israel

Received 6 October 2013; Revised 25 November 2013; Accepted 4 December 2013

Academic Editor: Lawrence S. Morse

Copyright © 2013 Joseph Pikkel et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. Injection of anti-VEGF antibody into the vitreous body is a well-established treatment for ischemic central retinal vein occlusion (CRVO) associated macular edema. Various treatment regimens regarding the timing, number, and frequency of injections have been proposed. Methods. We reviewed the medical records of 68 patients treated by intravitreal bevacizumab (Avastin) injections for macular edema due to CRVO. We examined final visual acuity six months following the last injection in relation to injection policy (one primary injection followed by subsequent injections based on anatomical response versus a prescheduled protocol of one injection per month for the first 3 months) and in relation to the time lapsing from CRVO diagnosis to the first injection. Results. Mean visual acuity improved more for patients treated by a protocol of 3 prescheduled injections than for those treated with one primary injection. Improvement in mean visual acuity was greater for patients who received their first injection within the first month than those treated after 3 months (). Conclusion. A protocol of three prescheduled injections of bevacizumab, starting within one month of a CRVO event, was associated with better visual outcome compared to single injection and/or treatment starting more than 3 months following the time of diagnosis.

1. Introduction

Ischemic central retinal vein occlusion (CRVO) is a retinal vascular disorder that carries a potential risk of blindness. The introduction of anti-VEGF therapy has altered treatment options for this disease [1]. However, there is currently no standard treatment protocol for ischemic CRVO in an acute setting. Macular grid laser photocoagulation has demonstrated effectiveness in treating macular edema (ME) in branch retinal vein occlusion (BRVO) but not in CRVO [2]. Other medical and surgical therapies that have been suggested have failed to achieve the desired outcome or were associated with undesirable complications [3–10].

Vascular endothelial growth factor (VEGF), triggered by hypoxia, has been shown to increase in pathological ischemic conditions [11, 12]. In cases of CRVO, there is evidence of intraretinal upregulated expression of VEGF mRNA [13]. Increased concentration of VEGF has been reported in the vitreous fluid of patients with ischemic CRVO and plays a role in the increased vascular permeability that leads to ME [14]. Thus, the injection of anti-VEGF antibody into the vitreous body has become an accepted treatment for CRVO associated ME [15]. Following intravitreal bevacizumab injections, VEGF levels were shown to decrease considerably, to a concentration lower than physiologic levels [16].

At the present time no substantiated protocol for treating ischemic CRVO associated ME by anti-VEGF is available. Some retinal specialists inject once while others inject three times. The optimal sequence and timing of intravitreal anti-VEGF injections have yet to be determined.

In an attempt to assess the association of the number and timing of bevacizumab injections with the final visual outcome in cases of ischemic CRVO associated ME we compared retrospectively the visual outcome of patients who were treated with intravitreal anti-VEGF by different protocols in one ophthalmology department during 6-year period.

2. Methods

The medical records of all patients that suffered from ischemic central retinal vein occlusion and were treated with intravitreal bevacizumab (Avastin) injections for ME due to CRVO in the Ziv Medical Center, Israel, from January 1, 2006 to December 31, 2011, were reviewed. Ischemic central retinal vein occlusion was diagnosed if there was severe visual loss (equal or less than 20/200), extensive retinal hemorrhages, and cotton-wool spots, presence of relative afferent pupillary defect, poor perfusion to retina in FFA examination, and macular edema clinically and/or in OCT examination. All patients underwent an FFA examination and an OCT examination [17–19]. Data collected included age, gender, general health condition, primary visual acuity, visual acuity 6 months after last injection, timing of first intravitreal injection, and existence of macular edema 6 months after last injection. The difference between baseline and final visual acuity was calculated for each patient. Patients for whom at least 6-month follow-up data after the last injection were not available or who had incomplete medical records were excluded from the study.

Patients who were treated at the beginning of the study period (from January 2006 to June 2008) received one injection (and subsequent injections based on anatomical response). From July 2008, patients were treated according to a prescheduled protocol of one injection per month for the first 3 months.

Patients were divided into two major groups: those whose primary treatment consisted of one injection and those whose primary treatment consisted of one injection per month for 3 months. The two groups were divided into four subgroups by the timing of their first Avastin injection—within one month of the CRVO event, 1-2 months from the CRVO event, 2-3 months from the event, and 3 or more months after the CRVO event.

Statistical analyses and the Kruskal-Wallis nonparametric test were used to compare treatment outcomes among the study groups. Chi-square correlation was used to calculate the correlations between the categorical variables. value <0.05 was considered statistically significant.

3. Results

Of 96 patients treated in our department for ischemic CRVO between January 1, 2006 and December 31, 2011, 68 met the inclusion criteria of the present study. For 29 patients, primary treatment was one intravitreal injection of bevacizumab. Of them, 6 received an additional injection and 2 received 2 additional injections. Thirty-nine were treated according to a preset protocol of three injections (one injection per month for 3 months).

Demographic data and incidence rates of selected relevant systemic diseases did not differ significantly between the two groups (Table 1). Table 2 and Figure 1 present the improvement in visual acuity according to the time from the CRVO event to the first Avastin injection and the regimen of injections administered (1 versus 3 prescheduled injections). No improvement in visual acuity was observed among those treated according to a single or three-injection regimen. For both regimens, the earlier the administration of the first Avastin injection, the greater the improvement in visual acuity.

Table 1: Demographic data and incidence rates of selected diseases.

Characteristic
All patients ()
1 injection ()
3 injections ()
()

%

%

%

Sex (number male)
42
61.8
17
58.6
25
64.1
0.212

Diagnosed with hypertension
43
63.2
17
58.6
26
66.7
0.496

Diagnosed with diabetes
27
39.7
12
41.1
15
38.5
0.808

Diagnosed with hypercoagulability
1
1.5
1
3.4
0
0

Age: mean (range)
68.0 (29–83)

63.5 (29–79)

63.4 (49–83)

0.890

Baseline visual acuity (Mean)
6/90

6/85

6/95

0.963

Table 2: Mean change of visual acuity by the time from the CRVO event to the first Avastin injection and the regimen of injections administered.

Number and timing of injections
Mean primary visual acuity
Mean final visual acuity
Change in mean visual acuity

1 injection within 1 month
0.075
0.166
0.091

1 injection within 2 months
0.05
0.18
0.058

1 injection within 3 months
0.05
0.072
0.022

1 injection after more than 3 months
0.02
0.02
0.00

3 injections beginning within 1 month
0.05
0.193
0.143

3 injections beginning within 2 months

0.075
0.168
0.093

3 injections beginning within 3 months

0.04
0.091
0.051

3 injections beginning after more than 3 months

0.02
0.017
−0.003

Figure 1: Improvement of mean visual acuity according to time of first injection and number of injections. Different subscripts represent statistically significant differences between the groups (). The 2 statistically significant results are 3 injections starting within the first month (greatest improvement) and 1 or 3 injections starting after 3 months (worst result).

The number of patients treated with one injection in each subgroup and the number of patients with residual edema are shown in Table 3.

Table 3: Patients, timing of injections, and residual edema in OCT-1 injection group.

1 injection within 1 month
1 injection within 2 months
1 injection within 3 months
1 injection after more than 3 months

No. of patients
12
6
5
6

No. of patients with residual edema in OCT
2
1
2
4

The number of patients treated with three injections in each subgroup and the number of patients with residual edema are shown in Table 4.

Table 4: Patients, timing of injections, and residual edema in OCT-3 injections group.

3 injection first within 1 month
3 injection first within 2 months
3 injection first within 3 months
3 injection first after more than 3 months

No. of patients
15
8
9
7

No. of patients with residual edema in OCT
2
1
2
3

The improvement in mean visual acuity between those treated by 3 injections starting within the first month (best improvement) and those treated with 1 or 3 injections, starting after 3 months (worst result) was statistically significant ().

4. Discussion

Therapies that have been explored for treatment of CRVO, but have failed to achieve the desired outcome or were associated with undesirable complications, include laser-induced chorioretinal venous anastomosis, intravitreal administration of recombinant tissue plasminogen activator, isovolemic hemodilution therapy, oral pentoxifylline, hyperbaric oxygen therapy, radial optic neurotomy, vitrectomy with or without internal limiting membrane peeling, and direct injection of recombinant tissue plasminogen activator into the lumen of a retinal vein via retinal vein cannulation [3–10]. Intravitreal triamcinolone acetonide injections have been used as an anti-inflammatory agent to treat CRVO-ME with variable success [20]. The short acting effect and possible complications, such as increased intraocular pressure and cataract formation, led to the search of other treatment modalities for CRVO.

Until recently, most of our clinical decisions regarding the management of CRVO-ME were based on the central vein occlusion study [2]. Recently, the Cochrane Eye and Vision Group published a systematic review on anti-VEGF therapy in the management of ME secondary to CRVO [21]. They showed that ranibizumab intravitreal injections yielded good results in the short-term treatment of nonischemic CRVO-ME. Though many studies reported convincing evidence of the benefits of anti-VEGF treatments in CRVO, regarding both visual and anatomical resolution, there were no data on anti-VEGF agents among patients with ischemic CRVO, with or without ME.

The present study was conducted in order to assess injection protocols on final visual acuity in patients treated with Avastin for CRVO associated ME. Patients treated with one injection were compared to patients treated with three injections, and the effect of the timing of the first injection on treatment outcome was studied. Our results demonstrate that bevacizumab intravitreal injections applied up to 3 months following CRVO improve visual acuity. While both early first injection and multiple injections were found to have positive effect on final visual acuity, treatment timing had a greater effect than the number of injections administered. Patients who received only one early Avastin injection within 1 month of a CRVO event demonstrated greater improvement in final visual acuity than did patients who received three injections the first of which being applied more than 2 months after a CRVO event. This difference showed borderline statistical significance (). Patients who received one injection as primary treatment and had additional injections applied later showed less improvement in visual acuity than those who were treated by a preset protocol of three injections. Intravitreal injections that were administered more than three months after CRVO events were not effective in either the single or the preset three injection groups.

Due to the retrospective design of this study, reasons for the differences in timing of the first injections are unknown. Differences in patient awareness and access to medical care may be a possibility.

5. Conclusions

The findings of this study demonstrate improved visual acuity following treatment of CRVO associated ME with bevacizumab intravitreal injections. The observed benefit was greater for patients for whom the first injection was administered early and for patients for whom three injections were administered (compared to a single injection). Large-scale prospective studies are needed to further substantiate and refine the results of this study.

Conflict of Interests

The authors have no conflict of interests to disclose.

References

R. Klein, S. E. Moss, S. M. Meuer, and B. E. K. Klein, “The 15-year cumulative incidence of retinal vein occlusion: the Beaver Dam Eye study,” Archives of Ophthalmology, vol. 126, no. 4, pp. 513–518, 2008.

J. G. Clarkson, E. Chuang, D. Gass et al., “A randomized clinical trial of early panretinal photocoagulation for ischemic central vein occlusion: the Central Vein Occlusion study group N report,” Ophthalmology, vol. 102, no. 10, pp. 1434–1444, 1995.

P. M. Dodson, D. J. Galton, A. M. Hamilton, and R. K. Blach, “Retinal vein occlusion and the prevalence of lipoprotein abnormalities,” British Journal of Ophthalmology, vol. 66, no. 3, pp. 161–164, 1982.

E. Ai and S. S. Yang, “Venous occlusive disease: the latest in current management,” Retina, vol. 26, no. 6, pp. S63–S64, 2006.

A. E. Höh, K. B. Schaal, and S. Dithmar, “Central and branch retinal vein occlusion: current strategies for treatment in Germany, Austria and Switzerland,” Ophthalmologe, vol. 104, no. 4, pp. 290–294, 2007.

C. H. Park, A. W. Scott, and S. Fekrat, “Effect of oral pentoxifylline on cystoid macular edema associated with central retinal vein occlusion,” Retina, vol. 27, no. 8, pp. 1020–1025, 2007.

J. K. Wright, B. Franklin, and E. Zant, “Clinical case report: treatment of a central retinal vein occlusion with hyperbaric oxygen,” Undersea and Hyperbaric Medicine, vol. 34, no. 5, pp. 315–319, 2007.

J. F. Arevalo, R. A. Garcia, L. Wu et al., “Radial optic neurotomy for central retinal vein occlusion: results of the Pan-American Collaborative Retina study group (PACORES),” Retina, vol. 28, no. 8, pp. 1044–1052, 2008.

D. H. Park and I. T. Kim, “Long-term effects of vitrectomy and internal limiting membrane peeling for macular edema secondary to central retinal vein occlusion and hemiretinal vein occlusion,” Retina, vol. 30, no. 1, pp. 117–124, 2010.

J. N. Weiss and L. A. Bynoe, “Injection of tissue plasminogen activator into a branch retinal vein in eyes with central retinal vein occlusion,” Ophthalmology, vol. 108, no. 12, pp. 2249–2257, 2001.

S. Montoro-García, P.-L. Lip, C.-C. Chan, and G. Y. H. Lip, “Soluble Vascular Endothelial Growth Factor Receptor (VEGFR)-2 in macular oedema—a mechanism for regulating angiogenesis?” British Journal of Ophthalmology, vol. 95, no. 6, pp. 757–758, 2011.

P. L. Lip, S. Chatterjee, G. J. Caine et al., “Plasma vascular endothelial growth factor, angiopoietin-2, and soluble and angiopoietin receptor tie-2 in diabetic retinopathy: effects of laser photocoagulcution and angiotensin receptor blockade,” British Journal of Ophthalmology, vol. 88, no. 12, pp. 1543–1546, 2004.

J. Pe'er, R. Folberg, A. Itin, H. Gnessin, I. Hemo, and E. Keshet, “Vascular endothelial growth factor upregulation in human central retinal vein occlusion,” Ophthalmology, vol. 105, no. 3, pp. 412–416, 1998.

H. Noma, H. Funatsu, T. Mimura, S. Harino, T. Sone, and S. Hori, “Increase of vascular endothelial growth factor and interleukin-6 in the aqueous humour of patients with macular oedema and central retinal vein occlusion,” Acta Ophthalmologica, vol. 88, no. 6, pp. 646–651, 2010.

U. E. K. Wolf-Schnurrbusch, R. Ghanem, S. P. Rothenbuehler, V. Enzmann, C. Framme, and S. Wolf, “Predictors of short-term visual outcome after anti-VEGF therapy of macular edema due to central retinal vein occlusion,” Investigative Ophthalmology and Visual Science, vol. 52, no. 6, pp. 3334–3337, 2011.

M. Funk, K. Kriechbaum, F. Prager et al., “Intraocular concentrations of growth factors and cytokines in retinal vein occlusion and the effect of therapy with bevacizumab,” Investigative Ophthalmology and Visual Science, vol. 50, no. 3, pp. 1025–1032, 2009.

Central Vein Occlusion Study Group, “Natural history and clinical management of central retinal vein occlusion,” Archives of Ophthalmology, vol. 115, no. 4, pp. 486–491, 1997.

Central Vein Occlusion Study Group, “Erratum in “natural history and clinical management of central retinal vein occlusion”,” Archives of Ophthalmology, vol. 115, no. 10, article 1275, 1997.

S. S. Hayreh, “Classification of central retinal vein occlusion,” Ophthalmology, vol. 90, no. 5, pp. 458–474, 1983.

D. Gewaily and P. B. Greenberg, “Intravitreal steroids versus observation for macular edema secondary to central retinal vein occlusion,” Cochrane Database of Systematic Reviews, no. 1, Article ID CD007324, 2009.

T. Braithwaite, A. A. Nanji, and P. B. Greenberg, “Anti-vascular endothelial growth factor for macular edema secondary to central retinal vein occlusion,” Cochrane Database of Systematic Reviews, no. 10, Article ID CD007325, 2010.