Journal of Ophthalmology
Volume 2018 (2018), Article ID 8941489, 6 pages
https://doi.org/10.1155/2018/8941489

Research Article

A Small Disc Area Is a Risk Factor for Visual Field Loss Progression in Primary Open-Angle Glaucoma: The Glaucoma Stereo Analysis Study

Yasushi Kitaoka,¹ Masaki Tanito,2,3 Yu Yokoyama,⁴ Koji Nitta,⁵ Maki Katai,⁶ Kazuko Omodaka,⁴ and Toru Nakazawa⁴

¹Department of Ophthalmology, St. Marianna University School of Medicine, 2-16-1 Sugao, Miyamae-ku, Kawasaki, Kanagawa 216-8511, Japan
²Division of Ophthalmology, Matsue Red Cross Hospital, 200 Horomachi, Matsue, Shimane 690-8506, Japan
³Department of Ophthalmology, Shimane University Faculty of Medicine, Enya 89-1, Izumo, Shimane 693-8501, Japan
⁴Department of Ophthalmology, Tohoku University Graduate School of Medicine, 1-1 Seiryo-machi, Aoba-ku, Sendai 980-8574, Japan
⁵Department of Ophthalmology, Fukui-ken Saiseikai Hospital, 7-1 Funabashi, Wadanaka-machi, Fukui 918-8503, Japan
⁶Department of Ophthalmology, Sapporo Medical Center Nippon Telegraph and Telephone East Corporation, South 1 West 15, Chuo-ku, Sapporo 060-0061, Japan

Correspondence should be addressed to Yasushi Kitaoka; kitaoka@marianna-u.ac.jp

Received 26 August 2017; Revised 4 January 2018; Accepted 13 February 2018; Published 21 March 2018

Academic Editor: Paolo Fogagnolo

Copyright © 2018 Yasushi Kitaoka et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. The Glaucoma Stereo Analysis Study, a cross-sectional multicenter collaborative study, used a stereo fundus camera (nonmyd WX) to assess various morphological parameters of the optic nerve head (ONH) in glaucoma patients. We compared the associations of each parameter between the visual field loss progression group and no-progression group. Methods. The study included 187 eyes of 187 patients with primary open-angle glaucoma or normal-tension glaucoma. We divided the mean deviation (MD) slope values of all patients into the progression group (<−0.3 dB/year) and no-progression group (≧−0.3 dB/year). ONH morphological parameters were calculated with prototype analysis software. The correlations between glaucomatous visual field progression and patient characteristics or each ONH parameter were analyzed with Spearman’s rank correlation coefficient. Results. The MD slope averages in the progression group and no-progression group were −0.58 ± 0.28 dB/year and 0.05 ± 0.26 dB/year, respectively. Among disc parameters, vertical disc width (diameter), disc area, cup area, and cup volume in the progression group were significantly less than those in the no-progression group. Logistic regression analysis revealed a significant association between the visual field progression and disc area (odds ratio 0.49/mm² disc area). Conclusion. A smaller disc area may be associated with more rapid glaucomatous visual field progression.

1. Introduction

Glaucomatous optic neuropathy (GON) is characterized by axon degeneration that can be observed as the thinning of the neural rim and enlargement of the cup in the optic nerve head (ONH). The Disc Damage Likelihood Scale (DDLS) was developed by Bayer et al. [1] and Spaeth et al. [2] for assessing the degree of optic nerve damage in GON. This method reflects the disc size and divides discs into three sizes, small (<1.5 mm), middle (1.5–2.0 mm), and large (>2.0 mm), and combines the disc size with the radial width of the neural rim or the circumferential extent of the absence of the neural rim [1, 2]. It was shown that the DDLS significantly correlates with all global and sectoral visual field indexes and with the sectoral rim area in Heidelberg Retina Tomograph (HRT) II measurements [3].

A simultaneous stereo fundus camera with analysis software (nonmyd WX, Kowa Company, Ltd., Japan) can provide ONH images in 3D and a detailed quantitative display of the ONH parameters. The Glaucoma Stereo Analysis Study (GSAS) is a multicenter study using this system to estimate various morphological parameters of the ONH in Japanese patients with GON [4, 5]. The GSAS previously demonstrated that the DDLS stage obtained through stereoscopic analysis was significantly inversely correlated with the MD and positively correlated with the pattern standard deviation (PSD) [6]. These findings suggest that the DDLS stage reflects the degree of visual field damage that is measured and expressed by the MD and PSD [6]. Since smaller discs can be categorized in higher stages in the DDLS system, and a human histological study in a relatively large number of eyes (72 eyes from 56 donors) found increasing axon numbers with greater optic disc size [7], it is reasonable to speculate that the disc size may affect glaucomatous visual field progression. In the present phase of the GSAS, we examined the relationships between visual field progression and patient characteristics or various ONH parameters.

2. Patients and Methods

The GSAS is a multicenter collaborative study and was conducted in accordance with the tenets of the Declaration of Helsinki. The Institutional Review Boards of the Tohoku University Graduate School of Medicine, Shimane University Faculty of Medicine, Fukui-ken Saiseikai Hospital, Sapporo Teishin Hospital, and St. Marianna University School of Medicine approved this study. The formal written consent from patients is not required for this type of study, a hospital-based and retrospective study. We analyzed anonymously all data gathered from the participating institutions.

One hundred and eighty-seven eyes of 187 patients with GON were recruited into this study from five institutions as previously reported [4]. The methods of ophthalmic examination and data collection were described previously [4]. Briefly, presurgical refractive error data were collected from eyes that had undergone refractive procedures including cataract surgery. Data from at least six visual field examinations (approximately every six months) (Carl Zeiss Meditec, Dublin, CA) were also collected retrospectively with the Humphrey visual field analyzer for each patient. MD slope values obtained from those data were divided into two groups: the visual field loss progression group (<−0.3 dB/year) and no-progression group (≧−0.3 dB/year). Additional inclusion criteria included (1) best corrected visual acuity of 0.155 or better (LogMAR); (2) no congenital ONH anomalies; (3) ONH size within the typical normal range, defined as a disc-macula distance-to-disc diameter (DM/DD) ratio of between approximately 2.4 and 3.0; (4) no clinically apparent secondary cause of glaucoma and no other disease affecting the visual field; (5) no history of intraocular surgery other than cataract or glaucoma surgery; (6) no history of cataract or glaucoma surgery in the previous 3 years; and (7) glaucomatous visual field loss of better than −12 dB MD [4]. Other exclusion criteria may include (1) retinal diseases, neuro-ophthalmological diseases, degenerative myopia, and central nervous system diseases which can affect the visual field; (2) pseudoexfoliation; (3) angle closure; and (4) use of systemic or topical steroid. The patients were also queried about a history of systemic hypertension, diabetes mellitus, and hyperlipidemia.

The stereo images of ONH were obtained with a stereo fundus camera (nonmyd WX). The built-in software (VK-2 WX, prototype version, Kowa Company, Ltd., Japan) automatically calculates ONH morphological parameters based on manually set contour lines for the ONH disc and cup as described previously [4]. The disc contour was delineated by the inner margin of Elschnig’s scleral ring, and the cup contour was delineated by the outer cup margin, which was indicated by the bending of the ONH vessels at the rim in accordance with the recommendations of the Japan Glaucoma Society Guideline for Glaucoma, 3rd edition [4].

2.1. Statistical Analysis

Continuous variables were expressed as . Demographic patient data and ONH parameters were compared between the progression and no-progression groups using the t-test for continuous variables and Fisher’s exact probability test for categorical variables. Correlations between glaucoma progression and ONH parameters were assessed using stepwise logistic regression analysis in which progression or no progression was set as a dependent variable, and the 38 ONH parameters reported previously [4] were set as independent variables. In the stepwise logistic regression analysis, a forward selection method was used to determine the significant ONH parameter(s). Progression/no progression was fit to the determined ONH parameter(s) using the nominal logistic regression model to calculate the odds ratio of progression. The level of significance was 0.05 in all statistical tests.

3. Results

The characteristics of the 187 patients in the visual field progression group () and no-progression group () are shown in Table 1. There was no significant difference in the average age and the gender ratio between the progression and no-progression groups (Table 1). There were significantly fewer patients with a history of systemic hypertension in the progression group compared with those in the no-progression group (, Table 1), and significantly more used β-blocker or carbonic anhydrase inhibitor eyedrops in the former compared with those in the latter group ( and , resp.). There was also a significant difference in the MD between the progression (−5.88 ± 2.91 dB) and no-progression groups (−4.28 ± 3.28 dB) (, Table 1). In addition, there was a significant difference in the PSD between the progression (9.43 ± 3.69 dB) and no-progression (7.59 ± 4.25 dB) groups (, Table 1). The averages of MD slopes in the progression group and no-progression group were −0.58 ± 0.28 dB/year and 0.05 ± 0.26 dB/year, respectively (, Table 1).

Table 1: Comparison of demographic data between patients in the progression and no-progression groups.

Patient data
Progression ()
No progression ()
Value

Age (years)
61.48 ± 8.92
61.33 ± 9.58
0.92

Sex (male : female)
25 : 25
62 : 75
0.62

Hypertension (+)
7 (14%)
41 (29.93%)
0.037

Corneal curvature radius on the test day (mm)
7.65 ± 0.25
7.68 ± 0.28
0.52

Pretreatment IOP (mmHg)
16.97 ± 4.87
16.92 ± 4.09
0.94

PG (+)
35 (70%)
93 (67.88%)
0.86

β-Blocker (+)
28 (56%)
51 (37.23%)
0.029

CAI (+)
16 (32%)
16 (11.68%)
0.002

Antiglaucoma eyedrops (number)
1.70 ± 1.04
1.20 ± 0.88
0.0012

MD (dB)
−5.88 ± 2.91
−4.28 ± 3.28
0.0028

PSD (dB)
9.43 ± 3.69
7.59 ± 4.25
0.0074

Pretreatment spherical equivalent refractive error (D)
−3.49 ± 3.89
−3.34 ± 3.72
0.8

MD slope (dB/year)
−0.58 ± 0.28
0.05 ± 0.26
<0.0001

PG = prostaglandin; CAI = carbonic anhydrase inhibitor; MD = mean deviation; PSD = pattern standard deviation.

The ONH parameters in the two groups are shown in Table 2. Among these parameters, vertical disc width (diameter) and disc area in the progression group were significantly less than those in the no-progression group ( and , resp., Table 2). Unexpectedly, the cup area and cup volume in the progression group were also significantly less than those in the no-progression group ( and , resp., Table 2). Therefore, further statistical analysis was performed to clarify the association between ONH parameters and visual field progression. Stepwise logistic regression analysis showed that among the 38 ONH parameters, only the disc area was selected as a significant factor associated with visual field progression (). In the nominal logistic regression model (Figure 1), the odds ratio of visual field loss progression was calculated to be 0.49/mm² disc area.

Table 2: Comparison of ONH parameters between the progression and no-progression groups.

Optic nerve head parameters
Progression ()
No-progression ()
Value

Vertical disc width
1.79 ± 0.18
1.89 ± 0.24
0.017

Horizontal disc width
1.60 ± 0.24
1.69 ± 0.29
0.052

Vertical cup-disc ratio
0.83 ± 0.08
0.82 ± 0.08
0.574

Horizontal cup-disc ratio
0.73 ± 0.08
0.75 ± 0.09
0.227

Minimum rim-disc ratio
0.018 ± 0.024
0.018 ± 0.025
0.979

Superior minimum rim-disc ratio
0.077 ± 0.055
0.086 ± 0.060
0.363

Inferior minimum rim-disc ratio
0.043 ± 0.060
0.033 ± 0.040
0.209

Superior rim width
0.19 ± 0.09
0.21 ± 0.10
0.161

Inferior rim width
0.12 ± 0.11
0.12 ± 0.09
0.922

Mean cup depth
0.19 ± 0.07
0.21 ± 0.09
0.202

Maximum cup depth
0.50 ± 0.15
0.53 ± 0.20
0.368

Height variation contour
0.57 ± 0.22
0.58 ± 0.28
0.738

Disc area
2.24 ± 0.46
2.49 ± 0.67
0.016

Cup area
1.30 ± 0.47
1.50 ± 0.59
0.029

Cup-disc area ratio
0.57 ± 0.12
0.59 ± 0.11
0.265

Rim area
0.94 ± 0.26
0.99 ± 0.27
0.301

Rim-disc area ratio
0.43 ± 0.12
0.41 ± 0.11
0.265

Rim-disc ratio of section 1
0.076 ± 0.045
0.067 ± 0.046
0.204

Rim-disc ratio of section 2
0.11 ± 0.05
0.11 ± 0.06
0.94

Rim-disc ratio of section 3
0.18 ± 0.06
0.17 ± 0.06
0.257

Rim-disc ratio of section 4
0.20 ± 0.08
0.19 ± 0.07
0.462

Rim-disc ratio of section 5
0.15 ± 0.09
0.14 ± 0.08
0.568

Rim-disc ratio of section 6
0.065 ± 0.061
0.056 ± 0.045
0.293

Disc volume
0.87 ± 0.29
0.96 ± 0.47
0.217

Cup volume
0.25 ± 0.14
0.33 ± 0.24
0.04

Rim volume
0.17 ± 0.09
0.17 ± 0.10
0.995

Rim decentering
0.28 ± 0.44
0.31 ± 0.42
0.668

Disc tilt angle
11.51 ± 12.97
10.07 ± 12.29
0.486

Figure 1: Logistic fit of glaucomatous visual field progression/no progression by disc area. The curve indicates the predicted probability of visual field progression (the left y-axis) as a function of disc area (x-axis) (). In this model, the odds ratio of visual field progression is calculated to be 0.49/mm² disc area.

4. Discussion

The present study found that a history of systemic hypertension is not a risk factor for visual field progression, since fewer patients in the progression group had systemic hypertension. Consistent with this result, previous studies showed that a lower diastolic blood pressure was associated with glaucomatous progression [8, 9]. Comparisons of other characteristics demonstrated that the use of β-blocker or carbonic anhydrase inhibitor eyedrops was more common in the visual field progression group. It is reasonable to assume that prostaglandin (PG) eyedrops are the first choice for administration in glaucoma patients, and therefore, PG alone is not associated with disease progression. However, the administration of multiple types of eyedrops may be associated with progression.

We also found significantly worse MD and PSD values in the progression group compared with the no-progression group. This is consistent with a previous review article demonstrating that the baseline MD was significantly associated with the incidence of progression, with the incidence rate increasing by 0.9 percentage points per additional dB of MD loss [10]. It is also interesting to note previous findings showing that the rate of progression increased with the severity of visual field loss (; ) in patients with mild visual field loss () but did not increase in the same manner in patients with moderate ( to ≧−12 dB) or severe loss () [11]. That study suggested that in the most severe cases, visual field worsening cannot be observed as the field gets closer to total perimetric blindness [11]. Because we excluded patients with severe visual field loss worse than −12 dB MD, the average MD in the 187 patients included in this study was −4.71 ± 3.26 dB, meaning that 68% could be categorized as having mild field loss [4].

In the nominal logistic regression model (Figure 1), the smallest disc exists in the no-progression group (the right y-axis); therefore, it seems that merely the disc size cannot distinguish the visual field progression group from the no visual field progression group. In fact, there are several controversial reports regarding the disc size and glaucomatous damage. For example, some reports suggested that a large disc is a risk factor and the stress to the lamina cribrosa is greater in eyes with a larger disc than those with a smaller disc [12]. In contrast, other studies suggested that larger discs were more likely to be classified as glaucomatous whether they were glaucomatous or not, while small discs were more likely to be classified as normal [13, 14]. Moreover, two different groups reported that the retinal nerve fiber layer (RNFL) thickness significantly increased with a greater optic disc size [15, 16], although care must be taken in interpreting the relationship between disc size and RNFL thickness found in optical coherence tomography studies [6]. Taken together with the finding that the optic nerve fiber count increased with greater disc size in a human histological study [7], it is possible that smaller optic discs may contain fewer optic nerve axons than larger ones. Therefore, one hypothesis is that smaller optic discs may be more vulnerable than larger discs. Consistent with this hypothesis, we found that the vertical disc width and disc area in the visual field progression group were significantly smaller than those in the no-progression group. However, cup area and cup volume in the progression group were also smaller than those in the no-progression group. Because the vertical (0.83 ± 0.08 versus 0.82 ± 0.08) and horizontal C/D ratios (0.73 ± 0.08 versus 0.75 ± 0.09) did not differ between the two groups in the current study, smaller cup area and cup volume may be the result of smaller disc size in the progression group. Moreover, it is interesting to note that the results of a recent study indicated that the C/D ratio is smaller for small discs and positively correlated with the disc size in healthy human eyes [17]. In the present study, the curve in the nominal logistic regression model (Figure 1) indicates the predicted probability of visual field progression (the left y-axis), implicating that larger discs may have lower probability. Our current logistic regression analysis revealed a significant association between visual field loss progression and disc area (odds ratio 0.49/mm² disc area), indicating that if the disc area increased by 1 mm², the probability of progression would decrease by about half. This also means that if the disc area decreased by 1 mm², the probability of progression would be approximately twofold greater.

This study had several limitations. It was retrospective and hospital based. From a technical viewpoint, in some cases such as those with temporal peripapillary atrophy or shallow cupping, it can be difficult to define the margins accurately. Moreover, it is possible that the amount of rim width asymmetry is an important factor which may affect disc size results, although the rim decentering, which may reflect with asymmetry, did not differ significantly between the progression group and no-progression group. In addition, although the typical normal ONH size was defined as a DM/DD ratio of between approximately 2.4 and 3.0, both the disc size and the DM distance may increase in some cases such as high myopia. However, most cases included in the present study were within the typical normal range, and therefore, it remains to be elucidated whether smaller or larger discs also fit this concept. Nonetheless, taking the results of the present phase of the GSAS together, these findings suggest that a smaller disc area may be associated with more rapid glaucomatous visual field progression.

Consent

For this type of hospital-based, retrospective study, formal consent is not required.

Disclosure

Authors Yasushi Kitaoka, Masaki Tanito, Yu Yokoyama, Koji Nitta, and Toru Nakazawa received speakers’ honoraria from Kowa Company. Masaki Tanito and Toru Nakazawa received financial support for consultancy from Kowa. Kowa had no role in the design or conduct of this research. Authors Maki Katai and Kazuko Omodaka certify that they have no affiliations with or involvement in any organization or entity with any financial interest.

Conflicts of Interest

The authors declare that there is no conflict of interest regarding the publication of this paper.

References

A. Bayer, P. Harasymowycz, J. D. Henderer, W. G. Steinmann, and G. L. Spaeth, “Validity of a new disk grading scale for estimating glaucomatous damage: correlation with visual field damage,” American Journal of Ophthalmology, vol. 133, no. 6, pp. 758–763, 2002.

G. L. Spaeth, J. Henderer, C. Liu et al., “The disc damage likelihood scale: reproducibility of a new method of estimating the amount of optic nerve damage caused by glaucoma,” Transactions of the American Ophthalmological Society, vol. 100, pp. 181–185, 2002.

H. V. Danesh-Meyer, J. Y. F. Ku, T. L. Papchenko, T. Jayasundera, J. C. Hsiang, and G. D. Gamble, “Regional correlation of structure and function in glaucoma, using the Disc Damage Likelihood Scale, Heidelberg Retina Tomograph, and visual fields,” Ophthalmology, vol. 113, no. 4, pp. 603–611, 2006.

Y. Yokoyama, M. Tanito, K. Nitta et al., “Stereoscopic analysis of optic nerve head parameters in primary open angle glaucoma: the Glaucoma Stereo Analysis Study,” PLoS One, vol. 9, no. 6, article e99138, 2014.

M. Tanito, K. Nitta, M. Katai et al., “Differentiation of glaucomatous optic discs with different appearances using optic disc topography parameters: the Glaucoma Stereo Analysis Study,” PLoS One, vol. 12, no. 2, article e0169858, 2017.

Y. Kitaoka, M. Tanito, Y. Yokoyama et al., “Estimation of the Disc Damage Likelihood Scale in primary open-angle glaucoma: the Glaucoma Stereo Analysis Study,” Graefe's Archive for Clinical and Experimental Ophthalmology, vol. 254, no. 3, pp. 523–528, 2016.

J. B. Jonas, A. M. Schmidt, J. A. Müller-Bergh, U. M. Schlötzer-Schrehardt, and G. O. Naumann, “Human optic nerve fiber count and optic disc size,” Investigative Ophthalmology & Visual Science, vol. 33, no. 6, pp. 2012–2018, 1992.

M. C. Leske, S. Y. Wu, A. Hennis, R. Honkanen, B. Nemesure, and BESs study group, “Risk factors for incident open-angle glaucoma: the Barbados Eye Studies,” Ophthalmology, vol. 115, no. 1, pp. 85–93, 2008.

M. M. McGlynn, J. R. Ehrlich, E. D. Marlow et al., “Association of blood and ocular perfusion pressure with structural glaucomatous progression by flicker chronoscopy,” The British Journal of Ophthalmology, vol. 97, no. 12, pp. 1569–1573, 2013.

P. J. G. Ernest, W. Viechtbauer, J. S. A. G. Schouten et al., “The influence of the assessment method on the incidence of visual field progression in glaucoma: a network meta-analysis,” Acta Ophthalmologica, vol. 90, no. 1, pp. 10–19, 2012.

H. L. Rao, A. U. Kumar, J. G. Babu, S. Senthil, and C. S. Garudadri, “Relationship between severity of visual field loss at presentation and rate of visual field progression in glaucoma,” Ophthalmology, vol. 118, no. 2, pp. 249–253, 2011.

T. Chi, R. Ritch, D. Stickler, B. Pitman, C. Tsai, and F. Y. Hsieh, “Racial differences in optic nerve head parameters,” Archives of Ophthalmology, vol. 107, no. 6, pp. 836–839, 1989.

A. Heijl and H. Mölder, “Optic disc diameter influences the ability to detect glaucomatous disc damage,” Acta Ophthalmologica, vol. 71, no. 1, pp. 122–129, 1993.

J. B. Jonas, F. M. Zäch, G. C. Gusek, and G. O. H. Naumann, “Pseudoglaucomatous physiologic large cups,” American Journal of Ophthalmology, vol. 107, no. 2, pp. 137–144, 1989.

G. Savini, M. Zanini, V. Carelli, A. A. Sadun, F. N. Ross-Cisneros, and P. Barboni, “Correlation between retinal nerve fibre layer thickness and optic nerve head size: an optical coherence tomography study,” The British Journal of Ophthalmology, vol. 89, no. 4, pp. 489–492, 2005.

D. L. Budenz, D. R. Anderson, R. Varma et al., “Determinants of normal retinal nerve fiber layer thickness measured by Stratus OCT,” Ophthalmology, vol. 114, no. 6, pp. 1046–1052, 2007.

K. I. Jung, J. A. Shin, H. Y. L. Park, and C. K. Park, “Retinal nerve fiber layer converges more convexly on normal smaller optic nerve head,” Journal of Glaucoma, vol. 24, no. 6, pp. 448–454, 2015.