Journal of Ophthalmology
Volume 2019 (2019), Article ID 4786431, 1 page
https://doi.org/10.1155/2019/4786431

Erratum

Erratum to “Visual Outcomes of Ultrathin-Descemet Stripping Endothelial Keratoplasty versus Descemet Stripping Endothelial Keratoplasty”

Konstantinos Droutsas,1,2 Myrsini Petrelli,¹ Dimitrios Miltsakakis,³ Konstantinos Andreanos,¹ Anastasia Karagianni,³ Apostolos Lazaridis,1,2 Chrysanthi Koutsandrea,¹ and George Kymionis1,4

¹First Department of Ophthalmology, National and Kapodistrian University of Athens, General Hospital “G. Gennimatas”, Athens, Greece
²Department of Ophthalmology, Philipps University, Marburg, Germany
³State Ophthalmology Clinic, General Hospital “G. Gennimatas”, Athens, Greece
⁴Jules Gonin Eye Hospital, Faculty of Biology and Medicine, University of Lausanne, Lausanne, Switzerland

Correspondence should be addressed to Konstantinos Droutsas; konstantinos_droutsas@yahoo.gr

Received 6 December 2018; Accepted 16 December 2018; Published 10 January 2019

Copyright © 2019 Konstantinos Droutsas et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Visual Outcomes of Ultrathin-Descemet Stripping Endothelial Keratoplasty versus Descemet Stripping Endothelial Keratoplasty” [1], the Authors’ Contributions section was missing and should be added as follows:

Authors’ Contributions

The authors Konstantinos Droutsas and Myrsini Petrelli contributed equally.

References

K. Droutsas, M. Petrelli, D. Miltsakakis et al., “Visual outcomes of ultrathin-descemet stripping endothelial keratoplasty versus descemet stripping endothelial keratoplasty,” Journal of Ophthalmology, vol. 2018, Article ID 5924058, 5 pages, 2018.