Journal of Ophthalmology
Volume 2020 (2020), Article ID 9157518, 9 pages
https://doi.org/10.1155/2020/9157518

Clinical Study

Comparison between Cryopreserved and Dehydrated Human Amniotic Membrane Graft in Treating Challenging Cases with Macular Hole and Macular Hole Retinal Detachment

Yu-Hsuan Huang,¹ Der-Chong Tsai,2,3 Lei-Chi Wang,3,4 and Shih-Jen Chen3,5

¹Department of Ophthalmology, Asia University Hospital, Taichung, Taiwan
²Department of Ophthalmology, National Yang-Ming University Hospital, Yilan, Taiwan
³School of Medicine, National Yang Ming University, Taipei, Taiwan
⁴Department of Pathology and Laboratory Medicine, Taipei Veterans General Hospital, Taipei, Taiwan
⁵Department of Ophthalmology, Taipei Veterans General Hospital, Taipei, Taiwan

Correspondence should be addressed to Shih-Jen Chen; sjchen96@gmail.com

Received 3 May 2020; Revised 12 June 2020; Accepted 18 June 2020; Published 7 July 2020

Academic Editor: Tamer A. Macky

Copyright © 2020 Yu-Hsuan Huang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Purpose. To evaluate the surgical outcomes of cryopreserved and dehydrated human amniotic membrane (hAM) graft transplantation for macular hole (MH) and macular hole retinal detachment (MHRD) repair. Materials and Methods. This retrospective, interventional case series was conducted in two hospitals. Two types of hAM grafts, namely, the dehydrated form (AmnioGen, HCT Regenerative, Taiwan) and the cryopreserved form (AmnioGraft, Bio-Tissue, Miami, FL), were consecutively used in MH surgeries. Anatomical and functional outcomes between the 2 types of hAM grafts were compared. Results. Seventeen patients (mean age: 62.1 ± 10.0 years, 9 (52.9%) males) were enrolled. Of them, 11 patients had persistent MH, 3 had MH without prior surgery, and 3 had MHRD. A cryopreserved hAM graft was used in 10 patients, and a dehydrated hAM graft was used in 8 patients. One patient used a cryopreserved hAM in the first MH surgery and a dehydrated hAM in the second surgery for extramacular hole with retinal detachment. After a 6-month follow-up, 13 (76.5%) patients had sealed MHs. The average visual acuity (VA) of cases with sealed MHs improved from 1.38 ± 0.62 to 1.12 ± 0.47 logMAR (). In the other 4 cases with persistent MH, 3 had graft dislocation and 1 had a reopened MH with graft contraction. There were no significant differences in closure rate (80.00% vs. 71.43%, ) or VA improvement (0.19 ± 0.37 logMAR vs. 0.15 ± 0.41 logMAR, ) between the 2 kinds of hAM graft. Conclusion. This preliminary case series showed that both cryopreserved hAM and dehydrated hAM are feasible alternative grafts for either persistent or recurrent MH. Both approaches have similar anatomical and functional outcomes.

1. Introduction

Persistent macular holes (MHs) and macular hole retinal detachment (MHRD) or primary MHs and MHRD with large holes are very challenging to manage and often cause severe visual impairment, especially in highly myopic eyes [1–4]. The reported rates of persistence and reopening of MHs are 4.8%–9.2% in previous studies where surgeons had used different materials such as internal limiting membranes, lens capsules, and autologous retinal free-flaps to fill the hole [5–13].

Human amniotic membrane (hAM) grafts have been widely applied in the treatment of ocular surface disorders for a long time, as they serve as a scaffold for cell growth and migration, facilitate re-epithelialization by providing growth factors, and reduce inflammation and scarring by inhibiting TGF-β signal transduction [14–17]. Recently, Rizzo et al. and Caporossi et al. reported subretinal implantation of hAM grafts in the treatment of recurrent MH and retinal detachment with large macular tears and retinal breaks. Encouraging anatomical and functional outcomes were reported in these studies [18–20]. Cryopreserved hAM grafts from a tissue bank, instead of commercialized tissue products, were applied in these studies.

Two types of commercial hAM graft products are now available for medical use: cryopreserved and dehydrated amniotic membranes. They differ in morphology and structure due to differences in processing [21]. Both types of commercial hAM graft have been utilized in plastic and orthopedic surgery, such as for burns [22], diabetic foot ulcers [23, 24], tendinopathy, and arthritis [25, 26]. No significant differences between the outcomes of either type of hAM graft for these procedures were reported [23]. These commercially available hAM grafts are commonly used for treating ocular surface diseases [27], yet their differences in therapeutic efficacy remain unclear due to lack of large comparable studies. In this study, we aimed to report the surgical outcomes of applying cryopreserved or dehydrated hAM graft transplantation for persistent MH, recurrent MHRD, or primary MH and MHRD with macular holes larger than 500 μm.

2. Materials and Methods

This retrospective, consecutive case series was conducted in Taipei Veterans General Hospital and National Yang-Ming University Hospital. This study adhered to the Declaration of Helsinki and was approved by the Institutional Review Boards of Taipei Veterans General Hospitals (2019-06-023CC) and National Yang-Ming University Hospital (2019A026). Informed consent for surgery was obtained from all the patients.

We retrospectively reviewed the medical records of patients who received vitrectomy and hAM graft transplantation from October 2018 to August 2019. All patients had MH with or without retinal detachment before surgery and were followed up for at least 6 months. All surgeries were performed by the same experienced surgeons (S. J. Chen and D. C. Tsai). Detailed ophthalmic histories were taken preoperatively, including previous ocular diagnoses, duration of MH, previous surgeries, or traumatic injury. All patients underwent a thorough ophthalmic examination before and after the surgery (2 weeks, 1 month, 3 months, and 6 months postoperatively), including best-corrective visual acuity (BCVA; converted to logMAR), axial length, slit-lamp biomicroscopy, fundus color photography, optical coherence tomography (OCT), and optical coherence tomography angiography (OCTA; AngioVue; Optovue, Fremont, CA). The size of the macular hole was defined as the minimum diameter of the hole measured on the OCT image using the caliper function.

All cases underwent standard 23-gauge 3-port microincision vitrectomy with a Constellation Vision System (Alcon Surgical, Fort Worth, TX). After completing vitrectomy and internal limiting membrane peeling for primary MH and MHRD, the hAM graft was trimmed according to the size of the MH by a 1 mm- or 1.5 mm-skin biopsy punch or simply cut using scissors with the aid of a caliper. The size of the graft was designed to be approximately 300–500 μm larger than the MH size calculated according to OCT before surgery. One of either the dehydrated (AmnioGen, HCT Regenerative, Taiwan) graft or the cryopreserved hAM (AmnioGraft, Bio-Tissue, Miami, FL) graft was randomly selected for each patient according to the availability of the graft at the time of surgery. For easier identification of the two sides of the graft, the epithelial side of the graft was stained with Brilliant Blue G (at Taipei Veterans General Hospital) or indocyanine green (at National Yang-Ming University Hospital) before cutting. The trimmed hAM graft was then gently implanted into the MH with intraocular forceps and secured by trapping the graft edge beneath the retina 360 degree, if possible, with the stromal side in contact with the retinal pigmented epithelium (RPE) or at least under the retina as much as possible and left the rest of the graft above the retina in patients with large MHs and concomitant RD. To make sure that the graft was not inserted upside down, we identified the sticky stromal side with the intraocular forceps before implantation into the MH, as described by Caporossi et al. [19]. When the graft was in the correct position, fluid-gas exchange was performed, followed by 20% sulfur hexafluoride (SF₆) or silicone oil. All patients maintained the prone position immediately after the surgery and kept the face-down position for one to two weeks. They stayed in the hospital for 3–5 days and were then discharged. We instructed the patients to maintain the prone position at home for at least 16 hours a day for 1 week for patients with MH and 2 weeks for patients with MHRD.

Pathological exam of the 2 types of commercial hAM graft products was performed to find out the differences in their structures at cellular level.

The statistical analysis was performed using SPSS software (version 22.0; IBM, Armonk, NY). Descriptive statistics were used to obtain mean and standard deviation. Univariate analyses were conducted using Pearson’s chi-square test or the Mann–Whitney U test. was considered to indicate statistical significance.

3. Results

In the pathological exam, both types of hAM graft have a single layer of devitalized epithelial cells (Figures 1(a) and 1(b)). Cryopreserved grafts have thicker stroma than dehydrated hAM grafts. No viable cells were detected in either type of hAM graft by staining with calcein AM and ethidium homodimer-1 dye (Figures 1(c)–1(h)).

(a)

(b)

(c)

(d)

(e)

(f)

(g)

(h)

Figure 1: Pathology of dehydrated hAM (a) and cryopreserved hAM (b) with hematoxylin and eosin stain (400x). Note the monolayer epithelium in both hAM (asterisk). Dehydrated hAM is much thinner than cryopreserved hAM. The epithelial cells of dehydrated hAM (c, e, g) and cryopreserved hAM (d, f, h) under the microscope. The epithelial cells were confirmed devitalized by staining with calcein AM (e, f), which is retained within live cells and ethidium homodimer-1 (g, h), which enters cells with damaged plasma membrane and undergoes a 40-fold enhancement of fluorescence upon binding to nucleic acids in devitalized cells.

In total, 17 patients, 9 males and 8 females, were included in this study. The demographic data and characteristics of all patients were collected (Table 1). Their mean age was 62.1 ± 10.0 years (range 41–81 years). Fourteen patients (82.4%) had MH, and 3 patients (17.6%) had MHRD. Among the 14 patients with MH, 11 patients had persistent MH and 3 had primary MH (Figure 2). Among the patients with MHRD, two were recurrent after previous vitrectomy and one was primary. Among the 17 patients, 9 (52.9%) had a history of MHRD. Thirteen patients (77.5%) had received one to three times of vitrectomy in the past. The average axial length of the affected eye was 27.9 ± 3.4 mm (range 22.30–32.57 mm). Eleven cases (64.7%) were highly myopic, with axial lengths ranging from 27.80 to 32.57 mm. The mean preoperative BCVA was 1.32 ± 0.57 logMAR (range 0.7–3 logMAR, 6/30 to hand motion by the Snellen chart). The mean MH size was 1072.1 ± 666.0 μm (range 230–3285 μm). Cryopreserved hAM grafts were used in 10 patients, and dehydrated grafts were used in 8 patients (one patient received surgery twice with a cryopreserved hAM graft for MH and a dehydrated hAM for extramacular hole, Figure 3). Fourteen patients had 20% SF₆ tamponade. Two of the patients with recurrent MHRD had silicone oil tamponade (Figure 4), and one patient with persistent MH had the hAM graft inserted under the oil phase.

Table 1: Clinical and demographic information of 17 patients.

Patient
Age (y/o)
Sex
Affected eye
Graft type
Diagnosis
MH size (um)
Time (yr) for MH
Previous VT (diagnosis)
Axial length (mm)
Pre-OP BCVA
Post-OP BCVA
Follow-up length (mo)
Tamponade material
Post-OP findings

1
81
M
OS
Cryopreserved
Persistent MH
924
12
+(MH)
24.52
2/60
2/60
11
20% SF6
Sealed MH

2
71
M
OS
Cryopreserved
Persistent MH
902
7
+(MHRD)
24.33
6/60
6/60
8
20% SF6
Sealed MH

3
67
M
OD
Cryopreserved
Persistent MH
1072
5
+(MHRD)
32.57
5/60
3/60
7
20% SF6
Sealed MH with PFA

4
66
M
OD
Cryopreserved
Persistent MH
1195
7
+(MHRD)
28.27
6/30
6/30
6
20% SF6
Sealed MH

5
60
F
OD
Cryopreserved
Persistent MH
1500
8
+(MHRD)
30.13
6/60
6/60
6
20% SF6
Persistent MH, graft dislocation

6
62
F
OD
Cryopreserved
Persistent MH
975
8
+(MH)
25.02
6/60
5/60
6
20% SF6
Persistent MH, graft dislocation

7
55
M
OD
Cryopreserved
Primary MH
550
0.1
—
30.71
3/60
6/30
10
20% SF6
Sealed MH with PFA

8
41
M
OD
Cryopreserved
Recurrent MHRD
3285
1.5
+(Traumatic MHRD)
23.34
HM
CF
13
SiO
Sealed MH with attached retina

9
55
F
OS
Cryopreserved
Primary MHRD
640
33
—
28.17
6/60
6/30
8
20% SF6
Sealed MH with attached retina

10
69
F
OD
Dehydrated
Persistent MH
905
16
+(MHRD)
31.50
6/30
6/60
13
20% SF6
Reopen MH

11
65
F
OS
Dehydrated
Persistent MH (1st OP)
Partially-sealed MH (2nd OP)
1153/737
(1st/2nd OP)
5
+(MHRD)
27.80
5/60
6/60
10/9
(1st/2nd OP)
20% SF6
(1st & 2nd OP)
Sealed MH with PFA

12
70
F
OS
Dehydrated
Persistent MH
459
4.5
+(MHRD)
27.86
CF
CF
9
20% SF6
Sealed MH with PFA

13
65
M
OS
Dehydrated
Persistent MH
1530
12
+(MHRD)
31.02
1/60
1/60
6
20% SF6
Persistent MH, graft dislocation

14
69
M
OD
Dehydrated
Primary MH
860
0.5
—
22.30
3/60
3/60
8
20% SF6
Sealed MH

15
57
F
OD
Dehydrated
Primary MH
796
2
—
23.78
6/60
6/30
6
20% SF6
Sealed MH

16
43
M
OS
Dehydrated
Recurrent MHRD
230
1.5
+(MHRD)
31.24
CF
6/60
8
SiO
Sealed MH with attached retina

17
59
F
OD
Cryopreserved (1st)
Dehydrated (2nd)
Persistent MH (1st OP)
Extramacular hole RD (2nd OP)
1250/1500 (1st/2nd OP
26
+(MHRD)
31.23
6/60
6/30
7/6
(1st/2nd OP)
SiO
(1st and 2nd OP)
Sealed MH (1st)
Sealed extramacular hole with attached retina (2nd)

This patient had received 2 times of hAM graft transplantation. Persistent macular hole with elevated hAM graft at the margin of MH was noted after the 1st surgery. Sealed MH was noted finally after the 2nd surgery. This patient had received 2 times of hAM graft transplantation. Extramacular hole with retinal detachment was noted after the 2nd surgery. Sealed macular hole and extramacular hole with attached retina was noted after the 2nd surgery. y/o: year-old; M: male; F: female; MH: macular hole; MHRD: macular hole retinal detachment; OP: operation; RD: retinal detachment; yr: year(s); VT: vitrectomy; BCVA: best-corrective visual acuity; HM: hand movement; CF: counting finger; LP: light perception; mo: month(s); SF6: sulfur hexafluoride; SiO: silicone oil; PFA: parafoveal atrophy; hAM: human amniotic membrane.

Figure 2: Preoperative fundus photograph (a) and optical coherence tomography (OCT) image (b) of a primary macular hole (MH) in a 69-year-old male. The size of the MH was about 860 μm. Macular hole sealed after transplantation of a dehydrated human amniotic membrane (hAM) graft. One-month postoperative fundus photograph and OCT (c, d), 3-month postoperative fundus photograph and OCT (e, f), and 6-month postoperative fundus photograph and OCT (g, h) showed the hAM graft in place with retinal tissue grew on top of the graft.

Figure 3: Preoperative fundus photograph (a) and optical coherence tomography (OCT) image (b) of a persistent macular hole (MH) for 26 years in a 59-year-old female. She had received vitrectomy with membrane peeling 2 times for macular retinal detachment before. The size of the MH was about 1250 μm. Macular hole sealed after transplantation of a cryopreserved human amniotic membrane (hAM) graft. One-month postoperative fundus photograph (c) and OCT (d) showed the hAM graft in place connecting 2 ends of MH with partial hAM at retina surface. An extramacular hole (e) (arrow) with retinal detachment (f) (arrowhead) developed 2 months after the surgery. The extramacular hole was sealed, and retina re-attached with dehydrated hAM transplantation in the second surgery in oil phase (g)–(i). OCT (i) showed the extramacular hole was sealed with the hAM graft adhered to retinal pigment epithelium (arrowhead).

Figure 4: Preoperative fundus photograph (a) and optical coherence tomography (OCT) image (b) of a recurrent macular hole retinal detachment (MHRD) in a 41-year-old male who had received scleral buckle, vitrectomy, and silicone oil tamponade for traumatic macular hole and retinal detachment. The size of the MH was about 3285 μm. Macular hole sealed, and retina was attached after transplantation of a cryopreserved human amniotic membrane (hAM) graft. Two-week postoperative fundus photograph and OCT (c, d), 1-month postoperative fundus photograph and OCT (e, f), 3-month postoperative fundus photograph and OCT (g, h), and 6-month postoperative fundus photograph and OCT (i, j) showed the hAM graft in place with tight adherence to retinal pigment epithelium, and retinal tissue grew on top of the graft (arrow). Subretinal fluid subsided gradually.

After following up patients for at least 6 months, 13 cases (76.5%) including 3 cases of MHRD had sealed MHs. There was no significant difference in the MH closure rate between patients with cryopreserved and dehydrated hAM grafts (80.0% vs. 71.4%, ) (Table 2). Among the patients with sealed MHs, 1 patient had partial MH closure with an elevated hAM graft at the nasal edge of the hole after the first surgery and received operation again 1 month later to reposition the old hAM graft and implant a new graft to cover the temporal edge of the hole. The MH was sealed after the second surgery. Another patient had MH closure after the first hAM graft transplantation, but an extramacular hole over the superior arcade with subretinal fluid developed 1 month later. A second hAM graft transplantation to the extramacular hole under the oil phase was performed, and the retina was reattached (Figure 3).

Table 2: Comparison between clinical data of two types of human amniotic membrane graft.

Type of hAM
Cryopreserved
Dehydrated
value

Number of cases
10
7

Sex (M : F)
6 : 4
3 : 4

Age (y/o)
61.70 ± 10.72
62.57 ± 9.69
0.87

Axial length (mm)
27.83 ± 3.32
27.93 ± 3.70
0.95

Size of MH (μm)
1229.30 ± 774.54
847.57 ± 427.69
0.26

Sealed MH (%)
8 (80%)
5 (71%)
0.68

Visual gain (logMAR)
0.19 ± 0.37
0.15 ± 0.41
0.85

One patient received cryopreserved hAM graft for MH, and dehydrated hAM graft for extramacular hole was enrolled in the cryopreserved group. M: male; F: female; y/o: year-old; MH: macular hole.

The average BCVA of cases with sealed MHs improved from 1.38 ± 0.62 to 1.12 ± 0.47 logMAR (). When comparing the final visual outcome or visual gain of patients receiving cryopreserved or dehydrated hAM grafts, there were no significant differences between the two groups (change in the BCVA of cryopreserved vs. dehydrated hAM in logMAR: 0.19 ± 0.37 vs. 0.15 ± 0.41, ). In the other 4 cases of persistent MH, 3 cases (16.7%) had hAM graft dislocation (Figure 5), and 1 case (5.6%) had a reopened MH with hAM graft contraction to the nasal and inferior edge of the MH. BCVA remained stable (1.13 ± 0.47 to 1.22 ± 0.39 logMAR, ) in these patients. There was no significant difference in visual gain between highly myopic (axial length ≥26.5 mm) and nonhighly myopic (axial length <26.5 mm) patients (change in BCVA in logMAR: 0.11 ± 0.35 vs. 0.20 ± 0.41, ). No significant difference in visual gain was found between patients with large MHs (≥1000 μm) or small MHs (<1000 μm) (change in BCVA in logMAR: 0.17 ± 0.40 vs. 0.12 ± 0.35, ). After excluding those with MHRD and silicone oil tamponade, MH sizes were significantly larger in patients with graft dislocation, reopened MH, and partial closure (n = 5, 1212.6 ± 290.7 μm) than in those with sealed MHs (n = 8, 844.8 ± 245.6 μm, ), while age and axial length were not significantly different between the 2 groups.

Figure 5: Preoperative fundus photograph (a) and optical coherence tomography (OCT) image (b) of a persistent macular hole (MH) in a 65-year-old male with previous vitrectomy for macular hole retinal detachment (MHRD) 13 years ago. The size of the MH was about 1530 μm. Dislocation of the dehydrated hAM graft inferiorly was noted after the surgery (c) (arrow). Persistent MH was noted in the 1-month and 5-month follow-up OCT (d, e).

None of these eyes showed signs of infection, inflammation, or rejection during the follow-up period. No marked regression in either graft type was noted in this short-term follow-up.

4. Discussion

In this short case series, we found no significant differences in the anatomical or functional outcomes between the two types of hAM graft. Human amniotic membrane is a fetal tissue composed of epithelium, stroma, and a thick basement membrane. Studies demonstrated that hAM secretes growth factors and adhesion molecules, which facilitate conjunctival and corneal re-epithelialization [28]. Processed hAM has been approved by the United States Food and Drug Administration for ocular surface reconstruction as a kind of allograft and is extensively applied to ocular surface diseases such as pterygium or corneal ulcers [14]. Compared to hAM allografts from a tissue bank, which have uneven surfaces and irregular shapes and are not always readily available, commercial hAM grafts have a flat surface, are perfectly round or rectangular with known sizes, are easier to manipulate, and are readily available in the operating room. Although there were no significant differences in functional or anatomical outcomes between the 2 grafts, differences do exist in handling and storage of the grafts. Dehydrated hAMs are stored at room temperature, which make them easier to transport and preserve. They need to be rehydrated with a small droplet of balanced salt solution before further manipulation. Cryopreserved hAMs must be stored in the frozen state and are expensive in terms of transportation. Cryopreserved grafts are attached to carrier paper, which make them easier to punch and can be directly cut into an optimal size without additional rehydration. During implantation, the stromal side of the cryopreserved graft tends to adhere better to RPE and is spongier, allowing for some fine compression.

In our case series, the average rate of anatomical MH closure after surgery was 76.5% (71.4% in MH and 100% in MHRD) for both types of grafts. In these cases, sealed MHs could be observed at the first follow-up (2 weeks postoperatively). Although cryopreserved hAMs have better preserved structural and biochemical integrity than dehydrated hAMs, we found no significant difference in healing rates or in the regeneration of the outer retina. These grafts acted as scaffolds for glial cell proliferation above the graft as in case 14 (Figure 2) and also fillers to approximate the retina around the hole in all sealed cases. However, layers of external limiting membrane, ellipsoid zones, and interdigitation zones were still disorganized or did not regrow as observed by OCT. The improvement in BCVA, as observed in patients with internal limiting membrane free grafts or free retina grafts with no outer retinal restoration, may be due to the improved sensitivity and decreased scotoma when the halo of the elevated retina around the hole was flattened and approximated [29, 30]. Future functional tests with microperimetry in patients receiving hAM transplantation for MH might be helpful in detecting changes in retinal function around the rim of MHs.

In this short-term study, graft contracture with parafoveal atrophy was found around the hole in four highly myopic cases (average axial length 29.73 ± 2.33 mm, range 27.80–32.57 mm) in the first month after surgery. We hypothesized that the potential contributing factors may include preexisting myopic maculopathy, graft insertion-related surgical trauma, and hAM graft contracture. To minimize the surgical trauma to the RPE, we slid the graft into the subretinal space as gently as possible and avoided excessive manipulation in all cases. Parafoveal atrophy did not develop in the other 3 cases with graft dislocation, 2 of which were highly myopic. Thus, we do not think that surgical trauma itself can fully explain this phenomenon. We hypothesized that the strong adhesion of the stromal side of the hAM graft to RPE may drag the pigment and cause parafoveal atrophy during graft contracture. The mechanism of atrophy in these cases still needs further investigation (British Journal of Ophthalmology, submitted).

Unlike the hAM graft for ocular surface reconstruction that dissolves within 2 months and disintegrates by matrix metalloproteinase produced by migrating epithelial cells [31, 32], total absorption of hAM grafts was not observed in our cases in the follow-up period from 6 to 13 months. We initially used hAM grafts in 4 cases with primary MHs because we thought that the graft tissue would be nearly disintegrated after transplantation, like in the cases reported by others [18]. However, the graft shrank only a little in all of our cases, and therefore, we stopped using hAM grafts for primary MHs. We postulated that lack of certain inflammatory cytokines or enzymes, as well as lack of frequent mechanical rubbing of eyelids (as is seen in corneal surgery) probably results in a longer time for graft regression. The long-term fates of the graft and MH need further studies.

Three cases presented with graft dislocation after surgery in our study (cases 5, 6, and 13). The cryopreserved grafts were used for two cases, and the dehydrated graft was used for one case; all graft dislocation was noted on the first postoperative day. All 3 dislocated cases had grafts inserted 360° underneath the retina and used SF₆ as the final modality of fluid-gas exchange. Compared to those without dislocation, the only factor for these graft-dislocated eyes was the larger size of the hole. Grewal et al. suggested the use of a flap 0.5-disc larger than the hole and use of liquid perfluorocarbon to stabilize the autologous retinal flap routinely and avoid graft dislocation [13]. Cutting the graft into an optimal and precise size can be very challenging, especially for large MHs. In our series, 4 cases (cases 3, 4, 8, and 17) with partial grafts positioned above the edge of the MH still sealed well. In our experience, leaving part of the graft above the retina does not necessarily lead to anatomical failure.

Our study was limited by the small sample size. Further studies with longer follow-up periods are needed to confirm the clinical application of hAM grafts and evaluate the differences between the two types of hAM graft.

5. Conclusion

This preliminary case series showed that both dehydrated and cryopreserved hAM grafts were feasible alternatives for MH and MHRD. Both approaches have similar anatomical and functional outcomes. The surgical procedure provides a high sealing rate for persistent MH, MHRD, and giant MHs. However, grafts may dislodge when the size of the MH is large.

Data Availability

The data used to support the findings of this study are available from the corresponding author upon request.

Ethical Approval

This study adhered to the 1964 Helsinki Declaration and was approved by the Institutional Review Boards in Taipei Veterans General Hospitals (2019-06-023CC) and National Yang-Ming University Hospital (2019A026).

Consent

Informed consent was obtained from all individual participants included in the study.

Conflicts of Interest

The authors declare that they have no conflicts of interest.

Authors’ Contributions

Yu-Hsuan Huang and Shih-Jen Chen contributed to study conception and design. Yu-Hsuan Huang, Der-Chong Tsai, Lei-Chi Wang, and Shih-Jen Chen were responsible for data acquisition, analysis, and interpretation. Yu-Hsuan Huang, Der-Chong Tsai, and Shih-Jen Chen contributed to drafting and revising the article. Yu-Hsuan Huang, Der-Chong Tsai, Lei-Chi Wang, and Shih-Jen Chen had overall responsibility.

References

R. Krishnan, C. Tossounis, and Y. F. Yang, “20-gauge and 23-gauge phacovitrectomy for idiopathic macular holes: comparison of complications and long-term outcomes,” Eye, vol. 27, no. 1, pp. 72–77, 2013.

S. Kusuhara, S. Ooto, D. Kimura et al., “Outcomes of 23- and 25-gauge transconjunctival sutureless vitrectomies for idiopathic macular holes,” British Journal of Ophthalmology, vol. 92, no. 9, pp. 1261–1264, 2008.

T.-T. Wu and Y.-H. Kung, “Comparison of anatomical and visual outcomes of macular hole surgery in patients with high myopia vs. nonhigh myopia: a case-control study using optical coherence tomography,” Graefe’s Archive for Clinical and Experimental Ophthalmology, vol. 250, no. 3, pp. 327–331, 2012.

C. Azzolini, “Macular hole: from diagnosis to therapy,” Journal of Ophthalmology, vol. 14, pp. 1-2, 2020.

A. M. Abbey, L. Van Laere, A. R. Shah, and T. S. Hassan, “Recurrent macular holes in the era of small-gauge vitrectomy: a review of incidence, risk factors, and outcomes,” Retina, vol. 37, no. 5, pp. 921–924, 2017.

M. Paques, P. Massin, P. Blain, A.-S. Duquesnoy, and A. Gaudric, “Long-term incidence of reopening of macular holes,” Ophthalmology, vol. 107, no. 4, pp. 760–765, 2000.

J. S. Duker, R. Wendel, A. C. Patel, and C. A. Puliafito, “Late reopening of macular holes after initially successful treatment with vitreous surgery,” Ophthalmology, vol. 101, no. 8, pp. 1373–1378, 1994.

N. J. Christmas, W. E. Smiddy, and H. W. Flynn, “Reopening of macular holes after initially successful repair,” Ophthalmology, vol. 105, no. 10, pp. 1835–1838, 1998.

F. Giansanti, R. Tartaro, T. Caporossi et al., “An internal limiting membrane plug and gas endotamponade for recurrent or persistent macular hole,” Journal of Ophthalmology, vol. 2019, Article ID 6051724, 6 pages, 2019.

J. Peng, C. Chen, H. Jin, H. Zhang, and P. Zhao, “Autologous lens capsular flap transplantation combined with autologous blood application in the management of refractory macular hole,” Retina, vol. 38, no. 11, pp. 2177–2183, 2018.

S.-N. Chen and C.-M. Yang, “Lens capsular flap transplantation in the management ofrefractory macular hole from multiple etiologies,” Retina, vol. 36, no. 1, pp. 163–170, 2016.

A. L. Wu, L. H. Chuang, N. K. Wang et al., “Refractory macular hole repaired by autologous retinal graft and blood clot,” BMC Ophthalmology, vol. 18, no. 1, p. 213, 2018.

D. S. Grewal, S. Charles, B. Parolini, K. Kadonosono, and T. H. Mahmoud, “Autologous retinal transplant for refractory macular holes: multicenter international collaborative study group,” Ophthalmology, vol. 126, no. 10, pp. 1399–1408, 2019.

A. Paolin, E. Cogliati, D. Trojan et al., “Amniotic membranes in ophthalmology: long-term data on transplantation outcomes,” Cell and Tissue Banking, vol. 17, no. 1, pp. 51–58, 2016.

J. Liu, H. Sheha, Y. Fu, L. Liang, and S. C. Tseng, “Update on amniotic membrane transplantation,” Expert Review of Ophthalmology, vol. 5, no. 5, pp. 645–661, 2010.

C. Malhotra and A. K. Jain, “Human amniotic membrane transplantation: different modalities of its use in ophthalmology,” World Journal of Transplantation, vol. 4, no. 2, pp. 111–121, 2014.

S.-B. Lee, D.-Q. Li, D. T. H. Tan, D. Meller, and S. C. G. Tseng, “Suppression of TGF-β signaling in both normal conjunctival fibroblasts and pterygial body fibroblasts by amniotic membrane,” Current Eye Research, vol. 20, no. 4, pp. 325–334, 2000.

S. Rizzo, T. Caporossi, R. Tartaro et al., “A human amniotic membrane plug to promote retinal breaks repair and recurrent macular hole closure,” Retina, vol. 39, no. Suppl 1, pp. S95–S103, 2019.

T. Caporossi, L. Angelis, B. Pacini et al., “A human amniotic membrane plug to manage high myopic macular hole associated with retinal detachment,” Acta Ophthalmologica, vol. 98, no. 2, pp. e252–256, 2020.

T. Caporossi, R. Tartaro, L. De angelis, B. Pacini, and S. Rizzo, “A human amniotic membrane plug to repair retinal detachment associated with large macular tear,” Acta Ophthalmologica, vol. 97, no. 8, pp. 821–823, 2019.

M. Cooke, E. K. Tan, C. Mandrycky, H. He, J. O’Connell, and S. C. G. Tseng, “Comparison of cryopreserved amniotic membrane and umbilical cord tissue with dehydrated amniotic membrane/chorion tissue,” Journal of Wound Care, vol. 23, no. 10, pp. 465–476, 2014.

M. R. Kesting, K.-D. Wolff, B. Hohlweg-Majert, and L. Steinstraesser, “The role of allogenic amniotic membrane in burn treatment,” Journal of Burn Care & Research, vol. 29, no. 6, pp. 907–916, 2008.

A. M. Haugh, J. G. Witt, A. Hauch et al., “Amnion membrane in diabetic foot wounds: a meta-analysis,” Plastic Reconstructive Surgery Global Open, vol. 5, no. 4, p. e1302, 2017.

Y. N. Su, D. Y. Zhao, Y. H. Li et al., “Human amniotic membrane allograft, a novel treatment for chronic diabetic foot ulcers: a systematic review and meta-analysis of randomised controlled trials,” International Wound Journal, vol. 17, no. 3, pp. 753–764, 2020.

A. C. Gellhorn and A. Han, “The use of dehydrated human amnion/chorion membrane allograft injection for the treatment of tendinopathy or arthritis: a case series involving 40 patients,” The Journal of Injury, Function and Rehabilitation, vol. 9, no. 12, pp. 1236–1243, 2017.

J. Ang, C.-K. D. Liou, and H. P. Schneider, “The role of placental membrane allografts in the surgical treatment of tendinopathies,” Clinics in Podiatric Medicine and Surgery, vol. 35, no. 3, pp. 311–321, 2018.

C. Giannikas, I. J. Udell, A. Steiner A, and C. Shih, “Sutureless amniotic membrane transplantation for ocular surface disorders: a comparison of prokera to AmbioDisc,” Investigative Ophthalmology & Visual Science, vol. 55, p. 4707, 2014.

T. Zhang, G. H.-F. Yam, A. K. Riau et al., “The effect of amniotic membrane de-epithelialization method on its biological properties and ability to promote limbal epithelial cell culture,” Investigative Opthalmology & Visual Science, vol. 54, no. 4, pp. 3072–3081, 2013.

R. N. Sjaarda, D. A. Frank, B. M. Glaser, J. T. Thompson, and R. P. Murphy, “Assessment of vision in idiopathic macular holes with macular microperimetry using the scanning laser ophthalmoscope,” Ophthalmology, vol. 100, no. 10, pp. 1513–1518, 1993.

G. Sborgia, A. Niro, A. Sborgia et al., “Inverted internal limiting membrane-flap technique for large macular hole: a microperimetric study,” International Journal of Retina and Vitreous, vol. 5, no. 1, p. 44, 2019.

A. Azuara-Blanco, C. T. Pillai, and H. S. Dua, “Amniotic membrane transplantation for ocular surface reconstruction,” British Journal of Ophthalmology, vol. 83, no. 4, pp. 399–402, 1999.

W. Li, H. He, C.-L. Kuo, Y. Gao, T. Kawakita, and S. C. G. Tseng, “Basement membrane dissolution and reassembly by limbal corneal epithelial cells expanded on amniotic membrane,” Investigative Opthalmology & Visual Science, vol. 47, no. 6, pp. 2381–2389, 2006.