Journal of Pregnancy

Volume 2013 (2013), Article ID 518591, 1 page

http://dx.doi.org/10.1155/2013/518591

Retraction

Retracted: The Effects of Fetal Gender on Serum Human Chorionic Gonadotropin and Testosterone in Normotensive and Preeclamptic Pregnancies

Journal of Pregnancy

Received 2 October 2013; Accepted 2 October 2013

Copyright © 2013 Journal of Pregnancy. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “The Effects of Fetal Gender on Serum Human Chorionic Gonadotropin and Testosterone in Normotensive and Preeclamptic Pregnancies” [1], published in Journal of Pregnancy, has been retracted as it is found to contain a substantial amount of material from the paper “Human chorionic gonadotropin and testosterone in normal and preeclamptic pregnancies in relation to fetal sex,” authored by Johan Arnt Steier, Magnar Ulstein, and Ole L. Myking, and it is published in “Obstetrics & Gynecology” in September 2002.

References

N. Lorzadeh and S. Kazemirad, “The effects of fetal gender on serum human chorionic gonadotropin and testosterone in normotensive and preeclamptic pregnancies,” Journal of Pregnancy, vol. 2012, Article ID 874290, 6 pages, 2012.