Journal of Sensors
Volume 2019 (2019), Article ID 3605104, 2 pages
https://doi.org/10.1155/2019/3605104

Corrigendum

Corrigendum to “Application of Fractional Differential Calculation in Pretreatment of Saline Soil Hyperspectral Reflectance Data”

Anhong Tian,1,2 Junsan Zhao,¹ Heigang Xiong,3,4 Shu Gan,¹ and Chengbiao Fu1,2

¹Faculty of Land Resource Engineering, Kunming University of Science and Technology, Kunming, Yunnan 650093, China
²College of Information Engineering, Qujing Normal University, Qujing, Yunnan 655011, China
³College of Applied Arts and Science, Beijing Union University, Beijing 100083, China
⁴College of Resource and Environment Sciences, Xinjiang University, Urumqi, Xinjiang 830046, China

Correspondence should be addressed to Junsan Zhao; jszht@kmust.edu.cn

Received 16 January 2019; Accepted 20 January 2019; Published 7 April 2019

Copyright © 2019 Anhong Tian et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Application of Fractional Differential Calculation in Pretreatment of Saline Soil Hyperspectral Reflectance Data” [1], there was a typographical error in Table 3 and Table 4, where the numbers 676 and 1946 at the headers of the tables should be removed. The corrected tables are shown below:

Table 3: The bands with the largest CC absolute in the no human interference area.

Order

Absolute
Band
Absolute
Band
Absolute
Band
Absolute
Band
Absolute
Band

0
0.247549
2355
0.258711
676
0.303965
676
0.273546
676
0.24171
1946

0.2
0.272918
2355
0.279275
2355
0.325149
672
0.289407
672
0.263505
2355

0.4
0.337521
2268
0.343669
2268
0.362546
2268
0.349886
2268
0.330819
2355

0.6
0.452251
2267
0.454245
2268
0.478337
2268
0.462786
2268
0.448415
2267

0.8
0.488129
2267
0.558134
693
0.651624
690
0.635344
693
0.487335
2267

1
0.680359
1049
0.694649
1049
0.693701
1049
0.700773
1049
0.649393
862

1.2
0.670618
689
0.674993
690
0.664982
690
0.678021
690
0.654813
689

1.4
0.672355
682
0.678587
682
0.666791
682
0.678755
682
0.656751
682

1.6
0.704214
682
0.70968
682
0.699427
682
0.710109
682
0.69164
682

1.8
0.708322
682
0.714082
682
0.709584
682
0.715906
682
0.697884
682

2
0.680375
681
0.686301
681
0.700033
1148
0.68948
681
0.671469
681

Table 4: The bands with the largest CC absolute in the human interference area.

Order

Absolute
Band
Absolute
Band
Absolute
Band
Absolute
Band
Absolute
Band

0
0.39693
2384
0.390787
2384
0.361249
2384
0.382675
2384
0.407767
2310

0.2
0.41892
2384
0.412882
2384
0.384573
2383
0.405559
2383
0.4258
2384

0.4
0.45916
2346
0.456893
2383
0.457625
614
0.455213
2383
0.489956
2346

0.6
0.57097
2346
0.545842
2346
0.491625
668
0.515645
2346
0.608853
2346

0.8
0.66103
2095
0.640903
2095
0.593338
955
0.612877
955
0.67799
2095

1
0.61547
1443
0.615054
1988
0.598832
1988
0.625937
1988
0.64202
2095

1.2
0.63752
1988
0.64851
1988
0.631102
1764
0.652144
1988
0.629525
630

1.4
0.62432
1988
0.635681
1988
0.638534
1988
0.643132
1988
0.62093
531

1.6
0.63035
957
0.621285
957
0.589642
1987
0.610791
1987
0.64168
957

1.8
0.61592
957
0.605922
957
0.563155
957
0.593538
957
0.630378
957

2
0.60516
958
0.595053
958
0.553827
958
0.582938
958
0.621153
958

In addition, there was an error in equation (2) where (m-0) should be (). The corrected equation should be as follows:

References

A. Tian, J. Zhao, H. Xiong, S. Gan, and C. Fu, “Application of fractional differential calculation in pretreatment of saline soil hyperspectral reflectance data,” Journal of Sensors, vol. 2018, Article ID 8017614, 12 pages, 2018.