Journal of Spectroscopy
Volume 2015 (2015), Article ID 748673, 1 page
http://dx.doi.org/10.1155/2015/748673

Corrigendum

Corrigendum to “Oxidative Stability of Baru (Dipteryx alata Vogel) Oil Monitored by Fluorescence and Absorption Spectroscopy”

Vanessa D. Silva,¹ José N. Conceição,¹ Ivan P. Oliveira,¹ Caroline H. Lescano,¹ Rozanna M. Muzzi,¹ Omar P. S. Filho,² Edemilson C. Conceição,² Gleison A. Casagrande,³ and Anderson R. L. Caires¹

¹Grupo de Óptica Aplicada, Universidade Federal da Grande Dourados, CP 533, 79804-970 Dourados, MS, Brazil
²Faculdade de Farmácia, Universidade Federal de Goiás, CP 131, 74001-970 Goiânia, GO, Brazil
³Instituto de Química, Universidade Federal de Mato Grosso do Sul, CP 549, 79074-460 Campo Grande, MS, Brazil

Received 2 August 2015; Accepted 16 September 2015

Copyright © 2015 Vanessa D. Silva et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Oxidative Stability of Baru (Dipteryx alata Vogel) Oil Monitored by Fluorescence and Absorption Spectroscopy” [1], an error occurred in the inset information (spectrum identification) of “Figure 6(b)” and it should be corrected as follows.

- - - Chlorophyll— -carotene

References

V. D. Silva, J. N. Conceição, I. P. Oliveira et al., “Oxidative stability of baru (Dipteryx alata Vogel) oil monitored by fluorescence and absorption spectroscopy,” Journal of Spectroscopy, vol. 2015, Article ID 803705, 6 pages, 2015.