Mediators of Inflammation
Volume 2018 (2018), Article ID 1739615, 10 pages
https://doi.org/10.1155/2018/1739615

Research Article

Predictive Value of Combined LIPS and ANG-2 Level in Critically Ill Patients with ARDS Risk Factors

Zhi Xu,¹ Guo-Ming Wu,¹ Qi Li,¹ Fu-Yun Ji,¹ Zhong Shi,² Hong Guo,³ Jin-Bo Yin,⁴ Jian Zhou,⁵ Liang Gong,⁶ Chun-Xia Mei,1,7 and Guan-Song Wang¹

¹Institute of Respiratory Disease, Department of Respiratory, Respiratory Intensive Care Unit, Xinqiao Hospital, Third Military Medical University, Chongqing 400037, China
²Emergency Department, Xinqiao Hospital, Third Military Medical University, Chongqing 400037, China
³Gastroenterology Department, Xinqiao Hospital, Third Military Medical University, Chongqing 400037, China
⁴Department of Neurosurgery, Neurosurgical Intensive Care Unit, Xinqiao Hospital, Third Military Medical University, Chongqing 400037, China
⁵Intensive Care Unit, Daping Hospital, Third Military Medical University, Chongqing 400042, China
⁶Department of Respiratory, Southwest Hospital, Third Military Medical University, Chongqing 400038, China
⁷Department of Respiratory, Chongqing Traditional Chinese Medicine Hospital, Chongqing 400011, China

Correspondence should be addressed to Chun-Xia Mei; 1111mcx@163.com and Guan-Song Wang; wanggs2003@163.com

Received 29 November 2017; Revised 12 April 2018; Accepted 16 April 2018; Published 12 June 2018

Academic Editor: Giuseppe Valacchi

Copyright © 2018 Zhi Xu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

To investigate the predictive value of the acute physiology and chronic health evaluation 2 (APACHE2) score and lung injury prediction score (LIPS) for acute respiratory distress syndrome (ARDS) when combined with biomarkers for this condition in patients with ARDS risk factors. In total, 158 Han Chinese patients with ARDS risk factors were recruited from the Respiratory and Emergency Intensive Care Units. The LIPS, APACHE2 score, primary diagnosis at admission, and ARDS risk factors were determined within 6 h of admission, and PaO₂/FiO₂ was determined on the day of admission. Blood was collected within 24 h of admission for the measurement of angiopoietin-2 (ANG-2), sE-selectin, interleukin-6 (IL-6), and interleukin-8 (IL-8) levels. ARDS was monitored for the next 7 days. Univariate and multivariate analyses and receiver operating characteristic (ROC) analyses were employed to construct a model for ARDS prediction. Forty-eight patients developed ARDS within 7 days of admission. Plasma ANG-2 level, sE-selectin level, LIPS, and APACHE2 score in ARDS patients were significantly higher than those in non-ARDS patients. ANG-2 level, LIPS, and APACHE2 score were correlated with ARDS (, , and , resp.). When the APACHE2 score was used in combination with the LIPS and ANG-2 level to predict ARDS, the area under the ROC curve (AUC) was not significantly increased. Compared to LIPS or ANG-2 alone, LIPS in combination with ANG-2 had significantly increased positive predictive value (PPV) and AUC for the prediction of ARDS. In conclusion, plasma ANG-2 level, LIPS, and APACHE2 score are correlated with ARDS. Combined LIPS and ANG-2 level displays favorable sensitivity, specificity, and AUC for the prediction of ARDS.

1. Introduction

Acute respiratory distress syndrome (ARDS) is a critical illness characterized by noncardiogenic pulmonary edema and refractory hypoxemia [1]. Although great progress has been made in the methods used to improve the clinical prognosis of ARDS (such as the use of protective mechanical ventilation [2–4] and fluid balance therapy [5]), the morbidity and mortality of ARDS remain largely unchanged. Thus, early prediction and early therapy for ARDS will be helpful for reducing morbidity and mortality [6].

Unfortunately, although a variety of ARDS studies have been conducted, there is no favorable prediction model for ARDS. The multicenter study by Gajic et al. included more than 5000 cases, and the investigators constructed a predictor of ARDS: the lung injury prediction score (LIPS) [7, 8]. However, the positive predictive value (PPV) of the LIPS was only 0.18, thereby limiting its clinical application. Other predictors of ARDS (such as early acute lung injury (ALI) and surgical lung injury prediction models) are not validated in clinical practice [9, 10].

ARDS is an uncontrollable pulmonary inflammation characterized by neutrophil activation and endothelial injury [11–13]. Plasma interleukin-6 (IL-6) and interleukin-8 (IL-8) in ARDS patients are significantly higher than those in patients without ARDS [14–16]. Plasma angiopoietin-2 (ANG-2) is a proinflammatory cytokine that can regulate endothelial permeability [17]. Serum ANG-2 level is significantly increased in ARDS patients [18, 19], and ANG-2 displays predictive value for ARDS [19, 20]. However, numerous other factors also affect the outcomes of ARDS, and no single biomarker has been found to predict ARDS onset.

We hypothesized that the combined use of two or more parameters would be better than using only one factor in predicting ARDS. Thus, in the present study, the predictive value for ARDS by combining LIPS with one or more of 4 biomarkers was investigated.

2. Materials and Methods

2.1. Study Population

In this prospective study, 254 Han Chinese patients with risk factors for ARDS were recruited from the Respiratory Intensive Care Unit (RICU) and Emergency Intensive Care Unit (EICU) of Xinqiao Hospital, Daping Hospital, and Southwest Hospital of the Third Military Medical University, between March 2013 and May 2016. The inclusion criterion was one or more risk factors for ARDS in the patients [8]. The exclusion criteria were as follows: (1) patients who developed ARDS before initial evaluation or blood collection (); (2) patients who were rehospitalized (); (3) the hospital stay was shorter than 7 days, and it was unfeasible to determine the clinical outcome (); (4) patients who died within 6 h of admission (); (5) patients had a history of chronic interstitial lung disease () or were diagnosed with congestive heart failure (); (6) chest computed tomography (CT) or computed radiography (CR) was not performed within the prior 7 days (); and (7) sample collection was not performed until 24 h of admission (). Patients fulfilling one or more of the above conditions were excluded from the study. Finally, 158 patients were enrolled into our study (Figure 1). This study was approved by the Ethics Committee of the Third Military Medical University. Informed consent was obtained from each patient or the patient’s relatives before the study.

Figure 1: Details of subject enrollment and reason for exclusion from the present study.

2.2. Sample Collection

Blood was collected within 24 h of admission into the RICU or EICU, and plasma was separated and stored at −80°C.

2.3. Biomarker Measurements

Plasma concentrations of ANG-2, sE-selectin, IL-6, and IL-8 were measured by commercial ELISA kits (Cusabio, China) according to the manufacturer’s instructions as follows: standards for ANG-2, sE-selectin, IL-6, and IL-8 were prepared for generating corresponding standard curves. In each well, 100 μl sample or standard was added and the plate was sealed using a membrane for 90 min of reaction at 37°C. Then, 100 μl biotin-labeled anti-rat antibodies was added for 60 min of reaction at 37°C. Subsequently, 300 μl washing buffer was added, and after the mixture had soaked into the plate for 1 min, the buffer was discarded. In each well, 90 μl color development solution was added, and the plate was sealed using a membrane and placed in the dark for 30 min of reaction at 37°C. Thereafter, 100 μl termination solution was added, and the color of the solution turned from blue to yellow. Samples were read at 450 nm using a microplate reader. Values were calculated based on a standard curve constructed for each assay.

2.4. Clinical Data Collection

Baseline clinical information, including age, sex, admission source, primary diagnosis at admission, ARDS risk factors, ARDS risk modifiers, and other parameters, was collected within 6 h of admission into the RICU or EICU (Table 1). The LIPS was calculated within 6 h of admission as previously reported [8]. The LIPS has two indexes including 22 categories, such as shock, aspiration, and sepsis. The scores range from 0 to 15.5. The acute physiology and chronic health evaluation 2 (APACHE2) score was calculated within 24 h of admission. The APACHE2 score has three categories, namely, acute physiology score, age score, and chronic health score [21]. The scoring was performed by 2 investigators in this study who were blinded to the measurement and expression of biomarkers.

Table 1: Baseline characteristics of patients in the ARDS and non-ARDS groups.

Variable
Non-ARDS group ()
ARDS group ()
value

Age, yr
58.5 ± 20.3
60.0 ± 17.1
0.107

Male
82 (72.6%)
35 (77.8%)
0.500

Ethnicity
Han (100.0%)
Han (100.0%)
1.000

Patients resource

0.979

    Family
46 (40.7%)
19 (42.2%)
0.861

    Other departments
18 (15.9%)
7 (15.6%)
0.954

    General wards of the respiratory department
2 (1.8%)
1 (2.2%)
0.851

    Other hospital
47 (41.6%)
18 (40.0%)
0.854

Primary diagnosis at admission

0.364

    Respiratory
59 (52.2%)
31 (68.9%)
0.056

    Trauma
31 (27.4%)
6 (13.3%)
0.059

    Other
7 (6.2%)
3 (6.7%)
0.912

    Acute abdominal disease
7 (6.2%)
1 (2.2%)
0.304

Cardiopulmonary resuscitation
3 (2.7%)
1 (2.2%)
0.878

    Operation
6 (5.3%)
3 (6.7%)
0.740

Predisposing conditions

    Category

0.128

    Shock
7 (6.2%)
5 (11.1%)
0.292

    Sepsis
34 (30.1%)
23 (51.1%)
0.013

    Pancreatitis
5 (4.4%)
1 (2.2%)
0.513

    Pneumonia
82(72.6%)
38 (84.4%)
0.115

    High-risk surgery
3 (2.7%)
1 (2.2%)
0.876

    Trauma
31 (27.4%)
5 (11.1%)
0.027

Number

0.580

    Include 1 factor: n (%)
57 (50.4%)
19 (40.2%)
0.351

    Include 2 factors: n (%)
43 (38.1%)
20 (44.4%)
0.459

    Include 3 factors: n (%)
11 (9.7%)
6 (13.3%)
0.510

    Include 4 factors: n (%)
2 (1.8%)
0 (0.0%)
0.369

APACHE2 score
14.7 ± 6.0
18.5 ± 7.2
0.001

LIPS
4.4 ± 2.1
5.6 ± 1.8
0.001

60-day outcome
16 (14.2%)
21 (46.7%)
<0.001

Use of vasopressors
23 (20.3%)
19 (42.2%)
0.005

Methods of respiratory support

<0.001

    Oxygen inhalation through the nasal tube
33 (29.2%)
14 (31.1%)
0.813

    Noninvasive ventilation
25 (22.1%)
10 (22.2%)
0.989

    Invasive mechanical ventilation
48 (42.5%)
21 (46.7%)
0.632

    Noninvasive and invasive mechanical ventilation
7 (6.2%)
13 (28.9%)
<0.001

, .

2.5. Primary Outcome and Definitions

The primary endpoints were ARDS onset within 7 days and clinical outcomes of ARDS within 60 days. The primary endpoints were determined by two experienced clinicians who were blinded to the expression of the plasma biomarkers. ARDS was diagnosed according to the Berlin definition for ARDS (2010) [1]. Sepsis, severe sepsis, and septic shock were diagnosed according to the criteria of the American College of Chest Physicians/Society of Critical Care Medicine Consensus Conference [22].

2.6. Statistical Analysis

Statistical analysis was performed with SPSS version 20.0. Continuous data were expressed as the mean ± standard deviation and categorical data as numbers. Comparisons of continuous data were performed with the -test or Student’s -test and of categorical data with the chi-square test or Fisher’s exact test between two groups (ARDS group and non-ARDS group, the group of patients with and without ARDS, resp.). Univariate and multivariate logistic regression analyses were employed to identify factors associated with ARDS. For the establishment of the model with the LIPS and ANG-2, the probability value ( value) was obtained from logistic regression analysis and then used as a new indicator for the diagnosis of ARDS based on receiver operating characteristic (ROC) curve analysis. The accuracy of diagnosis was determined using area under the ROC curve (AUC; 95% confidence interval (CI) and value < 0.05). Linear regression analysis was used for determining correlations. A value of was considered statistically significant.

3. Results

3.1. Clinical Information and Patient Characteristics at Baseline

3.1.1. Baseline Characteristics of Patients

A total of 254 patients with risk factors of ARDS were recruited, and 158 patients were included for final analysis. The incidence of ARDS was 28.5% within 7 days of admission (45/158). As shown in Table 1, there were no significant differences in age, sex, initial diagnosis, or risk factors between ARDS and non-ARDS groups. However, the APACHE2 score, LIPS, use of invasive mechanical ventilation, and mortality within 60 days were significantly higher in the ARDS group than in the non-ARDS group, indicating that disease severity in the ARDS group is higher than that in the non-ARDS group.

3.1.2. Characteristics of Patients in Different Groups at Baseline

Preexisting medical interventions and therapies before evaluation are important factors affecting the accuracy of a prediction model. However, whether patients receive prior interventions or therapies before admission is an uncontrollable factor. Thus, a good prediction model requires the inclusion of other medical confounding factors. In the present study, patients were divided into two groups as follows: (group A) patients who had received vasopressors or different kinds of respiratory support including oxygen inhalation through the nasal tubes, noninvasive mechanical ventilation, or/and invasive mechanical ventilation before admission and (group B) patients who received no prior therapy before admission. The APACHE2 score, use of invasive mechanical ventilation, and mortality within 60 days were comparable in the 2 groups, suggesting that disease severity was similar between them (Table 2).

Table 2: Baseline characteristics of patients who received prior therapy and those who did not.

Variable
Group A ()
Group B ()
value

Age, yr
62.9 ± 18.1
56.0 ± 20.8
0.028

Male
72 (77.4%)
45 (69.2%)
0.248

Primary diagnosis at admission

0.018

    Respiratory
56 (60.2%)
34 (52.3%)
0.323

    Trauma
17 (18.3%)
20 (30.8%)
0.068

    Acute abdominal disease
2 (2.2%)
6 (9.2%)
0.046

    Cardiopulmonary resuscitation
2 (2.2%)
2 (3.1%)
0.715

    Operation
9 (9.7%)
0 (0.0%)
0.011

    Other
7 (7.5%)
3 (4.6%)
0.460

Predisposing conditions

Category

0.088

    Shock
8 (8.6%)
4 (6.2%)
0.568

    Sepsis
40 (43.0%)
17 (26.2%)
0.030

    Pancreatitis
2 (2.2%)
4 (6.2%)
0.195

    Pneumonia
79 (84.9%)
41 (63.1%)
0.002

    High-risk surgery
3 (3.2%)
1 (1.5%)
0.506

    Trauma
16 (17.2%)
20 (30.8%)
0.046

Number

0.563

    Include 1 factor: n (%)
42 (45.2%)
34 (52.3%)
0.376

    Include 2 factors: n (%)
39 (41.9%)
24 (36.9%)
0.527

    Include 3 factors: n (%)
10 (10.8%)
7 (10.8%)
0.997

    Include 4 factors: n (%)
2 (2.2%)
0 (0.0%)
0.234

APACHE2 score
15.9 ± 6.6
15.6 ± 6.6
0.743

LIPS
5.1 ± 2.2
4.2 ± 1.8
0.017

60-day outcome
23 (24.7%)
14 (21.5%)
0.641

Morbidity of ARDS
26 (28.0%)
19 (29.2%)
0.861

Group A: patients who had received therapy before admission; group B: patients who had not received therapy before admission. , .

3.2. Prediction and Regression Analysis of LIPS, APACHE2 Score, and ANG-2, sE-Selectin, IL-6, and IL-8 Levels for ARDS

3.2.1. LIPS, APACHE2 Score, and ANG-2, sE-Selectin, IL-6, and IL-8 Concentration in the ARDS and Non-ARDS Groups

Plasma ANG-2 level, sE-selectin level, LIPS, and APACHE2 score in the ARDS group were significantly higher than those in the non-ARDS group, but plasma IL-8 and IL-6 level was not different between the two groups (Tables 3).

Table 3: LIPS, APACHE2 score, and levels of ANG-2, sE-selectin, IL-6, and IL-8 in the ARDS and non-ARDS groups.

ARDS ()
Non-ARDS ()
-test or Student’s -test
value

ANG-2 (ng/ml)
7.36 ± 5.99
3.05 ± 2.98
4.601
<0.001

IL-8 (pg/ml)
97.82 ± 188.99
73.16 ± 314.70
0.491
0.624

IL-6 (pg/ml)
117.54 ± 182.08
79.32 ± 132.47
1.464
0.145

sE-selectin (ng/ml)
10.61 ± 5.56
7.84 ± 5.18
2.968
0.003

APACHE2 score
18.5 ± 7.2
14.7 ± 6.0

0.001

LIPS
5.6 ± 1.8
4.4 ± 2.1

0.001

ANG-2: angiopoietin-2; IL: interleukin; LIPS: lung injury prediction score. Data are presented as the mean ± SD or n (%). Analysis performed using -test or Student’s -test.

3.2.2. Univariate and Multivariate Regression Analyses of LIPS and Biomarkers for the Prediction of ARDS

Univariate analysis showed that ANG-2 level, sE-selectin level, APACHE2 score, LIPS, and septic shock were closely associated with ARDS (Table 4, univariate analysis). However, multivariable logistic regression analysis indicated that only ANG-2 level, LIPS, and APACHE2 score were correlated with ARDS (Table 4, multivariate regression analysis).

Table 4: Univariate and multivariate regression analyses of LIPS and prediction of ARDS.

Univariate regression analyses
Multivariate regression analyses

OR
95% CI of OR

value
OR
95% CI of OR

value

ANG-2 (ng/ml)
1.252
1.138~1.377
21.289
<0.001
1.258
1.137~1.392
19.702
<0.001

IL-8 (pg/ml)
1.000
0.999~1.001
0.234
0.628

IL-6 (pg/ml)
1.002
0.999~1.004
2.017
0.156

sE-selectin (ng/ml)
1.097
1.028~1.170
7.866
0.005

APACHE2 score
1.092
1.034~1.154
10.004
0.002
1.070
1.003~1.141
4.150
0.042

LIPS
1.344
1.123~1.610
10.338
0.001
1.324
1.083~1.618
7.520
0.006

Sepsis
1.141
0.457~2.850
0.080
0.777

Severe sepsis
1.444
0.456~4.573
0.391
0.532

Sepsis shock
4.327
1.531~12.225
7.639
0.006

Infection-related ARDS risk
2.343
0.994~5.527
3.783
0.052

Invasive mechanical ventilation
1.575
0.786~3.157
1.639
0.200

3.2.3. Prediction of ARDS with APACHE2 Score Alone or in Combination with LIPS or ANG-2 Level

When the APACHE2 score, LIPS, and ANG-2 level were independently used to predict ARDS, the APACHE2 score had the lowest AUC (0.649). When the APACHE2 score was used in combination with LIPS or ANG-2 level for the prediction of ARDS, the AUC did not significantly increase (Tables 5 and 6). The APACHE2 score had a low AUC for the prediction of ARDS, and the APACHE2 score in combination with LIPS or ANG-2 level also failed to increase the AUC for the prediction of ARDS. Thus, the APACHE2 score was not included as a factor for the prediction of ARDS.

Table 5: Prediction of ARDS with the APACHE2 score alone or in combination with LIPS or ANG-2.

Cutoff
TPR
TNR
PV+
PV−
AUC
SE
95% CI
value

APACHE2
16.5000
0.5333
0.6460
0.3750
0.7766
0.649
0.048
0.555~0.743
0.003

ANG-2
4.1210
0.6667
0.7522
0.5172
0.8500
0.735
0.048
0.641~0.829
<0.001

LIPS
5.2500
0.6222
0.6814
0.4375
0.8191
0.704
0.044
0.618~0.789
<0.001

ANG-2 + APACHE2
0.2887
0.7111
0.7788
0.5614
0.8713
0.795
0.038
0.721~0.869
<0.001

LIPS + APACHE2
0.2409
0.7556
0.5664
0
0.8534
0.707
0.044
0.622~0.793
<0.001

Table 6: AUC for the APACHE2 score alone or in combination with LIPS or ANG-2 level in predicting ARDS.

value

ANG-2 versus ANG-2 + APACHE2
0.9801
0.3271

LIPS versus LIPS + APACHE2
0.0482
0.9615

3.3. Prediction of ARDS with LIPS, ANG-2, and LIPS + ANG-2 Models

In subsequent experiments, we used LIPS, ANG-2 level, and LIPS + ANG-2 level to establish models for the prediction of ARDS. In the LIPS + ANG-2 model, the probability of LIPS and ANG-2 was obtained from logistic regression analysis ( + 0.317LIPS + 0.232ANG-2) and then used to predict ARDS.

When the cutoff value of ANG-2 level was 4.121 ng/ml, the sensitivity, specificity, and AUC were 66.67%, 75.22%, and 0.735, respectively, in predicting ARDS. The predictive value of the ANG-2 model was slightly better than that of the LIPS model. The sensitivity, specificity, and AUC were 71.11%, 79.65%, and 0.803, respectively, in predicting ARDS with the LIPS + ANG-2 with a cutoff of 0.2821. The PPV and AUC for the LIPS + ANG-2 model were significantly higher than those for the LIPS or ANG-2 model, indicating that the LIPS in combination with ANG-2 level has a better capability to predict ARDS than when either of the parameters is used alone (Table 7 and Figure 2).

Table 7: Characteristics of ANG-2, LIPS, and LIPS + ANG-2 models for predicting ARDS.

Cutoff
TPR
TNR
PPV
NPV
AUC
SE
95% CI
value

LIPS
5.2500
0.6222
0.6814
0.4375
0.8191
0.704
0.044
0.618~0.789
<0.001

ANG-2
4.1210
0.6667
0.7522
0.5172
0.8500
0.735
0.048
0.641~0.829
<0.001

LIPS + ANG-2
0.2821 (Y)
0.7111
0.7965
0.5819
0.8738
0.803
0.039
0.727~0.879
<0.001

 + 0.317LIPS + 0.232ANG-2.

Figure 2: ROC of ANG-2, LIPS, and LIPS + ANG-2 for predicting ARDS. The figure depicts that the AUC for the LIPS + ANG-2 model was significantly higher than that for the LIPS or ANG-2 model, indicating that the LIPS + ANG-2 model has a better predictive value for ARDS that the LIPS and ANG-2 models.

3.4. Subgroup Analysis of the LIPS, ANG-2, and LIPS + ANG-2 Models

The major difference between group A and group B was the use of medical intervention or therapy before evaluation of the LIPS or measurement of biomarkers. However, prior medical interventions or therapies may affect the accuracy of prediction models. To evaluate the influence of medical intervention or therapy on the accuracy of the above models, we performed subgroup analysis. The results showed that the LIPS + ANG-2 model had the largest AUC (0.772), and the LIPS model had the smallest AUC (0.652) in group A; the LIPS + ANG-2 model had the largest AUC (0.847), and the ANG-2 model had the smallest AUC (0.720) in group B. These results suggest that the LIPS + ANG-2 model has a better predictive value for ARDS than the LIPS or ANG-2 model regardless of prior medical intervention or therapy. The AUCs for the LIPS + ANG-2 model and the LIPS model in group A were smaller than those in group B (0.772 versus 0.847 and 0.652 versus 0.788, resp.), but the AUC for the ANG-2 model in group A was larger than that in group B (0.749 versus 0.720). These findings indicate that although the prediction of ARDS with the LIPS + ANG-2 model is affected by prior medical intervention; the LIPS + ANG-2 model has a better predictive capability for ARDS. Moreover, the prediction of ARDS with the LIPS model is also influenced by prior medical intervention. However, the prediction with the ANG-2 model does not seem to be affected by prior medical intervention, and its AUC is higher in group A (Table 8 and Figure 3).

Table 8: Subgroup analysis for the prediction of ARDS with the LIPS, ANG-2, and LIPS + ANG-2 models.

Group A

Group B

LIPS
ANG-2
LIPS + ANG-2
LIPS
ANG-2
LIPS + ANG-2

Cutoff
5.2500
3.1110
0.2827
5.2500
5.9235
0.2392

TPR
0.6154
0.7692
0.7308
0.6316
0.6316
0.8421

TNR
0.5821
0.6866
0.7612
0.8261
0.8913
0.8261

PPV
0.3697
0.4943
0.5493
0.5912
0.6982
0.6585

NPV
0.7917
0.8819
0.8766
0.8492
0.8587
0.9293

AUC
0.652
0.749
0.772
0.788
0.720
0.847

95% CI
0.532~0.772
0.631~0.868
0.664~0.881
0.675~0.902
0.566~0.873
0.742~0.952

value
0.023
<0.001
<0.001
<0.001
0.006
<0.001

Group A: patients who had received prior therapy before admission; group B: patients who had not received prior therapy before admission.

(a)

(b)

(c)

Figure 3: ROC curves of the LIPS, ANG-2, and LIPS + ANG-2 models for predicting ARDS in group A (solid line) and group B (dotted line). (a) AUC for the LIPS model in group A was smaller than that in group B (0.652 versus 0.788); (b) AUC for the ANG-2 model in group A was larger than that in group B (0.749 versus 0.720); (c) AUC for the LIPS + ANG-2 model in group A was smaller than that in Group B (0.772 versus 0.847).

3.5. Correlation of LIPS, ANG-2, and LIPS + ANG-2 Models with PaO₂/FiO₂

The correlation of the three prediction models with PaO₂/FiO₂ on the day of admission was further evaluated. Simple and binary linear regression analyses (Table 9) showed that the three models were positively correlated with severity of lung injury and that the LIPS + ANG-2 model displayed the best correlation (LIPS: , ; ANG-2: , ; LIPS + ANG-2: , ).

Table 9: Correlation of the LIPS, ANG-2, and LIPS + ANG-2 models with PaO₂/FiO₂.

LIPS
ANG-2
LIPS + ANG-2

Correlation coefficient
−0.394
−0.189
−0.426

value
<0.001
0.018
<0.001

4. Discussion

Our results showed that the LIPS, evaluated based on clinical information, could predict the occurrence of ARDS (AUC: 0.704, 95% CI: 0.618~0.789, ). In addition, of the 4 investigated biomarkers of ARDS, only ANG-2 level displayed predictive value for ARDS (AUC: 0.735, 95% CI: 0.641~0.829, ). The combined use of the LIPS and ANG-2 level increased the accuracy of prediction of ARDS (AUC: 0.803, 95% CI: 0.727~0.879, ), and the PPV of the LIPS + ANG-2 model increased to 58.19%.

The LIPS model was proposed in 2011 by Gajic and Trillo-Alvarez for the prediction of ALI/ARDS according to their multicenter study on a large sample. It has a good predictive value for ALI (AUC: 0.80~0.84). Our results showed that the LIPS was also correlated with ARDS (odds ratio (OR): 1.324, 95% CI: 1.083~1.618, ).

For patients with critical illness in the ICU, the APACHE2 score is a good parameter that can be used to predict mortality [23]. However, no study has been conducted on the usefulness of the APACHE2 score in the prediction of ARDS. In our study, the APACHE2 score was closely correlated with ARDS (OR: 1.070, 95% CI: 1.003~1.141, ). However, compared with the LIPS and ANG-2 level, APACHE2 score displayed the smallest AUC for ARDS prediction. Moreover, when combined with the LIPS and ANG-2 level, APACHE2 score failed to increase the predictive power of these two parameters. Therefore, the APACHE2 score was not included for further analysis, but the LIPS was preserved.

In this study, 4 biomarkers, namely, ANG-2, sE-selectin, IL-8, and IL-6, related to the pathogenesis of ARDS were measured in blood.

ANG-2 is a secreted endothelial cell-specific growth factor. It can improve the sensitivity of vascular endothelial cells to vascular endothelial growth factors (VEGFs) and enhance angiogenesis in the presence of VEGF. On the other hand, ANG-2 can cause endothelial apoptosis, leading to vascular degeneration. Therefore, ANG-2 is an important biomarker of endothelial activation/dysfunction [24]. ANG-2 demonstrated proinflammatory activity and can regulate endothelial permeability [17]. ARDS is an uncontrollable pulmonary inflammation characterized by neutrophil activation and endothelial injury [11–13]. Increased vascular permeability and pulmonary vascular leakage are extremely important pathophysiological indicators of ARDS. Studies have shown that ANG-2 level is significantly increased in ARDS patients [18, 19]. In patients with severe sepsis, ANG-2 level is correlated with the clinical outcomes of ARDS at 28 days and can be used to predict the prognosis of ARDS [25].

IL-8 and IL-6 are important proinflammatory cytokines involved in the pathogenesis of ARDS [7, 14, 16, 26]. sE-selectin is a proinflammatory cytokine expressed on endothelial cells and is can mediate adhesion and aggregation between white blood cells and endothelial cells [27]. sE-selectin may predict ARDS with a PPV of 68% and negative predictive value (NPV) of 86% [28]. The activation and migration of neutrophils are important for the pathogenesis of ARDS.

We found that plasma ANG-2 and sE-selectin levels in ARDS patients were dramatically higher than those in non-ARDS patients, but IL-8 or IL-6 level displayed no difference between the ARDS and non-ARDS groups. Further multivariate analysis showed that only ANG-2 had a close correlation with ARDS (OR: 1.258, 95% CI:1.137~1.392, ). Thus, sE-selectin, IL-8, and IL-6 were not included in the model for the prediction of ARDS, and ANG-2 was employed to establish this model.

Although our findings showed that the LIPS had the predictive capability for ARDS, its AUC was significantly lower than that reported by Gajic et al. and Trillo-Alvarez et al. [7, 8]. This difference may be explained by the fact that some patients in the present study were transferred from other hospitals, and medical intervention before the evaluation of the LIPS may have biased the results. Nevertheless, the LIPS still had a high predictive value with an AUC of 0.704.

Our results also revealed that ANG-2 level alone had favorable predictive capability for ARDS (AUC: 0.735). However, we attempted to identify a model with better predictive capability than LIPS or ANG-2 alone. Thus, we performed logistic regression analysis of the LIPS and ANG-2, and the probability value ( + 0.317LIPS + 0.232 ANG-2) was obtained and used to predict ARDS. The results showed that, with the cutoff value of this probability of 0.2821, the AUC for the LIPS + ANG-2 model was 0.803 in predicting ARDS, which was higher than that for the LIPS or ANG-2 model alone. In addition, the LIPS + ANG-2 model had higher PPV and NPV than did the LIPS or ANG-2 model.

Unlike the study by Agrawal et al. [29], we further investigated whether the LIPS in combination with ANG-2 level had different predictive capabilities in patients with or without medical intervention before admission. The results showed that the prediction of ARDS with the LIPS model but not with the ANG-2 model was affected by prior medical intervention. Moreover, the predictive capability of the LIPS + ANG-2 model for ARDS was better than that of the LIPS or ANG-2 model alone, regardless of prior medical intervention. However, prior medical interventions actually affected the accuracy of the LIPS + ANG-2 model in the prediction of ARDS, and its AUC was reduced by 7%. Nevertheless, the LIPS + ANG-2 model had a good predictive capability for ARDS in group A. Thus, we speculate that the LIPS + ANG-2 model would be more suitable for predicting ARDS in complex clinical situations.

Although strict inclusion and exclusion criteria were used in the present study to establish a better prediction model than the LIPS or ANG-2 model, our study had several limitations. (1) The volume of blood collected was relatively small, and thus it was impossible to detect all biomarkers for ARDS (such as biomarkers related to epithelial injury, endothelial injury, and other inflammatory factors). (2) The time and location of sample collection were limited, and we failed to dynamically observe changes in plasma biomarkers or compare plasma biomarkers with bronchoalveolar lavage fluid (BALF) biomarkers, which may have limited our understanding of these biomarkers. (3) The sample size was small. We need to expand the sample size in future studies. Nevertheless, our study had some advantages. This was a multicenter study in which patients were recruited from three general hospitals. In addition, the exclusion criteria were strict and excluded most clinical confounding factors to make our results reliable. Furthermore, patients who received medical intervention before admission were also recruited in the present study. These patients are special but are common in ICUs. Thus, our results are more likely to be widely applicable.

5. Conclusions

Taken together, our results demonstrate that the combined use of a clinical scoring system and biomarkers of ARDS is helpful for the early prediction of ARDS and might become a future research direction in the establishment of models for ARDS prediction. Compared with the LIPS model and the ANG-2 model, the LIPS + ANG-2 model had the best predictive capability for ARDS. In subgroup analysis, the results revealed that the ANG-2 model and the LIPS + ANG-2 model were applicable in patients with medical intervention before admission and that the LIPS + ANG-2 model had better predictive capability than the ANG-2 model. Our findings are helpful for the early identification of patients at high risk for ARDS and early prevention and management of ARDS.

Abbreviations

ANG-2: | Angiopoietin-2
IL: | Interleukin
LIPS: | Lung injury prediction score
ARDS: | Acute respiratory distress syndrome
APACHE2: | Acute physiology and chronic health evaluation 2
PPV: | Positive predictive values
AUC: | Area under the receiver operating characteristic
ROC: | Receiver operating characteristic.

Conflicts of Interest

The authors declare that they have no competing interests.

Authors’ Contributions

Zhi Xu, Chun-Xia Mei, and Guan-Song Wang contributed to study design, performed the statistical analysis, contributed to enroll patients, sample collection and clinical data collection, contributed to the interpretation of data, and drafted the manuscript. Guo-Ming Wu and Qi Li contributed to determine the primary endpoints and to the critical review of the manuscript. Fu-Yun Ji contributed to laboratory measurements and performed the statistical analysis. Zhong Shi, Hong Guo, Jin-Bo Yin, Jian Zhou, and Liang Gong contributed to enroll the patients, sample collection, and clinical data collection. All authors read and approved the final manuscript.

Acknowledgments

The authors thank the Institute of Respiratory Disease of Xinqiao Hospital of the Third Military Medical University and the colleagues in this institute for their support and help. This study was supported by the National Natural Science Foundation of China (Grants 81070053 and 81370169) and the Foundation for the Construction of Research Principle (Respiratory Medicine) of Xinqiao Hospital.

References

ARDS Definition Task Force, V. M. Ranieri, G. D. Rubenfeld et al., “Acute respiratory distress syndrome: the Berlin definition,” JAMA, vol. 307, no. 23, pp. 2526–2533, 2012.

M. B. P. Amato, C. S. V. Barbas, D. M. Medeiros et al., “Effect of a protective-ventilation strategy on mortality in the acute respiratory distress syndrome,” New England Journal of Medicine, vol. 338, no. 6, pp. 347–354, 1998.

Acute Respiratory Distress Syndrome Network, R. G. Brower, M. A. Matthay et al., “Ventilation with lower tidal volumes as compared with traditional tidal volumes for acute lung injury and the acute respiratory distress syndrome,” New England Journal of Medicine, vol. 342, no. 18, pp. 1301–1308, 2000.

M. O. Meade, D. J. Cook, G. H. Guyatt et al., “Ventilation strategy using low tidal volumes, recruitment maneuvers, and high positive end-expiratory pressure for acute lung injury and acute respiratory distress syndrome: a randomized controlled trial,” JAMA, vol. 299, no. 6, pp. 637–645, 2008.

C. V. Murphy, G. E. Schramm, J. A. Doherty et al., “The importance of fluid management in acute lung injury secondary to septic shock,” Chest, vol. 136, no. 1, pp. 102–109, 2009.

R. G. Spragg, G. R. Bernard, W. Checkley et al., “Beyond mortality: future clinical research in acute lung injury,” American Journal of Respiratory and Critical Care Medicine, vol. 181, no. 10, pp. 1121–1127, 2010.

C. Trillo-Alvarez, R. Cartin-Ceba, D. J. Kor et al., “Acute lung injury prediction score: derivation and validation in a population based sample,” European Respiratory Journal, vol. 37, no. 3, pp. 604–609, 2011.

O. Gajic, O. Dabbagh, P. K. Park et al., “Early identification of patients at risk of acute lung injury: evaluation of lung injury prediction score in a multicenter cohort study,” American Journal of Respiratory and Critical Care Medicine, vol. 183, no. 4, pp. 462–470, 2011.

D. J. Kor, D. O. Warner, A. Alsara et al., “Derivation and diagnostic accuracy of the surgical lung injury prediction model,” Anesthesiology, vol. 115, no. 1, pp. 117–128, 2011.

J. E. Levitt, H. Bedi, C. S. Calfee, M. K. Gould, and M. A. Matthay, “Identification of early acute lung injury at initial evaluation in an acute care setting prior to the onset of respiratory failure,” Chest, vol. 135, no. 4, pp. 936–943, 2009.

L. B. Ware and M. A. Matthay, “The acute respiratory distress syndrome,” New England Journal of Medicine, vol. 342, no. 18, pp. 1334–1349, 2000.

M. A. Matthay and R. L. Zemans, “The acute respiratory distress syndrome: pathogenesis and treatment,” Annual Review of Pathology: Mechanisms of Disease, vol. 6, no. 1, pp. 147–163, 2011.

C. Pierrakos, M. Karanikolas, S. Scolletta, V. Karamouzos, and D. Velissaris, “Acute respiratory distress syndrome: pathophysiology and therapeutic options,” Journal of Clinical Medicine Research, vol. 4, no. 1, pp. 7–16, 2012.

A. Takala, I. Jousela, O. Takkunen et al., “A prospective study of inflammation markers in patients at risk of indirect acute lung injury,” Shock, vol. 17, no. 4, pp. 252–257, 2002.

D. Bouros, M. G. Alexandrakis, K. M. Antoniou et al., “The clinical significance of serum and bronchoalveolar lavage inflammatory cytokines in patients at risk for acute respiratory distress syndrome,” BMC Pulmonary Medicine, vol. 4, no. 1, p. 6, 2004.

S. C. Donnelly, C. Haslett, R. M. Strieter et al., “Interleukin-8 and development of adult respiratory distress syndrome in at-risk patient groups,” The Lancet, vol. 341, no. 8846, pp. 643–647, 1993.

M. Sporek, P. Dumnicka, A. Gala-Bladzinska et al., “Angiopoietin-2 is an early indicator of acute pancreatic-renal syndrome in patients with acute pancreatitis,” Mediators of Inflammation, vol. 2016, Article ID 5780903, 7 pages, 2016.

D. C. Gallagher, S. M. Parikh, K. Balonov et al., “Circulating angiopoietin 2 correlates with mortality in a surgical population with acute lung injury/adult respiratory distress syndrome,” Shock, vol. 29, no. 6, pp. 656–661, 2008.

M. van der Heijden, G. P. van Nieuw Amerongen, P. Koolwijk, V. W. M. van Hinsbergh, and A. B. J. Groeneveld, “Angiopoietin-2, permeability oedema, occurrence and severity of ALI/ARDS in septic and non-septic critically ill patients,” Thorax, vol. 63, no. 10, pp. 903–909, 2008.

T. Wada, S. Jesmin, S. Gando et al., “The role of angiogenic factors and their soluble receptors in acute lung injury (ALI)/ acute respiratory distress syndrome (ARDS) associated with critical illness,” Journal of Inflammation, vol. 10, no. 1, p. 6, 2013.

W. A. Knaus, E. A. Draper, D. P. Wagner, and J. E. Zimmerman, “APACHE II-a severity of disease classification system: reply,” Critical Care Medicine, vol. 13, no. 10, pp. 818–829, 1985.

R. C. Bone, R. A. Balk, F. B. Cerra et al., “Definitions for sepsis and organ failure and guidelines for the use of innovative therapies in sepsis,” Chest, vol. 101, no. 6, pp. 1644–1655, 1992.

L. G. d. S. Cardoso and P. A. Chiavone, “The APACHE II measured on patients’ discharge from the intensive care unit in the prediction of mortality,” Revista Latino-Americana de Enfermagem, vol. 21, no. 3, pp. 811–819, 2013.

I. B. Lobov, P. C. Brooks, and R. A. Lang, “Angiopoietin-2 displays VEGF-dependent modulation of capillary structure and endothelial cell survival in vivo,” Proceedings of the National Academy of Sciences, vol. 99, no. 17, pp. 11205–11210, 2002.

D. R. Ricciuto, C. C. d. Santos, M. Hawkes et al., “Angiopoietin-1 and angiopoietin-2 as clinically informative prognostic biomarkers of morbidity and mortality in severe sepsis,” Critical Care Medicine, vol. 39, no. 4, pp. 702–710, 2011.

S. S. Chung, Y. Wu, Q. Okobi et al., “Proinflammatory cytokines IL-6 and TNF-α increased telomerase activity through NF-κB/STAT1/STAT3 activation, and withaferin A inhibited the sin colorectal cancer cells,” Mediators of Inflammation, vol. 2017, Article ID 5958429, 11 pages, 2017.

E. Nishida, M. Aino, S. I. Kobayashi et al., “Serum amyloid A promotes E-selectin expression via toll-like receptor 2 in human aortic endothelial cells,” Mediators of Inflammation, vol. 2016, Article ID 7150509, 8 pages, 2016.

K. Okajima, N. Harada, G. Sakurai et al., “Rapid assay for plasma soluble E-selectin predicts the development of acute respiratory distress syndrome in patients with systemic inflammatory response syndrome,” Translational Research, vol. 148, no. 6, pp. 295–300, 2006.

A. Agrawal, M. A. Matthay, K. N. Kangelaris et al., “Plasma angiopoietin-2 predicts the onset of acute lung injury in critically ill patients,” American Journal of Respiratory and Critical Care Medicine, vol. 187, no. 7, pp. 736–742, 2013.