Mediators of Inflammation
Volume 2021 (2021), Article ID 9816785, 4 pages
https://doi.org/10.1155/2021/9816785

Corrigendum

Corrigendum to “MicroRNA-30-5p Suppresses Inflammatory Factor-Induced Endothelial Cell Injury by Targeting TCF21”

Zhenyu Zhou,1,2 Yu Chen,³ Dongying Zhang,¹ Shiyong Wu,¹ Tao Liu,² Guoqiang Cai,¹ and Shu Qin¹

¹Department of Cardiology, The First Affiliated Hospital of Chongqing Medical University, Chongqing 400016, China
²Department of Cardiology, Nanchong Central Hospital, The Second Clinical School of North Sichuan Medical College, Nanchong, China
³Comprehensive Ward, Nanchong Central Hospital, The Second Clinical School of North Sichuan Medical College, Nanchong, China

Correspondence should be addressed to Shu Qin; cardio_shuqin@163.com

Received 14 August 2021; Accepted 14 August 2021; Published 22 October 2021

Copyright © 2021 Zhenyu Zhou et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “MicroRNA-30-3p Suppresses Inflammatory Factor-Induced Endothelial Cell Injury by Targeting TCF21” [1], the authors identified an error introduced during the preparation of the manuscript in Figure 4, where the GAPDH bands were duplicated between Figures 4(d) and 4(h). In Figure 4(d), “ox-LDL + mimics” should also be corrected to “ox-LDL + siRNA.”

Additionally, the significance indicators were omitted from Figures 1, 2, 4, and 5 in error, and in Table 1, a primer was not included. The corrected figures and tables are as below.

Figure 1: miR-30-5p was down-regulated in patients with atherosclerosis and its functional enrichment analysis. (a) The expression levels of miR-30-5p in patients with atherosclerosis (patients) and normal healthy people (control) were determined by qRT-PCR. indicated p <0.05 vs. control.

(a)

(d)

(g)

Figure 2

(a)

(d)

(h)

Figure 4

(a)

(d)

(h)

Figure 5

Table 1: Primers’ sequences in the real-time PCR assay.

Gene
Forward primers
Reversed primers

TCF 21
CCTGGCTAACGACAAATACG
TTTCAGGTCACTCTCGGGT

GAPDH
TGTTCGTCATGGGTGTGAAC
ATGGCATGGACTGTGGTCAT

miR-30-5p RT
CTCAACTGGTGTCGTGGAGTCGGCAATTCAGTTGAGACGTGAGT

miR-30-5p F
ACACTCCAGCTGGGTGTAAACATCCTACACT

All R
CTCAACTGGTGTCGTGGA

U6
CTCGCTTCGGCAGCACA
AACGCTTCACGAATTTGCGT

Due to an error during manuscript preparation, the incorrect miRNA was stated in the title of the manuscript. The article has been updated from “MicroRNA-30-3p” to “MicroRNA-30-5p” as shown above.

The authors apologize for these errors and confirm that they do not impact the conclusions of the article.

References

Z. Zhou, C. Yu, D. Zhang et al., “MicroRNA-30-5p Suppresses Inflammatory Factor-Induced Endothelial Cell Injury by Targeting TCF21,” Mediators of Inflammation, vol. 2019, Article ID 1342190, 2019.