Mobile Information Systems
Volume 2017 (2017), Article ID 8246050, 10 pages
https://doi.org/10.1155/2017/8246050

Research Article

An Efficient Channel Access Scheme for Vehicular Ad Hoc Networks

Syed Asad Hussain,¹ Muddesar Iqbal,² Atif Saeed,1,3 Imran Raza,¹ Hassan Raza,⁴ Amjad Ali,¹ Ali Kashif Bashir,⁵ and Adeel Baig6,7

¹Department of Computer Science, COMSATS Institute of Information Technology, Lahore, Pakistan
²Department of Computer Science and Informatics, London South Bank University, London, UK
³Department of Computing, Lancaster University, Lancaster, UK
⁴Department of Engineering Mathematics and Internetworking, Dalhousie University, Halifax, NS, Canada
⁵Department of Science and Technology, University of the Faroe Islands, Faroe Islands, Denmark
⁶School of Electrical Engineering & Computer Science (SEECS), National University of Sciences & Technology (NUST), Islamabad, Pakistan
⁷College of Computer and Information Systems (CCIS), Al Yamamah University, Riyadh, Saudi Arabia

Correspondence should be addressed to Amjad Ali; amjad.ali@ciitlahore.edu.pk

Received 7 December 2016; Revised 24 March 2017; Accepted 18 May 2017; Published 13 June 2017

Academic Editor: Gianluigi Ferrari

Copyright © 2017 Syed Asad Hussain et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Vehicular Ad Hoc Networks (VANETs) are getting more popularity due to the potential Intelligent Transport Systems (ITS) technology. It provides many efficient network services such as safety warnings (collision warning), entertainment (video and voice), maps based guidance, and emergency information. VANETs most commonly use Road Side Units (RSUs) and Vehicle-to-Vehicle (V2V) referred to as Vehicle-to-Infrastructure (V2I) mode for data accessing. IEEE 802.11p standard which was originally designed for Wireless Local Area Networks (WLANs) is modified to address such type of communication. However, IEEE 802.11p uses Distributed Coordination Function (DCF) for communication between wireless nodes. Therefore, it does not perform well for high mobility networks such as VANETs. Moreover, in RSU mode timely provision of data/services under high density of vehicles is challenging. In this paper, we propose a RSU-based efficient channel access scheme for VANETs under high traffic and mobility. In the proposed scheme, the contention window is dynamically varied according to the times (deadlines) the vehicles are going to leave the RSU range. The vehicles with shorter time deadlines are served first and vice versa. Simulation is performed by using the Network Simulator (NS-3) v. 3.6. The simulation results show that the proposed scheme performs better in terms of throughput, backoff rate, RSU response time, and fairness.

1. Introduction

The significant improvements in the Intelligent Transportation System (ITS) have led the key advancements in the conventional IEEE 802.11p standard. In order to support the ITS services and applications (i.e., traffic management, traveler information, and public safety messages which are further divided into two classes; (i) periodic (beacon) safety messages and (ii) event driven messages) over Vehicular Ad Hoc Networks (VANETs), the Wireless Access in the Vehicular Environment (WAVE) standard has specified the required changes in the conventional IEEE 802.11p standard [1–3]. In dense and high traffic load scenarios the WAVE prioritizes the messages by which its delay increases significantly; however, its throughput decreases considerably. The Federal Communications Commission (FCC) has allocated 5.9 GHz and 5.8 GHz bands in the USA and South Korea, respectively, for vehicular communication. Moreover, Dedicated Short Range Communications (DSRC) scheme is also proposed to allocate the spectrum for vehicular communications. This scheme allocates spectrum between the vehicles and the roadside infrastructure or among the high speed vehicles within a range of up to 1 km.

In VANETs, vehicles can communicate with each other through roadside infrastructure known as Road Side Unit (RSU) as well as directly. Direct communication between vehicles is called Vehicle-to-Vehicle (V2V) communication. However, the conventional IEEE 802.11p standard does not provide satisfactory operating environment for VANETs under high traffic load and high mobility. Whereas, high traffic density and high mobility cause more frequent network topology changes as well as fluctuations in traffic density. This happens because the IEEE 802.11p shares basic characteristics of Distributed Coordination Function (DCF) of IEEE 802.11 and IEEE 802.11e (EDCF) [3–9] such as carrier sensing procedures and service priority levels, respectively. If a vehicle has high speed it is a likely chance that it will not be able to access the RSU for channel allocation while others can [10].

This paper presents an efficient channel allocation scheme which dynamically adapts the contention window (CW) for the vehicle according to the deadline. The deadline of each vehicle is calculated based on its speed. In the proposed scheme the CW for high speed vehicle and vehicle with emergency data is varied slowly which consequently gives quick access to the channel and vice versa. Simulation results present the comparative evaluation of the proposed scheme with conventional scheme and schemes proposed in [10, 11]. The proposed scheme performs better in terms of throughput, backoff rate, and RSU response time and fairness.

The rest of the paper is organized as follows. In Section 2, the related work is presented. Section 3 consists of motivations and main contribution; it also discusses the proposed RSU-based scheme for efficient channel access under high traffic load and mobility. Section 4 presents the performance analysis. Finally, Section 5 concludes the paper.

2. Related Work

We present a review of the work related to channel access for VANETs under high traffic density and high mobility conditions. The authors in [10] introduce clustering approach for periodic broadcasting of vehicle’s information such as its one-hop neighbors and its average speed. Each cluster is maintained by a cluster head. The cluster head broadcasts messages to vehicles within its cluster. Due to high mobility of cluster heads routes/hops can be broken and established frequently resulting in overall low network performance. This scheme categorizes vehicles based on their speed deviation from average speed of neighboring vehicles. The vehicles adjust their CWs according to the three fixed contention window ranges and not based on the time they leave the range of the RSU.

The scheme proposed in [12] investigates the performance of IEEE 802.11p by proposing two approaches of adaptive backoff window sizes. One is centralized and other one is distributed. In the centralized scheme the base station knows the number of concurrent transmitting vehicles and uses this information to calculate the optimal window size. The number of transmitting vehicles information is broadcasted periodically by the base station. Once such a broadcast is received by a vehicle, it will calculate the optimal transmission probability. However, in distributed approach each vehicle only uses its local channel information to select the backoff time. Each vehicle increases its backoff window size when the number of vehicles increases and vice versa. The vehicle in solicitation-based IEEE 802.11p MAC protocol [13] solicits data frames in an opportunistic style by requesting transmissions of the frames from a WAVE Mode Basic Service Set (WBSS) provider by a WAVE-poll frame. This counters fast channel variation conditions due to speed variability of vehicles.

Suthaputehakun and Ganz in [14] deploy conventional IEEE 802.11e with EDCF mechanism for priority assignment in intervehicle communication. High priority messages are repetitively transmitted to increase the probability of transmission as compared to lower priority ones. This results in more collisions and congestion in the network. The scheme proposed in [15] does not use CW based access mechanism; rather it uses the concept of super-frame consisting of collision-free and collision based phases. The vehicles are polled by the RSU according to their deadlines. Contention Free Period (CFP) is assigned 80% fixed length of the super-frame. However, Balon and Guo in [16] have considered the number of frames received by each vehicle to estimate the reception rate of that vehicle. Each vehicle knows local state of the network by maintaining a table carrying entries for neighboring vehicle. The entries include a MAC address, the last sequence number, a weighted reception rate, and a time stamp. CW is adapted according to the local reception rate of the vehicle. As the number of vehicles increases, maintenance of tables gets time consuming and complex for highly varying and fast road traffic. Furthermore, the paper does not explain how much CW is altered and how its threshold value is determined for comparison.

In [17], transmission power and CW for vehicles is dynamically adapted based on the vehicle density and instantaneous packet collision rate, respectively. In order to determine the estimated collision rate and adapt CW accordingly, the proposed scheme deploys the conventional IEEE 802.11 approach as well as using the concept of local reception rate suggested by Balon and Guo in [16]. The proposed scheme has almost the same issues as the scheme proposed in [16]. Additionally, the algorithm compares the estimated collision rate with a threshold value to relate CW but does not discuss how this threshold value is calculated. The scheme proposed in [18] considers the priority of packets consisting of static and dynamic fields. The static priority field is defined according to the sender application and contents of the message. This factor consists of five priority levels adopted by car-to-car (C2C) Communication Consortium. Dynamic factors such as speed of the vehicle, message utility, and message validity are used to schedule messages. Message utility calculates the transmission zone covered by a vehicle; that is, the smaller the zone, the higher the priority to send the message. The message validity factor takes into account serving deadline of messages; the message whose deadline is earliest is served first.

In [19], authors calculate network traffic density to adjust the size of the CW. The proposed scheme estimates the channel conditions using packet transmission status. It maintains channel states in a vector to update the CW in order to improve throughput of a network. In [20], a performance analysis of IEEE 802.11p is presented under the exchange of small status messages known as beacons. Vehicles use these beacon messages for establishing cooperative awareness. The cooperative awareness is used by different applications increasing road safety and efficiency of ITS. The proposed scheme targets real-time vehicle control by enhancing the efficiency of IEEE 802.11p broadcasts. The size of CW is adaptive based on traffic density improving delay and reception probability. Authors present a self-adaptive CW based scheme in [21] to improve the efficiency of VANETs. The proposed scheme uses persistence factor (PF) for dynamic adjustment of CW size. Moreover, based on total local reception rate of past few seconds, a vehicle can adapt the CW dynamically. To ensure more deterministic dynamic range [, CW()], the proposed MAC protocol implements Sliding Contention Window (SCW) adaptive to changing network conditions, bound by the predefined range. The messages are prioritized according to their urgency for timely propagation. The integration of contention based MAC and IEEE 802.11e Enhance Distributed Channel Access (EDCA) increases the communication reliability.

Early Deadline First (EDF) concept is also introduced by EL Korbi and Azouz Saidane in [11]; the authors develop a Markov chain-based analysis modeling the backoff process of the EDF policy. Moreover, the authors implement this scheme in MANETs to evaluate EDF policy over IEEE 802.11 in a multihop environment by considering two routing protocols: proactive Destination Sequenced Distance Vector (DSDV) and the reactive Ad Hoc On-Demand Distance Vector (AODV). However, the proposed scheme is developed for static environments. In [22], Dang et al. implement MAC protocols increasing efficiency and reliability of VANETs. Both the control and service channel intervals are proposed to carry safety messages to ensure the security of broadcast messages. It is also proposed to use control channel for the transmission of service packets to improve the service throughput. Table 1 provides the comparison of the existing schemes in terms of EDF, adjustment of CW, throughput, and number of backoffs.

Table 1: Comparison of existing schemes.

Scheme
Applied on VANET
EDF
Adjustment of CW
Fast topology
Throughput calculated/not calculated
Backoffs calculated/not calculated

Alasmary and Zhuang Scheme [10]
Yes
No
Adjust CW sizes according to the three fixed CW ranges based on their speed and not based on the time they leave the range of the RSU
Yes
Average compared to proposed scheme
Average compared to proposed scheme

Wang et al. [12]
Yes
No
No
No
Not calculated
Not calculated

Choi et al. [13]
Yes
No
No
Yes
Not calculated
Not calculated

Suthaputehakun and Ganz [14]
Yes
No
It defines min and max CW size
No
Not calculated
Not calculated

Bohm and Jonsson [15]
Yes
No
No
No
Not calculated
Not calculated

Balon and Guo [16]
Yes
No
Local reception rate of the nodes
No
Not calculated
Not calculated

Rawat et al. [17]
Yes
No
It adapts the CW size considering the packet collision rate
No
Not calculated
Not calculated

Bouassida and Shawky [18]
Yes
Yes
No
No
Not calculated
Not calculated

Balador et al. [19]
Yes
No
Based on the network traffic density
No
Not calculated
Not calculated

Reinders et al. [20]
Yes
No
It adjusts the CW size based on traffic density
No
Not calculated
Not calculated

Raut and Jeyakumar [21]
Yes
No
By sliding window with dynamic persistence factor (PF)
No
Not calculated
Not calculated

EL Korbi and Azouz Saidane Scheme [11]
No
Markov chain-based model
No
No
Not calculated
Not calculated

Dang et al. [22]
Yes
No
No
No
Scheme is evaluated for improving throughput
Not calculated

Proposed Scheme
Yes
Priority based scheme
This scheme assigns priority to vehicles based on their deadline in which they leave the range of RSU; the priorities are determined on real-time basis by changing CW size according to the deadlines in which the vehicles are going to leave the RSU range
Yes
Good as compared to EL Korbi and Azouz Saidane Scheme [11]
Good as compared to EL Korbi and Azouz Saidane Scheme [11]

3. A RSU-Based Efficient Channel Access Scheme for VANETs under High Traffic and Mobility

In the section, first we present our motivation and main contributions and then we discuss the RSU-based proposed scheme.

3.1. Motivation and Contributions

Our work is motivated by the observation that the existing schemes do not consider the fast changing topology of VANETs. Some of the schemes discussed in Section 2 are static in their nature; they either have deployed the conventional IEEE 802.11 or IEEE 802.11e EDCF mechanisms for channel access rendering the vehicles around RSU without timely provision of services or are reactive in their operations such as the calculation of the parameters (tables, collision rate) to adapt the CW size which is slow and complex process, which defeats the whole concept of real-time services for highly mobile vehicular traffic. Some of the mechanisms use conventional concepts of Mobile Ad Hoc Networks (MANETs) such as cluster head for cluster formation. Due to dynamic nature of vehicles in VANETs, routes/hops are frequently broken and established which results in overall degradation of network performance. Our proposed scheme follows the IEEE 802.11p standard which is particularly designed for WLANs and modifies it to support VANETs. In the proposed scheme, priority is assigned to each vehicle based on its deadline. Furthermore, we determine the priority of each vehicle dynamically by changing its CW size according to its deadline. The CWs for high speed vehicle having low Early Deadline First (EDF) are assigned small CW which adapts slowly as compared to the low speed vehicle having high EDF.

3.2. RSU-Based Proposed Scheme

The proposed scheme deals with the following parameters:

(1)speed of the vehicle,(2)direction of the vehicle with respect to the RSU,(3)emergency services.

The first two parameters are used to calculate the EDF value against each vehicle whereas the third parameter is used for tie breaking such as if multiple vehicles have the same value of EDF, then the vehicle having emergency service will be served first. However, the vehicle with small or low value of EDF is considered as high priority vehicle and the vehicle with high value of EDF is considered as low priority vehicle. The traffic density of vehicles generally follows the curve as shown in Figure 1. As it is clearly seen from the figure, traffic density is high near road crossings. Therefore, the vehicle’s prioritization is highly required at this point. The working of the proposed scheme is as follows:

(1)The RSU selects the vehicle, which is moving towards it within its range.(2)Time stamp of EDF is calculated for each vehicle, which is in the range of RSU. However, the EDF of a vehicle is calculated from its speed and geographic position as given below:

 Each vehicle is assumed to know the service deadline of its request. This is reasonable because a GPS enabled vehicle can estimate the departure time based on its speed and geographic location. The high speed vehicle has high priority while it has low EDF. Therefore, it should be served first. Figure 2 shows traffic scheduling by RSUs.(3)After a vehicle establishes connectivity with the RSU, its geographic location and radio range of RSU are calculated through beacon messages. The vehicle can estimate its departure time, which is its service deadline with the help of its driving speed and position information. Moreover, the vehicles are grouped according to their EDF.(4)Vehicles with lowest values of EDF shall be served first because they will cross the RSU range first. The CW for such vehicles should adapt slowly as compared to other vehicles with high values of EDF. The CWs for high EDF vehicles change quickly (doubled). The vehicles with low EDF values are considered as high priority and vice versa for high EDF value vehicles. In conventional IEEE 802.11 and EDCF standards [3–9], whenever there is a collision the CW is always doubled to reduce number of collisions and it is set to minimum CW whenever there is a successful packet transmission irrespective of the conditions. Figure 3 shows the channel access mechanism of the proposed scheme. Moreover, Table 2 demonstrates the selected parameters for channel access in the proposed scheme. (5)If multiple vehicles have the same value of EDF, then the one with single hop emergency message or small size data will be served first.(6)If multiple vehicles with the same value of EDF are crossing the RSU, then they may generate a broadcast storm which causes packet collisions. This situation is mitigated through Master-Slave scheme [10]. A cluster is created based on the transmission radius of the very first vehicle in the first lane when vehicles stop at a crossing point. The cluster will comprise two types of vehicles: one is master and the rest are slaves. The master vehicle is the one having maximum signal strength that can cover the maximum transmission radius in the cluster and this aspect is decided by the RSU. In a cluster, only the master vehicle broadcasts messages to slave vehicles. If the slave vehicles in the cluster want to send specific messages, they send them to master vehicle for onwards transmission to other slave vehicles in a cluster or outside the cluster if necessary.(7)If the RSU is not able to serve the fast moving vehicles due to their high speeds then it transfers the request to the next RSU depending on the direction of the vehicle. This may avoid dropping of the requests and system can manage to handle the high speed vehicles requests in the same way as mobile network does.

Table 2: Parameter used for channel access in proposed scheme.

Priority
EDF
CW change
CW min
CW max
AIFS

High
Low
Slow
3
7

Medium
Medium
Medium
7
15

Lowest
High
Fast
15
1023

Figure 1: Traffic pattern near road crossing.

Figure 2: Traffic Scheduling by RSUs.

Figure 3: Channel access mechanism of the proposed scheme.

Algorithms 1 and 2 calculate the EDFs of the vehicles moving towards the RSU and new contention window, respectively. Algorithm 1 calculates the EDFs of moving vehicles as follows:

(1)For vehicle with least EDF (high priority), previous CW is increased linearly with the min limit of 3 and max limit of 7.(2)For vehicles with EDF greater than least EDF (medium priority), a factor of 2 is added to the previous CW with the min limit of 7 and max limit of 15.(3)For vehicle with EDF greater than medium priority (low priority), a factor of 2 is multiplied with the previous CW in min limit of 15 and max limit of 1023.

Algorithm 2 dynamically adapts the CWs of the vehicle which is present in the range of the RSU according to its EDF. It selects the vehicle as follows:

(1)if the current distance of the vehicle is less than its previous distance and the vehicle is in the range of the RSU,(2)if current distance is greater than its previous distance and the vehicle is not within the range of the RSU.

Input: Vdc = Vehicle current distance, dp = Previous

Distance, Rr = RSU Range

Output: Calculation of EDF

initialization;

begin

while Vehicle not crossingRSU   do

read  current  distance  of  Vehicle

if then

;

else

go  back  to  the  beginning  of  then  section;

end

end

Algorithm 1: Calculation of EDF.

Input: VEDF = Vehicle EDF

VLEDF = Vehicle Least EDF

VMEDF = Vehicle Medium EDF

PCW = Previous CW.

Output: Calculation of New Contention Window

initialization;

begin

if then

end

if then

else

end

end

Algorithm 2: Calculation of new contention window.

4. Performance Analysis

We present and discuss our simulation parameters and performance analysis of the proposed scheme with respect to conventional scheme and schemes proposed in [10, 11]. Simulations are performed to evaluate the impact of mobility on IEEE 802.11p by using Network Simulator (NS-3) v. 3.6 [23]. Moreover, we use Simulation of Urban MObility (SUMO) as mobility simulator [24]. It is an open source microscopic, multimodal traffic simulation package which includes net import and demand modeling component. The simulation environment implements a 3-lane highway scenario. Each lane has a length of 3 km and a width of 10 m. The speed of vehicles is variable from 8 km/h to 100 km/h, whereas each vehicle is using the IEEE 802.11p MAC protocol. Simulation time is set to 200 s for all the simulations results and the transmission range of each vehicle is set to 500 m. The packet length is set to be 512 bytes. The number of vehicles contending for the channel may vary from 10 to 63. The time slot parameter of IEEE 802.11p is set to be 10 sec, and SIFS time is 25 sec. Table 3 presents the simulation parameters.

Table 3: Simulation parameters.

Parameters
Values

Network area
 m

Propagation model
Two-ray ground

Number of vehicles
10, 30, 40, 63

Speed
8 km/h to 100 km/h

Simulation time
200 sec

Traffic type
CBR

Radio range
500 m

MAC layer
IEEE 802.11p

Packet size
512 bytes

Traffic load
Packet sent every 1 ms

Traffic lights
1

Number of Lanes
3 in each direction

SIFS time
25 microseconds

Figure 4 shows the throughput analysis of the proposed scheme, the conventional scheme, and the schemes proposed in [10, 11]. It is clear from the figure that the throughput decreases as the number of vehicles increases. This is due to the reason that when the RSU serves more vehicles, the contention for channel increases, leading to more packet losses which consequently decreases the throughput. Hence, the proposed scheme performs better than the other schemes even with more number of vehicles.

Figure 4: Throughput of vehicles in the range of the RSU.

Figure 5 presents the simulations analysis in terms of backoff rate. The number of backoffs increases as the number of vehicles increases. However, the proposed schemes in [10, 11] do not adapt CW according to the priority of vehicles. Therefore, they cause more backoffs compared to the proposed scheme.

Figure 5: Backoff rate.

Figure 6 presents performance comparison of RSU response times for 10, 30, 40, and 63 vehicles. It is clear from the figure that the response time of RSU in the proposed scheme is less compared to the conventional scheme as well as the schemes proposed in [10, 11] under the high traffic load scenarios. This is because the proposed scheme assigns priority to the high speed vehicles (less EDF) by assigning smallest CW and slowly varies it, whereas the schemes proposed in [10, 11] assign priority to the vehicles based on the deviation from the average speed of the neighbors. It means that vehicles with extremely high deviation (low and high speeds) from the average speed are assigned high priority compared to the vehicles with average speed which in this case varies between 50 km/h and 60 km/h. This is the reason of a sharp rise of response time at these average values. In our proposed scheme, we assign priorities to the vehicles on the basis of deviation which is calculated as follows:

where is the average speed and is actual speed of a vehicle.

(a) RSU response time for 10 vehicles

(b) RSU response time for 30 vehicles

(c) RSU response time for 40 vehicles

(d) RSU response time for 63 vehicles

Figure 6: RSU response time for 10, 30, 40, and 63 vehicles.

Figure 7 shows the values of Jains fairness index plotted against the number of vehicles. Jains fairness index is calculated as follows:

where represents the number of vehicles and denotes the throughput for the th connection. The result ranges from (worst case) to 1 (best case) and it is maximum when all the users receive the same allocation. Simulation shows poor Jain fairness index at low number of vehicles. This is because some vehicles have less connectivity than the others, whereas, the frequent fragmentation of the network is one of the major reasons for less connectivity of vehicles. Fairness index increases with the number of vehicles increasing or with more high traffic density.

Figure 7: Jain’s fairness index.

5. Conclusion

In this paper we propose a RSU-based efficient channel access scheme for VANETs under high traffic and mobility conditions. It dynamically adapts the contention window of each vehicle based on its deadline of departure from the range of RSU. The contention window for higher priority packets is varied slowly and vice versa for lower priority ones. Simulations are performed to evaluate the mobility impact on the standard IEEE 802.11p. Our simulation results demonstrate that the proposed scheme performs better than the conventional scheme and schemes proposed in [10, 11] in terms of throughput, backoff rate, RSU response time, and fairness.

Conflicts of Interest

The authors declare that there are no conflicts of interest regarding the publication of this paper.

References

J.-M. Chung, M. Kim, Y.-S. Park, M. Choi, S. Lee, and H. S. Oh, “Time coordinated V2I communications and handover for WAVE networks,” IEEE Journal on Selected Areas in Communications, vol. 29, no. 3, pp. 545–558, 2011.

G. Karagiannis, O. Altintas, E. Ekici et al., “Vehicular networking: a survey and tutorial on requirements, architectures, challenges, standards and solutions,” IEEE Communications Surveys and Tutorials, vol. 13, no. 4, pp. 584–616, 2011.

B. P. Crow, I. Widjaja, J. G. Kim, and P. T. Sakai, “IEEE 802.11 wireless local area networks,” IEEE Communications Magazine, vol. 35, no. 9, pp. 116–126, 1997.

Y. Xiao, “IEEE 802.11 E: QoS provisioning at the MAC layer,” IEEE Wireless Communications, vol. 11, no. 3, pp. 72–79, 2004.

G. Bianchi, “Performance analysis of the IEEE 802.11 distributed coordination function,” IEEE Journal on Selected Areas in Communications, vol. 18, no. 3, pp. 535–547, 2000.

G. Bianchi, I. Tinnirello, and L. Scalia, “Understanding 802.11e contention-based prioritization mechanisms and their coexistence with legacy 802.11 stations,” IEEE Network, vol. 19, no. 4, pp. 28–34, 2005.

I. Inan, F. Keceli, and E. Ayanoglu, “Analysis of the 802.11e enhanced distributed channel access function,” IEEE Transactions on Communications, vol. 57, no. 6, pp. 1753–1764, 2009.

S. Mangold, S. Choi, G. R. Hiertz, O. Klein, and B. Walke, “Analysis of IEEE 802.11 e for QoS Support in Wireless LANs,” IEEE Wireless Communications, vol. 10, no. 6, pp. 40–51, 2003.

J. W. Robinson and T. S. Randhawa, “Saturation throughput analysis of IEEE 802.11e Enhanced distributed coordination function,” IEEE Journal on Selected Areas in Communications, vol. 22, no. 5, pp. 917–928, 2004.

W. Alasmary and W. Zhuang, “The Mobility Impact in IEEE 802.11p Infrastructureless Vehicular Networks,” in Proceedings of the 2010 IEEE Vehicular Technology Conference (VTC 2010-Fall), pp. 1–5, Ottawa, ON, Canada, September 2010.

I. El Korbi and L. Azouz Saidane, “Performance evaluation of the Earliest Deadline First policy over ad hoc networks,” International Journal of Ad Hoc and Ubiquitous Computing, vol. 10, no. 3, pp. 175–195, 2012.

Y. Wang, A. Ahmed, B. Krishnamachari, and K. Psounis, “IEEE 802.11p performance evaluation and protocol enhancement,” in Proceedings of the IEEE International Conference on Vehicular Electronics and Safety (ICVES '08), pp. 317–322, IEEE, Columbus, Ohio, USA, September 2008.

N. Choi, S. Choi, Y. Seok, T. Kwon, and Y. Choi, “A solicitation-based IEEE 802.11p MAC protocol for roadside to vehicular networks,” in Proceedings of the 2007 Mobile Networking for Vehicular Environments, MOVE, pp. 91–96, May 2007.

C. Suthaputehakun and A. Ganz, “Priority based inter-vehicle communication in vehicular ad-hoc networks using IEEE 802.11e,” in Proceedings of the 2007 IEEE 65th Vehicular Technology Conference (VTC '07), pp. 2595–2599, April 2007.

A. Bohm and M. Jonsson, “Supporting real-time data traffic in safety-critical vehicle-to-infrastructure communication,” in Proceedings of the 2008 33rd IEEE Conference on Local Computer Networks (LCN '08), pp. 614–621, Montreal, QB, Canada, October 2008.

N. Balon and J. Guo, “Increasing broadcast reliability in vehicular ad hoc networks,” in Proceedings of the VANET—Third ACM International Workshop on Vehicular Ad Hoc Networks, pp. 104-105, Angeles, Calif, USA, September 2006.

D. B. Rawat, D. C. Popescu, G. Yan, and S. Olariu, “Enhancing VANET performance by joint adaptation of transmission power and contention window size,” IEEE Transactions on Parallel and Distributed Systems, vol. 22, no. 9, pp. 1528–1535, 2011.

M. S. Bouassida and M. Shawky, “A cooperative congestion control approach within VANETs: formal verification and performance evaluation,” Eurasip Journal on Wireless Communications and Networking, vol. 2010, Article ID 712525, 2010.

A. Balador, C. T. Calafate, J. Cano, and P. Manzoni, “Congestion control for vehicular environments by adjusting IEEE 802.11 contention window size,” in Algorithms and Architectures for Parallel Processing, vol. 8286 of Lecture Notes in Computer Science, pp. 259–266, Springer International Publishing, 2013.

R. Reinders, M. Van Eenennaam, G. Karagiannis, and G. Heijenk, “Contention window analysis for beaconing in VANETs,” in Proceedings of the 7th International Wireless Communications and Mobile Computing Conference (IWCMC '11), pp. 1481–1487, July 2011.

T. V. Raut and A. Jeyakumar, “Self-adaptive Cw size by sliding window with dynamic persistence factor,” Int. J. of Recent Trends in Engineering Technology, vol. 11, no. 1, 2014.

D. N. M. Dang, C. S. Hong, S. Lee, and E.-N. Huh, “An efficient and reliable MAC in VANETs,” IEEE Communications Letters, vol. 18, no. 4, pp. 616–619, 2014.

“Network Simulator(NS-3),” http://www.nsnam.org.

M. Behrisch, L. Bieker, J. Erdmann, and D. Krajzewicz, “SUMO simulation of urban mobility: an overview,” in Proceedings of third International Conference on Advances in System Simulation (SIMUL '11), pp. 452–3969, 2011.