Mathematical Problems in Engineering

Volume 2013 (2013), Article ID 497108, 1 page

http://dx.doi.org/10.1155/2013/497108

Erratum

Erratum to “Study of the Nonlinear Dropping Shock Response of Expanded Foam Packaging System”

Huan-xin Jiang,¹ Yong Zhu,² and Li-xin Lu¹

¹Jiangsu Province Key Laboratory of Advanced Food Manufacturing Equipment and Technology, Jiangnan University, Wuxi 214122, China

²Key Laboratory of Product Packaging and Logistics of Guangdong Higher Education Institutes, Packaging Engineering Institute, Jinan University, Zhuhai 519070, China

Received 15 September 2013; Accepted 23 September 2013

Copyright © 2013 Huan-xin Jiang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the paper titled “Study of the Nonlinear Dropping Shock Response of Expanded Foam Packaging System” the affiliations of the authors are corrected here.