Mathematical Problems in Engineering

Volume 2013 (2013), Article ID 519432, 10 pages

http://dx.doi.org/10.1155/2013/519432

Research Article

Closed-Loop Identification Applied to a DC Servomechanism: Controller Gains Analysis

Roger Miranda Colorado and Gamaliel Contreras Castro

Universidad Politécnica de Victoria, Avenida Nuevas Tecnologías 5902, Parque Científico y Tecnológico de Tamaulipas, 87138 Ciudad Victoria, TAMPS, Mexico

Received 13 June 2013; Accepted 11 October 2013

Academic Editor: Wudhichai Assawinchaichote

Copyright © 2013 Roger Miranda Colorado and Gamaliel Contreras Castro. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

Usually, when parameter identification is applied, there are some gains related to the identification algorithm whose value must be carefully adjusted in order to obtain a good performance of the algorithm. However, when performing closed loop identification, there are some other constants that in general are not taken into account for the identification algorithm: the controller gains, which may appear inside the identification algorithm, specifically in the regressor vector, which is very important for the parameter convergence according to the persistence of excitation condition. Therefore, the effect of these gains on the estimated parameters should be analyzed so that better estimates can be obtained. This paper addresses the behavior of the parameter estimates for a closed-loop identification methodology applied to a DC servomechanism with a bounded perturbation signal and a PD controller. It is shown that, with this perturbation, the parameter estimates converge to a region whose size can be modified not only by varying the identification algorithm gains but also by modifying the P and D controller gains in a suitable way.

1. Introduction

It is well known that servomechanisms are fundamental in modern robotic and mechatronic systems for industrial applications where high speed and high precision are of prime importance. On the other hand, in order to apply model-based tuning methods it is necessary to apply an identification algorithm to the servomechanism and, if it is required, to design a high performance controller where a small steady state tracking error and high precision are necessary. Besides, the system parameters are also important to know if the system itself behaves as it should, for example, by evaluating its performance with some specified test signals. Thus, parameter identification plays a very important role for designing a controller as pointed out from several points of view [1–4].

For a DC servomechanism, there are several techniques that may be applied for identifying its parameters, when the servomechanism operates in open loop and in closed loop. However, it is important to note that if the variable of interest is the servo position, then a linear model of a servomechanism contains a pole on the imaginary axis, thus making the system not BIBO stable, that is, a bounded input applied to the servomechanism would not produce a bounded position and this may lead to undesired effects, for example, in robotic applications. Therefore, for security reasons, parameter identification should be performed in closed loop.

One way to characterize the system identification algorithms is [5, 6] (i) direct methods and (ii) indirect methods. Many of the identification procedures using a linear controller [7–9] fall into the category of direct methods; that is, the parameter identification procedures are applied without regard to the controller being used to close the loop. On the other hand, if a technique takes into account the controller structure, then it falls into the category of indirect methods.

As mentioned before, for security reason it is better to estimate the system parameters with the system working in closed loop. One way to perform closed loop parameter identification of a servomechanism is with the relay-based techniques [10–12], which are widespread for servo identification. The idea with this methodology is to close the loop through a relay in order to obtain a sustained oscillation and then the values of the frequency and amplitude allows identifying a model of the system. The relay based techniques may work well; however, the reference signal used for exciting the system becomes constant in many time instants, and then no control is being applied in that time and then the effect of the disturbances may affect the estimates obtained with this methodology. Besides, tuning of the relay controller can be cumbersome and no one of the reviewed methods takes explicitly into account the disturbances affecting the servomechanism.

References [7–9, 13–15] propose methods for closed loop identification of position-controlled servos where the loop is closed using a linear controller. The approach proposed in [13, 14] uses a PD controller to close the loop and an on-line gradient algorithm allows estimating a linear and nonlinear model of a servomechanism. Also, in [15] a two-step identification method for estimating the four parameters of a nonlinear model of a position control servomechanism is presented, where the proposed identification scheme relies on the theory of operational calculus. However, the effect of perturbations is considered only for constant values. On the other hand, a common technique used for identifying DC servomechanisms is based on the least squares algorithm. In [16], an approach for identifying a DC motor is presented considering the Coulomb friction and dead zone using a recursive discrete time least squares algorithm with forgetting factor using a Hammerstein model for the motor. In [17], second-order sliding modes approach is applied for estimating the parameters of a DC motor operating in open-loop and closed loop, while in [18] the inertia of a second-order model of a DC servomechanism driving a human assistive system is identified using Bode plots obtained from input-output measurements. Finally, another interesting approach is presented in [2, 4], where an online algebraic identification method is proposed. Besides, [19, 20] show how this methodology can be used for parameter identification of a DC motor and also this methodology was used and modified in [21] introducing a batch least squares algorithm for estimating the parameters of an induction motor.

All the previous works consider in general the importance of some gains related with the identification algorithm for closed-loop identification. However, in some cases (as that presented in [13, 14]) the controller gains get involved in with some important elements for the identification scheme, for example, in the regressor vector. In this case, it has not been analyzed which effect actually has such gains in the parameter identification procedure and how the parameter estimates will behave when a disturbance is affecting the system. Then, this work presents the analysis of a closed loop identification algorithm for a perturbed position-controlled DC servomechanism where a PD controller closes the loop and achieves stability without knowledge about the servomechanism parameters. Theoretical results show that, when the perturbation signal is identically zero, exponential convergence can be claimed, and in the presence of a bounded perturbation it is possible to obtain a region where the parameter estimates belong. What’s more, it will be shown that this region can be made arbitrarily small if the controller gains are tuned properly. Some simulations depict the behavior of the region , showing the effect that the controller gains have on the estimated parameters. The paper is organized as follows. Section 2 is devoted to present preliminary theoretical results of passivity based control, adaptive control, and the general description of the DC servomechanism. Section 3 presents the analysis for closed loop identification of the servomechanism when no disturbances are affecting the system and the exponential stability of the overall identification scheme is shown. Section 4 extends the analysis for the perturbed case and Section 5 deals with the analysis of the results. Finally, Section 6 gives some concluding remarks.

2. Preliminary Results

The closed loop identification analysis that will be presented is based on some results related with passivity theory and adaptive control, and thus the following results are worth presenting.

2.1. Passivity and Adaptive Control

As pointed out before, the aim of this work is to show the convergence properties of the identification algorithm with respect to the value of the controller gains. To this end it will be necessary to use the observability property given in [22] and some results of passivity and stability that will be described in the following.

Let us consider the linear time-varying system defined by

where , , while and are piecewise continuous functions. A system is said to be uniformly completely observable (UCO) [22] if there exist strictly positive constants such that, for all , where is the so-called observability Gramian as

where is the state transition matrix associated with . Now, assume that, for all , there exists such that, for all , where the matrix corresponds to the system under output injection as

with , , and . Then, the system is UCO if and only if is UCO, where the term stands for the output injection term as indicated in [22]. Moreover, if the observability Gramian of the system satisfies the previous upper and lower bounds on , then the observability Gramian of the system satisfies these inequalities with identical and

Now assume that has continuous and bounded first partial derivatives in and is piecewise continuous in for all , . Then, the following statements are equivalent [22].

(1) is an exponentially stable equilibrium point of , .(2)There exists a function and some strictly positive constants , , , , and such that, for all and , , , and .

Now, if there exists a function and strictly positive constants , , , and , such that, for all , : , and then, converges exponentially to zero.

Finally [23], the state equation is a minimal realization of a proper rational function if and only if is controllable, is observable, or if and only if , where and .

In the next definitions, let us consider the system defined as

where is the state vector, the input, and the system output. Consider the set of dimensional real valued functions and define the set , with the Euclidean norm. This set constitutes a normed vector space with the field and norm . Let us introduce the extended space as

where . In the same way, let us introduce the inner product and the truncated inner product of functions and as

The system (5) is dissipative [24] with respect to the supply rate if and only if there exists a storage function: , such that for all , all , and all . The system is passive if its supply rate is given by . It is input strictly passive (ISP) if there exists a positive constant such that the supply rate can be expressed as , . Finally, it is output strictly passive (OSP) if there exists a positive constant such that the supply rate can be expressed as , . The system (5) is called finite gain stable if there exists a positive constant such that for any initial condition there exists a finite constant such that and one important result from [24] is that if is OSP, then it is stable.

A state space system , , is zero state observable from the output if, for all initial conditions , the output implies that . It is zero state detectable if implies that as .

Regarding the identification algorithms, the persistence excitation (PE) condition is very important and its definition is given now according to [22]: a vector is persistently exciting (PE) if there exist constants such that

Besides, let . If is PE, the signals belong to the space , and is a rational stable strictly proper minimum phase transfer function, then is PE.

Theorem 1 (small signal I/O stability, [22]). Consider the perturbed system , and the unperturbed system , , where , , and . Let be an equilibrium point of the unperturbed system, that is, , for all . Let be piecewise continuous in and have continuous and bounded first partial derivatives in for all , , . Let be Lipchitz in u, with Lipchitz constant , for all , , . Let . If is an exponentially stable equilibrium point of the unperturbed system, then the perturbed system is small-signal stable; that is, there exist , , such that implies that , where is the solution of starting at . There exists such that, for all , implies that converges to a ball of radius ; that is, for all , there exists such that for all , along the solutions of starting at . Also for , .

2.2. Model of the DC Servomechanism

The closed loop identification analysis that will be presented considers the model of a perturbed DC servomechanism described by the following equation:

where , and are the inertia, viscous friction coefficient, amplifier gain, input voltage, perturbation signal, and torque input, respectively. The perturbation signal may be due to possibly constant disturbances or parasitic voltages appearing inside the amplifier. The model (9) can be rewritten as

where and are positive constants and and are the servo angular position and velocity, respectively. It is also assumed that the perturbation signal is bounded, that is: , . In the following it will be shown that there exists a region where the parameter estimates converge, even in the presence of the perturbation signal . Furthermore, it will be shown that the size of this region can be arbitrarily reduced by increasing the controller gains employed for stabilizing the servomechanism. This analysis will consider two cases.

(i)Closed loop identification of the unperturbed DC servomechanism, where the main objective will be to get a formula to estimate the system parameters and show the condition under which the system is exponentially stable.(ii)Closed loop identification of the perturbed DC servomechanism where the existence of the region will be shown where the parameter estimates converge, when a perturbation signal affects the system.

3. Closed-Loop Identification Algorithm: Nonperturbed Case

This section describes the closed loop identification approach and the way the parameter updating law is constructed. Besides, it is proved that under some assumptions the overall system is exponentially stable. Then, first the stability analysis will be presented to ensure the asymptotic stability of the closed loop system and the parameter error dynamics. Later, the system exponential stability property will be established.

3.1. Stability Analysis and Parameter Convergence

The closed loop identification analysis to be described is similar to that presented in [14] and depicted in Figure 1. For this (unperturbed) case, it will be considered that is identically zero, leading to the following unperturbed servo model:

The closed loop identification methodology consists of selecting a model of (11) with the following dynamics:

where is the estimated servo position, the estimated velocity, are the estimates of , and the control law for the estimated model. Then, the loop is closed around the real servomechanism and its model by using two PD controllers, where the same gains are used for both of them. Now let us define the output error , and then this error and its time derivative are employed to feed an identification algorithm which estimates the system parameters and updates them in the estimated model. All this procedure is now theoretically summarized.

Figure 1: Blocks diagram for the identification algorithm.

For closing the loop around the unperturbed system and its model, let us consider the PD controllers u(t) and as follows: and , where , , is the reference signal, and , the proportional and derivative controller gains which are used in both controllers. Then, the system (11) in closed loop with leads to the next closed-loop dynamics (for the sake of simplicity, from now on the time argument will be omitted) as

while the system (12) in closed loop with leads to the following dynamics:

By using the Routh-Hurwitz criterion, it is easy to show that the control law stabilizes the unperturbed servo model (11). However, even when the system (13) is stable, the same conclusion cannot be drawn for (14), because the coefficients of this estimated model (i.e., ,  ) are updated by one identification algorithm to be described later, and then these parameters are time varying; therefore, it is necessary to analyze the stability of (14). From the definition of , it is possible to evaluate its second time derivative and employing (13) and (14), the error dynamics is established as follows:

where , is the parameter error vector, and is the so-called regressor vector, where , , with being the estimate of . In order to analyze the behavior of the signals involved in the error dynamics (15), passivity based arguments will be used [24, 25]. To this end, let be the state vector of (15) and consider the following storage function:

where . The choice of will lead to concluding the OSP property of (15). Then, taking the time derivative of along the trajectories of (15) leads to

It is easy to prove that if . Besides, if , then the time derivative of along the trajectories of (15) yields ; that is, (15) defines an OSP operator . Moreover, it is well known that the feedback interconnection of passive subsystems is passive [24], thus making an intuitive to consider the parameter error dynamics as follows: , with matrix . Then, by considering the storage function , its time derivative along the trajectories of leads to , so that defines the passive operator . Finally, let us consider the feedback interconnection of (15) with given by

Then, by considering the storage function for (18) as the sum of and , it is easy to prove that Σ is still OSP; thus, it follows that . Let us define the signal as the output for the interconnected system (18). Then, note that corresponds to the output of an exponentially stable filter whose input belongs to the space; therefore, tends to zero as [26]. Therefore, it has been proved that and as , and thus as ; that is, , and then it turns out that the time varying system (14) is stable, as desired, although it remains to prove that the parametric error converges to zero, that is, that converges to the real parameter vector . To this end, let us consider the state-space description of (15) as

with:

As described in [22], a necessary and sufficient condition for parameter convergence in linear systems is the PE condition of the regressor vector . However, the results presented in [22] assume that all the signals in come from a linear time invariant system, which is not the case here because here the regressor has signals from the estimated model (14), which is a time varying system. To overcome this technical difficulty it is possible to consider the real regressor vector which consists of signals from the real servomechanism (13). Following the same procedure as that presented in [22], it is not a difficult task to show that if , then will be PE. Now, let us consider the difference

and consider the Lyapunov function candidate . Clearly if and , , with . Therefore, if , then , and considering the fact that permits concluding that , which makes clear that . Now, given a PE signal and a signal , the sum is still PE [22]. Thus, is PE as desired and the convergence of to zero can be claimed, that is, the estimated parameters converge to the real ones. Then, based on the previous analysis, the following proposition follows.

Proposition 2. Consider the system (13) and assume that . Then , and the parameter error vector converge to zero as time tends to infinity.

From the previous result, asymptotic stability has been proved for the closed loop system and identification approach. However, in the identification framework usually it is preferable to have a more robust stability condition, that is, exponential stability to guarantee that the parameter identification scheme will be robust against disturbances which may affect the system, such as unmodeled dynamics and measurement noise. Therefore, the next analysis will establish the necessary conditions for the servomechanism to be an exponentially stable system.

3.2. Exponential Convergence

As mentioned above, one appealing and important property of the parameter identification schemes is the exponential stability, because it guarantees robustness of the identification algorithm in presence of external disturbances or unmodeled dynamics. Thus, in the following it will be proved which conditions must be satisfied in order to make the system to be exponentially stable. First recall the state space description given by (19). Clearly the system is observable and controllable [23]; that is, it is a minimal realization, if . Let us consider the systems

The last analysis proved that is PE which turns out to be equivalent to the UCO condition on the system and so do . Then, the main result of this section can be established as follows.

Theorem 3. Given the system (18), assume that μ fulfills the bound conditions of Proposition 2. Let be an equilibrium point of . Then is an exponentially stable equilibrium point.

Proof. Let be the state of (18) and consider the following Lyapunov function candidate:

with as previously mentioned and defined as follows:

Clearly, if the inequality holds. Besides, it is possible to show that

Taking the time derivative of along the trajectories of (18) yields

Let us define the diagonal matrix ; then we have that , where if . Now assume that there exist strictly positive constants such that

First note from (18) and the time derivative of that

and then (27) will be valid if, for , the following inequality holds:

for all and . Now consider the following system:

Let us consider the UCO property of with . It is clear that, for the UCO condition,

Also we know that ; thus, there exists a positive constant such that . What’s more, the output of (19) is given by

because from (30) we note that the vector is constant. Let us define the signals and as follows:

From the stability analysis of Section 3 it was concluded that and that is PE. Thus, it is clear that [22] is PE. Therefore, there exist positive constants such that for all and . Moreover, because matrix is stable there exist positive constants , such that for all , and an integer to be defined later. Because is observable there exists with increasing such that for all , and . Let be another integer to be defined and . Then

Let both and be large enough such that and ; then,

Similarly, it is possible to conclude that

Now we define and . Then, it is possible to obtain the following bounds:

and therefore

where , , , and . Then we conclude that the system (18) is exponentially stable.

The last result established the exponential stability of (18) for the unperturbed case. However, in practice there are several disturbance sources (e.g., unmodeled dynamics, noise from the environment or from the measuring devices, etc.) which may affect the system performance of both the system and the identification algorithm. Therefore, the next analysis shows the extension of the last analysis to those scenarios.

4. Closed-Loop Identification Algorithm: Perturbed Case

Till now exponential stability of the equilibrium of (18) has been established. Now, it will be considered the perturbed system (10) in closed loop with the PD controller and it will be proved that this closed loop system is stable in the sense of Theorem 1. Let us consider the system (10) in closed loop with , the system , and the output error defined as before. Then, it is possible to obtain the following error dynamics:

For the system (39) it is important to know if it is still stable in the presence of the perturbation signal . If it is the case, then the system will be robust even in the presence of perturbations, which is desirable in the identification context because reliable parameter estimates can be obtained even in the perturbed case. The next result obtained from [22] allows concluding that the perturbed system (39) is stable.

Theorem 4. Consider the perturbed system (39) and the unperturbed system (18). If the equilibrium of (18) is exponentially stable, then one has the following.

(1)The perturbed system (39) is small signal -stable; that is, there exists such that , where is the solution of (39) starting at .(2)There exists , such that implies that converges to a ball of radius ; that is, for all , there exists such that for all , along the solutions of (39) starting at . Also for all , .

Proof. Consider again the Lyapunov function . Assuming that inequalities for given in Proposition 2, it is possible to obtain . Let us define the constants , , ,   , and . Then, the time derivative of along the trajectories of (39) yields and two cases may be considered.

(1)First it will be proved that . To this end consider the case where . Note that because of , which implies that for all . Suppose that it is not true, and then, by continuity of the solutions there exists and , with such that , and for all : , and then, from the time derivative of it is clear that in : , but in this case and , which is a contradiction; therefore, for all with initial condition , a solution for (39) remains on .(2)Assume that and that for all there exists such that and suppose that it is not true; then, for some and for all : and from the time derivative of given previously it is possible to obtain , which is a strictly negative constant. However, this contradicts with the fact that for all , because the inequality must be strict. On the other hand, let us assume that for all the following inequality holds: and it is possible to probe this affirmation in the same way that the first step of this proof. Thus, we conclude that converges to , as desired, and the proof is completed.

5. Analysis of the Results

The previous analysis showed that even in the presence of a bounded perturbation signal the parameter estimates remain in a region . Now it is important to analyze the behavior of this region and to see that how the controller gains influence the way this region behaves. To this end, recall from Theorem 4 that the state of (39) is bounded by

Besides, it is easy to obtain the eigenvalues of as . Thus, the minimal () and maximum () eigenvalues for are given by

Besides, for the diagonal matrix , note that .Then, note that the region depends on several parameters, among which are the controller gains and . In order to see the effect of the controller gains, let us consider the minimal and maximum eigenvalues of . From (40), it is possible to note that the region can be reduced by minimizing the value of and maximizing that of ; that is, the value of must be the minimum possible. Then, let us consider the function and its first and second partial derivatives with respect to , , and as follows:

If we set the first partial derivatives to zero, we obtain the equilibrium points with the following expressions:

Now, let us analyze the qualitative behavior of the region for different values of , , , , , , and . Figure 2 depicts the behavior of region for different values of and (the controller gains) and Figure 3 shows also the behavior for different values of and (the matrix related with the identification algorithm). From this set of graphics and (40), note the following.

(i)For a given constant value of and , if is big, the value of is reduced and the region is also reduced. For a given constant value of , if is big, the values of and are reduced, which turns out to reduce again the size of the region .(ii)The region can be made arbitrarily small if the values for and min are as large as possible and the value for can be increased if the controller gains and have large values, which is the case if a high gain PD controller is used. Then, the size of may be reduced and therefore the quality of the parameter estimates may be improved by means of the controller gains.(iii)By increasing the value of and , the value of is increased, which may reduce the size of and by increasing the values of the gain matrix the value of is also increased, reducing then the size of .(iv)As it can be seen from Figure 4, for the controller gains, the effect of the gain is more important for reducing the size of region than that of gain , because large values of do not influence significantly in the reduction of the region . What’s more, the effect of gain is almost imperceptible if the gain is large enough.(v)Finally, as expected, if the values of the maximum or minimum eigenvalues for the gain matrix dominate, the size of will also be reduced.

Figure 2: Behavior of the region when the values of and are taken as variables.

Figure 3: Behavior of the region when the values of () and () are taken as variables.

(a)

(b)

(c)

Figure 4: Behavior of the region for different cases: (a) variation of ; (b) variation of ; (c) variation of .

From the last analysis, it is possible to conclude that, for robustness of the identification algorithm, it is important to pay attention not only to the setup of the gain matrix and from the identification algorithm, but also to the value of the controller gains and . Then, the region is effectively reduced if a high gain is employed, and also if large eigenvalues are assigned to matrix .

Another subject to be considered is the controller structure, because it is possible to note that not all the gains have the same effect of reducing region . Therefore, when the parameter identification algorithm is designed, it is important to note that the structure of the controller should be an important issue that has been underestimated and that will be important in real applications where noisy measurements or unmodeled dynamics may be affecting the system.

6. Conclusion

This paper analyzes a method for on-line closed loop identification of a linear DC servomechanism with a bounded perturbation signal and a PD controller. Theoretical results show that, without perturbation signals, the system is exponentially stable and the parameter error converges to zero, but when a perturbation signal is present, the parameter estimates converge to a region and the overall system is stable; that is, the system is robust in face of perturbation signals. Besides, by increasing the controller and adaptation gains the region can be arbitrarily reduced, which means that the accuracy of the parameter estimates can be increased, which gives some insight into the importance of the controller structure in the identification process. Future work will be devoted to design more complicated controllers and verify the controller structure needed to obtain a better estimate of the system parameters, that is, a controller which reduces as much as possible and ensures the overall exponential stability.

References

H. Garnier, M. Mensler, and A. Richard, “Continuous-time model identification from sampled data: implementation issues and performance evaluation,” International Journal of Control, vol. 76, no. 13, pp. 1337–1357, 2003.

M. Fliess and H. Sira-Ramírez, “An algebraic framework for linear identification,” ESAIM, Control, Optimisation and Calculus of Variations, no. 9, pp. 151–168, 2003.

G. P. Rao and H. Unbehauen, “Identification of continuous-time systems,” IEE Proceedings—Control Theory and Applications, vol. 153, no. 2, pp. 185–220, 2006.

M. Fliess and H. Sira Ramírez, “Closed loop parametric identification for continuous time linear systems via new algebraic techniques,” in Continuous Time Model Identification from Sampled Data, H. Garnier and L. Wang, Eds., Springer, London, UK, 2007.

L. Ljung, System Identification, Prentice Hall, 1987.

U. Forssell and L. Ljung, “Closed-loop identification revisited,” Automatica, vol. 35, no. 7, pp. 1215–1241, 1999.

T. Iwasaki, T. Sato, A. Morita, and H. Maruyama, “Autotuning of two-degree-of-freedom motor control for high-accuracy trajectory motion,” Control Engineering Practice, vol. 4, no. 4, pp. 537–544, 1996.

E. J. Adam and E. D. Guestrin, “Identification and robust control of an experimental servo motor,” ISA Transactions, vol. 41, no. 2, pp. 225–234, 2002.

Y. Zhou, A. Han, S. Yan, and X. Chen, “A fast method for online closed-loop system identification,” International Journal of Advanced Manufacturing Technology, vol. 31, no. 1-2, pp. 78–84, 2006.

A. Besançon-Voda and G. Besançon, “Analysis of a two-relay system configuration with application to Coulomb friction identification,” Automatica, vol. 35, no. 8, pp. 1391–1399, 1999.

K. K. Tan, T. H. Lee, S. N. Huang, and X. Jiang, “Friction modeling and adaptive compensation using a relay feedback approach,” IEEE Transactions on Industrial Electronics, vol. 48, no. 1, pp. 169–176, 2001.

S.-L. Chen, K. K. Tan, and S. Huang, “Friction modeling and compensation of servomechanical systems with dual-relay feedback approach,” IEEE Transactions on Control Systems Technology, vol. 17, no. 6, pp. 1295–1305, 2009.

R. Garrido and R. Miranda, “Autotuning of a DC servomechanism using closed loop identification,” in Proceedings of the IEEE 32nd Annual Conference on Industrial Electronics (IECON '06), Paris, France, October 2006.

R. Garrido and R. Miranda, “DC servomechanism parameter identification: a closed loop input error approach,” ISA Transactions, vol. 51, no. 1, pp. 42–49, 2012.

R. Garrido and A. Concha, “An algebraic recursive method for parameter identification of a servo model,” IEEE/ASME Transactions on Mechatronics, vol. 18, no. 5, pp. 1572–1580, 2012.

T. Kara and I. Eker, “Nonlinear closed-loop direct identification of a DC motor with load for low speed two-directional operation,” Electrical Engineering, vol. 86, no. 2, pp. 87–96, 2004.

J. Davila, L. Fridman, and A. Poznyak, “Observation and identification of mechanical systems via second order sliding modes,” International Journal of Control, vol. 79, no. 10, pp. 1251–1262, 2006.

K. Kong, J. Bae, and M. Tomizuka, “A compact rotary series elastic actuator for human assistive systems,” IEEE/ASME Transactions on Mechatronics, vol. 17, no. 2, pp. 288–297, 2012.

G. Mamani, J. Becedas, V. Feliu-Batlle, and H. Sira-Ramírez, “Open- and closed-loop algebraic identification method for adaptive control of DC motors,” International Journal of Adaptive Control and Signal Processing, vol. 23, no. 12, pp. 1097–1103, 2009.

J. Becedas, G. Mamani, and V. Feliu, “Algebraic parameters identification of DC motors: methodology and analysis,” International Journal of Systems Science, vol. 41, no. 10, pp. 1241–1255, 2010.

J. C. Romero, C. G. Rodríguez, A. L. Juárez, and H. S. Ramírez, “Algebraic parameter identification for induction motors,” in Proceedings of the 37th Annual Conference of the IEEE Industrial Electronics Society (IECON '11), pp. 1734–1740, Melbourne, Australia, November 2011.

S. Sastry and M. Bodson, Adaptive Control: Stability, Convergence and Robustness, Prentice Hall, Englewood Cliffs, NJ, USA, 1989.

C.-T. Chen, Linear System Theory and Design, Oxford University Press, Oxford, UK, 4th edition, 2012.

R. Ortega, A. Loria, P. J. Nicklasson, and H. Sira-Ramírez, Passivity-Based Control of Euler-Lagrange Systems, Springer, London, UK, 3rd edition, 1998.

R. Sepulchre, M. Jankovic, and P. Kokotovic, Constructive Nonlinear Control, Springer, New York, NY, USA, 1996.

C. A. Desoer and M. Vidyasagar, Feedback Systems: Input-Output Properties, Academic Press, New York, NY, USA, 1975.