Mathematical Problems in Engineering

Volume 2013 (2013), Article ID 968025, 1 page

http://dx.doi.org/10.1155/2013/968025

Retraction

Retracted: Gabor Weber Local Descriptor for Bovine Iris Recognition

Mathematical Problems in Engineering

Received 12 November 2013; Accepted 12 November 2013

Copyright © 2013 Mathematical Problems in Engineering. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

The paper titled “Gabor Weber Local Descriptor for Bovine Iris Recognition” [1], published in Mathematical Problems in Engineering, has been retracted upon the authors’ request as it was found to include erroneous data. Its findings and conclusion cannot be relied on.

References

S. Sun, L. Zhao, and S. Yang, “Gabor Weber local descriptor for bovine iris recognition,” Mathematical Problems in Engineering, vol. 2013, Article ID 920597, 7 pages, 2013.