Mathematical Problems in Engineering

Volume 2014 (2014), Article ID 302565, 13 pages

http://dx.doi.org/10.1155/2014/302565

Research Article

A Modified D-K Iteration Approach for the Decentralized Control of Civil Structures with Parametric Uncertainties

Chunxu Qu, Linsheng Huo, and Hongnan Li

Faculty of Infrastructure Engineering, Dalian University of Technology, Dalian 116024, China

Received 30 October 2013; Revised 10 December 2013; Accepted 11 December 2013; Published 13 March 2014

Academic Editor: Hamid Reza Karimi

Copyright © 2014 Chunxu Qu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

Abstract.

This paper presents a robust decentralized controller design method to suppress the vibration of civil structures with the consideration of parametric uncertainties. The decentralized controller design is motivated by the double homotopy approach, which approximates the bilinear matrix inequality (BMI) derived from bounded real lemma to linear matrix inequality (LMI), and gradually deforms a centralized controller to a decentralized controller. The centralized controller can be designed for the civil structures with the parametric uncertainties through D-K iteration method in μ synthesis, which can consider the diagonal block pattern of the uncertain matrix. This paper combines the double homotopy approach and D-K iteration method to design the robust decentralized controller for the civil structures with parametric uncertainties. The proposed method is validated numerically with a four-story building example.

1. Introduction

Civil structures can be vibrated extremely and even damaged by the excessive earthquakes or wind load. Structural control is a new view to suppress the structural vibration. Active or semiactive control attracts more and more researcher attentions [1–7]. In active or semiactive control, a controller should be designed to complete a feedback loop, which contains sensors, actuators, and structures besides the controller. Traditional structural control adopts the centralized control, which needs all the sensor data and delivers the control command to all the actuators. For large-scale civil structures, the feedback loop with the centralized controller has high requirements on data transmission rate and embedded controller processor for computing, which may result in economical and technical difficulties.

Decentralized control is an available method to replace the centralized control, which makes the control decisions only according to the sensor data in the neighborhood of a control device [8, 9]. As a result, the time cost for data transmission and controller computing is reduced a lot. Qiu et al. considered the network-based environment with time delays [10–12]. For the decentralized control in civil structures, it has only been investigated in recent years. For example, Lynch and Law [13] modified LQR control for decentralized control and used it in the controller design of large-scale civil structures. Loh and Chang [14] made comparisons between some centralized and decentralized control algorithms. Labibi et al. [15] designed the decentralized controller by reducing the multivariable system to an optimization problem with LMI constraints. Wang et al. [16, 17] considered the time delay and presented decentralized dynamic output feedback control schemes through homotopy approach. As an alternative, Mehendale and Grigoriadis [18] proposed a double homotopy approach for decentralized control in continuous time domain. Motivated by Mehendale and Grigoriadis, Qu et al. [19] proposed a time-delayed decentralized controller design scheme through a double homotopy approach in discrete time domain.

It should be noted that the performance of a designed controller is up to how precise the structural model is. For the civil structures, such as tall buildings and long-span bridges, they are more susceptible to the external excitation. Earthquakes or strong wind could vibrate the civil structures and make some damages to the structural components, which would result in the structural parametric uncertainties. On the other hand, civil infrastructures always have large scale and complex structure. The precise numerical model is hard to build due to the neglect of the model high order or approximation of the structural complex part, which can also cause the uncertainties. These uncertainties can be reflected in the measurement data. The data-driven framework is an available method to obtain the uncertainty information, which is only dependent on the measured process variables [20, 21]. There are also some efforts on the robust controller design preconsidering the uncertainties. Wang et al. [22] studied the robust controller design for the uncertain structure, whose uncertainties located in the system matrices and control input matrices. Wang et al. [23] also developed a state feedback controller for the uncertainties in the disturbance input matrix. In the previous research, the parametric uncertainties are mixed up in the state-space matrices. Young [24] provided an introduction of design techniques for the system with parametric uncertainties through structured singular value approach. Moreno and Thomson [25] used D-K iteration method to design a tuned mass damper (TMD) for one degree-of-freedom system, which can consider the parametric uncertainties separately.

This paper considers the parametric uncertainties and presents a robust decentralized controller design method. The parametric uncertainties exist in the mass, damping, and stiffness matrices and are extracted by linear fractional transformation (LFT). The design method is to modify D-K iteration by combining the double homotopy approach to search the decentralized controller and the D-K iteration approach to consider the uncertainties. The proposed method is validated numerically by a four-story structure with two actuators.

2. Problem Formulation

For an degree-of-freedom (DOF) shear-frame civil structure instrumented with control devices, the equations of motion can be formulated as

where is the displacement vector relative to the ground; the mass, damping, and stiffness constant matrices are denoted by , and , respectively; and are the external excitation vector and its location matrix, respectively; and are the control force vector and its location matrix, respectively. If the external excitation is unidirectional earthquake acceleration , the excitation location matrix . However, when there are some uncertainties in these structural parameters, such as mass, damping, and stiffness, the matrices , , and in (1) can be formulated as

where , , and can be recognized as the structural parameters with uncertainties; , , and are the nominal value part of , , and , respectively; , , and are the matrices to describe the worst uncertainties; , , and are the norm bounded matrices, whose entry values are perturbed. For example, when the DOF , there are 10%, 20%, and 30% uncertainties in the mass, damping, and stiffness, respectively. It can be derived that , , , and . It is obvious that , , and are constant matrices with given values, which can be recognized as the part of nominal system. And , , and are the uncertainties due to their perturbation. In the state-space representation or the dynamic equation solving process, the mass matrix is always used in its inverse version. Equations (2a), (2b), and (2c) can be deduced as

It should be noted that the absolute values of the perturbed uncertainties , , and are smaller than the values of , , and . So cannot be zero matrix, which means that the matrix is invertible. According to the linear fractional transformations (LFTs) in the chapter 9 of [26], (3a), (3b), and (3c) have the similar format to the upper LFT formulation and can be described as in Figures 1(a)–1(c).

(a)

(b)

(c)

(d)

Figure 1: Diagram of upper LFTs for , , and .

From the upper LFTs, the parameter uncertainties can be extracted from the dynamic equation of the civil structure as shown in Figure 1(d). is the diagonal combination of , , and :

denotes the augmented system and can be represented in state-space:

where is the system state vector; denotes the input vector of the uncertainties; is the system response output vector; is the system measurement output vector; is the output vector of the uncertainties. The values for the matrices in the third and fourth expressions of (5) will be determined according to the response output and measurement . Other matrices in (5) can be derived as

To facilitate the decentralized feedback formulation, the structural state vector in (5) can be organized as

The continuous-time system can be discretized to discrete-time system using sampling time through zero-order hold criteria [27]:

where , , , and are given as

To consider the feedback time delay, an auxiliary LTI (linear time-invariant) system to describe the time delay can be concatenated to the structural system. The structural system in (8) is denoted by and the combined system is shown in Figure 2 [16].

Figure 2: Diagram of the structural control system.

As described in [16], through cascading the structural system and time delay system, the open-loop system in Figure 2 can be formulated as

where is the open-loop system state vector, which contains structural system state vector, , and time-delay system state vector, . is the sensor measurement with time delay. The controller system in Figure 2, which is described as (11), should be designed to complete the feedback loop and reduce the response output :

where is the controller state vector; , , , and are the constant matrices of the controller, whose values should be determined through the controller design.

3. Robust Decentralized Controller Design considering Parametric Uncertainties in Discrete Time

This section first introduces the decentralized controller design scheme for the open-loop system (10) through double homotopy approach. Then D-K method in synthesis is invoked to design a robust controller considering the structural parametric uncertainties. Finally, this paper combines the double homotopy approach and the D-K method to design a robust decentralized controller for the uncertain structures.

3.1. Decentralized Controller

An controller is considered to be designed for the open-loop system (10). Take controller system in (11) into the open-loop system in (10) to shape the closed-loop system as shown in Figure 2. The closed-loop system can be formulated as (12) after assuming without the loss of generality [28]:

where symbol CL denotes the closed-loop system from to ; the matrices of the closed-loop system , , ,  and are denoted as

The unknown notations in (13) are defined as

where are the notations of the open-loop system in (10). According to bounded real lemma in discrete time, an controller can be designed to make the closed-loop system (12) stable and its norm smaller than a given scalar if and only if there exists a symmetric positive definite matrix such that the following matrix inequality holds [29]:

where () denotes the terms induced by symmetry. For the centralized controller, the inequality (15) is equivalent to a series of linear matrix inequalities according the projection lemma [28]. For the decentralized control, the controller system in (11) can be divided into multiple subcontrollers that are independent from each other. Each subcontroller only needs part of sensor measurement data as input and generates only part of control forces as output:

Therefore, the controller matrices in (11) have diagonal block pattern as the following:

As discussed in [16], when the controller matrix in (14) has the sparse pattern as (17), (15) is bilinear matrix inequality problem (BMI). It is not a convex problem and cannot be solved by general off-the-shelf numerical package or algorithm. The cone complementarity linearization algorithm is available to solve the BMI problem in the static output feedback controller design process [30–33]. Qu et al. [19] proposed a time-delayed dynamic output feedback decentralized controller design scheme through a double homotopy approach. The BMI is approximately linearized as a linear matrix inequality, which can be solved by some LMI solvers. This approach is employed to solve (15) and introduced briefly as follows.

The double homotopy algorithm approximates BMI to linear matrix inequality (LMI) that can be easily conducted [28]. After initializing a controller without the constraint for the sparse pattern of the controller matrices, the algorithm gradually changes the diagonal-block entries. At the same time, the off-diagonal-block entries are transformed to zero along the homotopy steps. The initials and are set to the centralized controller matrix and coexisting :

where is the block diagonal part of that has the same sparse pattern as the desired decentralized controller matrix; represents the off-diagonal blocks with the satisfaction of (18a). At the th homotopy step (), and can be described as follows:

Equations (19a), (19b), and (19c) with (18a) and (18b) can be taken into (15). The entry parts with the multiplication of and can be neglected because they are much smaller than other parts. Omitting the derivation, (15) can be approximated to

where

Equation (20) is an LMI and can be solved easily [28, 34]. After and are solved from (20), they will be taken back into (19a), (19b), and (19c) to construct for the next homotopy step. When , the is the desired decentralized controller. It should be noted that the double homotopy approach cannot guarantee convergence. If there is a convergent solution, it may be a local optimization. If not, it does not mean that there is no desired decentralized controller.

It is should be pointed out that the decentralized controller stabilizes the closed-loop system and makes the norm of the transfer function from to smaller than . It is consistent with small gain theorem described as Figure 3(a).

(a)

(b)

Figure 3: Diagram of the closed-loop system with parametric uncertainties.

As shown in Figure 3,   is the fictitious unstructured uncertainty which is supposed to be existing between the response output vector and the excitation input vector . The norm of can be determined according to the transfer function CL(s) and the weighting function of output that is adjusted during designing the controller . is the parametric uncertain matrix in (4). Symbol CL denotes the closed-loop transfer function from to . is the diagonal combination of and , which is expressed as

According to the small gain theorem, the closed-loop system is internally stable for all with

Obviously, cannot explain how large the norm of the transfer function is, which is the combination of the uncertainties and the closed-loop system CL as the system from to shown in Figure 3(b). Moreover, in (23a) and (23b) is norm-bounded without consideration of the block diagonal structure of in (22) and in (4). It will be conservative for the designed controller. So the small gain theorem is not suitable for the controller design.

3.2. Parametric Uncertainties

To consider the block diagonal structure of , the definition of the structured singular value in the synthesis theory should be introduced first [35]. The structured singular value for the closed-loop system CL is defined as

where is named as the structured singular value of the closed-loop system CL; det is the abbreviation of determinant; is the largest singular value of . The poles with of the transfer function are the zeros of . The system is stable if and only if there is no zero of . The system CL is stable. So the expression “” means that the uncertainty destabilizes the closed-loop system CL. Apparently, the larger the largest singular value of the uncertainty is, the more hardly the stability of the system is guaranteed. It is only needed to choose a minimum structured singular value of such that is unstable, which is the meaning for the denominator of (24). The structured singular value of the closed-loop system CL is the reciprocal of the minimized . Obviously, in (24) is not norm-bounded and its diagonal block structure can be considered. If the system CL is internally stable and , according to Theorem in [35], the following two inequalities are equivalent:

It means that if there is an controller to make the structured singular value with the uncertainties , then the norm of the uncertain system . An apparent method is to use instead of to design a robust controller. Unfortunately, there is no available method to calculate . An approximation method of is motivated by the following inequality [35]:

where means that the values for two sides of (26a) are changing along the frequency ; inf is the abbreviation of infimum; CL is the closed-loop system as above and contains open loop system named OL and controller , which can be written as CL(OL, ) as described in (26b); and combine a sequence of transfer functions and identity matrix diagonally and are denoted as

From (26a), the value of the expression in the right side is the upper bound of . If the triple matrix variables , , and K are chosen appropriately, the difference between and can be minimized. So can be used to be calculated instead of . The problem for designing a robust controller is transferred to solve the optimal problem as the expression in (26b). In order to approximate more precisely, the triple matrix variables , , and in CL should be decided appropriately. It is not a convex problem for (26b) because the triple matrix variables multiply together. One possible way is to calculate , , and separately. For the given scaling matrices and , (26b) is turned to a standard optimization issue, which can be solved by LMI solvers or DGKF solvers. On the other hand, for a fixed , (26b) is a convex optimization problem at each frequency point . A sequence of and can be optimized by solving (26b) at each frequency point. Through curve fitting for the sequence of and , the rational transfer function matrices and can be approximated, respectively. Then the controller can be recalculated by fixing the new and in the next iteration. This procedure is called D-K iteration. However, there is no guarantee that D-K iteration can converge to a global minimum due to the nonconvex nature of the D-K iteration.

3.3. Decentralized Controller for Structural Parametric Uncertainties

Motivated by the above methods, this paper combines the double homotopy method and the D-K iteration method together to design a robust decentralized controller with the consideration of the structural parametric uncertainties. From the expression in (26b), the open-loop system OL multiplied by and can be written as

where OLnew is the new open-loop system, whose system matrices in (14) can be rewritten as

After defining the new open-loop system, a new centralized controller is designed for the new open-loop system in (28) according to the bounded real lemma, which is a convex optimization problem. Then and in (18a) and (18b) are then split from the new . The new matrices in (29) can be taken into (20) to solve the variable . would be constructed for the next step to compute in (20) by taking into (19a), (19b), and (19c). The decentralized controller for the new open-loop system can be solved gradually. The new pairs of and can be got by fixing the computed new decentralized controller in (26b). So another new open loop system can be formed to replace the previous “new” open loop by (28), and then the iterations for solving decentralized controller for the new open-loop system can be started, that is the procedure to design the robust decentralized controller for the uncertain system. In other words, the idea is to replace the centralized controller design when and are fixed in D-K iteration by the decentralized controller design schemes. It is a modified D-K iteration method. The proposed process is summarized as follows.

Step 1. Start with initials and , usually set .

Step 2. Construct a new open-loop system as (28) and replace OL with OLnew.

Step 3. Fix and , and solve the decentralized controller through double homotopy approach (see Figure 4).

Figure 4

Step 4. Fix the computed decentralized controller , and solve the convex optimization problem in (26b) for and at each frequency point . Then in (27a) and (27b) will be obtained.

Step 5. Fit the values of the sequence of to get the rational transfer function . Then construct the new matrices and as (27a).

Step 6. Compare and by curve fitting at each frequency point with and of the previous D-K iteration, respectively. If they are close, the iteration can be stopped, otherwise, replace and with and and return to Step 2.

It should be noted that the double homotopy method would cost a lot of time to compute the decentralized controller. When this method is integrated into D-K iteration, it would be executed once at each D-K iteration procedure. The computation time may be very large.

4. Numerical Example

This section investigates the influence of the parametric uncertainties on the structural decentralized control performance. Then the performance comparisons are made between the decentralized controller designed by small gain theorem and the proposed modified D-K iteration for the structures with the parametric uncertainties. The numerical model is a four-story structure instrumented with two actuators as shown in Figure 5(a) [23].

(a)

(b)

Figure 5: A four-story model structure.

The nominal values of the structure parameters are  kg,  N·s/m, and  N/m. The mass, damping, and stiffness for each floor are shown in Figure 5(a). The nominal values for the structural parametric matrices are denoted as

In this numerical example, only the stiffness uncertainties are considered the worst case of which is assumed as

According to (2c), it can be derived that , . The 1940 El Centro NS earthquake record is adopted as the ground excitation . The peak ground acceleration is scaled to be 9.8 m/s². The excitation location matrix and the control force location matrix in (1) are shown as follows:

The structural measurement outputs in (5) are the interstory drifts as described in (33a). The response outputs in (5) are the combination of the interstory drifts and control forces with different weightings denoted by

To design the decentralized controllers, three different cases represented by different degrees of centralization (DC) are set and shown in Figure 5(b). DC1 means that each sub-controller system only needs two neighbouring floor measurements and generates one control force. Each sub-controller system in DC2 covers three floor measurements and generates one control force. For case DC3, the controller system covers all four floor measurements and generates two control forces, which is obviously the centralized controller. In practical implementation, the data transmitting and the embedded controller computing can cost time and result in time delay in the feedback loop. In this study, the continuous structural system is discretized by the sampling period that is determined by the cost time. The time delay is assumed to be equal to one sampling period. Obviously, a larger number of DC indicates that more time is required for the transmitting and computing. The sampling time or the delayed time from DC1 to DC3 is listed in Table 1.

Table 1: Feedback time delay and sampling period for four three DCs (unit: ms).

DC1
DC2
DC3

15
20
40

To describe the following comparison simply, the comparing cases are first listed in Table 2 and explained in the following figure comparisons.

Table 2: Notations for different comparing cases.

Without control
Decentralized control
Centralized control

Nominal structure
Bare
DC1nom
DC2nom
DC3nom

Uncertain structure

    Controller designed by small gain theorem
Bareun
DC1un
DC2un
DC3un

    Controller designed by the proposed

    modified D-K iteration
Bareun
DCDK1
DCDK2
DCDK3

In this numerical example, the uncertainties are the stiffness uncertainties that are the worst case in (31) and reduce the stiffness of the nominal structural system. The decentralized controllers can be designed for the uncertain structural system through the double homotopy approach by the small gain theorem, which use Step 3 in the modified D-K iteration with the setting . When the designed decentralized controllers are used in the nominal structural system, the comparison is shown in Figure 6(a). The solid line named Bare is the nominal structural response without control, and DC1nom, DC2nom, and DC3nom represent that the decentralized and centralized controllers are designed by small gain theorem and used in nominal system as denoted in Table 2. From Figure 6(a), the three controllers can reduce the bare structural response comparing with the solid line. DC1nom has the better control performance than DC2 nom, and DC3nom has the worst. Obviously, the decentralized controllers have a better work than the centralized controller. Furthermore, it can be concluded that the longer the delayed time is, the worse the performance of the decentralized controller has.

(a)

(b)

Figure 6: Simulation results for decentralized control without consideration of structural parametric uncertainties.

The decentralized controllers designed by small gain theorem but used in the uncertain structure are denoted as DC1un, DC2un, and DC3un in Table 2. The performance of these controllers would be influenced extremely by the uncertainties as shown in Figure 6(b). The solid line named Bareun is the uncertain structural response without control. DC1un, DC2un, and DC3un in Figure 6(b) have worse performance than that in Figure 6(a). Furthermore, DC2un in Figure 6(b) enlarges the response at the third story. It can be concluded that the decentralized controllers designed by the small gain theorem are conservative, because the controller design scheme through the small gain theorem cannot consider the diagonal structure of the uncertainties, even though, there are only stiffness uncertainties in this numerical example. It should be noted that the uncertainties from the output to input of the closed-loop can be supposed as the notation in (22), which can compose the block diagonal structured uncertainties as described in (22).

Through the modified D-K iteration method with the combination of D-K iteration and double homotopy approach, which is proposed in the previous section, the decentralized controllers are designed for the uncertain structures and denoted as DCDK1, DCDK2, and DCDK3 in Table 2. The computation time to solve the robust decentralized controllers are listed in Table 3.

Table 3: Computation time to solve robust controllers for three different DCs (unit: ms).

DC1
DC2
DC3

1 d 23 hr 8 min 59 s
17 hr 30 min 10 s
36 s

From Table 3, it demonstrates that the higher level of centralization results in the less time cost to search the robust controller. The comparison of the interstory drift peak values is shown in Figure 7(a). The relationship between DCDK1, DCDK2, and DCDK3 is similar with that in Figure 6(a). DCDK1 has the best performance, while DCDK3 has the worst due to the longest delayed time. To make the comparison clearly between the decentralized controllers designed by the small gain theorem and the proposed combined method, each DC is compared separately in Figures 7(b), 7(c), and 7(d). The three figures have the similar trend. Figure 7(c) can be taken for an example. When there exist stiffness uncertainties in the structure, the performance for DC2un is worse than that for DC2nom. And sometimes the designed controller by small gain theorem may enlarge the response of the uncertain structure, which can be seen from the comparison from DC2un and Bareun. DCDK2 is the decentralized controller designed by the proposed method, which has better robust performance than DC2un. For the comparisons in Figures 7(b) and 7(d), the performance of the controllers DC1un and DC3un which are designed by small gain theorem, is worse than the performance of DC1nom and DC3nom, but not so much. It illustrates that a robust controller can be designed based on the small gain theorem. However, the comparisons with the DCDK1 and DCDK3 demonstrates that the decentralized controllers designed by the proposed method can contain more robustness than these designed by small gain theorem.

(a)

(b)

(c)

(d)

Figure 7: Simulation results for decentralized control with and without consideration of structured parametric uncertainties.

Beside the comparisons in time domain, the controller performance can be checked in frequency domain as shown in Figure 8. Figure 8(a) illustrates the norm comparison for the closed-loop system with the decentralized controller DC1 in (14). The closed-loop systems with DC1un and DCDK1 have the similar norm valued about 1.25. When considering the structure of uncertainties, the structured singular values in (24) have been compared as shown in Figure 8(b). Their values are smaller than their norm, respectively; that is, for DC1un and for DCDK1. The reason is that synthesis as describe in the second part of the last section can consider the uncertain structure but norm cannot. It should be noted that norm is used in small gain theorem and more conservative than value. Another important view can be concluded from the comparison of DCDK1 between Figures 8(a) and 8(b). The norm of the closed-loop with DCDK1 is 1.2751, which means that if using the optimization to analyses the system stability, the norm of the uncertainties that can be tolerated is smaller than . On the other hand, the value for the system with DCDK1 is 0.6793, and the system stability is preserved for . It illustrates that the same closed-loop systems with the same controllers have different stabilities due to using different criteria to analyses the system performance. Figures 8(c) and 8(d) have the same trend with Figures 8(a) and 8(b). The norm of the system with DC2un in Figure 8(c) is 1.4760 and the value of the system with DCDK2 is 0.5925 in Figure 8(d), whose value distance between 1.4760 (DC2un) and 0.5925 (DCDK2) is larger than that in Figures 8(a) and 8(b), the value distance between 1.25 (DC1un) and 0.6793 (DCDK1). So that is the reason why the response differences are more obvious in time domain between DC2un and DCDK2 in Figure 7(c) than that between DC1un and DCDK1 in Figure 7(b).

(a)

(b)

(c)

(d)

Figure 8: Comparisons of norm and values between decentralized controllers designed for nominal and uncertain systems.

From the comparisons in frequency domain, the controllers designed by the proposed method can contain more robustness than these designed by the small gain theorem. Because the former uses the singular value concept, and the latter takes the criterion that cannot consider the diagonal block structure of the uncertainties.

5. Conclusions

This paper presents a robust decentralized controller design method for the civil structures with the parametric uncertainties. The parametric uncertainties are first extracted from the civil structural model by LFT. The controller design architecture with parametric uncertainties and time delay is then modeled in discrete time. The double homotopy method to design a decentralized controller for the structure without uncertainties and the D-K iteration method to design a centralized controller for the structure with parametric uncertainties are introduced, respectively. Finally, the schemes to design the robust decentralized controller considering parametric uncertainties are proposed, which modified the D-K iteration by combining the double homotopy approach and D-K iteration method.

The controller performance is validated through a four-story numerical example. The centralized and decentralized controllers designed by small gain theorem and used in the nominal system have good performance to reduce the structural vibration. The larger the delayed time is, the worse the controller performance is (e.g., the comparison between DC1nom, DC2nom, and DC3nom). If the designed controllers by small gain theorem are used in uncertain system, the decentralized controllers will have worse control performance and even enlarge the structural response as described as DC1un, DC2un, and DC3un. Through the proposed controller design schemes, they have more robust control performance. DCDK1, DCDK2, and DCDK3 have better performance than DC1un, DC2un, and DC3un, respectively.

It is noted that the computation time of the proposed method deserves to be reduced. The method to solve the BMI problem should be investigated further more. The effectiveness should be validated by some experiments. All these problems are the future works.

Conflict of Interests

The authors declare that there is no conflict of interests regarding the publication of this paper.

Acknowledgments

The authors are grateful for the support of National Key Basic Research and Development Program (973 Program) (Grant no. 2011CB013605) and National Natural Science Foundation of China (Grant nos. 51261120375, 51121005), and they also appreciate technical support from Structural Health Monitoring and Control Lab in Faculty of Infrastructure Engineering, Dalian University of Technology. The authors also appreciate Dr. Yang Wang of the Department of Civil and Environmental Engineering at Georgia Institute of Technology for the insightful opinions about the decentralized control.

References

H. Adeli and H. Kim, “Wavelet-hybrid feedback-least mean square algorithm for robust control of structures,” Journal of Structural Engineering, vol. 130, no. 1, pp. 128–137, 2004.

J. Kang, H.-S. Kim, and D.-G. Lee, “Mitigation of wind response of a tall building using semi-active tuned mass dampers,” The Structural Design of Tall and Special Buildings, vol. 20, no. 5, pp. 552–565, 2011.

Y. Kim, S. Hurlebaus, and R. Langari, “Model-based multi-input, multi-output supervisory semi-active nonlinear fuzzy controller,” Computer-Aided Civil and Infrastructure Engineering, vol. 25, no. 5, pp. 387–393, 2010.

C.-C. Lin, C.-L. Chen, and J.-F. Wang, “Vibration control of structures with initially accelerated passive tuned mass dampers under near-fault earthquake excitation,” Computer-Aided Civil and Infrastructure Engineering, vol. 25, no. 1, pp. 69–75, 2010.

Y. Ribakov and G. Agranovich, “Control of structural seismic response by a limited set of active dampers,” The Structural Design of Tall and Special Buildings, vol. 20, no. 5, pp. 594–611, 2011.

B. F. Spencer Jr. and S. Nagarajaiah, “State of the art of structural control,” Journal of Structural Engineering, vol. 129, no. 7, pp. 845–856, 2003.

J. Y. Xu, J. Tang, and Q. S. Li, “Semi-active control devices in structural control implementation,” The Structural Design of Tall and Special Buildings, vol. 14, no. 2, pp. 165–174, 2005.

N. R. Sandell Jr., P. Varaiya, M. Athans, and M. G. Safonov, “Survey of decentralized control methods for large scale systems,” IEEE Transactions on Automatic Control, vol. AC-23, no. 2, pp. 108–128, 1978.

D. D. Siljak, Decentralized Control of Complex Systems, Academic Press, Boston, Mass, USA, 1991.

J. Qiu, G. Feng, and J. Yang, “A new design of delay-dependent robust H∞ filtering for discrete-time T-S fuzzy systems with time-varying delay,” IEEE Transactions on Fuzzy Systems, vol. 17, no. 5, pp. 1044–1058, 2009.

J. Qiu, G. Feng, and H. Gao, “Fuzzy-model-based piecewise ℋ ∞ static-output-feedback controller design for networked nonlinear systems,” IEEE Transactions on Fuzzy Systems, vol. 18, no. 5, pp. 919–934, 2010.

Y. Wei, J. Qiu, H. Reza Karimi, and M. Wang, “A new design of H∞ filtering for continuous-time Markovian jump systems with time-varying delay and partially accessible mode information,” Signal Processing, vol. 93, pp. 2392–2407, 2013.

J. P. Lynch and K. H. Law, “Decentralized control techniques for large scale civil structural systems,” in Proceedings of the 20th International Modal Analysis Conference, Los Angeles, Calif, USA, 2002.

C.-H. Loh and C.-M. Chang, “Application of centralized and decentralized control to building structure: analytical study,” Journal of Engineering Mechanics, vol. 134, no. 11, pp. 970–982, 2008.

B. Labibi, H. J. Marquez, and T. Chen, “LMI optimization approach to robust decentralized controller design,” International Journal of Robust and Nonlinear Control, vol. 21, no. 8, pp. 904–924, 2011.

Y. Wang, “Time-delayed dynamic output feedback H∞ controller design for civil structures: a decentralized approach through homotopic transformation,” Structural Control and Health Monitoring, vol. 18, no. 2, pp. 121–139, 2011.

Y. Wang, K. H. Law, and S. Lall, “Time-delayed decentralized H∞ controller design for civil structures: a homotopy method through linear matrix inequalities,” in Proceedings of the American Control Conference (ACC '09), pp. 4549–4556, St. Louis, Mo, USA, June 2009.

C. S. Mehendale and K. M. Grigoriadis, “A double homotopy method for decentralised control design,” International Journal of Control, vol. 81, no. 10, pp. 1600–1608, 2008.

C. Qu, L. Huo, H. Li, and Y. Wang, “A double homotopy approach for decentralized H∞ control of civil structures,” Structural Control and Health Monitoring, 2013.

S. Yin, S. X. Ding, A. Haghani, H. Hao, and P. Zhang, “A comparison study of basic data-driven fault diagnosis and process monitoring methods on the benchmark Tennessee Eastman process,” Journal of Process Control, vol. 22, pp. 1567–1581, 2012.

S. Yin, H. Luo, and S. X. Ding, “Real-time implementation of fault-tolerant control systems with performance optimization,” IEEE Transactions on Industrial Electronics, vol. 61, pp. 2402–2411, 2013.

S.-G. Wang, L. S. Shieh, and J. W. Sunkel, “Robust optimal pole-clustering in a vertical strip and disturbance rejection for uncertain Lagrange's systems,” Dynamics and Control, vol. 5, no. 3, pp. 295–312, 1995.

S.-G. Wang, P. N. Roschke, and H. Y. Yeh, “Robust control for structural systems with unstructured uncertainties,” Journal of Engineering Mechanics, vol. 130, no. 3, pp. 337–346, 2004.

P. M. Young, “Structured singular value approach for systems with parametric uncertainty,” International Journal of Robust and Nonlinear Control, vol. 11, no. 7, pp. 653–680, 2001.

C. P. Moreno and P. Thomson, “Design of an optimal tuned mass damper for a system with parametric uncertainty,” Annals of Operations Research, vol. 181, no. 1, pp. 783–793, 2010.

K. Zhou and J. C. Doyle, Essentials of Robust Control, Prentice Hall, Upper Saddle River, NJ, USA, 1998.

G. F. Franklin, J. D. Powell, and M. L. Workman, Digital Control of Dynamic Systems, Addison-Wesley, Menlo Park, Calif, USA, 3rd edition, 1998.

P. Gahinet and P. Apkarian, “A linear matrix inequality approach to H∞ control,” International Journal of Robust and Nonlinear Control, vol. 4, no. 4, pp. 421–448, 1994.

Y. Wang, R. A. Swartz, J. P. Lynch, K. H. Law, K.-C. Lu, and C.-H. Loh, “Decentralized civil structural control using real-time wireless sensing and embedded computing,” Smart Structures and Systems, vol. 3, no. 3, pp. 321–340, 2007.

H. Zhang, Y. Shi, and A. Saadat Mehr, “Robust non-fragile dynamic vibration absorbers with uncertain factors,” Journal of Sound and Vibration, vol. 330, no. 4, pp. 559–566, 2011.

H. Zhang, Y. Shi, and A. S. Mehr, “Robust H∞ PID control for multivariable networked control systems with disturbance/noise attenuation,” International Journal of Robust and Nonlinear Control, vol. 22, no. 2, pp. 183–204, 2012.

L. El Ghaoui, F. Oustry, and M. AitRami, “A cone complementarity linearization algorithm for static output-feedback and related problems,” IEEE Transactions on Automatic Control, vol. 42, no. 8, pp. 1171–1176, 1997.

H. Zhang, Y. Shi, and J. Wang, “Observer-based tracking controller design for networked predictive control systems with uncertain Markov delays,” International Journal of Control, vol. 86, pp. 1824–1836, 2013.

R. Y. Chiang and M. G. Safonov, MATLAB Robust Control Toolbox, The MathWorks, Natick, Mass, USA, 2nd edition, 1998.

U. Mackenroth, Robust Control Systems: Theory and Case Studies, Springer, Berlin, Germany, 2004.