Mathematical Problems in Engineering
Volume 2016 (2016), Article ID 5415809, 1 page
http://dx.doi.org/10.1155/2016/5415809

Retraction

Retracted: Dynamic Generation and Editing System for Wrongly Written Chinese Characters Font

Mathematical Problems in Engineering

Received 8 June 2016; Accepted 8 June 2016

Copyright © 2016 Mathematical Problems in Engineering. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

At the request of the authors, the article titled “Dynamic Generation and Editing System for Wrongly Written Chinese Characters Font” [1] has been retracted, as it was previously published as “Li Xiao and Li Qingsheng, ‘Dynamic Generation and Editing System for Wrongly Written Chinese Character Font,’ International Journal of Multimedia and Ubiquitous Engineering, Vol. 10(9), 31–40, 2015.”

References

Q. Li and X. Li, “Dynamic generation and editing system for wrongly written chinese characters font,” Mathematical Problems in Engineering, vol. 2015, Article ID 282408, 7 pages, 2015.