Mathematical Problems in Engineering
Volume 2017 (2017), Article ID 6461591, 1 page
https://doi.org/10.1155/2017/6461591

Corrigendum

Corrigendum to “A New Biobjective Model to Optimize Integrated Redundancy Allocation and Reliability-Centered Maintenance Problems in a System Using Metaheuristics”

Shima MohammadZadeh Dogahe¹ and Seyed Jafar Sadjadi²

¹Department of Industrial Engineering, Islamic Azad University, Science and Research Branch, Hesarak, Tehran 1477893855, Iran
²Center of Excellence in Advanced Manufacturing and Optimization, School of Industrial Engineering, Iran University of Science and Technology, Tehran, Iran

Correspondence should be addressed to Seyed Jafar Sadjadi; sjsadjadi@iust.ac.ir

Received 31 January 2017; Accepted 1 March 2017; Published 9 April 2017

Copyright © 2017 Shima MohammadZadeh Dogahe and Seyed Jafar Sadjadi. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “A New Biobjective Model to Optimize Integrated Redundancy Allocation and Reliability-Centered Maintenance Problems in a System Using Metaheuristics” [1], Dr. Shima MohammadZadeh Dogahe was incorrectly listed as the corresponding author. The corresponding author is Dr. Seyed Jafar Sadjadi.

References

S. M. Dogahe and S. J. Sadjadi, “A new biobjective model to optimize integrated redundancy allocation and reliability-centered maintenance problems in a system using metaheuristics,” Mathematical Problems in Engineering, vol. 2015, Article ID 396864, 16 pages, 2015.