Mathematical Problems in Engineering
Volume 2018 (2018), Article ID 4036854, 1 page
https://doi.org/10.1155/2018/4036854

Corrigendum

Corrigendum #2 to “On Synergistic Integration of Adaptive Dithering Based Internal Model Control for Hysteresis Compensation in Piezoactuated Nanopositioner”

Saikat Kumar Shome,¹ Mangal Prakash,² Sourav Pradhan,² and Arpita Mukherjee¹

¹Academy of Scientific and Innovative Research (AcSIR), CSIR Central Mechanical Engineering Research Institute (CSIR-CMERI) Campus, Durgapur, India
²Department of Electrical Engineering, University of Minnesota, Minneapolis, MN 55455, USA

Correspondence should be addressed to Saikat Kumar Shome; saikatkumarshome@gmail.com

Received 27 May 2018; Accepted 29 May 2018; Published 8 July 2018

Copyright © 2018 Saikat Kumar Shome et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “On Synergistic Integration of Adaptive Dithering Based Internal Model Control for Hysteresis Compensation in Piezoactuated Nanopositioner” [1], the method description in Section is to be elaborated. The actuator used in the research refers to packaged/preloaded type piezoelectric actuator of Physik Instrumente, and the maker of the cRIO-9073 system is National Instruments.

References

S. K. Shome, M. Prakash, S. Pradhan, and A. Mukherjee, “On synergistic integration of adaptive dithering based internal model control for hysteresis compensation in piezoactuated nanopositioner,” Mathematical Problems in Engineering, vol. 2015, Article ID 365141, 19 pages, 2015.