Mathematical Problems in Engineering
Volume 2019 (2019), Article ID 1439131, 1 page
https://doi.org/10.1155/2019/1439131

Erratum

Erratum to “An ADRC Method for Noncascaded Integral Systems Based on Algebraic Substitution Method and Its Structure”

Zhijian Huang,1,2 Yudong Li,¹ Yihua Liu,¹ Bowen Sui,¹ and Guichen Zhang¹

¹Lab of Intelligent Control and Computation, Shanghai Maritime University, Shanghai 201306, China
²Department of Electrical, Computer, and Biomedical Engineering, University of Rhode Island, Kingston, RI 02881, USA

Correspondence should be addressed to Zhijian Huang; zjhuang@shmtu.edu.cn

Received 4 July 2019; Accepted 7 July 2019; Published 15 July 2019

Copyright © 2019 Zhijian Huang et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “An ADRC Method for Noncascaded Integral Systems Based on Algebraic Substitution Method and Its Structure” [1], there was an error in the name format of the fourth author as it should be “Bowen Sui” instead of “Wenbo Sui”. The corrected name format is shown above.

References

Z. Huang, Y. Li, Y. Liu, W. Sui, and G. Zhang, “An ADRC method for noncascaded integral systems based on algebraic substitution method and its structure,” Mathematical Problems in Engineering, vol. 2018, Article ID 3905879, 10 pages, 2018.