Mathematical Problems in Engineering
Volume 2020 (2020), Article ID 9374098, 1 page
https://doi.org/10.1155/2020/9374098

Corrigendum

Corrigendum to “Finite Element Simulation of Oil and Gas Reservoir In Situ Stress Based on a 3D Corner-point Grid Model”

Yuyang Liu,1,2,3 Shiqi Liu,1,2,3 and Mao Pan1,2,3

¹School of Earth and Space Science, Peking University, Beijing 100871, China
²The Key Laboratory of Orogenic Belts and Crustal Evolution (MOE), Peking University, Beijing 100871, China
³Institute of Oil & Gas, Peking University, Beijing 100871, China

Correspondence should be addressed to Yuyang Liu; yuyang.liu@pku.edu.cn and Mao Pan; panmao@pku.edu.cn

Received 5 August 2020; Accepted 6 August 2020; Published 18 September 2020

Copyright © 2020 Yuyang Liu et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Finite Element Simulation of Oil and Gas Reservoir In Situ Stress Based on a 3D Corner-point Grid Model” [1], information was omitted in the Acknowledgments section. The corrected section appears as follows:

Acknowledgments

This work was funded by Major National Science and Technology Projects of China (no. 2017ZX05013-002-002), Research Institute of Exploration and Development of Changqing Oil-field Corporation of Petrochina (no. 2019-22040), and Research Institute of Exploration and Development of Petrochina (no. RIPED.CN-2018-JS-105). The authors express their sincere gratitude to Springer Nature Author Services, who provided linguistic assistance. This paper is based on work by Yuyang et al. (2019) in Acta Scientiarum Naturalium Universitatis Pekinensis.

References

L. Yuyang, L. Shiqi, and P. Mao, “Finite element simulation of oil and gas reservoir in situ stress based on a 3d corner-point grid model,” Mathematical Problems in Engineering, vol. 2020, Article ID 7384085, p. 14, 2020.