Mathematical Problems in Engineering
Volume 2020 (2020), Article ID 9653058, 1 page
https://doi.org/10.1155/2020/9653058

Corrigendum

Corrigendum to “Mathematical Analysis of Heat Transfer in Peristaltic Transport through a Rough Nonuniform Inclined Channel”

R. Shukla,¹ A. Medhavi,¹ S. S. Bhatt,² and R. Kumar³

¹Department of Mechanical Engineering, Kamla Nehru Institute of Technology, Sultanpur, India
²Independent Researcher, India
³B. N. College of Engineering and Technology, Lucknow, India

Correspondence should be addressed to S. S. Bhatt; shankarbhatt56@gmail.com

Received 10 September 2020; Accepted 10 September 2020; Published 30 September 2020

Copyright © 2020 R. Shukla et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Mathematical Analysis of Heat Transfer in Peristaltic Transport through a Rough Nonuniform Inclined Channel” [1], an incorrect affiliation was given for S. S. Bhatt. The corrected author list is shown above.

References

R. Shukla, A. Medhavi, S. S. Bhatt, and R. Kumar, “Mathematical analysis of heat transfer in peristaltic transport through a rough nonuniform inclined channel,” Mathematical Problems in Engineering, vol. 2020, Article ID 4715082, 16 pages, 2020.