Neural Plasticity
Volume 2019 (2019), Article ID 5181649, 1 page
https://doi.org/10.1155/2019/5181649

Erratum

Erratum to “The Role of fMRI in the Assessment of Neuroplasticity in MS: A Systematic Review”

Laura De Giglio,1,2 Silvia Tommasin,¹ Nikolaos Petsas,³ and Patrizia Pantano1,3

¹Department of Human Neurosciences, Sapienza University of Rome, Rome, Italy
²Multiple Sclerosis Centre, Sant’Andrea Hospital, Sapienza University of Rome, Rome, Italy
³IRCCS NEUROMED, Pozzilli, Italy

Correspondence should be addressed to Patrizia Pantano; patrizia.pantano@uniroma1.it

Received 8 May 2019; Accepted 14 May 2019; Published 3 June 2019

Copyright © 2019 Laura De Giglio et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “The Role of fMRI in the Assessment of Neuroplasticity in MS: A Systematic Review” [1], the authors’ names were reversed. The corrected author’s list is shown above.

References

D. G. Laura, T. Silvia, P. Nikolaos, and P. Patrizia, “The role of fMRI in the assessment of neuroplasticity in MS: a systematic review,” Neural Plasticity, vol. 2018, Article ID 3419871, 27 pages, 2018.