Obstetrics and Gynecology International
Volume 2018 (2018), Article ID 3725843, 1 page
https://doi.org/10.1155/2018/3725843

Corrigendum

Corrigendum to “Behaviour of the Foramen Ovale Flow in Fetuses with Intrauterine Growth Restriction”

Ângela R. L. Nader,¹ Paulo Zielinsky,1,2 Alexandre Antonio Naujorks,¹ Luiz Henrique S. Nicoloso,¹ Antonio Luiz Piccoli Junior,¹ Natássia Miranda Sulis,¹ Luiza Ferreira van der Sand,¹ Victoria de Bittencourt Antunes,¹ Gabriela dos Santos Marinho,¹ Fernanda Greinert dos Santos,¹ Natan Pereira Gosmann,³ Eduardo Becker Júnior,¹ Renato Frajndlich,¹ Tamara Beherens,¹ Marcelo Brandão da Silva,¹ Carolina Barbisan,¹ Stefano Busato,¹ Mauro Lopes,¹ and Caroline Klein¹

¹Unidade de Cardiologia Fetal, Instituto de Cardiologia do Rio Grande do Sul, Porto Alegre, RS, Brazil
²Departmento de Pediatria, Universidade Federal do Rio Grande do Sul (UFRGS), Porto Alegre, RS, Brazil
³Hospital de Clinicas de Porto Alegre, Porto Alegre, RS, Brazil

Correspondence should be addressed to Paulo Zielinsky; zielinsky@cardiol.br

Received 8 March 2018; Accepted 11 March 2018; Published 22 July 2018

Copyright © 2018 Ângela R. L. Nader et al. This is an open access article distributed under the Creative Commons Attribution License, which permits unrestricted use, distribution, and reproduction in any medium, provided the original work is properly cited.

In the article titled “Behaviour of the Foramen Ovale Flow in Fetuses with Intrauterine Growth Restriction” [1], the name of sixteenth author was given incorrectly as Caroline Barbisan. The author’s name should have been written as Carolina Barbisan. The revised authors’ list is shown above.

References

Â. R. L. Nader, P. Zielinsky, A. A. Naujorks et al., “Behaviour of the foramen ovale flow in fetuses with intrauterine growth restriction,” Obstetrics and Gynecology International, vol. 2018, Article ID 1496903, 6 pages, 2018.